Sarcoma
Volume 2015 (2015), Article ID 861575, 8 pages
http://dx.doi.org/10.1155/2015/861575

Clinical Study

Intercalary Reconstruction after Wide Resection of Malignant Bone Tumors of the Lower Extremity Using a Composite Graft with a Devitalized Autograft and a Vascularized Fibula

Koichi Ogura,¹ Shimpei Miyamoto,² Minoru Sakuraba,² Tomohiro Fujiwara,¹ Hirokazu Chuman,¹ and Akira Kawai¹

¹Department of Musculoskeletal Oncology, National Cancer Center Hospital, 5-1-1 Tsukiji, Chuo-ku, Tokyo 104-0045, Japan
²Department of Plastic and Reconstruction Surgery, National Cancer Center Hospital, 5-1-1 Tsukiji, Chuo-ku, Tokyo 104-0045, Japan

Received 29 November 2014; Revised 16 January 2015; Accepted 2 February 2015

Academic Editor: Valerae O. Lewis

Copyright © 2015 Koichi Ogura et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Introduction. Although several intercalary reconstructions after resection of a lower extremity malignant bone tumor are reported, there are no optimal methods which can provide a long-term reconstruction with fewest complications. We present the outcome of reconstruction using a devitalized autograft and a vascularized fibula graft composite. Materials and Methods. We conducted a retrospective review of 11 patients (7 males, 4 females; median age 27 years) undergoing reconstruction using a devitalized autograft (pasteurization (), deep freezing ()) and a vascularized fibula graft composite for lower extremity malignant bone tumors (femur (), tibia ()). Results. The mean period required for callus formation and bone union was 4.4 months and 9.9 months, respectively. Four postoperative complications occurred in 3 patients: 2 infections (1 pasteurized autograft, 1 frozen autograft) and 1 fracture and 1 implant failure (both in pasteurized autografts). Graft removal was required in 2 patients with infections. The mean MSTS score was 81% at last follow-up. Conclusions. Although some complications were noted in early cases involving a pasteurized autograft, our novel method involving a combination of a frozen autograft with a vascularized fibula graft and rigid fixation with a locking plate may offer better outcomes than previously reported allografts or devitalized autografts.

1. Introduction

Limb salvage surgery has replaced amputation for malignant musculoskeletal tumors. Most bone sarcomas occur in the metaphyseal portion of the bone and typical resection involves the whole proximal or distal part of the bone. Therefore, in most cases, the resected segment of bone is replaced by a prosthesis, which provides satisfactory results quickly after surgery. However, when the tumor involves the diaphyseal portion of the bone, an intercalary reconstruction method is required, and this has not been standardized. Intercalary allografts, which is the most widely accepted reconstruction method, are associated with high incidences of nonunion (12–57%), fracture (17–30%), and infection (10–15%). [1–6]. In addition, single use of devitalized autograft such as frozen autograft or pasteurized autograft was also associated with nonunion (20% and 7%, resp.) [7, 8]. Although a segmental prosthesis can provide immediate stability and good short-term postoperative function, it is associated with long-term problems including implant wear, breakage, and loosening with the 10-year implant survival of 63% [9]. Therefore there is an urgent need to develop an optimal reconstruction method for this type of condition.

Vascularized fibula grafts have been reported to yield favorable outcomes in terms of bone union in cases of trauma, infection, or musculoskeletal tumors [10–15]. Recently, several investigators have reported an intercalary reconstruction technique using a composite graft comprising a free vascularized fibula graft with an allograft, or an extracorporeally irradiated or pasteurized autograft, in order to overcome shortcomings such as nonunion, infection, and fracture resulting from deterioration of mechanical strength [10, 16–18].

The aim of the present study was to analyze the clinical and functional outcomes of intercalary reconstruction using a composite graft comprising a devitalized autograft and a vascularized fibula graft after wide resection of malignant bone tumor of the lower extremity and compare the results with those reported previously for other reconstruction methods. In addition, we investigated the applicability of a novel surgical technique using a frozen autograft and a vascularized fibula graft composite and compared it with pasteurized autograft group.

2. Patients and Methods

We conducted a retrospective review of 11 consecutive patients who underwent intercalary bone defect reconstruction using a devitalized autograft combined with a vascularized fibula graft composite between 2007 and 2011. Their clinical data, treatment modalities, and outcome were reviewed retrospectively with reference to the medical records. The mean follow-up period was 68 months (range, 25–131 months).

The following data were examined: demographic data (patient age at operation, gender, tumor site, and histologic diagnosis), surgical details (length of bone defect, methods of devitalization, operation time, total blood loss, and reconstruction details), adjuvant therapy (chemotherapy and radiotherapy), postoperative complications (nonunion, fracture, implant failure, or infection), the time required for bone union, the findings of bone scintigraphy, oncologic outcomes, and functional outcomes.

Wide resection of the tumor was performed in all cases, and the bone defect was reconstructed with a devitalized autograft and a vascularized fibula graft placed into the medullary canal of the autograft. The composite graft was rigidly fixed with a plate and screws (Figure 1). The pasteurized or frozen autografts were prepared as described previously [7, 19, 20]. Bone union was defined as the presence of fusion between the host bone and the devitalized autograft at both ends and full weight-bearing without pain. Bone scintigraphy was performed soon after surgery (within 2 months) and late after surgery (more than 6 months) in selected cases. Functional outcome of the reconstructed limb was assessed using the Musculoskeletal Tumor Society (MSTS) scoring system [21], which included pain, function, emotional acceptance, use of any external support, walking ability, and gait alteration.

Figure 1: Illustration showing reconstruction of a femur diaphysis using a composite graft with a devitalized autograft and a vascularized fibula graft.

3. Results

Patient demographics and treatment data are summarized in Tables 1 and 2. There were 7 males and 4 females with a mean age of 29 years (range, 11–63 years). No patients had preoperative comorbidities that might have influenced the bone healing time. The histological diagnoses were osteosarcoma (), bone involving soft tissue sarcoma (), Ewing’s sarcoma (), and chondrosarcoma (). The locations of the resected bone were the femur () and tibia (). Adjuvant chemotherapy and radiotherapy were performed in 8 and 1 patients, respectively. The mean length of the bone defect was 19 cm (range, 10–22 cm). The methods of devitalization included pasteurization () and deep freezing (). Free bone grafting from iliac crest at the junction was performed in 8 patients. The fixation method included a plate in 5 patients, a locking plate in 5 patients, and only screws in 1 patient. The total operation time ranged from 430 to 910 minutes (mean, 698 minutes) and mean blood loss was 1,086 mL (range, 354–2,162 mL). Although the mean operation time was shorter and mean blood loss was less in the frozen autograft group (645 minutes, 841 mL) than in the pasteurized autograft group (710 minutes, 1,291 mL), the differences were not statistically significant ( and 0.319, resp.).

Table 1: Patient demographics and adjuvant therapy data.

Number
Age
Gender
Histologic diagnosis
Tumor site
Tumor size (cm)
Chemotherapy
Radiotherapy

1
20
M
Osteosarcoma
Femur
16
Preoperative/postoperative
None

2
11
F
Osteosarcoma
Femur
16
Preoperative/postoperative
None

3
49
M
Bone involving recurrent myxoid liposarcoma
Femur
14
Preoperative/postoperative
Preoperative

4
27
M
Fibrosarcoma (grade 2)
Femur
13
None
None

5
37
M
Ewing's sarcoma
Femur
13
Preoperative/postoperative
None

6
29
F
Parosteal osteosarcoma
Femur
6
None
None

7
16
F
Osteosarcoma
Femur
14
Preoperative/postoperative
None

8
36
M
Osteosarcoma
Tibia
10
Preoperative/postoperative
None

9
11
F
Osteosarcoma
Femur
16
Preoperative/postoperative
None

10
63
M
Bone involving myxofibrosarcoma
Femur
12
Preoperative
None

11
19
M
Chondrosarcoma (grade 2)
Femur
16
None
None

Table 2: Surgical details of the patients.

Number
Length of bone defect (cm)
Method of devitalization
Free bone graft at the junction
Fixation
Operation time (min)
Blood loss (mL)

1
22
Pasteurization
Yes
Plate
630
1615

2
22
Pasteurization
Yes
Plate
540
574

3
20
Pasteurization
Yes
Plate
670
713

4
18
Pasteurization
No
Plate
910
1900

5
20
Pasteurization
No
Plate
660
823

6
10
Pasteurization
No
Screw
848
2121

7
20
Deep freezing
Yes
Locking plate
430
634

8
16
Deep freezing
Yes
Locking plate
854
604

9
22
Deep freezing
Yes
Locking plate
684
354

10
18
Deep freezing
Yes
Locking plate
750
450

11
22
Deep freezing
Yes
Locking plate
506
2162

Treatment results are summarized in Table 3. Bone union was achieved in 10 patients (91%). In case 5, deep infection occurred and resulted in graft removal to cure the infection at 2 months after surgery. Therefore, bone union was not evaluable. The mean period required for callus formation and bone union was 4.4 months (range, 3–11 months) and 9.9 months (range, 4–14 months), respectively. Time required for bone union was significantly shorter in the frozen autograft group (7.0 months) than in the pasteurized autograft group (11.2 months) (Student’s -test, ). Although no statistical significance was noted, the mean period until bone union in patients who underwent free bone grafting was shorter than in those who did not (8.9 months versus 11.0 months; Student’s -test, ). Hypertrophy of the vascularized fibula and subsequent bone integration into the devitalized autograft was seen in only 2 patients at 21 months (Patient 4) and 39 months (Patient 7) after surgery, respectively. Bone scintigraphy in the early phase was performed in 7 patients and all of them showed increased uptake in the fibula graft and no uptake in the devitalized autograft. Among these patients, 3 underwent bone scintigraphy in the late phase; 2 patients showed increased uptake in both the fibula graft and the devitalized autograft, and 1 patient showed increased uptake in the fibula graft and no uptake in the devitalized autograft.

Table 3: Treatment, oncologic, and functional outcomes.

Number
Time to callus formation (months)
Time to bone union (months)
Postoperative complications
Additional surgery for complications
Graft removal or amputation
Local recurrence
Metastasis
Oncologic outcome
Follow-up period (months)

1
3
7
Graft displacement resulting from screw breakage (11 months)
Reduction and refixation
Amputation due to recurrence
Yes
Lung, bone
DOD
44

2
4
12
None

No
No
No
CDF
131

3
3
13
None

Amputation due to recurrence
Yes
No
NED
129

4
11
14
None

No
No
Lung
DOD
39

5
6
12
Fracture (21 months)
Infection (32 months)
Reduction and refixation
Graft removal
Removal due to deep infection
No
No
CDF
104

6
4
10
None

No
No
No
CDF
81

7
3
9
None

No
No
No
CDF
75

8
NA
NA
Infection (2 months)
Graft removal and external fixation
Removal due to deep infection
No
Lung
AWD
56

9
4
10
None

No
No
Lung
AWD
37

10
3
8
None

No
No
Lung
AWD
31

11
3
4
None

No
No
No
CDF
25

Four postoperative complications occurred in 3 patients: 2 infections (1 pasteurized autograft, 1 frozen autograft) and 1 fracture at the proximal host-graft junction and 1 implant failure (screw breakage) (both in pasteurized autografts). No significant difference in the postoperative complication rate was seen between the pasteurized and frozen autograft groups (Fisher’s exact test, ). Graft removal was required in 2 patients with infections. Two patients suffered from local recurrence out of the pasteurized autograft, which necessitated amputation. Oncological outcomes for the patients overall were CDF in 5, NED in 1, AWD in 3, and DOD in 2 patients at the time of last follow-up. The mean MSTS score was 81% (range, 43–100%). The mean MSTS score was relatively higher in the frozen autograft group (85%) than in the pasteurized autograft group (70%), but the difference was not statistically significant (Student’s -test, ).

Representative Case (Patient 7). The patient was a 16-year-old female with osteosarcoma of the left distal femur (Figure 2(a)). She underwent neoadjuvant chemotherapy with adriamycin, cisplatin, and ifosfamide, and reduction in the size of the tumor was noted (Figures 2(b) and 2(c)). Intercalary wide resection was performed and the length of the bone defect was 20 cm. This was reconstructed using a composite graft comprising a frozen autograft and a vascularized fibula placed into the medullary canal of the frozen autograft. Microvascular anastomoses were performed and the composite graft was finally fixed to the host bone with a locking plate and screws (Figures 3(a) and 3(b)). Postoperatively, adjuvant chemotherapy with the same agents was performed. There were no postoperative complications or local recurrence. At 9 months after surgery, bone union at the host-devitalized autograft junction and host-fibula graft junction was achieved (Figure 3(c)). Hypertrophy of the inlaid fibula and subsequent integration with the frozen autograft became evident on CT at 39 months after surgery (Figure 4). The patient was able to walk without a walking aid and enjoy mild sports activity at 75 months after surgery. The MSTS score at the time of last follow-up was 100%.

(a)

(b)

(c)

Figure 2: A plain radiograph of the left distal femur demonstrates an osteolytic lesion with destruction of the cortex and intratumoral ossification (a). Coronal MR images demonstrate a large extraosseous mass with destruction of the cortex (b). Reduction in size of the tumor was noted after preoperative chemotherapy (c).

(a)

(b)

(c)

Figure 3: The composite graft was rigidly fixed to the host bone with a locking plate and screws ((a) operative photograph, (b) postoperative plain radiograph). A plain radiograph 9 months after surgery. Bone union was achieved (c).

Figure 4: A CT scan at 39 months after surgery. Bridging bone formation from the hypertrophic inlaid fibula to the frozen autograft is evident.

4. Discussion

Reconstruction options following intercalary resection of lower extremity malignancy have included the use of massive allografts [22–24], autoclaved autografts [25], pasteurized autografts [8], irradiated autografts [26], and segmental prostheses [9, 27]. Each procedure has its own shortcomings and no standardized method has been established. The complication rate associated with intercalary allograft reconstruction has been considerably high. The complications of intercalary allografts have included nonunion (12–57%), fracture (17–30%), and infection (10–15%) [1–6, 22–24, 28]. One of the main disadvantages of devitalized autografts such as autoclaved, pasteurized, or irradiated autografts is that it takes a long time for them to be revascularized and incorporated into the surrounding bone. In addition, several investigators have reported high rates of infections, fractures, nonunions, and bone resorption associated with the procedure [8, 25, 26, 28]. For example, reconstruction using a pasteurized autograft was associated with high rate (52%) of complications including primary nonunion (20%), infection (20%), fracture (12%), and massive bone resorption (8%) [8]. Reconstruction using an autograft frozen with liquid nitrogen was reported to be a simple and effective method of biological reconstruction [7]. However, it still has some problems similar to those of allografts or other types of devitalized autografts, including infection (11%), fracture (7%), or nonunion (7%) [7], and there is an urgent need to develop an optimal reconstruction to decrease these problems.

Recently, a composite graft technique that combines an allograft or a devitalized autograft with a vascularized fibula graft for reconstruction of large bony defects has been developed [10, 16–18, 29, 30]. The rationale for use of a composite graft is that it combines the advantages of immediate mechanical endurance of a massive allograft or a devitalized autograft with the long-standing biological properties of a vascularized fibula graft. The allograft or devitalized autograft provides a massive bone stock and early stabilization, whereas the vascularized fibular graft facilitates host-graft union. Chang and Weber [18] reported 6 primary intercalary reconstructions with composite use of a vascularized fibula graft and an allograft. All of the 6 studied patients (100%) achieved successful bone union, and the mean time until bone union was 6 months (range, 3–8 months). Sugiura et al. [10] reported 15 intercalary reconstructions with composite use of a vascularized fibula graft and a pasteurized autograft. Bone union was achieved in 13 cases (87%) and the mean period until bone union was 13.5 months (range, 7–25 months). Postoperative complications included fractures in 2 patients and infection in another 2. There were no local recurrences. Krieg et al. [17] reported 13 intercalary reconstructions with composite use of a vascularized fibula graft and an extracorporeal irradiated autograft. Nonunion was found in 16% of host-donor junctions and they required additional surgical procedures. The median time until primary bone union was 7.5 months at metaphyseal junctions and 11.1 months at diaphyseal junctions. Postoperative complications included 1 fracture. There were no cases of infection. Although direct comparison is difficult due to the lack of statistical power and the heterogeneity of the population, the bone union rate in the present study (91%) was comparable to these reports (84–100%) and postoperative complication rate (27%) seemed relatively high compared with these reports (0–27%) [10, 17, 18].

In addition to reconstruction with a previously reported combination of a vascularized fibula graft and a pasteurized autograft, we performed a novel reconstruction method combining a vascularized fibula graft with a frozen autograft for large segmental bone defects. Although there were no significant differences, perhaps as a result of limited statistical power, the frozen autograft group tended to have a shorter operation time, less blood loss, a lower postoperative complication rate, and better functional outcome. Out of 3 postoperative complications in 2 patients in the pasteurized autograft group, 1 fracture and 1 implant failure were related to insufficient internal fixation, and hence they may have been avoided by rigid fixation using a locking plate, as used in recent cases involving frozen autografts. The better functional outcome in the frozen autograft group may have been associated with earlier bone union, resulting in early mobilization of the reconstructed limb postoperatively. Another major point with regard to the use of a frozen autograft in composite graft reconstruction is its ability to be used anywhere and the simplicity of the procedure.

However, reconstruction using a composite graft has several disadvantages. First, it is impossible to perform histological analysis of the whole specimen for determining the effects of chemotherapy and the adequacy of the surgical margins. Second, it takes a longer operation time and requires specialist plastic surgeons. Third, the majority of the cases in the present study consisted of the reconstruction of the femur, which is considered to be less challenging than that of the tibia. Further investigation is required to show the applicability to expand this technique to patients with reconstruction of the tibia. Finally, some donor site complications which require surgical intervention such as claw toe deformity or peroneal nerve palsy may occur after the harvesting of vascularized fibula graft although there were no cases of such complications requiring surgical intervention in our series.

5. Conclusions

In conclusion, although some complications were noted especially in early cases involving a pasteurized autograft, our results suggest that a devitalized autograft combined with a vascularized fibula graft is a promising biological alternative for intercalary reconstruction after wide resection of malignant bone tumors of the lower extremity, especially in younger patients for whom longer life expectancy and increased physical activity make fractures and infections more likely. In addition, our novel method involving a combination of a frozen autograft with a vascularized fibula graft and rigid fixation with a locking plate may offer better outcomes than previously reported allografts or devitalized autografts, although longer follow-up of a greater number of patients will be required to confirm this.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This study was funded by a Grant-in-Aid for Scientific Research from the Ministry of Education and Science (B, no. 22390296) and by the National Cancer Center Research and Development Fund (23-A-10).

References

D. Donati, M. di Liddo, M. Zavatta et al., “Massive bone allograft reconstruction in high-grade osteosarcoma,” Clinical Orthopaedics and Related Research, no. 377, pp. 186–194, 2000.

M. C. Gebhardt, D. I. Flugstad, D. S. Springfield, and H. J. Mankin, “The use of bone allografts for limb salvage in high-grade extremity osteosarcoma,” Clinical Orthopaedics and Related Research, no. 270, pp. 181–196, 1991.

W. Mnaymneh, T. I. Malinin, R. D. Lackman, F. J. Hornicek, and L. Ghandur-Mnaymneh, “Massive distal femoral osteoarticular allografts after resection of bone tumors,” Clinical Orthopaedics and Related Research, no. 303, pp. 103–115, 1994.

D. L. Muscolo, M. A. Ayerza, L. Aponte-Tinao, M. Ranalletta, and E. Abalo, “Intercalary femur and tibia segmental allografts provide an acceptable alternative in reconstructing tumor resections,” Clinical Orthopaedics and Related Research, no. 426, pp. 97–102, 2004.

E. Ortiz-Cruz, M. C. Gebhardt, L. C. Jennings, D. S. Springfield, and H. J. Mankin, “The results of transplantation of intercalary allografts after resection of tumors. A long-term follow-up study,” The Journal of Bone and Joint Surgery—Americasn Volume, vol. 79, no. 1, pp. 97–106, 1997.

R. A. V. Griend, “The effect of internal fixation on the healing of large allografts,” The Journal of Bone and Joint Surgery Series A, vol. 76, no. 5, pp. 657–663, 1994.

H. Tsuchiya, S. L. Wan, K. Sakayama, N. Yamamoto, H. Nishida, and K. Tomita, “Reconstruction using an autograft containing tumour treated by liquid nitrogen,” Journal of Bone and Joint Surgery—Series B, vol. 87, no. 2, pp. 218–225, 2005.

J. Manabe, A. R. Ahmed, N. Kawaguchi, S. Matsumoto, and H. Kuroda, “Pasteurized autologous bone graft in surgery for bone and soft tissue sarcoma,” Clinical Orthopaedics and Related Research, no. 419, pp. 258–266, 2004.

M. D. Sewell, S. A. Hanna, A. McGrath et al., “Intercalary diaphyseal endoprosthetic reconstruction for malignant tibial bone tumours,” The Journal of Bone and Joint Surgery—British Volume, vol. 93, no. 8, pp. 1111–1117, 2011.

H. Sugiura, M. Takahashi, K. Nakanishi, Y. Nishida, and Y. Kamei, “Pasteurized intercalary autogenous bone graft combined with vascularized fibula,” Clinical Orthopaedics and Related Research, no. 456, pp. 196–202, 2007.

J. G. del Pino, E. B. del Valle, G. L. Graña, and J. F. Villanova, “Free vascularized fibular grafts have a high union rate in atrophic nonunions,” Clinical Orthopaedics and Related Research, no. 419, pp. 38–45, 2004.

A. Maghari, K. S. Forootan, S. A. Emami, and C. Melow, “Microvascular reconstruction of soft tissue and bone loss in war wounds,” Scandinavian Journal of Plastic and Reconstructive Surgery and Hand Surgery, vol. 26, no. 1, pp. 91–96, 1992.

A. Minami, T. Kasashima, N. Iwasaki, H. Kato, and K. Kaneda, “Vascularised fibular grafts. An experience of 102 patients,” Journal of Bone and Joint Surgery—Series B, vol. 82, no. 7, pp. 1022–1025, 2000.

R. Pollock, P. Stalley, K. Lee, and D. Pennington, “Free vascularized fibula grafts in limb-salvage surgery,” Journal of Reconstructive Microsurgery, vol. 21, no. 2, pp. 79–84, 2005.

H. Yajima, S. Tamai, S. Mizumoto, and H. Ono, “Vascularised fibular grafts for reconstruction of the femur,” The Journal of Bone and Joint Surgery—British Volume, vol. 75, no. 1, pp. 123–128, 1993.

O. Brunet, P. Anract, S. Bouabid et al., “Intercalary defects reconstruction of the femur and tibia after primary malignant bone tumour resection. A series of 13 cases,” Orthopaedics & Traumatology: Surgery & Research, vol. 97, no. 5, pp. 512–519, 2011.

A. H. Krieg, A. W. Davidson, and P. D. Stalley, “Intercalary femoral reconstruction with extracorporeal irradiated autogenous bone graft in limb-salvage surgery,” The Journal of Bone and Joint Surgery—British Volume, vol. 89, no. 3, pp. 366–371, 2007.

D. W. Chang and K. L. Weber, “Use of a vascularized fibula bone flap and intercalary allograft for diaphyseal reconstruction after resection of primary extremity bone sarcomas.,” Plastic and Reconstructive Surgery, vol. 116, no. 7, pp. 1918–1925, 2005.

H. Sugiura, S. Yamamura, K. Sato et al., “Remodelling and healing process of moderately heat-treated bone grafts after wide resection of bone and soft-tissue tumors,” Archives of Orthopaedic and Trauma Surgery, vol. 123, no. 10, pp. 514–520, 2003.

Y. Rong, K. Sato, H. Sugiura et al., “Effect of elevated temperature on experimental swarm rat chondrosarcoma,” Clinical Orthopaedics and Related Research, no. 311, pp. 227–231, 1995.

W. F. Enneking, W. Dunham, M. C. Gebhardt, M. Malawar, and D. J. Pritchard, “A system for the functional evaluation of reconstructive procedures after surgical treatment of tumors of the musculoskeletal system,” Clinical Orthopaedics and Related Research, no. 286, pp. 241–246, 1993.

R. L. M. Deijkers, R. M. Bloem, H. M. Kroon, J. B. van Lent, R. Brand, and A. H. M. Taminiau, “Epidiaphyseal versus other intercalary allografts for tumors of the lower limb,” Clinical Orthopaedics and Related Research, no. 439, pp. 151–160, 2005.

C. F. Lord, M. C. Gebhardt, W. W. Tomford, and H. J. Mankin, “Infection in bone allografts. Incidence, nature, and treatment,” The Journal of Bone and Joint Surgery—American Volume, vol. 70, no. 3, pp. 369–376, 1988.

H. J. Mankin, M. C. Gebhardt, L. C. Jennings, D. S. Springfield, and W. W. Tomford, “Long-term results of allograft replacement in the management of bone tumors,” Clinical Orthopaedics and Related Research, no. 324, pp. 86–97, 1996.

M. J. Khattak, M. Umer, and M. Umar, “Autoclaved tumor bone for reconstruction: an alternative in developing countries,” Clinical Orthopaedics and Related Research, no. 447, pp. 138–144, 2006.

D. Sabo, D. R. C. Brocai, M. Eble, M. Wannenmacher, and V. Ewerbeck, “Influence of extracorporeal irradiation on the reintegration of autologous grafts of bone and joint,” The Journal of Bone and Joint Surgery—British Volume, vol. 82, no. 2, pp. 276–282, 2000.

E. Y. S. Chao, B. Fuchs, C. M. Rowland, D. M. Ilstrup, D. J. Pritchard, and F. H. Sim, “Long-term results of segmental prosthesis fixation by extracortical bone-bridging and ingrowth,” The Journal of Bone and Joint Surgery—American Volume, vol. 86, no. 5, pp. 948–955, 2004.

B. Fuchs, C. Ossendorf, T. Leerapun, and F. H. Sim, “Intercalary segmental reconstruction after bone tumor resection,” European Journal of Surgical Oncology, vol. 34, no. 12, pp. 1271–1276, 2008.

D. W. Chang and K. L. Weber, “Segmental femur reconstruction using an intercalary allograft with an intramedullary vascularized fibula bone flap,” Journal of Reconstructive Microsurgery, vol. 20, no. 3, pp. 195–199, 2004.

K. Muramatsu, K. Ihara, T. Hashimoto, S. Seto, and T. Taguchi, “Combined use of free vascularised bone graft and extracorporeally-irradiated autograft for the reconstruction of massive bone defects after resection of malignant tumour,” Journal of Plastic, Reconstructive and Aesthetic Surgery, vol. 60, no. 9, pp. 1013–1018, 2007.