Pain Research and Management
Volume 2016 (2016), Article ID 6435156, 1 page
http://dx.doi.org/10.1155/2016/6435156

Corrigendum

Corrigendum to “Spinal Antinociceptive Action of Amiloride and Its Interaction with Tizanidine in the Rat Formalin Test”

Handong Ouyang, Peizong Wang, Wan Huang, Qian Li, Bilin Nie, and Weian Zeng

Department of Anesthesiology, State Key Laboratory of Oncology in Southern China, Cancer Center, Sun Yat-Sen University, Collaborative Innovation Center for Cancer Medicine, Guangzhou, China

Received 31 December 2015; Accepted 31 December 2015

Copyright © 2016 Handong Ouyang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In this article [1] published in the November/December 2015 issue of the journal, authors Handong Ouyang and Peizong Wang contributed equally to the study.

References

H. Ouyang, P. Wang, W. Huang, Q. Li, B. Nie, and W. Zeng, “Spinal antinociceptive action of amiloride and its interaction with tizanidine in the rat formalin test,” Pain Research and Management, vol. 20, no. 6, pp. 321–326, 2015.