Science and Technology of Nuclear Installations

Volume 2014 (2014), Article ID 950978, 6 pages

http://dx.doi.org/10.1155/2014/950978

Research Article

Natural Radioactivity Measurements and Radiation Dose Estimation in Some Sedimentary Rock Samples in Turkey

I. Akkurt¹ and K. Günoğlu²

¹Suleyman Demirel University, Fen-Edebiyat Fakultesi Fizik Bölümü, 32260 Isparta, Turkey

²Technical Sciences Vocational School, Suleyman Demirel University, 32260 Isparta, Turkey

Received 29 September 2013; Revised 19 December 2013; Accepted 29 December 2013; Published 2 April 2014

Academic Editor: Keith E. Holbert

Copyright © 2014 I. Akkurt and K. Günoğlu. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The natural radioactivity existed since creation of the universe due to the long life time of some radionuclides. This natural radioactivity is caused by γ-radiation originating from the uranium and thorium series and ⁴⁰K. In this study, the gamma radiation has been measured to determine natural radioactivity of ²³⁸U, ²³²Th, and ⁴⁰K in collected sedimentary rock samples in different places of Turkey. The measurements have been performed using γ-ray spectrometer containing NaI(Tl) detector and multichannel analyser (MCA). Absorbed dose rate (D), annual effective dose (AED), radium equivalent activities (), external hazard index (), and internal hazard index () associated with the natural radionuclide were calculated to assess the radiation hazard of the natural radioactivity in the sedimentary rock samples. The average values of absorbed dose rate in air (D), annual effective dose (AED), radium equivalent activity (), external hazard index (), and internal hazard index () were calculated and these were 45.425 nGy/h, 0.056 mSv/y, 99.014 Bq/kg, 0.267, and 0.361, respectively.

1. Introduction

The natural radioactivity existed since creation of the universe due to the long life time of radionuclide. This natural radioactivity is caused by γ-radiation originating from the uranium and thorium series and 40 K. Natural radioactivity arising from natural sources is the main contribution to the annual dose received by the world’s population, exposure resulting from radionuclides inherent in the earth’s crust and from cosmic rays. The terrestrial radionuclides are ubiquitous, belonging to the ²³⁸U and ²³²Th series and their decay products as well as single decay radionuclides, particularly 40 K. Gamma radiation emitted from such naturally occurring radionuclides in all ground formations represents the main external exposure to human body [1]. The knowledge of concentrations and distributions of the radionuclides are of interest since it provides useful information in the monitoring of environmental radioactivity. Natural environmental radioactivity and the associated external exposure due to gamma radiation depend primarily on the geological and geographical conditions and appear at different levels in the soils and rocks of each region in the world [2–4].

In this study, the natural radioactivity concentrations of 40 K, ²³⁸U (²²⁶Ra), and ²³²Th in some sedimentary rock samples collected in different regions of Turkey have been investigated. The results were used to assess the radiological hazard associated with the absorbed gamma dose rate in air (D), the annual effective dose rate, radium equivalent activities (), external hazard index (), and internal hazard index () from gamma radiation.

2. Material and Methods

In this study 19 different types of sedimentary rocks have been collected in different regions of Turkey. In Figure 1 the locations of Turkey in which samples were collected have been shown. After collection of samples, they were crushed and grinded to get proper grain size 100 mesh sieve. Then, samples were dried until 100°C in an oven for about 24 h. The dried samples have been filled in a cup which is sealed tightly with a thick tape around its neck to limit any gas escape from it, and it was stored for four weeks to get secular equilibrium to be achieved between ²³⁸U and its progeny [5].

Figure 1: The location of the sampling sites of the sedimentary rocks in Turkey.

The radioactivity of ²²⁶Ra, ²³²Th, and 40 K in the sedimentary rock samples was determined using a gamma-ray spectrometry [6] consisting of a NaI(Tl) detector connected to a 16384-channel multichannel analyser (MCA). Before measurement the system should be calibrated. This is done using ¹³⁷Cs and ⁶⁰Co radioactive sources, which produce γ-ray energy of 662, 1173, and 1332 keV, respectively. The γ-ray spectrum obtained from the mentioned source and related fit has been displayed in Figure 2.

(a)

(b)

Figure 2: Calibration spectrum obtained for ¹³⁷Cs and ⁶⁰Co source (a) and related fit (b).

The spectrum is analyzed using the MAESTRO32 obtained from ORTEC. The measurement was based on recording natural radioactivity quantities of three natural long-live elements: ²²⁶Ra, ²³²Th, and 40 K which are considered the photopeaks at 1760, 2610, and 1461 keV, respectively, in the natural γ-ray spectrum [5]. The efficiency calibration of the detector system was measured [7] and the results have been used in this work.

The activities for the natural radionuclides were calculated using the following relation [8]:

where  is the activity of the radionuclide in Bq/kg and is the net peak area under the most prominent photo peaks calculated by subtracting the respective count rate from the background spectrum obtained for the same counting time. The net count rate in the measurement is calculated from the background subtracted area of prominent gamma-ray peaks. is the detector efficiency of the specific gamma-ray, the absolute transition probability of gamma decay, the counting time (s) which is 72000 s, and the mass of the sample (kg).

3. Results and Discussion

The activity concentrations of natural radionuclides (40 K, ²³⁸U (²²⁶Ra), and ²³²Th) in the sedimentary rocks collected in Turkey are presented in Table 1. As shown in Table 1, the activity concentrations of sedimentary rock samples have ranged from 143.97 to 452.34 Bq/kg for 40 K, from 12.01 to 48.95 Bq/kg for ²²⁶Ra, and from 8.2 to 53.27 Bq/kg for ²³²Th. The obtained results have been displayed in Figure 3.

Table 1: The activity concentration of ⁴⁰K, ²²⁶Ra, and ²³²Th (in Bq/kg) of sedimentary rock samples.

Sample
Region
Activity concentration (Bq/kg)

40K
226Ra
232Th

S1
Bursa

S2
Bilecik

S3
Balıkesir

S4
Karaman

S5
Eskişehir

S6
Kayseri

S7
Diyarbakır

S8
Malatya

S9
Elazığ

S10
Isparta

S11
Burdur

S12
Hatay

S13
Afyon

S14
İzmir

S15
Manisa

S16
Denizli

S17
Kastamonu

S18
Karabük

S19
Amasya

UNSCEAR 2000
500.00
50.00
50.00

Figure 3: The activity concentration of 40 K, ²²⁶Ra, and ²³²Th for all samples.

The highest concentrations for all natural radionuclides were detected in the sample 13 (S13) which was collected from Afyon region. The worldwide average concentrations have been reported as 50 Bq/kg for ²²⁶Ra and ²³²Th concentrations and 500 Bq/kg for 40 K in the UNSCEAR, United Nations Scientific Committee on the Effects of Atomic Radiation [9–12]. It was found that obtained results for 40 K and ²²⁶Ra concentrations are lower than the worldwide average values. For ²³²Th concentration, S13 is higher than the worldwide average values.

The 40 K, ²²⁶Ra, and ²³²Th activity concentrations are used for estimation of the absorbed dose rate (D), the annual effective dose rates (AED), the radium equivalent activity (Raeq), and the index of external and internal radiation hazard ( and ).

The absorbed dose rate (D) in air at 1 m above the ground is calculated to provide a characteristic of the external terrestrial γ-ray [5, 11, 13]:

where , , and are activity concentrations of ²²⁶Ra, ²³²Th, and 40 K in Bq/kg, respectively. The absorbed dose rate ranged from 30.13 to 73.65 nGy·h⁻¹. The absorbed dose rate is displayed in Figure 4. The global average value of absorbed dose rate is 55 nGy·h⁻¹ [11].

Figure 4: Gamma absorbed dose rate at 1 m above ground for all samples.

The annual effective dose rates (AED) should be obtained to test the health effect of those absorbed dose rates. In order to estimate the annual effective doses, one has to take into account to conversion coefficient from absorbed dose in air to effective and the outdoor occupancy factor. In the UNSCEAR [11] reports, a value of 0.7 Sv/Gy was used for the conversion coefficient from absorbed dose in air to effective dose received by adults and 0.2 for the outdoor occupancy factor. The annual effective dose equivalent was calculated from the following equation:

The annual effective dose rate values varied from 0.037 to 0.09 mSv·y⁻¹. The AED results have been displayed in Figure 5. The average AED from the terrestrial radionuclides is 0.46 mSv·y⁻¹ in areas with the normal background radiation [11].

Figure 5: Effective dose rate for all samples.

Distribution of 40 K, ²²⁶Ra, and ²³²Th was not uniform in sedimentary rock samples. Uniformity with respect to exposure to radiation was defined in terms of radium equivalent activity (Raeq) in Bq/kg to compare the specific activity of materials containing different amounts of 40 K, ²²⁶Ra, and ²³²Th. The radium equivalent activity was calculated as follows [14]:

where , , and are the activity concentration of ²²⁶Ra, ²³²Th, and 40 K in Bq/kg, respectively. is estimated for the collected samples and is displayed in Figure 6. The values of varied from 62.44 to 159.15 Bq/kg. The recommended maximum value for is 370 Bq/kg [14].

Figure 6: Radium equivalent activity for all samples.

The external hazard index () and internal hazard index () are calculated from the equations [14]

where , , and are activity concentrations of ²²⁶Ra, ²³²Th, and 40 K in Bq/kg, respectively. The values of internal and external radiation hazard index must be less than unity for radiation hazard to be negligible.

The value of must be less than unity, which corresponds to the upper limit of (370 Bq/kg), in order to keep the radiation hazard under limit. The results have been displayed in Figure 7.

Figure 7: External and internal hazard index for all samples.

Also, all index results have been displayed in Table 2. It can be seen that the obtained values of absorbed dose rate for sedimentary rock samples except those collected from Afyon (S13), Kastamonu (S17), and Amasya (S19) are lower than the global average value of absorbed dose rate, which is 55 nGy·h⁻¹. For the annual effective dose, it is clear that none of the results are higher than the UNSCEAR limit, where the average AED from the terrestrial radionuclides is 0.46 mSv·y⁻¹ in areas with the normal background radiation. The estimated values of in the present work are lower than the recommended maximum value of 370 Bq/kg. For internal and external radiation hazard index, it can be seen that all measured results are lower than the upper limit of unity.

Table 2: Results of the absorbed dose rate (), the annual effective dose rates (AED), the radium equivalent activity (Raeq), and the index of external and internal radiation hazard (, ).

Sample
Region
Index

(nGy/h)
AED (mSv/y)
Raeq (Bq/kg)

S1
Bursa

0.05

0.25
0.35
0.33

S2
Bilecik

0.04

0.18
0.25
0.24

S3
Balıkesir

0.05

0.24
0.33
0.31

S4
Karaman

0.06

0.31
0.44
0.40

S5
Eskişehir

0.04

0.17
0.25
0.23

S6
Kayseri

0.05

0.23
0.28
0.31

S7
Diyarbakır

0.04

0.18
0.26
0.25

S8
Malatya

0.06

0.29
0.41
0.37

S9
Elazığ

0.05

0.26
0.30
0.36

S10
Isparta

0.05

0.22
0.32
0.29

S11
Burdur

0.06

0.31
0.39
0.41

S12
Hatay

0.05

0.26
0.36
0.34

S13
Afyon

0.09

0.43
0.56
0.58

S14
İzmir

0.04

0.19
0.25
0.25

S15
Manisa

0.05

0.26
0.36
0.34

S16
Denizli

0.06

0.31
0.42
0.41

S17
Kastamonu

0.08

0.37
0.50
0.50

S18
Karabük

0.05

0.22
0.31
0.29

S19
Amasya

0.08

0.39
0.52
0.53

4. Conclusion

The level of natural radioactivity in sedimentary rock samples collected from different regions of Turkey was evaluated using gamma-ray spectrometry. The mean activity concentrations of 40 K, ²²⁶Ra, and ²³²Th were 243.08, 34.66, and 31.92 Bq/kg, respectively. The mean activity concentrations are lower than the world mean values identified by UNSCEAR [11]. From the measured values, the average values of absorbed dose rate in air (D), annual effective dose (AED), radium equivalent activity (), external hazard index (), and internal hazard index () were calculated and these were 45.43 nGy/h, 0.056 mSv/y, 99.0 Bq/kg, 0.27, and 0.36, respectively. All the calculated values are lower than the recommended maximum values in the UNSCEAR [11] reports. As a result of these, it can be concluded that for people who are using and mining sedimentary rock in these regions of Turkey are safe in terms of radiation hazards.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the Suleyman Demirel University Foundation Unit (BAP) with the Project no. of 2226-D-10. The authors wish to thank to Professor Dr. R. Altındag for helping in providing rocks samples.

References

T. Santawamaitre, D. Malain, H. A. Al-Sulaiti, M. Matthews, D. A. Bradley, and P. H. Regan, “Study of natural radioactivity in riverbank soils along the Chao Phraya river basin in Thailand,” Nuclear Instruments and Methods in Physics Research A, vol. 652, no. 1, pp. 920–924, 2011.

A. Abbady, N. K. Ahmed, A. M. El-arabi, R. Michel, A. H. El-kamel, and A. G. E. Abbady, “Estimation of radiation hazard indices from natural radioactivity of some rocks,” Nuclear Science and Techniques, vol. 17, no. 2, pp. 118–122, 2006.

A. M. El-Arabi, N. K. Ahmed, and A. H. El-Kamel, “Gamma spectroscopic analysis of powdered granite samples in some Eastern desert’s areas,” in Proceedings of the 5th Radiation Conference, Cairo, Egypt, November 2000.

A. I. Abd El-mageed, A. H. El-Kamel, A. Abbady, S. Harb, A. M. M. Youssef, and I. I. Saleh, “Assessment of natural and anthropogenic radioactivity levels in rocks and soils in the environments of Juban town in Yemen,” Radiation Physics and Chemistry, vol. 80, no. 6, pp. 710–715, 2011.

I. Akkurt, B. Oruncak, and K. Gunoglu, “Natural radioactivity and dose rates in commerciallyused marble from Afyonkarahisar—Turkey,” International Journal of Physical Sciences, vol. 5, no. 2, pp. 170–173, 2010.

I. Akkurt, M. B. Mavi, H. A. H. Akyildirim, and K. G. K. Günoglu, “Natural radioactivity of coals and its risk assessment,” International Journal of Physical Sciences, vol. 4, no. 7, pp. 403–406, 2009.

I. Akkurt, K. Gunoglu, and Ş.Ş. Arda, “Detection efficiency of NaI(Tl) detector in 511–1332 keV,” Science and Technology of Nuclear Installations. In press

D. Amrani and M. Tahtat, “Natural radioactivity in Algerian building materials,” Applied Radiation and Isotopes, vol. 54, no. 4, pp. 687–689, 2001.

F. Steger and K. Grün, A Standard in AUSTRIA to Limit Natural Radioactivity in Building Materials, IAEA, Vienna, Austria, 1999.

UNSCEAR, United Nations Scientific Committee on the Effects of Atomic Radiation. Annex A: Exposure from Natural Sources, United Nations, New York, NY, USA, 1993.

UNSCEAR, United Nations Scientific Committee on the Effects of Atomic Radiation. Annex A: Exposure from Natural Sources, United Nations, New York, NY, USA, 2000.

U. Cevik, N. Damla, A. I. Kobya, A. Celik, and A. Kara, “Radiation dose estimation and mass attenuation coefficients of marble used in Turkey,” Annals of Nuclear Energy, vol. 37, no. 12, pp. 1705–1711, 2010.

R. Veiga, N. Sanches, R. M. Anjos et al., “Measurement of natural radioactivity in Brazilian beach sands,” Radiation Measurements, vol. 41, pp. 189–196, 2006.

J. Beretka and P. J. Mathew, “Natural radioactivity of Australian building materials, industrial wastes and by-products,” Health Physics, vol. 48, no. 1, pp. 87–95, 1985.