Mathematical Problems in Engineering
Volume 2019 (2019), Article ID 4878134, 1 page
https://doi.org/10.1155/2019/4878134

Corrigendum

Corrigendum to “A Single-Stage Buck-Boost Three-Level Neutral-Point-Clamped Inverter with Two Input Sources for the Grid-Tied Photovoltaic Power Generation”

Xuefeng Ge,¹ Mengxing Chen,² Mingming Shi,¹ Qi Zhou,¹ Juan Li,¹ Di Huang,¹ Xiaodong Yuan,¹ and Yubo Yuan¹

¹State Grid Jiangsu Electric Power Co., Ltd. Research Institute, Nanjing, China
²The Department of Energy Technology, Aalborg University, Aalborg, Denmark

Correspondence should be addressed to Xuefeng Ge; gexuefeng.2008@163.com

Received 25 July 2019; Accepted 25 July 2019; Published 27 August 2019

Copyright © 2019 Xuefeng Ge et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Single-Stage Buck-Boost Three-Level Neutral-Point-Clamped Inverter with Two Input Sources for the Grid-Tied Photovoltaic Power Generation” [1], there was an error in the funding information. The Acknowledgments section should be updated as follows.

The research and publication of the article are funded by the Project of National Key Research and Development Plan (2017YFB0903300) and the Project of State Power Grid Corp “Research on State Perception and Analysis of Distribution Network Based on Internet of Things.”

References

X. Ge, M. Chen, M. Shi et al., “A single-stage buck-boost three-level neutral-point-clamped inverter with two input sources for the grid-tied photovoltaic power generation,” Mathematical Problems in Engineering, vol. 2019, Article ID 3238159, 15 pages, 2019.