Scanning
Volume 2017 (2017), Article ID 3107374, 1 page
https://doi.org/10.1155/2017/3107374

Corrigendum

Corrigendum to “Microscopic Examination of Cold Spray Cermet Sn+In₂O₃ Coatings for Sputtering Target Materials”

M. Winnicki, A. Baszczuk, M. Rutkowska-Gorczyca, M. Jasiorski, A. Małachowska, W. Posadowski, Z. Znamirowski, and A. Ambroziak

Wrocław University of Technology, Wyb. Wyspiańskiego 27, 50371 Wrocław, Poland

Correspondence should be addressed to M. Winnicki; marcin.winnicki@pwr.wroc.pl

Received 14 September 2017; Accepted 16 October 2017; Published 25 October 2017

Copyright © 2017 M. Winnicki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Microscopic Examination of Cold Spray Cermet Sn+In₂O₃ Coatings for Sputtering Target Materials” [1], an acknowledgment should be added as follows.

This paper is based on the research supported by the Foundation for Polish Science (FNP).

References

M. Winnicki, A. Baszczuk, M. Rutkowska-Gorczyca et al., “Microscopic examination of cold spray cermet Sn+In₂O₃ coatings for sputtering target materials,” Scanning, vol. 2017, Article ID 4058636, 10 pages, 2017.