Scientifica

Volume 2012 (2012), Article ID 949164, 4 pages

http://dx.doi.org/10.6064/2012/949164

Research Article

Body-Surface-Area Related Renal Volume: A Common Normal Range from Birth to Adulthood

Th. Scholbach¹ and D. Weitzel²

¹Klinik für Kinder- und Jugendmedizin, Städtischen Klinikum, Chemnitz gGmbH, Flemmingstraße 4, 09116 Chemnitz, Germany

²Fachbereich Kinderheilkunde und Jugendmedizin, Deutsche Klinik für Diagnostik, Aukamm Allee 33, 65191 Wiesbaden, Germany

Received 18 March 2012; Accepted 3 May 2012

Academic Editors: T. Hayashida, R. L. Maser, and T. McMorrow

Copyright © 2012 Th. Scholbach and D. Weitzel. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Renal volume is an important parameter of renal development. Deviations from normal volume may indicate pathologic conditions. Thus, during childhood, the ever changing renal volumes require the continuous referral to normal volume charts in order to classify actual volumes, which is rather inconvenient. In daily practice this is frequently disregarded and kidneys are evaluated by their appearance only. Therefore, we tested the hypothesis that body surface area (BSA) and renal volume grow proportionally from birth to adulthood. We divided the renal volume of a child by its BSA to get the BSA-related renal volume (BSARV) and found no differences between left and right kidneys and a normal distribution for all kidneys regardless of the patient’s age. BSARV has a common normal range for all age groups with the 10th percentile of 45 and the 90th percentile of 85 mL/m². 80% of all kidneys do not exceed the volume of their counterparts by more than 20%. BSARV alleviates the correct evaluation of a child’s renal volume regardless of age and reveals pathological influences by the simple observation that a kidney deviates from a former percentile or z-value. This is especially valuable in the followup of kidneys with chronic diseases.

1. Introduction

Renal volume (RV) grows throughout fetal development [1–3] and childhood [4–8]. Therefore, the evaluation of the renal volume is crucial to assess a normal renal development as well as to detect renal diseases. To evaluate an individual’s renal size, it is therefore necessary to compare it with age-related normal value charts [4], percentiles [9], or nomograms [10]. On the one hand, this is cumbersome and therefore often disregarded. On the other hand, the referral to age groups is unphysiological, because it is not logical to assume, that normal ranges do jump if a certain child crosses the limits of its age group. At present, the higher age group requires then the reevaluation of the actual renal volume with the subsequent normal value chart for this age group.

We hypothesize that the function of the kidneys meets the metabolic requirements of the whole organism. These metabolic requirements are correlated with the body surface area (BSA) [11, 12].

2. Aim

The aim of the present study was therefore to investigate if a correlation of BSA and renal volumes exists irrespective to patients’ age. By dividing renal volume by BSA we aimed to eliminate the tendency of both parameters to change with preadult growth.

3. Material and Methods

3.1. Patients

Our patients stemmed from a population of newborn and babies who were recruited for a renal ultrasound screening program in Hesse and from children from 1 month to 18 years of age from a tertiary ultrasound outpatient department in Saxony. From these children, we selected randomly 624 children, equally distributed to 5 age groups, with normal renal morphology, empty renal pelvis, undilated ureters and without anamnestical hints to renal disease (<3 m; <3 y; <6 y; <12 y; <18 y with N = 123; 109; 138; 127; 127, resp.).

3.2. BSA Calculation

BSA was calculated according to D. Du Bois and E. F. Du Bois [13] as

3.2.1. Calculation of BSA-Related Renal Volume (BSARV)

Renal volume (RV) was calculated according to the volume formula of a rotational ellipsoid [4, 14, 15]:

where —length, —width and —depth.

All kidney dimensions are maximum values of strictly longitudinal and transverse sections through the centre of the kidney and were recorded from a dorsal approach with the patient lying in a prone position.

BSARV was then calculated as

The relative renal volume was defined as the ratio of left or right renal volume divided by the total renal volume.

3.3. Statistics

The renal volume data were evaluated with respect to a normal distribution with the Kolmogorov-Smirnov test (K-S test).

Differences between groups were examined with the Mann-Whitney-U-test with a significance level of .

4. Results

No significant differences were found between left and right renal volumes (P = 0.509).

BSARV is normally distributed irrespective of body side and body size from birth to 18 years (P = 0.822 and 0.727 for left and right BSARV, resp., tested with the K-S test) (Figures 1(a) and 1(b)). The common normal range for both kidneys ranges from 45 mL/m² (10th percentile) to 85 mL/m² (90th percentile) with a mean value of 66 mL/m² (Table 1). A strong symmetry is found between left and right kidneys with the expected normal distribution of the relative renal volumes of both sides and nearly equal percentiles (Table 1; lower rows). The normal range of the relative renal volume lies between the 10th percentile of 0.45 and the 90th percentile of 0.55 (Figures 2(a) and 2(b)) with a mean of 0.50 and a standard deviation of 0.045.

Table 1: Percentiles of BSARV and relative renal volumes of both kidneys.

BSARV (mL/m² BSA)

Percentiles
3%
5%
10%
25%
50%
75%
90%
95%
97%

Left kidney
36
40
45
55
66
78
86
92
94

Right kidney
38
40
45
55
66
75
85
90
94

Relative renal volume left kidney
0.42
0.43
0.45
0.47
0.50
0.53
0.56
0.58
0.59

Relative renal volume right kidney
0.41
0.42
0.44
0.47
0.50
0.53
0.55
0.57
0.58

(a)

(b)

Figure 1: (a) Normal distribution of BSARV of the left kidney: mean = 66.25 mL/m², N = 624, SD = 15.93. (b) Normal distribution of BSARV of the right kidney: mean = 65.55 mL/m², N = 624, SD = 15.20.

(a)

(b)

Figure 2: (a) Normal distribution of relative renal volume of the left kidney: mean = 0.50, N = 624, SD = 0.045. (b) Normal distribution of relative renal volume of the right kidney: mean = 0.50, N = 624. SD = 0.045.

No significant differences were found between BSA-related left and right renal volumes of girls and boys in the entire population as well as in the five age groups (Table 2).

Table 2: No significant differences of BSA-related renal volumes between both sexes (Mann-Whitney--test).

values (Mann-Whitney test) for differences of BSA-related renal volumes between both sexes

BSA-related left renal volume (mL/m²)
BSA-related right renal volume (mL/m²)

All age groups
0.712
0.973

Age < 3 m
0.480
0.152

Age > 3 m and ≤3 years
0.232
0.469

Age > 3 years and ≤6 years
0.074
0.327

Age > 6 years and ≤12 years
0.292
0.654

Age > 12 years and ≤18 years
0.589
0.285

5. Discussion

The examination of a kidney’s size may be a clue to renal function [16]. Volume measurements may predict single renal glomerular filtration rate better than renal length measurements [17]. Fetal renal growth was found predictive for intrauterine growth retardation and the 10th percentile of renal volume was found to be the best cutoff value [18]. For practical reasons, with respect to the inherent difficulties to investigate young children, we recommend to regard a range from 10 to 90% of the normally distributed BSARV as a normal range for all children and adolescents. As early as two decades ago, attempts were made to correlate renal function to parenchymal volume in urograms [19].

In renal sonograms, renal volume correlated better than volumes of the central echogenic area and the renal parenchyma with height, weight, and total body area in adults [20]. Nevertheless, the differentiation of total renal volumes and renal pelvis volumes might help to unveil very early damaging influences of the renal development as demonstrated in an MRI study [21]. Three-dimensional ultrasound, however, does not yet meet the needs of daily practice in readily differentiating parenchyma from renal pelvis [22]. Future developments might ease automated 3D rendering of renal parenchyma and its differentiation from surrounding fatty and connective tissue, which both exhibit an echogenicity that is similar to the young child’s renal parenchyma.

The new parameter of BSARV has some major advantages over existing parameters to evaluate renal volume.

Firstly, it makes the many separate normal charts unnecessary and combines them to an easy to remember two number range: 45–85 (mL/m²)-irrespective of age, sex, and body size.

Secondly, a relative renal volume greater than 55% of the total renal volume or less than 45%, or roughly a difference of both renal volume greater than 20%, should prompt the suspicion of a one-sided affection.

Thirdly, a BSA-related renal volume overwhelms the artificial virtual breaks in the followup of an individual kidney development, which emanate from changing from one to the next normal value chart, when the child grows up.

Fourthly, each child can be followed up smoothly according to his individual percentile corridor, which, as with body length and weight, describes the individual prognosis of the kidney volume development. Derangements as swelling or growth delay, which are often encountered early in chronic renal disease, can be unmasked easily.

All this promises a true advantage for children with renal disease by precocious detection of creeping renal volume changes. Therefore we recommend BSARV calculations and the observation of the relative renal volumes for all renal sonographic examinations in children and adolescents.

References

C. H. Yu, C. H. Chang, F. M. Chang, H. C. Ko, and H. Y. Chen, “Fetal renal volume in normal gestation: a three-dimensional ultrasound study,” Ultrasound in Medicine and Biology, vol. 26, no. 8, pp. 1253–1256, 2000.

J. M. Gloor, R. J. Breckle, and W. C. Gehrking, “Fetal renal growth evaluated by prenatal ultrasound examination,” Mayo Clinic Proceedings, vol. 72, no. 2, pp. 124–129, 1997.

V. Y. F. Leung, W. C. W. Chu, C. K. Yeung et al., “Nomograms of total renal volume, urinary bladder volume and bladder wall thickness index in 3,376 children with a normal urinary tract,” Pediatric Radiology, vol. 37, no. 2, pp. 181–188, 2007.

E. Dinkel, M. Ertel, and M. Dittrich, “Kidney size in childhood. Sonographical growth charts for kidney length and volume,” Pediatric Radiology, vol. 15, no. 1, pp. 38–43, 1985.

B. K. Han and D. S. Babcock, “Sonographic measurements and appearance of normal kidneys in children,” American Journal of Roentgenology, vol. 145, no. 3, pp. 611–616, 1985.

P. A. Dremsek, H. Kritscher, G. Bohm, and O. Hochberger, “Kidney dimensions in ultrasound compared to somatometric parameters in normal children,” Pediatric Radiology, vol. 17, no. 4, pp. 285–290, 1987.

J. Chandra, S. Mathur, S. K. Mittal, and K. P. Mittal, “Sonographic assessment of renal volume in Indian children,” Indian Journal of Pediatrics, vol. 66, no. 2, pp. 175–178, 1999.

H. Peters, D. Weitzel, C. Humburg, E. Dinkel, and M. Blum, “Sonographic determination of the normal kidney volume in newborn infants and infants,” Ultraschall in der Medizin, vol. 7, no. 1, pp. 25–29, 1986.

S. N. Rasmussen, L. Haase, H. Kjeldsen, and S. Hancke, “Determination of renal volume by ultrasound scanning,” Journal of Clinical Ultrasound, vol. 6, no. 3, pp. 160–164, 1978.

A. Vujic, J. Kosutic, R. Bogdanovic, S. Prijic, B. Milicic, and Z. Igrutinovic, “Sonographic assessment of normal kidney dimensions in the first year of life—a study of 992 healthy infants,” Pediatric Nephrology, vol. 22, no. 8, pp. 1143–1150, 2007.

H. C. Kim, D. M. Yang, W. Jin, and S. H. Lee, “Relation between total renal volume and renal function: usefulness of 3D sonographic measurements with a matrix array transducer,” American Journal of Roentgenology, vol. 194, no. 2, pp. w186–w192, 2010.

P. S. Kurtin, “Standardization of renal function measurements in children: kidney size versus metabolic rate,” Child Nephrology and Urology, vol. 9, no. 6, pp. 337–339, 1988.

D. Du Bois and E. F. Du Bois, “A formula to estimate the approximate surface area if height and weight be known,” Nutrition, vol. 17, pp. 863–871, 1916.

H. Holloway, T. B. Jones, and A. E. Robinson, “Sonographic determination of renal volumes in normal neonates,” Pediatric Radiology, vol. 13, no. 4, pp. 212–214, 1983.

H. Hricak and R. P. Lieto, “Sonographic determination of renal volume,” Radiology, vol. 148, no. 1, pp. 311–312, 1983.

A. Adibi, I. Adibi, and P. Khosravi, “Do kidney sizes in ultrasonography correlate to glomerular filtration rate in healthy children?” Australasian Radiology, vol. 51, no. 6, pp. 555–559, 2007.

E. Widjaja, J. W. Oxtoby, T. L. Hale, P. W. Jones, P. N. Harden, and I. W. McCall, “Ultrasound measured renal length versus low dose CT volume in predicting single kidney glomerular filtration rate,” British Journal of Radiology, vol. 77, no. 921, pp. 759–764, 2004.

C. H. Chang, P. Y. Tsai, C. H. Yu, H. C. Ko, and F. M. Chang, “Predicting fetal growth restriction with renal volume using 3-D ultrasound: efficacy evaluation,” Ultrasound in Medicine and Biology, vol. 34, no. 4, pp. 533–537, 2008.

S. Troell, U. Berg, B. Johansson, and I. Wikstad, “Comparison between renal parenchymal sonographic volume, renal parenchymal urographic area, glomerular filtration rate and renal plasma flow in children,” Scandinavian Journal of Urology and Nephrology, vol. 22, no. 3, pp. 207–214, 1988.

S. A. Emamian, M. B. Nielsen, J. F. Pedersen, and L. Ytte, “Kidney dimensions at sonography: correlation with age, sex, and habitus in 665 adult volunteers,” American Journal of Roentgenology, vol. 160, no. 1, pp. 83–86, 1993.

I. Y. Wong, H. L. Copp, C. J. Clark, H. Y. Wu, and L. D. Shortliffe, “Quantitative ultrasound renal parenchymal area correlates with renal volume and identifies reflux nephropathy,” The Journal of Urology, vol. 182, no. 4, pp. 1683–1687, 2009.

M. Riccabona, G. Fritz, and E. Ring, “Potential applications of three-dimensional ultrasound in the pediatric urinary tract: pictorial demonstration based on preliminary results,” European Radiology, vol. 13, no. 12, pp. 2680–2687, 2003.