Neural Plasticity

Volume 2012 (2012), Article ID 425818, 6 pages

doi:10.1155/2012/425818

Research Article

Calcium Imaging of Living Astrocytes in the Mouse Spinal Cord following Sensory Stimulation

Giovanni Cirillo, Daniele De Luca, and Michele Papa

Laboratorio di Morfologia delle Reti Neuronali, Dipartimento di Medicina Pubblica Clinica e Preventiva, Seconda Università di Napoli, 80100 Napoli, Italy

Received 25 July 2012; Accepted 2 September 2012

Academic Editor: Eduard Korkotian

Copyright © 2012 Giovanni Cirillo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Astrocytic Ca²⁺ dynamics have been extensively studied in ex vivo models; however, the recent development of two-photon microscopy and astrocyte-specific labeling has allowed the study of Ca²⁺ signaling in living central nervous system. Ca²⁺ waves in astrocytes have been described in cultured cells and slice preparations, but evidence for astrocytic activation during sensory activity is lacking. There are currently few methods to image living spinal cord: breathing and heart-beating artifacts have impeded the widespread application of this technique. We here imaged the living spinal cord by two-photon microscopy in C57BL6/J mice. Through pressurized injection, we specifically loaded spinal astrocytes using the red fluorescent dye sulforhodamine 101 (SR101) and imaged astrocytic Ca²⁺ levels with Oregon-Green BAPTA-1 (OGB). Then, we studied astrocytic Ca²⁺ levels at rest and after right electrical hind paw stimulation. Sensory stimulation significantly increased astrocytic Ca²⁺ levels within the superficial dorsal horn of the spinal cord compared to rest. In conclusion, in vivo morphofunctional imaging of living astrocytes in spinal cord revealed that astrocytes actively participate to sensory stimulation.

1. Introduction

Two-photon laser scanning microscopy represents one of the main techniques for high-resolution in vivo imaging of central nervous system (CNS) [1–4]. By this approach have been revealed new details of neuroglial dynamic interactions in either physiological and pathological conditions [5–9]. This has generated a yield of knowledge causing the full revision of our understanding of neuroglial network plasticity.

Astrocytes have been shown to play a key role in modulating neuroglial networks in the CNS [10–16] forming a structurally interconnected network functionally related to neurons. Ex vivo evidence has supported the astrocytic activation following neuronal activity, but it has never been established whether they respond to physiological activity in vivo [17].

Ca²⁺ oscillations occur spontaneously or in response to mechanical or electrical stimulation [18, 19]; few data have analyzed the astrocytic Ca²⁺ behavior during and after sensory processing. Cortical astrocytes have been extensively investigated [20, 21], but tools allowing imaging of glial cells in spinal cord in vivo are just emerging [22].

In this work, we have performed two-photon in vivo functional imaging of astrocytic Ca²⁺ dynamics in spinal cord. Pressurized injection of fluorescent dyes in the spinal cord specifically labeled astrocytes (red fluorescent sulforhodamine 101-SR101) and allowed monitoring of cytosolic Ca²⁺ dynamics (Oregon-Green BAPTA-1-OGB) during rest and after right hind paw stimulation. We found that Ca²⁺ levels in astrocytes significantly increase during sensory stimulation compared to resting. In conclusion, we directly imaged living astrocytes in spinal cord showing that astrocytes actively participate to sensory stimulation.

2. Materials and Methods

2.1. Animals

Adult (25–35 g; Charles River, Italy) male C57BL6-J mice () were used. Mice were maintained on a 12/12 h light/dark cycle and allowed free access to food and water. Animal care was in compliance with Italian (D. L. 116/92) and EC (O. J. of E. C. L358/1 18/12/86) regulations on the care of laboratory animals. All efforts were made to reduce animal numbers.

2.2. Spinal Cord Window Surgery

Mice () were anesthetized intramuscularly with 40 mg chlorohydrate tiletamine, 15 mg xylazine, and 2.5 mg acepromazine per kg in 0.9% NaCl solution. Anesthesia was then maintained using inhalatory sevoflurane (2% in 1 L/min oxygen). We minimized the breathing and heartbeat movements of the mouse using the Narishige device (STS-A, Narishige, UK). The skin of the back was incised and the muscles gently splayed to expose the thoracic vertebrae. We produced a custom spinal plate to be cemented on the vertebral surface, creating a well around the exposed vertebrae. The vertebral laminae were excised, and we exposed the lumbar spinal cord, leaving the intact dura [23, 24] (Figure 1(c)). The midline vein was visible through the vertebral window. We then filled the spinal well with a drop of artificial cerebral spinal fluid (ACSF).

Figure 1: Experimental setup. (a) Two-photon laser scanning microscope setup. (b) Schematic section of the lumbar spinal cord showing the regions of interest (laminae I-II). (c) Exposed spinal cord surface, after vertebral laminectomy, before SR101/OGB loading. In the middle line, the posterior medial spinal vein.

2.3. Pressure Injection of Ca²⁺-Sensitive AM Dyes and SR101

Spinal astrocytes were loaded via pressurized micropipette injection (multicell bolus loading) in vivo with a Ca²⁺-sensitive dye under multiphoton microscope visual guidance. A patch pipette with a tip diameter of 2-3 μm was inserted into the spinal cord to a depth of 150–300 μm from the surface. OGB was dissolved in dimethyl sulfoxide (DMSO) containing 20% pluronic acid (F-127, Invitrogen) and mixed in artificial cerebrospinal fluid (ACSF) to a final concentration of 0.8–1.0 mM. A volume (10–15 μL) of ACSF containing the dye was injected into the dorsal horn of spinal cord underneath the pial surface. The exposed spinal cord was also loaded with the astrocyte-specific indicator SR101 (Invitrogen, Italy). OGB and SR-101 were pressure-ejected from the pipette at 5–10 PSI for 60–90 seconds using the AM-system Picospritzer 2000. After injection, we allowed one hour for loading. To label vasculature, Dextran-Rhodamine (200 μL of 20 mg/mL solution), which highlights blood plasma, was injected into the tail vein.

2.4. Hind Paw Stimulation

Two subcutaneous copper needles were inserted into the right hind paw. Stimulus presentation was controlled by an analog-to-digital converter unit (AD instruments, UK) (pulse duration: 10 ms; amplitude: 1 mA; interpulse intervals: 167 ms/6 Hz). Three 30 s resting periods (R1, R2, R3) were allowed between two stimulations lasting for 10 s (S1, S2) [25].

2.5. In Vivo Imaging of the Mouse Spinal Cord: Image Processing and Quantification

Throughout the imaging session (about 3-4 h from the beginning of surgery to the end of imaging), the anesthetized mouse was maintained with inhalatory sevoflurane at 37°C using a heating pad. Two-photon imaging of the spinal cord was performed using a custom-built two-photon laser scanning microscope (Figure 1(a)). It consists of a laser, a variable attenuator filter, a scanning unit, an upright microscope, and a photomultiplier (PMT-) based detection system. Laser is a tuneable titanium: sapphire (Chameleon XR; Coherent), whose wavelength range is from 690 nm to 1040 nm, power about 2.7 W, frequency 76 MHz. It was tuned at 810 nm to efficiently excite SR101 and OGB. To minimize photodamage, the excitation laser intensity was kept at a minimum for a sufficient signal-to-noise ratio (15–20 mW at the sample). The upright microscope is an Olympus BX51WI and is equipped with a water-immersion objective lens (Olympus) XLUMPlanFL 20XW, 0.95 NA. The scanning unit is a modified Olympus FV300. Fluorescence detection system has two channels that allows the simultaneous detection of two fluorescence signals. In order to efficiently collect SR101 and OGB signals, our system is equipped with a 570 nm dichroic mirror and bandpass barrier filters placed in front of the PMTs (505–550 nm for OGB channel and 585–675 nm for SR101 channel). Movement artifacts associated with the mouse heartbeat were overcome by triggering image acquisition from the mouse heartbeat (Powerlab, AD Instruments). The brightness and contrast of the acquired images were adjusted. To reduce the background noise associated with photon or photomultiplier tube noise, a median filter (radius, 1 pixel) was applied to each image. ImageJ free software was used (version 1.42, NIH, USA).

2.6. Statistical Analysis

The fluorescent signals can be quantified by measuring the mean pixel intensities of the cell body of each astrocyte using ImageJ software. Movies were imported into ImageJ, and fluorescence traces were analyzed in spinal astrocytes and expressed as relative percentage changes () after background subtraction by exporting data to Sigma Plot 10.0 program (SPSS, Germany). We assumed that OGB-fluorescence intensity directly correlated to intracellular Ca²⁺ levels [26]. Data are expressed as the mean ± SEM. Multigroup comparisons were made using an ANOVA with post hoc  -tests. A value ≤ 0.05 was considered statistically significant.

3. Results

3.1. In Vivo Imaging of SR101 Positive Astrocytes in Dorsal Horn of Lumbar Spinal Cord

We used the posterior spinal vein, as a starting point (Figure 1(c)), and we follow the spinal blood vessels (Figure 4) to locate the dorsal horn of the spinal cord. Then, we imaged the area of posterior funiculus (Figure 1(b)): a depth of 200–300 μm was sufficient to include the superficial laminae of dorsal horn of the spinal cord. Pressurized injection in the spinal cord of the red fluorescent dye SR101 resulted in rapid staining of astrocytes (Figure 2(a)) down to 300 μm below the pial surface. All SR101-labeled cells showed morphological features of astrocytes.

(a)

(b)

Figure 2: Selective labeling of astrocytes with SR101 and calcium indicator OGB. (a) A subset of SR101-labeled astrocytes in the superficial laminae of dorsal horn of lumbar spinal cord. (b) OGB-labeled astrocytes in the same ROI (scale bar: 20 μm).

3.2. Ca²⁺  Levels of Spinal Astrocytes at Rest and following Right Hind Paw Stimulation

Ca²⁺ oscillations of OGB-labeled spinal astrocytes (Figure 2(b)) were imaged during resting periods and following right hind paw electrical stimulation according to previously described stimulating protocol.

At rest, in anesthetized mice under normal conditions, astrocytes exhibited transient Ca²⁺ oscillations and this pattern did not significantly change during sensory stimulation. In contrast, right hind paw stimulation triggered increase of astrocytic Ca²⁺ levels () (Figures 3(b) and 3(c)) compared to resting values () (Figures 3(a)–3(c)).

(a)

(b)

(c)

Figure 3: Sensory stimulation triggers Ca²⁺ increase in spinal astrocytes. Section of superficial laminae of dorsal horn of lumbar spinal cord, showing two different astrocytes (a1, a2) in rest condition (a) and following sensory stimulation (b) (scale bar: 10 μm). (c) Quantitative analysis of astrocytic Ca²⁺ levels during rest and stimulation expressed as . The mean value of Ca²⁺ increase during stimulation was significantly higher than that measured during rest (rest versus stimulus, ).

Figure 4: Time-lapse/ stack serial images of lumbar spinal cord. Spinal vessels are labeled with Dextran-Rhodamine; astrocytes adjacent to spinal vessels are labeled with OGB (scale bar: 10 μm).

4. Discussion

This study provides evidence that in the living spinal cord astrocytes respond to peripheral sensory stimulation with an increase of astrocytic Ca²⁺ levels. Time-lapse in vivo two-photon imaging of living spinal astrocytes, through intraspinal pressurized injection of dextran, SR101, and OGB, allows morphometric analysis of spinal microvasculature and spinal astrocytes, but also functional analysis of Ca²⁺ behavior.

For decades, cell cultures and ex vivo analysis have greatly supported the study of CNS allowing the characterization of morphofunctional properties of neurons and glial cells. Although these studies have undoubtedly contributed to better understand the neuroglial biology, they have not pointed out the relevance of vascular but also cellular dynamic changes, of neuroglial mutual interactions, and properties of the living CNS. Along to this point of view, the development of in vivo imaging techniques has boosted the study of synaptic plasticity and functional properties of neuroglial networks. Moreover, the widespread application of technical facilities (imaging, surgical and stabilization techniques) has improved in vivo image acquisition ensuring an outstanding stability and repeatability of raw data.

As recently reported [23], the use of a spinal stabilization device reduces artifacts caused by respiratory movements, improves the spinal column’s stability, and allows direct data acquisition. Therefore, this technique allows a detailed study of neuroglial network of deeper layers in the spinal cord and can thereby provide functional data of cellular structures, intercellular interactions, and their changes over time.

SR101-specific labeling of spinal astroglia permits the analysis of density and distribution of astrocytes in vivo and their role in neurodegenerative disease [27, 28] or following spinal cord or nerve injury [11, 12, 29, 30]. Colabeling other spinal elements, such as blood vessels and neurons, enables morphological and functional study of gliosvascular plasticity and neuroglial network [31]. Time-lapse imaging of astroglial end-feet and synaptic structures may help to elucidate their contribution to synapse formation and plasticity at the tripartite synapse [32].

We have presented a model to functional label astrocytes in vivo allowing morphofunctional imaging in the living spinal cord. OGB staining, in combination with SR101, enables the functional study of astrocytes in vivo and their role at the tripartite synapse in the spinal cord.

As we recently demonstrated [27, 29, 31], glial response and the consequent adaptive synaptic plasticity lead to the concept of noncell autonomous disease and phenotypic changes affecting astrocytes play a key role in the onset and progression of the disease. Thereby, the availability of a reproducible and steady technique facilitates the widespread application of this powerful tool in studies of the spinal cord disease in vivo.

Abbreviations

SR101: | Sulforhodamine 101
OGB: | Oregon-Green BAPTA-1
CNS: | Central nervous system.

Acknowledgments

This work was supported by grants from Regione Campania (L. R. N. 5 Bando 2003 to M. Papa), the Italian Minister of Research and University (PRIN2007 to M. Papa), Regione Campania (Prog. Spec art 12 E. F. 2000 to M. Papa), and the CNR (Neurobiotecnologie 2003 to M. Papa).

References

A. Holtmaat, T. Bonhoeffer, D. K. Chow et al., “Long-term, high-resolution imaging in the mouse neocortex through a chronic cranial window,” Nature Protocols, vol. 4, no. 8, pp. 1128–1144, 2009.

H. Hirase, L. Qian, P. Barthó, and G. Buzsáki, “Calcium dynamics of cortical astrocytic networks in vivo,” PLoS Biology, vol. 2, no. 4, article e96, 2004.

W. R. Zipfel, R. M. Williams, and W. W. Webb, “Nonlinear magic: multiphoton microscopy in the biosciences,” Nature Biotechnology, vol. 21, no. 11, pp. 1369–1377, 2003.

F. Helmchen and J. Waters, “Ca²⁺ imaging in the mammalian brain in vivo,” European Journal of Pharmacology, vol. 447, no. 2-3, pp. 119–129, 2002.

W. Mittmann, D. J. Wallace, U. Czubayko et al., “Two-photon calcium imaging of evoked activity from L5 somatosensory neurons in vivo,” Nature Neuroscience, vol. 14, no. 8, pp. 1089–1093, 2011.

X. Wang, N. Lou, Q. Xu et al., “Astrocytic Ca²⁺ signaling evoked by sensory stimulation in vivo,” Nature Neuroscience, vol. 9, no. 6, pp. 816–823, 2006.

A. Nimmerjahn, F. Kirchhoff, J. N. Kerr, and F. Helmchen, “Sulforhodamine 101 as a specific marker of astroglia in the neocortex in vivo,” Nat Methods, vol. 1, no. 1, pp. 31–37, 2004.

J. T. Trachtenberg, B. E. Chen, G. W. Knott et al., “Long-term in vivo imaging of experience-dependent synaptic plasticity in adult cortex,” Nature, vol. 420, no. 6917, pp. 788–794, 2002.

K. Svoboda, W. Denk, D. Kleinfeld, and D. W. Tank, “In vivo dendritic calcium dynamics in neocortical pyramidal neurons,” Nature, vol. 385, no. 6612, pp. 161–165, 1997.

G. Cirillo, N. Maggio, M. R. Bianco, C. Vollono, S. Sellitti, and M. Papa, “Discriminative behavioral assessment unveils remarkable reactive astrocytosis and early molecular correlates in basal ganglia of 3-nitropropionic acid subchronic treated rats,” Neurochemistry International, vol. 56, no. 1, pp. 152–160, 2010.

G. Cirillo, C. Cavaliere, M. R. Bianco et al., “Intrathecal NGF administration reduces reactive astrocytosis and changes neurotrophin receptors expression pattern in a rat model of neuropathic pain,” Cellular and Molecular Neurobiology, vol. 30, no. 1, pp. 51–62, 2010.

A. M. Colangelo, M. R. Bianco, L. Vitagliano et al., “A new nerve growth factor-mimetic peptide active on neuropathic pain in rats,” Journal of Neuroscience, vol. 28, no. 11, pp. 2698–2709, 2008.

T. Fellin and G. Carmignoto, “Neurone-to-astrocyte signalling in the brain represents a distinct multifunctional unit,” Journal of Physiology, vol. 559, no. 1, pp. 3–15, 2004.

M. Nedergaard, B. Ransom, and S. A. Goldman, “New roles for astrocytes: redefining the functional architecture of the brain,” Trends in Neurosciences, vol. 26, no. 10, pp. 523–530, 2003.

R. D. Fields and B. Stevens-Graham, “Neuroscience: new insights into neuron-glia communication,” Science, vol. 298, no. 5593, pp. 556–562, 2002.

P. G. Haydon, “Glia: listening and talking to the synapse,” Nature Reviews Neuroscience, vol. 2, no. 3, pp. 185–193, 2001.

A. Volterra and J. Meldolesi, “Astrocytes, from brain glue to communication elements: the revolution continues,” Nature Reviews Neuroscience, vol. 6, no. 8, pp. 626–640, 2005.

I. R. Winship, N. Plaa, and T. H. Murphy, “Rapid astrocyte calcium signals correlate with neuronal activity and onset of the hemodynamic response in vivo,” Journal of Neuroscience, vol. 27, no. 23, pp. 6268–6272, 2007.

A. C. Charles, J. E. Merrill, E. R. Dirksen, and M. J. Sanderson, “Intercellular signaling in glial cells: calcium waves and oscillations in response to mechanical stimulation and glutamate,” Neuron, vol. 6, no. 6, pp. 983–992, 1991.

C. Stosiek, O. Garaschuk, K. Holthoff, and A. Konnerth, “In vivo two-photon calcium imaging of neuronal networks,” Proceedings of the National Academy of Sciences of the United States of America, vol. 100, no. 12, pp. 7319–7324, 2003.

B. Lendvai, E. A. Stern, B. Chen, and K. Svoboda, “Experience-dependent plasticity of dendritic spines in the developing rat barrel cortex in vivo,” Nature, vol. 404, no. 6780, pp. 876–881, 2000.

J. V. Kim, N. Jiang, C. E. Tadokoro et al., “Two-photon laser scanning microscopy imaging of intact spinal cord and cerebral cortex reveals requirement for CXCR6 and neuroinflammation in immune cell infiltration of cortical injury sites,” Journal of Immunological Methods, vol. 352, no. 1-2, pp. 89–100, 2010.

D. Davalos, J. K. Lee, W. B. Smith et al., “Stable in vivo imaging of densely populated glia, axons and blood vessels in the mouse spinal cord using two-photon microscopy,” Journal of Neuroscience Methods, vol. 169, no. 1, pp. 1–7, 2008.

B. Zheng, C. Ho, S. Li, H. Keirstead, O. Steward, and M. Tessier-Lavigne, “Lack of enhanced spinal regeneration in Nogo-deficient mice,” Neuron, vol. 38, no. 2, pp. 213–224, 2003.

B. G. Sanganahalli, P. Herman, H. Blumenfeld, and F. Hyder, “Oxidative neuroenergetics in event-related paradigms,” Journal of Neuroscience, vol. 29, no. 6, pp. 1707–1718, 2009.

K. V. Kuchibhotla, C. R. Lattarulo, B. T. Hyman, and B. J. Bacskai, “Synchronous hyperactivity and intercellular calcium waves in astrocytes in Alzheimer mice,” Science, vol. 323, no. 5918, pp. 1211–1215, 2009.

A. M. Colangelo, G. Cirillo, M. L. Lavitrano, L. Alberghina, and M. Papa, “Targeting reactive astrogliosis by novel biotechnological strategies,” Biotechnology Advances, vol. 30, no. 1, pp. 261–271, 2012.

R. Giovannoni, N. Maggio, M. R. Bianco et al., “Reactive astrocytosis and glial glutamate transporter clustering are early changes in a spinocerebellar ataxia type 1 transgenic mouse model,” Neuron Glia Biology, vol. 3, no. 4, pp. 335–351, 2007.

G. Cirillo, A. M. Colangelo, M. R. Bianco et al., “BB14, a nerve growth factor (NGF)-like peptide shown to be effective in reducing reactive astrogliosis and restoring synaptic homeostasis in a rat model of peripheral nerve injury,” Biotechnology Advances, vol. 30, no. 1, pp. 223–232, 2012.

C. Cavaliere, G. Cirillo, M. R. Bianco et al., “Gliosis alters expression and uptake of spinal glial amino acid transporters in a mouse neuropathic pain model,” Neuron Glia Biology, vol. 3, no. 2, pp. 141–153, 2007.

G. Cirillo, M. R. Bianco, A. M. Colangelo et al., “Reactive astrocytosis-induced perturbation of synaptic homeostasis is restored by nerve growth factor,” Neurobiology of Disease, vol. 41, no. 3, pp. 630–639, 2011.

E. M. Ullian, S. K. Sapperstein, K. S. Christopherson, and B. A. Barres, “Control of synapse number by glia,” Science, vol. 291, no. 5504, pp. 657–661, 2001.