Neural Plasticity
Volume 2018 (2018), Article ID 6924505, 1 page
https://doi.org/10.1155/2018/6924505

Retraction

Retracted: Fractalkine Attenuates Microglial Cell Activation Induced by Prenatal Stress

Neural Plasticity

Received 25 October 2017; Accepted 25 October 2017; Published 22 May 2018

Copyright © 2018 Neural Plasticity. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Neural Plasticity has retracted the article titled “Fractalkine Attenuates Microglial Cell Activation Induced by Prenatal Stress” [1]. Figures 5 and 6 show signs of figure duplication. In Figure 5, β-actin lanes 1–3 and lanes 4–6 appear to be the same but rotated. In Figure 6, CX3CR1 lanes 1-2 and β-actin lanes 7-8 appear to be the same and CX3CR1 lanes 2 and 7 appear to be the same. The authors provided the underlying blots for Figures 1, 5, and 6, but these blots do not all match the corresponding published images and there was undeclared splicing.

The first author would like to apologize to the other authors, to the readers and editors of Neural Plasticity for these graphical errors. All authors agree to the retraction.

References

J. Ślusarczyk, E. Trojan, K. Głombik et al., “Fractalkine attenuates microglial cell activation induced by prenatal stress,” Neural Plasticity, vol. 2016, Article ID 7258201, 11 pages, 2016.