Neural Plasticity
Volume 2015 (2015), Article ID 653727, 10 pages
http://dx.doi.org/10.1155/2015/653727

Research Article

Evolution of Apparent Diffusion Coefficient and Fractional Anisotropy in the Cerebrum of Asphyxiated Newborns Treated with Hypothermia over the First Month of Life

Saskia Kwan,¹ Elodie Boudes,¹ Anouk Benseler,¹ Guillaume Gilbert,² Christine Saint-Martin,³ Michael Shevell,⁴ and Pia Wintermark¹

¹Division of Newborn Medicine, Department of Pediatrics, Montreal Children’s Hospital, McGill University, Montreal, QC, Canada H3H 1P3
²MR Clinical Science, Philips Healthcare, Montreal, QC, Canada H2S 2J3
³Department of Pediatric Radiology, Montreal Children’s Hospital, McGill University, Montreal, QC, Canada H3H 1P3
⁴Division of Pediatric Neurology, Department of Pediatrics, Montreal Children’s Hospital, McGill University, Montreal, QC, Canada H3H 1P3

Received 5 April 2015; Revised 14 June 2015; Accepted 15 June 2015

Academic Editor: Clive R. Bramham

Copyright © 2015 Saskia Kwan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The objective of this study was to assess the evolution of diffusion-weighted imaging (DWI) and diffusion-tensor imaging (DTI) over the first month of life in asphyxiated newborns treated with hypothermia and to compare it with that of healthy newborns. Asphyxiated newborns treated with hypothermia were enrolled prospectively; and the presence and extent of brain injury were scored on each MRI. Apparent diffusion coefficient (ADC) and fractional anisotropy (FA) values were measured in the basal ganglia, in the white matter and in the cortical grey matter. Sixty-one asphyxiated newborns treated with hypothermia had a total of 126 ADC and FA maps. Asphyxiated newborns developing brain injury eventually had significantly decreased ADC values on days 2-3 of life and decreased FA values around day 10 and 1 month of life compared with those not developing brain injury. Despite hypothermia treatment, asphyxiated newborns may develop brain injury that still can be detected with advanced neuroimaging techniques such as DWI and DTI as early as days 2-3 of life. A study of ADC and FA values over time may aid in the understanding of how brain injury develops in these newborns despite hypothermia treatment.

1. Introduction

Birth asphyxia and its resulting neonatal encephalopathy are associated with significant mortality and long-term neurodevelopmental complications, such as cerebral palsy, intellectual disability, learning difficulties, and other cognitive deficits. Therapeutic hypothermia has become the standard of care for these asphyxiated newborns to possibly prevent the development of brain injury and improve their long-term outcome [1–3].

Magnetic resonance imaging (MRI) is the standard imaging technique to define the presence and extent of brain injury in these newborns and to provide a prognosis [4, 5]. Before the cooling era, the evolution over time of diffusion-weighted imaging (DWI) [6–9] and diffusion-tensor imaging (DTI) [10, 11] had been widely studied to understand the development of brain injury in asphyxiated newborns [12–14]. Abnormalities of diffusion were typically most evident within the first few days of life and then were “pseudonormalized” over the first two weeks of life; structural abnormalities became clearly visible on conventional imaging by days 7–10 of life [15–17]. These abnormal changes within the first few days of life [18–20] have been repeatedly confirmed as objective measures of prognosis [21–23], often before conventional imaging changes are clearly notable [24–26].

Similar studies are currently lacking for asphyxiated newborns treated with hypothermia, and some have postulated that hypothermia treatment may modify the evolution of these sequences over time [27–31]. Literature on the brain imaging of asphyxiated newborns treated with hypothermia typically uses the brain imaging performed after the completion of the hypothermia [27–29, 31, 32]. Most available studies mainly address the incidence and type of brain injury observed following hypothermia treatment and their predictive value for subsequent neurological impairment [4, 5, 32]. Only a few studies have begun to investigate the value of diffusion parameters for these newborns [27–29], mostly at one time-point [28, 31, 33, 34]. However, none of these studies longitudinally follows the newborns so as to accurately define the evolution of these diffusion parameters within the first days of life and over the first month of life so as to understand better how the brain injuries develop in these newborns despite hypothermia treatment.

Thus, this present study was designed to compare the evolution of DWI and DTI within the first days of life and over the first month of life in asphyxiated newborns treated with hypothermia and to compare it with that of healthy newborns. We hypothesize that ADC values may already be abnormal in the injured brain areas within the first days of life in these asphyxiated newborns even if they are treated with hypothermia and that FA values may help us understand better the later development of brain injury despite hypothermia treatment.

2. Materials and Methods

2.1. Patients

We conducted a prospective cohort study of term asphyxiated newborns admitted to our neonatal intensive care unit from 2010 to 2014, who met established criteria for induced hypothermia [1–3]: (1) gestational age ≥ 36 weeks and birth weight ≥ 1800 g, (2) evidence of fetal distress, for example, a history of acute perinatal event, cord , or base deficit ≤ −16 mEq/L, (3) evidence of neonatal distress, such as an Apgar score ≤ 5 at 10 minutes, postnatal blood gas pH obtained within the first hour of life ≤ 7.0 or base deficit ≤ −16 mEq/L, or continued need for ventilation initiated at birth and continued for at least 10 minutes, and (4) evidence of moderate or severe encephalopathy obtained by standardized neurological exam and/or amplitude-integrated electroencephalogram. Eligible patients received whole-body cooling to an esophageal temperature of 33.5°C, initiated by 6 hours of life and continued for 72 hours (unless contraindications developed), and were then slowly rewarmed. Four additional healthy term newborns were also enrolled as controls. The research protocol was approved by the Institutional Review Board and informed parental consent was obtained in all cases.

2.2. Brain Magnetic Resonance Imaging (MRI)

As per standard clinical protocol at our institution, a brain magnetic resonance imaging (MRI) scan was performed for all these newborns around day 10 of life. When possible (i.e., when the parents consented for their newborns to have additional MRIs, when the newborns were hemodynamically stable, and when a team of a nurse and a respiratory therapist was available to go to the MRI), newborns were enrolled in an MRI research study, and MRI scans were performed on day 1 of life, on days 2-3 of life, around day 10 of life, and around 1 month of life. These time-points were chosen to ensure the absence of antenatal brain injury (day 1 of life), to assess early patterns of injury (days 2-3 of life), and to define the extent of later definitive structural brain injuries (around day 10 of life and around 1 month of life). Patients receiving hypothermia had their therapy maintained during the MRI scan without any adverse events [35]. Any ventilation, inotropic support, or sedation was maintained during the MRI scanning process, and additional sedation was avoided. Motion artifacts were minimized by wrapping the neonates in an MR imaging-compatible vacuum cushion. Each of the four healthy newborns was scanned at the four different time-points: on day 1 of life, on days 2-3 of life, around day 10 of life, and around 1 month of life.

The magnetic resonance imaging (MRI) scans were performed using a 3T clinical system (Achieva X, Philips Healthcare, Best, Netherlands). Each MRI research study included a 3D T1-weighted gradient-echo (TR/TE, 24/4.6 ms; matrix size, ; FOV, 180 mm; flip angle, 30 degrees; 104 sagittal slices, with a section thickness of 1.0 mm and multiplanar reformations in axial and coronal planes), a high resolution turbo spin echo T2-weighted imaging (TSE) (TR/TE, 5000/90 ms; TSE factor, 15; matrix size, ; FOV, 150 mm; flip angle, 90 degrees; 27 axial slices, with a section thickness of 3.0 mm), and a single shot echo planar imaging (EPI) diffusion-tensor imaging (DTI) sequence with isotropic resolution (TR/TE, 5937.8/69 ms; matrix size, ; FOV, 180 mm; SENSE factor 2; 32 directions; values, 0 and 750 s/mm²; 46 axial slices, with a section thickness of 1.8 mm).

Pediatric neuroradiologists, who were blind to the clinical conditions of the infants, interpreted the MRI studies of the asphyxiated newborns treated with hypothermia and the healthy newborns. They reported the presence and extent of brain injury in the cerebrum as per the previously described magnetic resonance imaging scoring system [36]. The MRI scores obtained around day 10 of life were used as the reference to determine the extent of the brain injury for each patient [17, 37–39].

In addition, the Brain Extraction Tool (Oxford Centre for Functional Magnetic Resonance of the Brain, Oxford University, Oxford, UK) was used to remove all extracerebral tissues (i.e., eyes, meninges, and skull) from the images [40]. Then, apparent diffusion coefficient (ADC) and fractional anisotropy (FA) maps were generated for the whole brain using the tools of the Diffusion Imaging in Python (DIPY) package (Sherbrooke Connectivity Imaging Lab, Sherbrooke University, Quebec, Canada) [41]. To assess the evolution of ADC and FA during the first month of life in asphyxiated newborns treated with hypothermia, ADC and FA values were measured in eight different regions of interest in the cerebrum (Figure 1): regions of interest in the thalamus, the posterior limb of the internal capsule and the lentiform nucleus, the white matter (within frontal and posterior white matter), and the cortical grey matter (within the frontal, parietal, and occipital cortices), as described in other studies [42]. The regions of interest always were drawn by the same observer on the axial ADC and FA maps using ImageJ (Image Processing and Analysis in Java) [43]. To accurately identify the regions of interest in the cerebrum, axial T1- and T2-weighted imaging was used in conjunction with the axial ADC and FA maps. Measurements were obtained in the right and left sides in these different regions of interest and then averaged. The measurements were repeated twice for each region of interest to increase the robustness of repeated measures.

(a)

(b)

Figure 1: Regions of interest. Axial T1-weighted images, T2-weighted images, apparent diffusion coefficient (ADC) maps, and fractional anisotropy (FA) maps at two different levels of cerebrum showing the manually drawn regions of interest: (a) lower level and (b) higher level. ADC and FA values were measured in eight different regions of interest in the cerebrum: that is, in the thalamus, the posterior limb of the internal capsule and the lentiform nucleus, the white matter (within the frontal and posterior white matter), and the cortical grey matter (within the frontal, parietal, and occipital cortices). Regions of interest were always drawn by the same observer by looking at the same time at the ADC and FA maps and the corresponding T1- and T2-weighted imaging.

2.3. Statistical Analysis

For the analysis of ADC and FA measurements in each region of interest, asphyxiated newborns treated with hypothermia were categorized into two subgroups based on the presence or absence of brain injury in that region of interest on their conventional MRI performed around day 10 of life. Statistical analysis was performed according to the day of life when the MRI scan was taken. For each region of interest, ADC and FA values were compared between the three different groups (i.e., healthy newborns, asphyxiated newborns treated with hypothermia who did not develop later brain injury, and asphyxiated newborns treated with hypothermia who developed later brain injury) using Mann-Whitney tests. A value < 0.05 was considered a priori as statistically significant. All statistical analyses were performed using GraphPad Prism (GraphPad Software Inc., San Diego, CA, USA).

3. Results

Sixty-one asphyxiated newborns treated with hypothermia were included in the present study (Table 1). Forty-nine percent (30/61) did not develop later brain injury, and 51% (31/61) developed later brain injury. Twenty-two percent (7/31) developed basal ganglia injury (Figure 2), 22% (7/31) developed watershed injury, and 56% (17/31) developed near-total injury.

Table 1: Clinical characteristics of the asphyxiated newborns treated with hypothermia.

Variables
All patients ()

Gestational age (weeks), mean ± SD
39.21 ± 1.52

Birth weight (g), mean ± SD
3402 ± 703

Sex

    Male, (%)
34 (56)

    Female, (%)
27 (44)

Arterial cord pH, mean ± SD
6.98 ± 0.20

Initial postnatal blood gas pH, mean ± SD
7.04 ± 0.16

Initial modified Sarnat score

    Score 1 (mild)
10 (16)

    Score 2 (moderate)
41 (67)

    Score 3 (severe)
10 (16)

Initiation of hypothermia (hours), mean ± SD
5.22 ± 1.30

The ten newborns with initial modified Sarnat score of 1 were cooled because their initial background pattern on amplitude-integrated electroencephalogram showed moderate encephalopathy.

(a)

(b)

(c)

Figure 2: Brain MRIs of a term asphyxiated newborn treated with hypothermia, performed on day 2 of life (a) and on day 9 of life (b-c). (a) The apparent diffusion coefficient map on day 2 of life for this patient shows a restricted diffusion involving the thalami and lentiform nuclei (arrows). (b and c) The T1-weighted imaging (b) and T2-weighted imaging (c) confirm the injury within the thalami and lentiform nuclei (arrows).

A total of 126 MRI scans were performed on these 61 asphyxiated newborns treated with hypothermia. Thirteen were obtained on day 1 of life, 32 on days 2-3 of life, 54 around day 10 of life (mean: day 11 of life; range: days 7–15 of life), and 27 around one month of life (mean: day 33 of life; range: days 29–45 of life). Eleven newborns were scanned at the four different time-points; 9 were scanned only at three time-points, 14 only at two time-points, and 27 only at one time-point. Three of the enrolled newborns died during the first week of life; for these patients, the autopsy results confirmed the brain injury observed on the early scans during hypothermia treatment.

In the asphyxiated newborns treated with hypothermia who developed or did not develop later brain injury, the ADC values (Table 2) were significantly decreased on day 1 of life and on days 2-3 of life in the different regions of interest (thalamus, posterior limb of internal capsule, lentiform nucleus, and anterior white matter, as well as frontal cortical grey matter) when compared with the healthy newborns; the same trend was observed in the posterior white matter, but it did not reach statistical significance. In addition, in the asphyxiated newborns developing brain injury, the ADC values were significantly decreased on days 2-3 of life in the different regions of interest, that is, the thalamus (), the posterior limb of the internal capsule (), the lentiform nucleus (), the anterior white matter (), the posterior white matter (), and the parietal cortical grey matter (), when compared with those without brain injury. The ADC values on day 1 of life were significantly decreased only in the thalamus () and in the lentiform nucleus () in the newborns developing later brain injury, compared with those without brain injury. Around day 10 of life, the ADC values were significantly increased only in the thalamus and in the frontal cortical grey matter in the asphyxiated newborns who developed brain injury when compared with those without brain injury; however, this was not anymore the case around day 30 of life. The ADC values in the posterior white matter were significantly increased around day 10 of life and around day 30 of life in the asphyxiated newborns treated with hypothermia developing or not developing brain injury when compared with the healthy newborns. This result was also observed around day 30 of life in the parietal cortical grey matter and the anterior white matter.

Table 2: Comparison of apparent diffusion coefficient (ADC) values (×10⁻³ mm²/s) in each region of interest between healthy newborns and asphyxiated newborns treated with hypothermia developing or not brain injury, on day 1 of life, on days 2-3 of life, around day 10 of life, and around day 30 of life.

Thalamus
Posterior limb of internal capsule
Lentiform nucleus
Anterior white matter
Posterior white matter
Frontal cortical grey matter
Parietal cortical grey matter
Occipital cortical grey matter

On day 1 of life

    Healthy newborns
1.076 ± 0.031 ()
1.085 ± 0.041 ()
1.144 ± 0.016 ()
1.760 ± 0.086 ()
1.494 ± 0.135 ()
1.208 ± 0.096 ()
1.128 ± 0.055 ()
1.080 ± 0.084 ()

    Asphyxiated newborns—no injury
1.014 ± 0.044 ()
1.018 ± 0.052 ()
1.096 ± 0.056 ()
1.634 ± 0.113 ()
1.444 ± 0.085 ()
1.042 ± 0.050 ()
1.005 ± 0.053 ()
0.959 ± 0.053 ()

    Asphyxiated newborns—injury
0.891 ± 0.179 ()
0.960 ± 0.137 ()
1.008 ± 0.130 ()
1.522 ± 0.114 ()
1.451 ± 0.036 ()

0.936 ± 0.062 ()

     value: no injury versus healthy
0.006
0.012
0.025
0.008
ns
0.0005
0.0002
0.002

     value: injury versus healthy
0.0003
0.0006
0.0002
—
—
—
0.004
—

     value: injury versus no injury
0.010
ns
0.042
—
—
—
ns (0.069)
—

On days 2-3 of life

    Healthy newborns
1.075 ± 0.036 ()
1.111 ± 0.029 ()
1.177 ± 0.027 ()
1.709 ± 0.147 ()
1.477 ± 0.115 ()
1.210 ± 0.085 ()
1.138 ± 0.056 ()
1.124 ± 0.059 ()

    Asphyxiated newborns—no injury
1.019 ± 0.058 ()
1.033 ± 0.058 ()
1.109 ± 0.063 ()
1.558 ± 0.123 ()
1.448 ± 0.121 ()
1.084 ± 0.074 ()
1.026 ± 0.051 ()
1.030 ± 0.078 ()

    Asphyxiated newborns—injury
0.891 ± 0.204 ()
0.925 ± 0.144 ()
0.975 ± 0.175 ()
1.447 ± 0.121 ()
1.312 ± 0.171 ()
1.030 ± 0.082 ()
0.963 ± 0.102 ()
1.002 ± 0.073 ()

     value: no injury versus healthy
0.016
0.002
0.005
0.018
ns
0.001
0.0002
0.001

     value: injury versus healthy
0.003
<0.0001
<0.0001
0.001
ns (0.050)
—
0.0004
0.0003

     value: injury versus no injury
0.011
0.004
0.0002
0.018
0.015
—
0.043
ns (0.078)

Around day 10 of life

    Healthy newborns
1.061 ± 0.017 ()
1.098 ± 0.022 ()
1.152 ± 0.014 ()
1.671 ± 0.111 ()
1.480 ± 0.077 ()
1.171 ± 0.037 ()
1.118 ± 0.064 ()
1.116 ± 0.043 ()

    Asphyxiated newborns—no injury
1.090 ± 0.055 ()
1.102 ± 0.051 ()
1.170 ± 0.062 ()
1.675 ± 0.118 ()
1.678 ± 0.121 ()
1.171 ± 0.061 ()
1.123 ± 0.049 ()
1.133 ± 0.068 ()

    Asphyxiated newborns—injury
1.154 ± 0.111 ()
1.120 ± 0.105 ()
1.201 ± 0.119 ()
1.725 ± 0.163 ()
1.622 ± 0.082 ()
1.211 ± 0.044 ()
1.124 ± 0.051 ()
1.132 ± 0.052 ()

     value: no injury versus healthy
ns
ns
ns
ns
0.0004
ns
ns
ns

     value: injury versus healthy
0.020
ns
ns
ns
0.0002
0.001
ns
ns

     value: injury versus no injury
0.009
ns
ns
ns
ns
0.015
ns
ns

Around day 30 of life

    Healthy newborns
1.020 ± 0.033 ()
1.040 ± 0.043 ()
1.086 ± 0.022 ()
1.508 ± 0.069 ()
1.379 ± 0.041 ()
1.082 ± 0.039 ()
1.055 ± 0.055 ()
1.113 ± 0.078 ()

    Asphyxiated newborns—no injury
1.029 ± 0.045 ()
1.052 ± 0.044 ()
1.110 ± 0.056 ()
1.607 ± 0.182 ()
1.609 ± 0.179 ()
1.141 ± 0.062 ()
1.100 ± 0.051 ()
1.112 ± 0.063 ()

    Asphyxiated newborns—injury
1.040 ± 0.052 ()
1.068 ± 0.044 ()
1.110 ± 0.062 ()
1.682 ± 0.207 ()
1.618 ± 0.110 ()
1.136 ± 0.058 ()
1.120 ± 0.050 ()
1.139 ± 0.056 ()

     value: no injury versus healthy
ns
ns
ns
ns
0.022
0.009
ns (0.052)
ns

     value: injury versus healthy
ns
ns
ns
0.043
<0.0001
—
0.026
—

     value: injury versus no injury
ns
ns
ns
ns
ns
—
ns
—

Mean ± standard deviation.

, , and .

FA values (Table 3) were not different between the three groups on day 1 of life and on days 2-3 of life in the different regions of interest. In the asphyxiated newborns treated with hypothermia who developed later brain injury, the FA values were decreased around day 10 of life and around day 30 of life in the thalamus ( around day 10 of life and around day 30 of life), the posterior limb of internal capsule ( around day 10 of life and around day 30 of life), the lentiform nucleus ( around day 10 of life), and the anterior white matter ( around day 10 of life and around day 30 of life) when compared with those infants without brain injury and the healthy newborns. The FA values in the posterior white matter were not different between the asphyxiated newborns developing or not developing brain injury, but they were significantly reduced when comparing these newborns to the healthy newborns. The FA values also decreased in the lentiform nucleus around day 10 of life () and in the anterior white matter on day 30 of life () in the asphyxiated newborns not developing brain injury, compared with the healthy newborns. The FA values in the cortical grey matter were not different between the three groups around day 10 of life and around day 30 of life.

Table 3: Comparison of fractional anisotropy (FA) values in each region of interest between healthy newborns and asphyxiated newborns treated with hypothermia developing or not developing brain injury, on day 1 of life, on days 2-3 of life, around day 10 of life, and around day 30 of life.

Thalamus
Posterior limb of internal capsule
Lentiform nucleus
Anterior white matter
Posterior white matter
Frontal cortical grey matter
Parietal cortical grey matter
Occipital cortical grey matter

On day 1 of life

    Healthy newborns
0.167 ± 0.006 ()
0.524 ± 0.044 ()
0.136 ± 0.018 ()
0.134 ± 0.031 ()
0.176 ± 0.070 ()
0.153 ± 0.030 ()
0.148 ± 0.022 ()
0.154 ± 0.027 ()

    Asphyxiated newborns—no injury
0.169 ± 0.016 ()
0.516 ± 0.049 ()
0.143 ± 0.017 ()
0.113 ± 0.027 ()
0.160 ± 0.035 ()
0.138 ± 0.018 ()
0.139 ± 0.018 ()
0.129 ± 0.031 ()

    Asphyxiated newborns—injury
0.174 ± 0.018 ()
0.484 ± 0.031 ()
0.139 ± 0.012 ()
0.101 ± 0.027 ()
0.148 ± 0.020 ()

0.147 ± 0.019 ()

     value: no injury versus healthy
ns
ns
ns
ns
ns
ns
ns
ns

     value: injury versus healthy
ns
ns
ns
—
—
—
ns
—

     value: injury versus no injury
ns
ns
ns
—
—
—
ns
—

On days 2-3 of life

    Healthy newborns
0.173 ± 0.012 ()
0.491 ± 0.033 ()
0.143 ± 0.026 ()
0.130 ± 0.018 ()
0.176 ± 0.028 ()
0.162 ± 0.017 ()
0.141 ± 0.038 ()
0.149 ± 0.034 ()

    Asphyxiated newborns—no injury
0.165 ± 0.019 ()
0.484 ± 0.038 ()
0.142 ± 0.026 ()
0.128 ± 0.028 ()
0.154 ± 0.025 ()
0.150 ± 0.026 ()
0.146 ± 0.019 ()
0.136 ± 0.029 ()

    Asphyxiated newborns—injury
0.173 ± 0.021 ()
0.478 ± 0.041 ()
0.142 ± 0.031 ()
0.128 ± 0.037 ()
0.162 ± 0.035 ()
0.165 ± 0.020 ()
0.139 ± 0.020 ()
0.167 ± 0.029 ()

     value: no injury versus healthy
ns
ns
ns
ns
ns
ns
ns
ns

     value: injury versus healthy
ns
ns
ns
ns
ns
—
ns
ns

     value: injury versus no injury
ns
ns
ns
ns
ns
—
ns
ns

Around day 10 of life

    Healthy newborns
0.175 ± 0.011 ()
0.503 ± 0.039 ()
0.156 ± 0.015 ()
0.135 ± 0.017 ()
0.186 ± 0.019 ()
0.159 ± 0.018 ()
0.127 ± 0.020 ()
0.133 ± 0.013 ()

    Asphyxiated newborns—no injury
0.171 ± 0.020 ()
0.502 ± 0.040 ()
0.136 ± 0.019 ()
0.131 ± 0.026 ()
0.142 ± 0.031 ()
0.154 ± 0.037 ()
0.140 ± 0.026 ()
0.121 ± 0.026 ()

    Asphyxiated newborns—injury
0.153 ± 0.027 ()
0.414 ± 0.040 ()
0.119 ± 0.014 ()
0.112 ± 0.027 ()
0.141 ± 0.025 ()
0.170 ± 0.066 ()
0.145 ± 0.027 ()
0.121 ± 0.020 ()

     value: no injury versus healthy
ns
ns
0.009
ns
0.001
ns
ns
ns

     value: injury versus healthy
0.048
0.0002
0.001
ns (0.087)
0.0003
ns
ns
ns

     value: injury versus no injury
0.021
<0.0001
0.0004
0.034
ns
ns
ns
ns

Around day 30 of life

    Healthy newborns
0.197 ± 0.014 ()
0.545 ± 0.028 ()
0.159 ± 0.012 ()
0.160 ± 0.016 ()
0.229 ± 0.042 ()
0.182 ± 0.047 ()
0.169 ± 0.027 ()
0.132 ± 0.019 ()

    Asphyxiated newborns—no injury
0.195 ± 0.024 ()
0.543 ± 0.047 ()
0.154 ± 0.022 ()
0.142 ± 0.028 ()
0.186 ± 0.052 ()
0.154 ± 0.026 ()
0.160 ± 0.027 ()
0.139 ± 0.040 ()

    Asphyxiated newborns—injury
0.173 ± 0.017 ()
0.474 ± 0.040 ()
0.145 ± 0.015 ()
0.115 ± 0.027 ()
0.153 ± 0.042 ()
0.180 ± 0.041 ()
0.173 ± 0.014 ()
0.169 ± 0.049 ()

     value: no injury versus healthy
ns
ns
ns
ns (0.074)
0.025
ns
ns
ns

     value: injury versus healthy
0.003
0.0001
0.022
0.004
0.0006
—
ns
—

     value: injury versus no injury
0.002
<0.0001
ns
0.011
ns
—
ns
—

Mean ± standard deviation

Injury versus no injury: , , and .

4. Discussion

Hypothermia treatment has been associated with improved brain metabolism and preserved brain microstructure [28] and has been postulated to slow down the evolution of diffusion changes in asphyxiated newborns [27–31]. Up to now, most studies that have investigated the value of diffusion parameters for these newborns only use imaging performed at one time-point [28, 31, 33, 34]. Massaro et al. [34] did not show any ADC difference between the newborns developing or not developing brain injury in 40 asphyxiated newborns treated with hypothermia on MRI scanned around day 7 of life (range: days 5–12 of life, eight newborns developed brain injury). Bonifacio et al. [28] showed that ADC values were higher and closer to normal in 29 asphyxiated newborns treated with hypothermia scanned around day 5 of life (range: days 4–6 of life, 12 newborns developed brain injury), compared with the asphyxiated newborns, who were not treated [28]; however, the newborns treated with hypothermia were usually imaged one day later compared with the not treated newborns, and “pseudonormalization” may have accounted for some of these reduced diffusion abnormalities [28]. Thakur et al. [31] concluded that ADC values are more likely to be abnormal when they are performed closer to the cessation of hypothermic treatment between days 4 and 8 of life; however, they did not perform any imaging before day 4 of life in their study of 44 asphyxiated newborns treated with hypothermia scanned around day 7 of life (range: days 4–17 of life, 14 newborns developed later brain injury) [31]. Lee et al. [33] demonstrated that FA values were lower in the injured brain areas in 36 asphyxiated newborns treated with hypothermia scanned around day 9 of life (range: days 5–18 of life, 24 newborns developed brain injury) [33]. Only two previous studies have investigated the diffusions changes on serial imaging [27, 29]. Gano et al. [29] suggested that hypothermia seemed to attenuate the severity and progression of brain injury; however, they studied only six asphyxiated newborns treated with hypothermia scanned on days 1, 3, and 10 of life, and only 3 newborns developed brain injury [29]. Bednarek et al. [27] concluded that therapeutic hypothermia may “slow down” the evolution of the mean diffusivity changes, with a delay in “pseudonormalization” occurring after the tenth day of life in 23 asphyxiated newborns treated with hypothermia with brain injury on MRI performed around day 6 of life (range: days 0–17 of life, 12 had serial imaging) compared with days 6–8 of life in the control group not treated with hypothermia [27].

The present study presents the evolution of ADC and FA values over the first month of life of 61 asphyxiated newborns treated with hypothermia (31 newborns developed brain injury) and compares them to the values obtained in four healthy newborns. In asphyxiated newborns treated with hypothermia who developed later brain injury, ADC values typically started to decrease on day 1 of life, were significantly decreased on days 2-3 of life, and then were “pseudonormalized,” compared with the asphyxiated newborns without brain injury; FA values were not different on days 1–3 of life but decreased around day 10 and 1 month of life when compared with the same newborns. Advanced neuroimaging techniques such as DWI and DTI still enable the detection of changes related to the later development of brain injury in asphyxiated newborns treated with hypothermia, as early as days 2-3 of life. This result is similar to what was described regarding normothermic asphyxiated newborns [6–15]. The early decrease of ADC within the first days of life was still visible in our cohort treated with hypothermia, as previously suggested by other authors [27].

Interestingly, ADC values were significantly decreased on day 1 of life and on days 2-3 of life for all the different regions of interest in all the asphyxiated newborns treated with hypothermia compared with the healthy newborns. Hypothermia itself has been previously described as modifying diffusion values such as ADC measurements [27, 44]. ADC values are known to have a dependence on temperature (2.4% per 1°C change) [27, 44] and thus diffusion measurements made during hypothermia treatment (i.e., at an esophageal temperature of 33.5°C) are expected to be lower than those that would be made at normal body temperature.

Intriguingly, FA values were different in the posterior white matter around day 10 of life and around day 30 of life for the asphyxiated newborns treated with hypothermia who did not develop brain injury compared with the healthy newborns; a similar trend was observed in the lentiform nucleus around day 10 of life and in the anterior white matter on day 30 of life. Interestingly, when looking more carefully at this analysis, a cluster of six newborns with no reported brain injury in these regions of interest had decreased FA values compared with the healthy newborns, but similar FA values compared with the asphyxiated newborns presenting injury in these regions of interest. For these six newborns, the ADC values on days 2-3 of life were not different compared with the healthy newborns, which suggests that no acute sign of brain injury existed in those regions of interest. However, all these patients had brain injury in the thalamus and the posterior limb of internal capsule. All together, these results suggest that injury in these regions of interest (anterior and posterior white matter and lentiform nucleus) may be indirect by way of transneuronal degeneration related to damage in other interconnected areas of the brain [13, 45, 46]. These results suggest that FA measurements may enable the detection of subtle white matter injuries that are otherwise not visible on conventional imaging.

FA values were not different in the cortical grey matter at the different time-points between asphyxiated newborns developing or not developing brain injury, even if ADC values tended to be lower within the first days of life in these regions of interest. The small number of newborns with brain injury in the regions of interest within cortical grey matter probably partly explains the lack of statistical significance in these regions of interest. Also it was technically challenging to always recognize the same specific regions in the cortical grey matter from one patient to the other and to avoid volume averaging with white matter when measuring in the cortical ribbon. The studied cortical gray matter areas may have been “contaminated” to varying degrees by subarachnoid fluid or by subcortical white matter. It is probably why most other studies measuring ADC and FA have focused on measuring these parameters only in the white matter and in the basal ganglia [13, 20, 29, 33, 47], since these regions of interest are more easily identifiable and provide reproducible and reliable identifiable measurements from one patient to the other.

The strength of the current study is the serial MRI design in the same newborns to follow the evolution of their brain injuries over time in a large number of asphyxiated newborns treated with hypothermia. When possible, imaging was repeated on day 1 of life, on days 2-3 of life, around day 10 of life, and/or around 1 month of life; these time-points were chosen to ensure the absence of antenatal brain injury (day 1 of life), to assess early patterns of injury (days 2-3 of life), and to define the extent of definitive brain injuries (around day 10 of life and around 1 month of life). In this study, the newborns were not imaged between days 4 and 6 of life, considering the possible risk of not seeing the full extent of the brain injury [18, 34, 39]. A group of healthy newborns scanned at the four different time-points were also included for comparison but only included four newborns. As the sample size was limited, we thus did not test whether the ADC and FA values were predictive or not of late injury. Also, it would have been ideal to study a group of asphyxiated newborns not treated with hypothermia so as to determine how the hypothermia treatment influenced the magnitude of the severity of the observed changes. However, since cooling is now the standard of care, it is no longer ethically possible to not receive hypothermia to assess the evolution over time of DWI and DTI. In addition, neurodevelopmental studies of these newborns also would be recommended to better understand how these injuries unfold into eventual neurodevelopmental impairments. Additional studies measuring the three principal eigenvectors that can describe diffusion in and around a lesion may provide additional insight into injury evolution and the response of the brain to the insult [48]. An atlas-based DTI analysis in which these results would be compared with healthy controls would also enable a better understanding of these injuries.

In conclusion, advanced neuroimaging techniques such as DWI and DTI still enable the detection of changes related to the development of later brain injury of asphyxiated newborns treated with hypothermia, as early as days 2-3 of life, similarly to what was described for normothermic asphyxiated newborns. In addition, repeated FA measurements may enable the detection of subtle white matter injuries that are otherwise not visible on conventional imaging. Further studies with serial MRI design focusing on a larger group of asphyxiated newborns treated with hypothermia who develop brain injury are needed to further understand how brain injuries develop in these newborns despite hypothermia treatment. These studies may improve the accuracy of prognostic information given to the parents of such infants.

Abbreviations

ADC: | Apparent diffusion coefficient
DTI: | Diffusion-tensor imaging
DWI: | Diffusion-weighted imaging
FA: | Fractional anisotropy
MRI: | Magnetic resonance imaging.

Disclosure

The study sponsors had no involvement in the study design, the collection, analysis, and interpretation of data, the writing of the report, or the decision to submit the paper for publication. This paper has been contributed to, seen, and approved by all the authors. Guillaume Gilbert is an employee of Philips Healthcare. All the authors fulfill the authorship credit requirements. Saskia Kwan wrote the first draft of this paper. No honorarium grant or other form of payment was received for the preparation of this paper.

Conflict of Interests

There is no conflict of interests.

Acknowledgments

The authors thank the families and their newborns for participating in the study. Special thanks are also expressed to the NICU nurses, the NICU respiratory therapists, and the MRI technicians who have made this study possible. The authors also thank Mr. Wayne Ross Egers for his professional English correction of the paper. Pia Wintermark received research grant funding from the FRSQ Clinical Research Scholar Career Award Junior 1, the New Investigator Research Grant from the SickKids Foundation and the CIHR Institute of Human Development, Child and Youth Health (IHDCYH).

References

D. Azzopardi, B. Strohm, N. Marlow et al., “Effects of hypothermia for perinatal asphyxia on childhood outcomes,” The New England Journal of Medicine, vol. 371, no. 2, pp. 140–149, 2014.

S. E. Jacobs, M. Berg, R. Hunt, W. O. Tarnow-Mordi, T. E. Inder, and P. G. Davis, “Cooling for newborns with hypoxic-ischemic encephalopathy,” The Cochrane Database of Systematic Reviews, vol. 1, Article ID CD003311, 2013.

S. Shankaran, A. Pappas, S. A. McDonald et al., “Childhood outcomes after hypothermia for neonatal encephalopathy,” The New England Journal of Medicine, vol. 366, pp. 2085–2092, 2012.

T. E. Inder, R. W. Hunt, C. J. Morley et al., “Randomized trial of systemic hypothermia selectively protects the cortex on MRI in term hypoxic-ischemic encephalopathy,” The Journal of Pediatrics, vol. 145, no. 6, pp. 835–837, 2004.

M. Rutherford, L. A. Ramenghi, A. D. Edwards et al., “Assessment of brain tissue injury after moderate hypothermia in neonates with hypoxic-ischaemic encephalopathy: a nested substudy of a randomised controlled trial,” The Lancet Neurology, vol. 9, no. 1, pp. 39–45, 2010.

F. Cavalleri, L. Lugli, M. Pugliese et al., “Prognostic value of diffusion-weighted imaging summation scores or apparent diffusion coefficient maps in newborns with hypoxic-ischemic encephalopathy,” Pediatric Radiology, vol. 44, pp. 1141–1154, 2014.

M. Rutherford, S. Counsell, J. Allsop et al., “Diffusion-weighted magnetic resonance imaging in term perinatal brain injury: a comparison with site of lesion and time from birth,” Pediatrics, vol. 114, no. 4, pp. 1004–1014, 2004.

J. D. Winter, D. S. Lee, R. M. Hung et al., “Apparent diffusion coefficient pseudonormalization time in neonatal hypoxic-ischemic encephalopathy,” Pediatric Neurology, vol. 37, no. 4, pp. 255–262, 2007.

R. L. Wolf, R. A. Zimmerman, R. Clancy, and J. H. Haselgrove, “Quantitative apparent diffusion coefficient measurements in term neonates for early detection of hypoxic-ischemic brain injury: initial experience,” Radiology, vol. 218, no. 3, pp. 825–833, 2001.

R. C. McKinstry, J. H. Miller, A. Z. Snyder et al., “A prospective, longitudinal diffusion tensor imaging study of brain injury in newborns,” Neurology, vol. 59, no. 6, pp. 824–833, 2002.

P. Ward, S. Counsell, J. Allsop et al., “Reduced fractional anisotropy on diffusion tensor magnetic resonance imaging after hypoxic-ischemic encephalopathy,” Pediatrics, vol. 117, no. 4, pp. e619–e630, 2006.

A. J. Barkovich, “MR imaging of the neonatal brain,” Neuroimaging Clinics of North America, vol. 16, no. 1, pp. 117–135, 2006.

C. Boichot, P. M. Walker, C. Durand et al., “Term neonate prognoses after perinatal asphyxia: contributions of MR imaging, MR spectroscopy, relaxation times, and apparent diffusion coefficients,” Radiology, vol. 239, no. 3, pp. 839–848, 2006.

S. K. Goergen, H. Ang, F. Wong et al., “Early MRI in term infants with perinatal hypoxic-ischaemic brain injury: Interobserver agreement and MRI predictors of outcome at 2 years,” Clinical Radiology, vol. 69, no. 1, pp. 72–81, 2014.

A. J. Barkovich, S. P. Miller, A. Bartha et al., “MR imaging, MR spectroscopy, and diffusion tensor imaging of sequential studies in neonates with encephalopathy,” American Journal of Neuroradiology, vol. 27, no. 3, pp. 533–547, 2006.

M. Rutherford, L. Srinivasan, L. Dyet et al., “Magnetic resonance imaging in perinatal brain injury: clinical presentation, lesions and outcome,” Pediatric Radiology, vol. 36, no. 7, pp. 582–592, 2006.

P. Wintermark, A. Hansen, J. Soul, M. Labrecque, R. L. Robertson, and S. K. Warfield, “Early versus late MRI in asphyxiated newborns treated with hypothermia,” Archives of Disease in Childhood: Fetal and Neonatal Edition, vol. 96, no. 1, pp. F36–F44, 2011.

A. J. Barkovich, K. D. Westmark, H. S. Bedi, J. C. Partridge, D. M. Ferriero, and D. B. Vigneron, “Proton spectroscopy and diffusion imaging on the first day of life after perinatal asphyxia: preliminary report,” American Journal of Neuroradiology, vol. 22, no. 9, pp. 1786–1794, 2001.

O. Brissaud, M. Amirault, F. Villega, O. Periot, J. F. Chateil, and M. Allard, “Efficiency of fractional anisotropy and apparent diffusion coefficient on diffusion tensor imaging in prognosis of neonates with hypoxic-ischemic encephalopathy: a methodologic prospective pilot study,” American Journal of Neuroradiology, vol. 31, no. 2, pp. 282–287, 2010.

J. S. Coats, A. Freeberg, E. G. Pajela, A. Obenaus, and S. Ashwal, “Meta-analysis of apperant diffusion coefficients in the newborn brain,” Pediatric Neurology, vol. 41, no. 4, pp. 263–274, 2009.

J. D. Hanrahan, I. J. Cox, D. Azzopardi et al., “Relation between proton magnetic resonance spectroscopy within 18 hours of birth asphyxia and neurodevelopment at 1 year of age,” Developmental Medicine & Child Neurology, vol. 41, no. 2, pp. 76–82, 1999.

C. L'Abee, L. S. de Vries, J. van der Grond, and F. Groenendaal, “Early diffusion-weighted MRI and ¹H-magnetic resonance spectroscopy in asphyxiated full-term neonates,” Biology of the Neonate, vol. 88, no. 4, pp. 306–312, 2005.

L. Liauw, G. van Wezel-Meijler, S. Veen, M. A. van Buchem, and J. van der Grond, “Do apparent diffusion coefficient measurements predict outcome in children with neonatal hypoxic-ischemic encephalopathy?” The American Journal of Neuroradiology, vol. 30, no. 2, pp. 264–270, 2009.

S. Thayyil, M. Chandrasekaran, A. Taylor et al., “Cerebral magnetic resonance biomarkers in neonatal encephalopathy: a meta-analysis,” Pediatrics, vol. 125, no. 2, pp. e382–e395, 2010.

P. S. Hüppi and J. Dubois, “Diffusion tensor imaging of brain development,” Seminars in Fetal and Neonatal Medicine, vol. 11, no. 6, pp. 489–497, 2006.

M. Rutherford, P. Ward, J. Allsop, C. Malamatentiou, and S. Counsell, “Magnetic resonance imaging in neonatal encephalopathy,” Early Human Development, vol. 81, no. 1, pp. 13–25, 2005.

N. Bednarek, A. Mathur, T. Inder, J. Wilkinson, J. Neil, and J. Shimony, “Impact of therapeutic hypothermia on MRI diffusion changes in neonatal encephalopathy,” Neurology, vol. 78, no. 18, pp. 1420–1427, 2012.

S. L. Bonifacio, A. Saporta, H. C. Glass et al., “Therapeutic hypothermia for neonatal encephalopathy results in improved microstructure and metabolism in the deep gray nuclei,” American Journal of Neuroradiology, vol. 33, no. 11, pp. 2050–2055, 2012.

D. Gano, V. Chau, K. J. Poskitt et al., “Evolution of pattern of injury and quantitative MRI on days 1 and 3 in term newborns with hypoxic-ischemic encephalopathy,” Pediatric Research, vol. 74, no. 1, pp. 82–87, 2013.

J. Neil, “Is MRI still cool after hypothermia?” The Lancet Neurology, vol. 9, no. 1, pp. 19–20, 2010.

N. H. Thakur, A. J. Spencer, H. W. Kilbride, and L. H. Lowe, “Findings and patterns on MRI and MR spectroscopy in neonates after therapeutic hypothermia for hypoxic ischemic encephalopathy treatment,” Southern Medical Journal, vol. 106, no. 6, pp. 350–355, 2013.

M. A. Rutherford, D. Azzopardi, A. Whitelaw et al., “Mild hypothermia and the distribution of cerebral lesions in neonates with hypoxic-ischemic encephalopathy,” Pediatrics, vol. 116, no. 4, pp. 1001–1006, 2005.

E. C. C. Lee, N. S. Kwatra, G. Vezina, and Z. P. Khademian, “White matter integrity on fractional anisotropy maps in encephalopathic neonates post hypothermia therapy with normal-appearing MR imaging,” Pediatric Radiology, vol. 43, no. 6, pp. 709–715, 2013.

A. N. Massaro, N. Kadom, T. Chang, P. Glass, K. Nelson, and S. Baumgart, “Quantitative analysis of magnetic resonance images and neurological outcome in encephalopathic neonates treated with whole-body hypothermia,” Journal of Perinatology, vol. 30, no. 9, pp. 596–603, 2010.

P. Wintermark, M. Labrecque, S. K. Warfield, S. Dehart, and A. Hansen, “Can induced hypothermia be assured during brain MRI in neonates with hypoxic-ischemic encephalopathy?” Pediatric Radiology, vol. 40, no. 12, pp. 1950–1954, 2010.

A. J. Barkovich, B. L. Hajnal, D. Vigneron et al., “Prediction of neuromotor outcome in perinatal asphyxia: evaluation of MR scoring systems,” American Journal of Neuroradiology, vol. 19, no. 1, pp. 143–149, 1998.

American Academy of Pediatrics, “Neonatal Encephalopathy and Neurologic Outcome, Second Edition,” Pediatrics, vol. 133, no. 5, pp. e1482–e1488, 2014.

“Executive summary: neonatal encephalopathy and neurologic outcome, second edition. Report of the American College of Obstetricians and Gynecologists’ Task Force on Neonatal Encephalopathy,” Obstetrics & Gynecology, vol. 123, no. 4, pp. 896–901, 2014.

E. Boudes, X. Tan, C. Saint-Martin, M. Shevell, and P. Wintermark, “MRI obtained during versus after hypothermia in asphyxiated newborns,” Archives of Disease in Childhood—Fetal and Neonatal Edition, vol. 100, no. 3, pp. F238–F242, 2015.

S. M. Smith, “Fast robust automated brain extraction,” Human Brain Mapping, vol. 17, no. 3, pp. 143–155, 2002.

E. Garyfallidis, M. Brett, B. Amirbekian et al., “Dipy, a library for the analysis of diffusion MRI data,” Frontiers in Neuroinformatics, vol. 8, article 8, 2014.

P. Wintermark, A. Hansen, M. C. Gregas et al., “Brain perfusion in asphyxiated newborns treated with therapeutic hypothermia,” The American Journal of Neuroradiology, vol. 32, no. 11, pp. 2023–2029, 2011.

C. A. Schneider, W. S. Rasband, and K. W. Eliceiri, “NIH Image to ImageJ: 25 years of image analysis,” Nature Methods, vol. 9, no. 7, pp. 671–675, 2012.

D. Le Bihan, J. Delannoy, and R. L. Levin, “Temperature mapping with MR imaging of molecular diffusion: application to hyperthermia,” Radiology, vol. 171, no. 3, pp. 853–857, 1989.

H. Bouza, L. M. S. Dubowitz, M. Rutherford, and J. M. Pennock, “Prediction of outcome in children with congenital hemiplegia: a magnetic resonance imaging study,” Neuropediatrics, vol. 25, no. 2, pp. 60–66, 1994.

L. S. de Vries, J. van Der Grond, I. C. van Haastert, and F. Groenendaal, “Prediction of outcome in new-born infants with arterial ischaemic stroke using diffusion-weighted magnetic resonance imaging,” Neuropediatrics, vol. 36, no. 1, pp. 12–20, 2005.

A. N. Massaro, I. Evangelou, A. Fatemi et al., “White matter tract integrity and developmental outcome in newborn infants with hypoxic-ischemic encephalopathy treated with hypothermia,” Developmental Medicine & Child Neurology, vol. 57, no. 5, pp. 441–448, 2015.

C. Limperopoulos, J. S. Soul, H. Haidar et al., “Impaired trophic interactions between the cerebellum and the cerebrum among preterm infants,” Pediatrics, vol. 116, no. 4, pp. 844–850, 2005.