Pain Research and Treatment
Volume 2015 (2015), Article ID 350798, 1 page
http://dx.doi.org/10.1155/2015/350798

Retraction

Retracted: Is Hippocampus Susceptible to Antinociceptive Tolerance to NSAIDs Like the Periaqueductal Grey?

Pain Research and Treatment

Received 12 October 2015; Accepted 12 October 2015

Copyright © 2015 Pain Research and Treatment. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Is Hippocampus Susceptible to Antinociceptive Tolerance to NSAIDs Like the Periaqueductal Grey?” [1] has been retracted as it is essentially identical in content with a previously published paper titled “Antinociceptive Tolerance to NSAIDs Microinjected into Dorsal Hippocampus” published by the same authors in BMC Pharmacology and Toxicology.

References

N. Tsiklauri, I. Nozadze, G. Gurtskaia, and M. G. Tsagareli, “Is hippocampus susceptible to antinociceptive tolerance to NSAIDs like the periaqueductal grey?” Pain Research and Treatment, vol. 2014, Article ID 654578, 8 pages, 2014.