Parkinson’s Disease
Volume 2019 (2019), Article ID 2654204, 1 page
https://doi.org/10.1155/2019/2654204

Corrigendum

Corrigendum to “Five-Year Clinical Outcomes of Local versus General Anesthesia Deep Brain Stimulation for Parkinson’s Disease”

Sheng-Tzung Tsai,1,2 Tsung-Ying Chen,³ Sheng-Huang Lin,⁴ and Shin-Yuan Chen1,2

¹Department of Neurosurgery, Tzu Chi General Hospital, Tzu Chi University, Hualien, Taiwan
²Institute of Medical Sciences, Tzu Chi University, Hualien, Taiwan
³Department of Anesthesiology, Tzu Chi General Hospital, Tzu Chi University, Hualien, Taiwan
⁴Department of Neurology, Tzu Chi General Hospital, Tzu Chi University, Hualien, Taiwan

Correspondence should be addressed to Shin-Yuan Chen; william.sychen@msa.hinet.net

Received 24 October 2019; Accepted 29 October 2019; Published 20 November 2019

Copyright © 2019 Sheng-Tzung Tsai et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Five-Year Clinical Outcomes of Local versus General Anesthesia Deep Brain Stimulation for Parkinson’s Disease” [1], there was an error in Methods where the IRB “no. 097-32” was missing. The sentence “The institutional review board of Tzu Chi General Hospital approved this study (no. 097-08)” should be corrected as follows: “The Institutional Review Board of Tzu Chi General Hospital approved the studies (no. 097-08 and no. 097-32).”

References

S.-T. Tsai, T.-Y. Chen, S.-H. Lin, and S.-Y. Chen, “Five-year clinical outcomes of local versus general anesthesia deep brain stimulation for Parkinson’s disease,” Parkinson’s Disease, vol. 2019, Article ID 5676345, 8 pages, 2019.