Scientifica
Volume 2016 (2016), Article ID 5062706, 8 pages
http://dx.doi.org/10.1155/2016/5062706

Research Article

Calcium Alginate and Calcium Alginate-Chitosan Beads Containing Celecoxib Solubilized in a Self-Emulsifying Phase

Lorena Segale, Lorella Giovannelli, Paolo Mannina, and Franco Pattarino

Dipartimento di Scienze del Farmaco, Università del Piemonte Orientale, Largo Donegani 2, 28100 Novara, Italy

Received 4 December 2015; Revised 25 February 2016; Accepted 9 March 2016

Academic Editor: Vitor M. Correlo

Copyright © 2016 Lorena Segale et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In this work alginate and alginate-chitosan beads containing celecoxib solubilized into a self-emulsifying phase were developed in order to obtain a drug delivery system for oral administration, able to delay the drug release in acidic environment and to promote it in the intestinal compartment. The rationale of this work was linked to the desire to improve celecoxib therapeutic effectiveness reducing its gastric adverse effects and to favor its use in the prophylaxis of colon cancer and as adjuvant in the therapy of familial polyposis. The systems were prepared by ionotropic gelation using needles with different diameters (400 and 600 μm). Morphology, particle size, swelling behavior, and in vitro drug release performance of the beads in aqueous media with different pH were investigated. The experimental results demonstrated that the presence of chitosan in the formulation caused an increase of the mechanical resistance of the bead structure and, as a consequence, a limitation of the bead swelling ability and a decrease of the drug release rate at neutral pH. Alginate-chitosan beads could be a good tool to guarantee a celecoxib colon delivery.

1. Introduction

Drug delivery systems containing biodegradable natural polymers are the object of more and more research studies considering the advantages that these materials can offer [1]. Among them, those containing alginate and chitosan have been widely exploited in pharmaceutical field [2–4].

Alginate is a water soluble natural biopolymer extracted from brown algae and composed of alternating blocks of 1-4 α-L-guluronic and β-D-mannuronic acid residues [5]. This polymer forms hydrogels in presence of divalent cations like Ca²⁺, Ba²⁺, Sr²⁺, and Zn²⁺ [6, 7] and this characteristic allows preparing drug loaded beads [8]. The mechanism of this gelation process involves guluronic residues with the specific chelation of Ca²⁺ forming the so-called “egg-box’’ structure [9]. Many researchers focused their attention on the development of calcium alginate beads as controlled drug delivery systems for the oral administration of drug molecules and proteins [10–12].

Chitosan is a biocompatible, biodegradable, nontoxic, linear polysaccharide composed of D-glucosamine and N-acetyl-D-glucosamine units linked by β-(1-4) glycosidic linkages [13]. Chitosan can be derived by partial deacetylation of chitin from crustacean shells and it is widely used for cell culture, drug delivery, and food additives [14–16].

Cross-linking of alginate and chitosan in a hydrogel is used to provide materials useful for medical and pharmaceutical applications; the obtained systems are characterized by enhanced stability compared to those obtained with a single polymer [17, 18]. In controlled drug delivery alginate-chitosan polyelectrolyte complex has received much attention in recent years [12, 19–22]. The two polymers form the polyelectrolyte complex via the ionic interaction between the carboxyl residues of alginate and the amino residues of chitosan. The alginate-chitosan beads can be produced by different methods: the two-step procedure and the one-step procedure [23]. In the first one, calcium alginate gel beads are produced by dropping a solution of alginate into a gelling bath containing calcium ions. The resulting beads are then transferred into a chitosan solution to form the membrane on their surface. The one-step procedure requires that the droplets of alginate solution fall into an aqueous solution containing both the gelling agent for alginate (e.g., calcium ions) and chitosan [24]. The choice of the production method is responsible for the properties of the beads because of the amount of bound chitosan in the resulting product. At the same time, the characteristics of the beads are affected by the molecular weight of the selected polymers and/or by the percentages of the various residues in the polymeric molecules [25, 26].

Celecoxib, a fluorinated benzenesulfonamide derivative, is a nonsteroidal anti-inflammatory drug (NSAID) with a highly selective cyclooxygenase-2 (COX-2) inhibitory action. It possesses anti-inflammatory, analgesic, and antipyretic activities due to the inhibition of prostaglandin synthesis catalyzed by COX-2. Recently, this drug was frequently investigated for its anticancer activity using in vitro and in vivo models [27–30]. Preclinical studies on celecoxib reported prominent anticancer activity against head and neck squamous cell carcinoma, colon cancer, breast cancer, and lung cancer [27, 28].

In this work alginate and alginate-chitosan beads containing celecoxib solubilized into a self-emulsifying phase were developed in order to obtain a drug delivery system for oral administration, able to delay the drug release in acidic environment and to promote it in the intestinal compartment. The rationale of this work was linked to the desire to improve celecoxib therapeutic effectiveness reducing its gastric adverse effects and to favor its use in the prophylaxis of colon cancer and as adjuvant in the therapy of familial polyposis [31–33]. The aim of the current study was the evaluation and the comparison of the properties of celecoxib loaded calcium alginate and calcium alginate-chitosan beads. Morphology, particle size, swelling behavior, and in vitro drug release performance of beads in aqueous media with different pH were investigated.

2. Materials and Methods

2.1. Materials

Celecoxib was obtained from Chemos GmbH (Regenstauf, Germany). Anhydrous calcium chloride and sodium alginate (molecular weight 120000–190000 g/mol; 1.56 mannuronic-guluronic residues ratio) were purchased from Sigma Aldrich (Milan, Italy), while low molecular weight chitosan was from Fluka (Milan, Italy). Labrasol (caprylocaproyl macrogol-8 glycerides) was a gift of Gattefossè (Milan, Italy); TPGS (D-α-tocopheryl polyethylenglycol 1000 succinate) was kindly donated by Isochem (Gennevillers, France). All other chemicals were of analytical grade.

2.2. Preparation of Calcium Alginate Beads

Calcium alginate beads were prepared by gelation method using calcium ions as cross-linking agent. In detail, a 1.5% (w/w) sodium alginate aqueous solution was mixed with a drug loaded self-emulsifying phase in 4 : 1 ratio and added drop by drop to a 100 mM CaCl₂ solution [34]. The self-emulsifying phase was prepared mixing weighed amounts of Labrasol and TPGS at 50°C and dissolving celecoxib in the excipient solution. The emulsion (sodium alginate solution and self-emulsifying phase) was manually extruded in the hardening bath through needles with 400 or 600 μm inner diameter, under constant gentle stirring, at room temperature. After 15 minutes, the beads were collected, washed with deionised water to eliminate the excess of calcium ions and then dried at 40°C overnight. The composition of prepared formulations, coded CAl 600 and CAl 400, was listed in Table 1.

Table 1: Composition of calcium alginate and calcium alginate-chitosan beads.

Formulation
Sodium alginate (% w/w)
Self-emulsifying phase (% w/w)
Gelling bath
Needle diameter (μm)

Cal 600
1.5
Celecoxib 27.4
CaCl₂ 100 mM
600

Labrasol 68.5

TPGS 4.1

Cal 400
1.5
Celecoxib 27.4
CaCl₂ 100 mM
400

Labrasol 68.5

TPGS 4.1

CAlCh 600
1.5
Celecoxib 27.4
CaCl₂ 100 mM + 0.2% chitosan
600

Labrasol 68.5

TPGS 4.1

CAlCh 400
1.5
Celecoxib 27.4
CaCl₂ 100 mM + 0.2% chitosan
400

Labrasol 68.5

TPGS 4.1

2.3. Preparation of Calcium Alginate-Chitosan Beads

Calcium alginate-chitosan beads (identified as CAlCh 600 and CAlCh 400) were prepared according to the one step method. The procedure was identical to that adopted in the case of alginate beads with the exception that the hardening bath was a 0.2% (w/w) chitosan solution in diluted acetic acid (1%) containing CaCl₂ at a concentration of 100 mM. The composition of the chitosan formulations was reported in Table 1.

2.4. Morphological and Particle Size Analysis

The morphology of the wet and dried beads and the particle size of the dried beads were analysed using a Motic SMZ168 stereomicroscope and an image analysis software (Motic Image Plus 2.0). For each formulation, the particle size was calculated as the average value of the size of 20 dried particles.

2.5. Drug Content

Six milligrams of drug loaded dried beads was solubilized in phosphate buffer solution (100 mL) at pH 6.8 added of 0.75% (w/v) sodium laurylsulphate at 70°C under stirring for two hours. After cooling, the obtained solutions were filtrated and analysed spectrophotometrically at 255 nm; the results are the average of at least three determinations.

2.6. Swelling Study

Swelling studies were carried out at 37°C on dried beads put into three aqueous media characterized by different pH: hydrochloric acid at pH 1.0 and phosphate buffer at pH 6.8 and pH 7.4.

Accurately weighed amounts of calcium alginate and calcium alginate-chitosan dried beads were put in glass vials containing 5 mL of each fluid. After fixed time intervals (5, 15, 30, 60, and 120 minutes), the samples were recovered, gently wiped with paper, and weighed again. The dynamic weight change of the beads with respect to time, defined as swelling degree (Sw), was calculated according to the following equation:

where is the weight of the beads in the swollen state at time and is the initial weight of the dried beads [35].

2.7. Celecoxib Release Study

The in vitro release studies were performed in hydrochloric acid at pH 1.0 and in phosphate buffer at pH 6.8 and at pH 7.4 added of 0.75% sodium laurylsulphate to guarantee the maintenance of the sink conditions. The studies were carried out by placing accurately weighed amounts of each formulation, equivalent to 8 mg of celecoxib, in 500 mL of the selected fluid at 37°C under a rotation rate of 100 rpm (apparatus 2, paddle). Filtered samples were withdrawn at specific time intervals without replacement and analysed for celecoxib content using an UV spectrophotometer at 255 nm when the fluid was HCl and phosphate buffer at pH 6.8 or at 256 nm in the case of phosphate buffer at pH 7.4. Each experiment was done in triplicate.

The drug release performances of calcium alginate and calcium alginate-chitosan beads were compared using the dissolution parameters t10%, t50%, and t90% which indicate the time points at which 10%, 50%, and 90% of the drug were released [36] and the f2 similarity parameter [37]. For curves to be considered similar f2 values should be close to 100, and f2 values greater than 50 (50–100) ensure sameness or equivalence of the two curves.

2.8. Statistical Analysis

The results were statistically analysed to test significant differences by Student’s t-test, at 95% confidence interval; values less than 0.05 were considered statistically significant.

3. Results and Discussion

Alginate and alginate-chitosan beads were obtained by ionotropic gelation method dropping an emulsion, composed of alginate aqueous solution and the drug loading self-emulsifying phase, through 23 G (600 μm) or 27 G (400 μm) needles, in a calcium chloride or in a calcium chloride-chitosan gelling bath. The excipients selected for the self-emulsifying phase were Labrasol, a liquid component with self-emulsifying and solubility enhancer properties, and D-α-tocopheryl polyethylenglycol 1000 succinate as coemulsifying and absorption enhancer agent (Table 1). The composition of the self-emulsifying phase was the same used in a previous work [34].

Stereomicroscopic images of wet and dry alginate and alginate-chitosan beads are reported in Figures 1 and 2. Immediately after the preparation CAl 600 beads (Figure 1(a)) show regular shape and homogeneous dimensions; they are white and opaque with a smooth, glossy, and homogeneous surface.

(a)

(b)

(c)

(d)

Figure 1: Stereomicroscopic images of wet (a-b) (2x magnification) and dry (c-d) (3x magnification) beads obtained using a needle of 600 μm in diameter.

(a)

(b)

(c)

(d)

Figure 2: Stereomicroscopic images of wet (a-b) (2x magnification) and dry (c-d) (3x magnification) beads obtained using a needle of 400 μm diameter.

The drying process does not change the shape of beads but leads to the reduction of their dimensions and modifies the characteristics of their surface, which is irregular and wrinkled (Figure 1(b)). The loss of water induces a decrease of the distance between the polymeric chains and a variation of the structure of the beads, which is not compact and continuous but composed of small micronuclei adhering to each other. The fully swollen CAlCh 600 particles are slightly yellow and quite regular in shape and show a smooth surface (Figure 1(c)). In this case, the drying process affects the spherical shape of the beads (Figure 1(d)); they become ellipsoidal; their dimension decreases and their surface is very rough. Moreover, after drying a partial surface agglomeration of the beads is observed: it is attributable to the adhesive properties of chitosan [38]. In the case of beads prepared using a 400 μm needle (Figures 2(a)–2(c)), the images recorded immediately after the preparation give evidence that for both the formulations (with or without chitosan) particles are not homogeneous in diameters even if they are regular in shape. CAl 400 and CAlCh 400 dry beads (Figure 2(b)) have a surface characterized by asperity and concavity; moreover, in the case of alginate-chitosan formulation the particle shape is completely irregular and the presence of solid bridges of chitosan is well evident which bind the beads impeding their separation.

Average size of celecoxib loaded beads is between 715 and 896 μm (Table 2). The diameter of the beads was significantly affected by the diameter of the needle used during preparation (). The addition of chitosan to alginate beads changes significantly their dimensions only when the 400 μm needle was used (). Moreover, as indicated by the high values of the standard deviation, using the 400 μm needle the final product is a family of particles inhomogeneous in dimensions.

Table 2: Average diameter and celecoxib content of the dry beads.

Diameter (μm)
Drug content (%)

CAl 600
896 ± 64.24
42.10 ± 1.30

CAl 400
715 ± 80.96
43.63 ± 0.77

CAlCh 600
881 ± 66.87
40.94 ± 1.37

CAlCh 400
795 ± 103.70
39.78 ± 0.66

All the formulations contain high amount of drug (Table 2) homogeneously distributed in the excipient matrix and the differences among their drug content were not significant except for CAlCh 400 slightly lower than the others (). The percentage of celecoxib in the beads exceeds the theoretical value and this is due to the loss of Labrasol during the curing time [34], justifiable considering the high affinity between this excipient and water which drives it out of the beads into the gelling bath.

A peculiar property of alginate or alginate-chitosan microparticulate systems in the dry form is their ability, after contact with an aqueous fluid, to rehydrate, take up the fluid, and undergo a swelling process, mainly associated with the hydration of the hydrophilic groups of polymers. When the fluid is water, it penetrates into the particles filling the pores among the polymeric chains and causing an important swelling of the system, without erosion/disintegration. Selecting fluids with different pH, the swelling behavior of the beads could change. For this reason, the swelling ability of calcium alginate and of calcium alginate-chitosan beads has been evaluated in HCl at pH 1.0 and in phosphate buffer solutions at pH 6.8 and 7.4 (Figures 3–5).

Figure 3: Swelling degree in hydrochloric acid at pH 1.0.

Figure 4: Swelling degree in phosphate buffer at pH 6.8.

Figure 5: Swelling degree in phosphate buffer at pH 7.4.

In acidic environment (Figure 3), there are no differences in the swelling ability of the four formulations; at this pH, the maximum swelling degree is not over 60%. The alginate and alginate-chitosan beads absorb part of the fluid; their weight initially increases and then remains constant. At this pH, for the alginate systems (CAl 600 and CAl 400), the carboxylate groups of the polymer localized on the surface of particles are protonated and a layer of alginic acid forms. The insolubility of alginic acid in this fluid and the formation of hydrogen bonds, responsible for an increase of the structure stability, impede the penetration of additional fluid into the deeper layers of particles, limiting their swelling. The same swelling behavior is observed for CAlCh 600 and CAlCh 400 systems. Even if, in acidic environment, chitosan is highly soluble and charged for the conversion of its amine units into NH³⁺ soluble form, the interaction of amino groups and protonated carboxylic groups is not strong enough to promote swelling. Thus, the limited total swelling behavior is dominated by calcium alginate structure.

Figures 4 and 5 show that the formulations exhibit high swelling ability at pH 6.8 and pH 7.4. For CAl 600 formulation, the weight of particles grows rapidly, reaches a peak after 30 minutes, and then decreases abruptly because of the erosion/disintegration of the system. This behavior can be due to ion exchange reaction between Na⁺ (present in the phosphate buffer) and Ca²⁺ linked to carboxylic groups of alginate. Monovalent ions replace bivalent ones causing the breakup of the “egg-box” structure and the increase of the distance between the polymeric chains and favoring the fluid absorption and the swelling of the systems. This process goes on until the osmotic pressure into the beads balances the strength of the cross-linking bonds and physical entanglements, which preserve the structure of the beads. Thus, particles start to disintegrate and their weight diminishes.

The results obtained from the swelling study evidence that CAlCh 600 and CAlCh 400 beads are characterized by a more resistant structure compared to CAl 600 and CAl 400, probably attributable to the interactions between alginate and chitosan chains. The maximum swelling degree of chitosan beads is lower than that of the alginate; alginate-chitosan systems are able to reach a swelling equilibrium in about 30 minutes and to maintain their weight at a constant level until the end of the test. Probably the interactions between the two polymers are responsible for the formation of particles with a considerable mechanical resistance, which limits the fluid uptake and the structure disintegration. Finally, comparing the swelling behavior of CAl 400 versus CAl 600 and CAlCh 400 versus CAlCh 600 beads (same composition, different diameter of the needle used in the preparation process), it is possible to note that in phosphate buffers CAl 400 and CAlCh 400 reached a swelling maximum peak higher than that of CAl 600 and CAlCh 600, respectively.

The drug release profiles obtained from the different formulations at pH of 1.0, 6.8, and 7.4 are shown in Figures 6–8. The in vitro celecoxib release is affected by the pH of the selected fluid: the percentage of drug released in acidic medium in two hours is quite low and varies between 12.70% and 24.53% (Figure 6). The delay of celecoxib release can be ascribed to the reduced swelling ability of the systems in this fluid; neither the composition of the beads nor their diameter affects the drug release performance (f2 parameter values always over 50). At pH 1.0, the release process is governed only by the diffusion of the drug. This result allows satisfying the first object of this research work that is to minimize drug delivery in acidic environment to promote and favor this process at intestinal level.

Figure 6: Celecoxib release profiles in hydrochloric acid at pH 1.0.

Figure 7: Celecoxib release profiles in phosphate buffer at pH 6.8.

Figure 8: Celecoxib release profiles in phosphate buffer at pH 7.4.

In phosphate buffer at pH 6.8, the formulations are characterized by a drug release behavior affected by their composition and not significantly by their dimensions (Figure 7). In this fluid, the systems initially swell and then erode/disintegrate and, consequently, the drug release process is driven at first by diffusion and then by the polymeric relaxation. Alginate beads (CAl 600 and CAl 400) are able to complete the celecoxib release in about eight hours; on the contrary no more than 75% of the drug loaded in alginate-chitosan beads passes in solution after the same time. The comparison of the results from alginate and alginate-chitosan microparticle formulations reveals that the profiles are not similar having f2 values lower than 50. A possible explanation for such a behavior is the electrostatic interaction between carboxyl groups of the alginate and the amino group of chitosan that improves the mechanical resistance of the polymeric network reducing its swelling and erosion at pH 6.8.

Surprisingly, the celecoxib release rate slows down mainly for CAlCh 400 formulation even if this formulation is characterized by the lowest particle size. Probably the small diameter and the high surface area of these particles lead to the formation of a thicker chitosan layer around the beads, which opposes a great resistance to the fluid uptake and, as a consequence, to the drug release.

Also at pH 7.4 the differences in the drug release performances can be attributed to the formulation composition rather than to the particle dimensions (Figure 8). All the formulations showed an almost constant drug release rate. There are no differences between CAl 600 and CAl 400 and between CAlCh 600 and CAlCh 400 release curves; when chitosan is in the beads, the drug release rate decreases.

The same conclusions are shown by the analysis of the results of the drug release through the dissolution parameters (t10%, t50%, and t90%) (Table 3). The differences in the release behavior of the beads are detected also through the dissolution parameters t10%, t50%, and t90% and are well evident for the time necessary to release 50 and 90% of the loaded drug. In phosphate buffer solutions, alginate-chitosan beads require longer times to deliver 50 and 90% of celecoxib compared to alginate beads. Probably the presence of the alginate-chitosan complex provokes a growth of the structural wrinkles, irregularity and complexity of the bead structure, which make the drug liberation difficult.

Table 3: Time (min) necessary to release 10, 50, and 90% of the loaded drug.

CAl 600
CAl 400
CAlCh 600
CAlCh 400

HCl

24
12
31
85

—
—
—
—

—
—
—
—

pH 6.8

16
19
10
30

130
110
261
310

290
220
>8 h
>8 h

pH 7.4

16
25
28
35

229
187
423
>8 h

>8 h
444
>8 h
>8 h

4. Conclusions

The investigated celecoxib loaded alginate and alginate-chitosan beads minimize the drug release in acidic environment favoring this process at intestinal pH (6.8 and 7.4). The experimental results demonstrate that the presence of chitosan in the formulation is responsible for an increase of the resistance of the bead structure and, as a consequence, for a limitation of the bead swelling ability and for a decrease of the drug release rate at neutral pH. Alginate-chitosan beads could be a valuable vehicle of celecoxib for dosage forms useful as adjuvant therapy in patients with familial polyposis and precancerous disease of colon.

Competing Interests

The authors declare that they have no competing interests.

References

T. Pongjanyakul and T. Rongthong, “Enhanced entrapment efficiency and modulated drug release of alginate beads loaded with drug-clay intercalated complexes as microreservoirs,” Carbohydrate Polymers, vol. 81, no. 2, pp. 409–419, 2010.

W. R. Gombotz and S. F. Wee, “Protein release from alginate matrices,” Advanced Drug Delivery Reviews, vol. 31, no. 3, pp. 267–285, 1998.

L. Illum, “Chitosan and its use as a pharmaceutical excipient,” Pharmaceutical Research, vol. 15, no. 9, pp. 1326–1331, 1998.

B. D. Ulery, L. S. Nair, and C. T. Laurencin, “Biomedical applications of biodegradable polymers,” Journal of Polymer Science Part B: Polymer Physics, vol. 49, no. 12, pp. 832–864, 2011.

M. George and T. E. Abraham, “Polyionic hydrocolloids for the intestinal delivery of protein drugs: alginate and chitosan-a review,” Journal of Controlled Release, vol. 114, no. 1, pp. 1–14, 2006.

C. Ouwerx, N. Velings, M. M. Mestdagh, and M. A. V. Axelos, “Physico-chemical properties and rheology of alginate gel beads formed with various divalent cations,” Polymer Gels and Networks, vol. 6, no. 5, pp. 393–408, 1998.

S. K. Bajpai and S. Sharma, “Investigation of swelling/degradation behavior of alginate beads cross-linked with Ca²⁺ and Ba²⁺ ions,” Reactive and Functional Polymers, vol. 59, no. 2, pp. 129–140, 2004.

L. G. Griffith, “Polymeric biomaterials,” Acta Materialia, vol. 48, no. 1, pp. 263–277, 2000.

G. T. Grant, E. R. Morris, D. A. Rees, P. J. C. Smith, and D. Thom, “Biological interactions between polysaccharides and divalent cations: the egg-box model,” FEBS Letters, vol. 32, no. 1, pp. 195–198, 1973.

M. J. Fernández-Hervás, M. A. Holgado, A. Fini, and J. T. Fell, “In vitro evaluation of alginate beads of a diclofenac salt,” International Journal of Pharmaceutics, vol. 163, no. 1-2, pp. 23–34, 1998.

M. R. Rasmussen, T. Snabe, and L. H. Pedersen, “Numerical modelling of insulin and amyloglucosidase release from swelling Ca-alginate beads,” Journal of Controlled Release, vol. 91, no. 3, pp. 395–405, 2003.

Y. Xu, C. Zhan, L. Fan, L. Wang, and H. Zheng, “Preparation of dual crosslinked alginate-chitosan blend gel beads and in vitro controlled release in oral site-specific drug delivery system,” International Journal of Pharmaceutics, vol. 336, no. 2, pp. 329–337, 2007.

G. A. F. Roberts, Chitin Chemistry, McMillan Press, London, UK, 1992.

A. Fakhry, G. B. Schneider, R. Zaharias, and S. Şenel, “Chitosan supports the initial attachment and spreading of osteoblasts preferentially over fibroblasts,” Biomaterials, vol. 25, no. 11, pp. 2075–2079, 2004.

Y.-H. Lin, H.-F. Liang, C.-K. Chung, M.-C. Chen, and H.-W. Sung, “Physically crosslinked alginate/N,O-carboxymethyl chitosan hydrogels with calcium for oral delivery of protein drugs,” Biomaterials, vol. 26, no. 14, pp. 2105–2113, 2005.

Q. S. Zhao, Q. X. Ji, K. Xing, X. Y. Li, C. S. Liu, and X. G. Chen, “Preparation and characteristics of novel porous hydrogel films based on chitosan and glycerophosphate,” Carbohydrate Polymers, vol. 76, no. 3, pp. 410–416, 2009.

J. Berger, M. Reist, J. M. Mayer, O. Felt, N. A. Peppas, and R. Gurny, “Structure and interactions in covalently and ionically crosslinked chitosan hydrogels for biomedical applications,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 57, no. 1, pp. 19–34, 2004.

J. Berger, M. Reist, J. M. Mayer, O. Felt, and R. Gurny, “Structure and interactions in chitosan hydrogels formed by complexation or aggregation for biomedical applications,” European Journal of Pharmaceutics and Biopharmaceutics, vol. 57, no. 1, pp. 35–52, 2004.

K. Y. Lee, W. H. Park, and W. S. Ha, “Polyelectrolyte complexes of sodium alginate with chitosan or its derivatives for microcapsules,” Journal of Applied Polymer Science, vol. 63, no. 4, pp. 425–432, 1997.

M. L. González-Rodríguez, M. A. Holgado, C. Sánchez-Lafuente, A. M. Rabasco, and A. Fini, “Alginate/chitosan particulate systems for sodium diclofenac release,” International Journal of Pharmaceutics, vol. 232, no. 1-2, pp. 225–234, 2002.

L. Becherán-Marón, C. Peniche, and W. Argüelles-Monal, “Study of the interpolyelectrolyte reaction between chitosan and alginate: influence of alginate composition and chitosan molecular weight,” International Journal of Biological Macromolecules, vol. 34, no. 1-2, pp. 127–133, 2004.

A. K. Anal and W. F. Stevens, “Chitosan-alginate multilayer beads for controlled release of ampicillin,” International Journal of Pharmaceutics, vol. 290, no. 1-2, pp. 45–54, 2005.

G. Pasparakis and N. Bouropoulos, “Swelling studies and in vitro release of verapamil from calcium alginate and calcium alginate-chitosan beads,” International Journal of Pharmaceutics, vol. 323, no. 1-2, pp. 34–42, 2006.

M. L. Huguet and E. Dellacherie, “Calcium alginate beads coated with chitosan: effect of the structure of encapsulated materials on their release,” Process Biochemistry, vol. 31, no. 8, pp. 745–751, 1996.

O. Gåserød, O. Smidsrød, and G. Skjåk-Bræk, “Microcapsules of alginate-chitosan-I. A quantitative study of the interaction between alginate and chitosan,” Biomaterials, vol. 19, no. 20, pp. 1815–1825, 1998.

O. Gåserød, A. Sannes, and G. Skjåk-Bræk, “Microcapsules of alginate-chitosan. II. A study of capsule stability and permeability,” Biomaterials, vol. 20, no. 8, pp. 773–783, 1999.

P.-W. Hsiao, C.-C. Chang, H.-F. Liu, C.-M. Tsai, T. H. Chiu, and J.-I. Chao, “Activation of p38 mitogen-activated protein kinase by celecoxib oppositely regulates survivin and gamma-H2AX in human colorectal cancer cells,” Toxicology and Applied Pharmacology, vol. 222, no. 1, pp. 97–104, 2007.

M. N. A. Bijman, C. A. Hermelink, M. P. A. van Berkel et al., “Interaction between celecoxib and docetaxel or cisplatin in human cell lines of ovarian cancer and colon cancer is independent of COX-2 expression levels,” Biochemical Pharmacology, vol. 75, no. 2, pp. 427–437, 2008.

D. M. Ghorab, M. M. Amin, O. M. Khowessah, and M. I. Tadros, “Colon-targeted celecoxib-loaded Eudragit® S100-coated poly-ε-caprolactone microparticles: preparation, characterization and in vivo evaluation in rats,” Drug Delivery, vol. 18, no. 7, pp. 523–535, 2011.

Y. Lee, H. Kim, W. Kim, J.-H. Yoon, S. H. Jeong, and Y. Jung, “Colon-specific delivery of celecoxib is a potential strategy to improve toxicological and pharmacological properties of the selective Cox-2 inhibitor: implication in treatment of familiar adenomatous polyposis,” Journal of Drug Targeting, vol. 20, no. 6, pp. 524–534, 2012.

Y. S. R. Krishnaiah, V. Satyanarayana, B. D. Kumar, and R. S. Karthikeyan, “Studies on the development of colon-targeted delivery systems for celecoxib in the prevention of colorectal cancer,” Journal of Drug Targeting, vol. 10, no. 3, pp. 247–254, 2002.

S. N. Kang, S.-S. Hong, M.-K. Lee, and S.-J. Lim, “Dual function of tributyrin emulsion: solubilization and enhancement of anticancer effect of celecoxib,” International Journal of Pharmaceutics, vol. 428, no. 1-2, pp. 76–81, 2012.

M. Rahman, K. Selvarajan, M. R. Hasan et al., “Inhibition of COX-2 in colon cancer modulates tumor growth and MDR-1 expression to enhance tumor regression in therapy-refractory cancers in vivo,” Neoplasia, vol. 14, no. 7, pp. 624–633, 2012.

L. Segale, P. Mannina, L. Giovannelli, and F. Pattarino, “Calcium alginate multi-unit oral dosage form for delayed release of celecoxib,” Journal of Drug Delivery Science and Technology, vol. 26, pp. 35–43, 2015.

C. Remuñán-López and R. Bodmeier, “Mechanical, water uptake and permeability properties of crosslinked chitosan glutamate and alginate films,” Journal of Controlled Release, vol. 44, no. 2-3, pp. 215–225, 1997.

P. Costa and J. M. Sousa Lobo, “Modeling and comparison of dissolution profiles,” European Journal of Pharmaceutical Sciences, vol. 13, no. 2, pp. 123–133, 2001.

Food & Drug Administration, Guidelines for Industry—Dissolution Testing of Immediate Release Solid Oral Dosage Forms, Food & Drug Administration, 1997.

N. D. Ceki, J. R. Milić, S. D. Savić, M. M. Savić, Z. Jović, and R. Daniels, “Influence of the preparation procedure and chitosan type on physicochemical properties and release behavior of alginate-chitosan microparticles,” Drug Development and Industrial Pharmacy, vol. 35, no. 9, pp. 1092–1102, 2009.