Stroke Research and Treatment

Volume 2014 (2014), Article ID 542638, 2 pages

http://dx.doi.org/10.1155/2014/542638

Erratum

Erratum to “Stroke Survivors Scoring Zero on the NIH Stroke Scale Score Still Exhibit Significant Motor Impairment and Functional Limitation”

Brittany Hand,¹ Stephen J. Page,² and Susan White²

¹Occupational Therapy Division, School of Health and Rehabilitation Sciences, The Ohio State University Medical Center, 453 West Tenth Avenue, Suite 406, Columbus, OH 43210, USA

²School of Health and Rehabilitation Sciences, The Ohio State University Medical Center, 453 West Tenth Avenue, Suite 406, Columbus, OH 43210, USA

Received 9 July 2014; Accepted 23 July 2014; Published 12 August 2014

Copyright © 2014 Brittany Hand et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Figure 1 was inserted twice and Figure 2 was omitted. Below are the correct figures.

(a)

(b)

Figure 1: Bivariate plots comparing NIHSS scores with UE FM scores (a) and NIHSS scores with AMAT scores (b).

Figure 2: Comparison of subjects with zero and nonzero NIHSS scores on the UE FM and on the AMAT.