Mathematical Problems in Engineering
Volume 2019 (2019), Article ID 4704986, 1 page
https://doi.org/10.1155/2019/4704986

Corrigendum

Corrigendum to “Full and Reduced-Order Unknown Input Observer Design for Linear Time-Delay Systems with Multiple Delays”

Seifeddine Ben Warrad,¹ Olfa Boubaker,¹ Mihai Lungu,² and Saleh Mobayen³

¹University of Carthage, National Institute of Applied Sciences and Technology, Centre Urbain Nord, BP 676, 1080 Tunis Cedex, Tunisia
²University of Craiova, Faculty of Electrical Engineering, 107 Decebal Blvd., Craiova, Romania
³Advanced Control Systems Laboratory, Department of Electrical Engineering, University of Zanjan, University Blvd., 45371-38791 Zanjan, Iran

Correspondence should be addressed to Olfa Boubaker; olfa.boubaker@insat.rnu.tn

Received 24 July 2019; Accepted 24 July 2019; Published 8 August 2019

Copyright © 2019 Seifeddine Ben Warrad et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Full and Reduced-Order Unknown Input Observer Design for Linear Time-Delay Systems with Multiple Delays [1],” there was an error in the first affiliation, where the name of the university was missing. The corrected affiliation is shown above.

References

S. Ben Warrad, O. Boubaker, M. Lungu, and S. Mobayen, “Full and reduced-order unknown input observer design for linear time-delay systems with multiple delays,” Mathematical Problems in Engineering, vol. 2018, Article ID 1745734, 13 pages, 2018.