Scanning
Volume 2019 (2019), Article ID 8567174, 1 page
https://doi.org/10.1155/2019/8567174

Corrigendum

Corrigendum to “Synthesis, Morphology, and Hydrogen Absorption Properties of TiVMn and TiCrMn Nanoalloys with a FCC Structure”

Bo Li,¹ Jianding Li,¹ Huaiyu Shao,1,2 Wei Li,³ and Huaijun Lin³

¹Institute of Applied Physics and Materials Engineering (IAPME), University of Macau, Macau SAR, China
²International Institute for Carbon-Neutral Energy Research (WPI-I2CNER), Kyushu University, Fukuoka 819-0395, Japan
³Institute of Advanced Wear & Corrosion Resistance and Functional Materials, Jinan University, Guangzhou 510632, China

Correspondence should be addressed to Huaiyu Shao; hshao@umac.mo and Huaijun Lin; hjlin@jnu.edu.cn

Received 21 April 2019; Accepted 5 May 2019; Published 31 July 2019

Copyright © 2019 Bo Li et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Synthesis, Morphology, and Hydrogen Absorption Properties of TiVMn and TiCrMn Nanoalloys with a FCC Structure,” [1], there was a former affiliation missing for the third author, which is “International Institute for Carbon-Neutral Energy Research (WPI- I2CNER), Kyushu University, Fukuoka 819-0395, Japan”. The corrected authors’ list and affiliations are shown above.

References

B. Li, J. Li, H. Shao, W. Li, and H. Lin, “Synthesis, morphology, and hydrogen absorption properties of TiVMn and TiCrMn nanoalloys with a FCC structure,” Scanning, vol. 2018, Article ID 5906473, 9 pages, 2018.