Pulmonary Medicine

Volume 2014 (2014), Article ID 426964, 1 page

http://dx.doi.org/10.1155/2014/426964

Retraction

Retracted: Predictive Role of ADA in Bronchoalveolar Lavage Fluid in Making the Diagnosis of Pulmonary Tuberculosis

Pulmonary Medicine

Received 27 May 2014; Accepted 27 May 2014; Published 5 June 2014

Copyright © 2014 Pulmonary Medicine. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

This article has been retracted as it is essentially identical in content with the published article “Adenosine Deaminase Activity in Bronchoalveolar Lavage Fluid in Patients with Smear-Negative Pulmonary Tuberculosis” [1] in 2008 by Tanaffos journal (Tanaffos (2008) 7(2), 45–49).

References

F. Binesh and A. Halvani, “Predictive role of ADA in bronchoalveolar lavage fluid in making the diagnosis of pulmonary tuberculosis,” Pulmonary Medicine, vol. 2013, Article ID 851518, 4 pages, 2013.