Stem Cells International
Volume 2017 (2017), Article ID 7427606, 1 page
https://doi.org/10.1155/2017/7427606

Corrigendum

Corrigendum to “Fabrication of Core-Shell PEI/pBMP2-PLGA Electrospun Scaffold for Gene Delivery to Periodontal Ligament Stem Cells”

Qiao Xie,1,2 Lie-ni Jia,¹ Hong-yu Xu,³ Xiang-gang Hu,¹ Wei Wang,¹ and Jun Jia¹

¹State Key Laboratory of Military Stomatology and National Clinical Research Center for Oral Diseases and Shaanxi Key Laboratory of Oral Diseases, Department of Prosthodontics, School of Stomatology, The Fourth Military Medical University, Xi’an, Shaanxi 710032, China
²No. 422 Hospital of PLA, Zhanjiang, Guangdong 524005, China
³Hospital of PLA No. 93523 Unit, Yongji, Shanxi 044500, China

Correspondence should be addressed to Jun Jia; jiajun@fmmu.edu.cn

Received 6 September 2016; Accepted 24 January 2017; Published 15 March 2017

Copyright © 2017 Qiao Xie et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Fabrication of Core-Shell PEI/pBMP2-PLGA Electrospun Scaffold for Gene Delivery to Periodontal Ligament Stem Cells” [1], there was an error in the Acknowledgments section, which should be corrected as follows:

The authors would like to thank the financial support received from the National Science Foundation of China (no. 81271136). This investigation was supported by the School of Stomatology, Department of Military Toxicology, the Fourth Military Medical University.

References

Q. Xie, L.-N. Jia, H.-Y. Xu, X.-G. Hu, W. Wang, and J. Jia, “Fabrication of core-shell PEI/pBMP2-PLGA electrospun scaffold for gene delivery to periodontal ligament stem cells,” Stem Cells International, vol. 2016, Article ID 5385137, 11 pages, 2016.