Shock and Vibration

Volume 2014 (2014), Article ID 809173, 8 pages

http://dx.doi.org/10.1155/2014/809173

Research Article

Improving Delay-Margin of Noncollocated Vibration Control of Piezo-Actuated Flexible Beams via a Fractional-Order Controller

Teerawat Sangpet,¹ Suwat Kuntanapreeda,¹ and Rüdiger Schmidt²

¹Department of Mechanical and Aerospace Engineering, King Mongkut’s University of Technology North Bangkok, Bangkok 10800, Thailand

²Institute of General Mechanics, RWTH Aachen University, D-52056 Aachen, Germany

Received 27 February 2014; Accepted 19 March 2014; Published 31 March 2014

Academic Editor: Vadim V. Silberschmidt

Copyright © 2014 Teerawat Sangpet et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Noncollocated control of flexible structures results in nonminimum-phase systems because the separation between the actuator and the sensor creates an input-output delay. The delay can deteriorate stability of closed-loop systems. This paper presents a simple approach to improve the delay-margin of the noncollocated vibration control of piezo-actuated flexible beams using a fractional-order controller. Results of real life experiments illustrate efficiency of the controller and show that the fractional-order controller has better stability robustness than the integer-order controller.

1. Introduction

Flexible structures have attracted increasing attentions for many applications because of their weights and production costs. However, the flexibility leads to unwanted vibration problems. Thus, vibration control is usually needed. Over the past few decades, active vibration control has drawn more interest from researchers since it can effectively suppress the vibration [1, 2]. A large part of the active vibration control research has used piezoelectric materials for actuation and sensing. Advantages of using piezo-actuators/sensors include nanometer scale resolution, high stiffness, and fast response. Piezo-actuators have been proven to be useful in suppressing structural vibration [3, 4].

Stabilization of flexible structures can be easily done by collocating the sensors and the actuators. However, the collocated control configuration is not always feasible in practice and its performance is not always satisfactory. Thus, noncollocated control has been investigated [5, 6]. However, noncollocated control results in a nonminimum-phase closed-loop system because the separation between the actuator and the sensor creates an input-output delay, which can deteriorate stability of the closed-loop system.

Fractional calculus is a 300-year-old mathematical topic [7, 8]. However, its practical applications have just recently been explored. Recently, fractional-order control has been attracting interest. It has been illustrated that fractional-order controllers yield superior performance to integer-order controllers [9, 10].

This paper presents a simple approach to improve the delay-margin of the noncollocated vibration control of piezo-actuated flexible beams using a fractional-order proportional-integral-derivative (PID) controller. The rest of the paper is organized as follows. Section 2 provides some preliminaries. Section 3 describes the piezo-actuated flexible beam that is used as an experimental test bench. Section 4 presents a finite element model of the experimental beam. The proposed controller design is given in Section 5. Experimental results are presented in Section 6. The last section concludes the paper.

2. Preliminaries

2.1. Fractional-Order Calculus

The frequently used definitions of fractional-order derivatives are Riemann-Liouville definition, Grünwald-Letnikov definition, and Caputo definition. The Riemann-Liouville definition is given as

where is the fractional order, is the integer that , and is the Gamma function. The Grünwald-Lentnikov definition can be written as

where is the fractional order and

is the usual notation for the binomial coefficients. The Caputo definition is described by

where is the fractional order, is the integer that , and is the Gamma function. These three definitions are equivalent to a wide class of functions [1, 2].

The most general expression of the Laplace transform of the fractional-order derivative is given as

where is the integer that and . If all the initial conditions are zero, the Laplace transform of the fractional derivative becomes very simple as

The transfer function of fractional -order integrator and the fractional -order derivative, respectively, is

The transfer function of the fractional-order proportional-integral-derivative (PID) controller can be expressed as

where , , , , and are the controller parameters. It is worth noting that the fractional-order controller has two extra degrees of freedom compared to the conventional integer-order PID controller. This provides more freedom to better adjust the performance of the closed-loop systems.

2.2. Piezo-Actuator Equation

The equation relating the applied voltage and the axial strain produced by a piezo-actuator is given as [11, 12]

where is the dielectric constant of the piezoelectric material, is the applied voltage, and is the thickness of the piezoelectric material. When the piezo-actuator is bonded on the surface of a beam, the normal stress and the bending moment on the beam produced by the actuator are

where is the thickness of the beam, is Young’s modulus of the piezoelectric material, and .

2.3. Finite Element Equation

Consider a simple cantilever beam with a piezo-actuator bonded on the surface as shown in Figure 1. It is assumed that the beam is divided into elements. Each element has two nodes and each node has two degrees of freedom: transverse direction and slope .

Figure 1: Finite element model of a piezo-actuated beam.

The transverse displacement at any position on the element can be expressed as [11, 13]

where is the nodal displacement vector and is the mode shape vector function. By using the Lagrangian method, the differential equation of motion to be solved can be expressed as [14, 15]

where is the mass matrix, is the stiffness matrix, is the damping matrix, and is the force matrix. For Raleigh proportional damping, , where , are the damping constants. The force matrix for the element without the piezo-actuator is and for the element bonded with the piezo-actuator is , which is directly derived from (11).

3. Experimental System

A schematic and a photograph of the experimental system used in this paper are shown in Figure 2. The system consists of a flexible cantilever beam, a piezoelectric actuator, a high-voltage power amplifier, a laser displacement sensor, a 12-bit A/D and D/A interface board, and a PC. The beam is made of aluminum. The dimensions and properties of the beam are summarized in Table 1. The actuator is lead-zirconate-titanate (also known as PZT). It is bonded on the beam at the distance from the clamped point. The dimensions and properties of the actuator are summarized in Table 2. The sensor comprises a sensor head and a sensor amplifier. The sensor head makes use of a red laser semiconductor with a wavelength of 655 nm and an output power of 220 W. The measurement range is ±5 mm. The maximum sampling frequency is 3 kHz, but in our experiments, a default setting of 1 kHz was used. The sensor amplifier outputs an analog signal with a range of ±5 V. The sensor measures the tip displacement of the beam. The displacement signal is fed back to the PC through the interface board. The control signal from the computer is converted to an analogue signal by the interface board and is transmitted to the high-voltage power amplifier. The gain of the amplifier is 150. Figure 3 displays the pulse response and the frequency response function of the beam and shows that the first two natural frequencies of the beam are 41.6952 rad/s and 235.1796 rad/s and the damping ratio is about 0.0097. The magnitude and duration of the pulse input are 1 V and 16 msec, respectively.

Table 1: Beam’s dimensions and properties.

Dimensions/properties
Symbol
Value
Unit

Young’s modulus

70
GPa

Density

2700
kg/m³

Poisson ratio

0.35
—

Length

335
mm

Width

15
mm

Thickness

0.8
mm

Table 2: Piezoelectric material’s dimensions and properties.

Dimensions/properties
Symbol
Value
Unit

Young’s modulus

66.67
GPa

Density

7800
kg/m³

Length

50
mm

Width

15
mm

Thickness

0.5
mm

Strain coefficient

m/V

m/V

(a)

(b)

Figure 2: Experimental system: (a) schematic, (b) photograph.

(a)

(b)

Figure 3: Experimental system’s responses: (a) pulse response, (b) frequency response function.

4. Finite Element Model

A finite element (FE) model of the experimental piezo-actuated beam was developed for being used in the control design process. For simplicity, was chosen. The pulse response and the frequency response function obtained from the developed FE model are shown in Figure 4. The responses agree with those of the experimental system.

(a)

(b)

Figure 4: System’s responses based on FE model: (a) pulse response, (b) frequency response function.

5. Control Design

The control objective is to drive the tip of the beam to a desired position within 3 seconds. The proposed fractional-order PID controller can be designed using the following steps.

Step 1. Design a conventional integer-order PID controller based on an approximated lower-order transfer function of the beam. Here, the transfer function containing only the first natural frequency was employed. The transfer function is expressed as

where , , and are the natural frequency, damping ratio, and system gain, respectively. The values found in Section 3 were used; that is,  rad/sec, , and . The transfer function of the controller is given by

where , , and are the integer-order controller parameters. A root locus technique was used to determine the parameters.

Step 2. Tune the integer-order controller parameters from Step 1 with a FE model of the beam. Here, the FE model developed in Section 4 was employed. The parameters of the controller were found to be , , and . A step response of the control system based on the FE model is shown in Figure 5. The result shows that the control response meets the objective. The Bode characteristic of the open-loop transfer function is shown in Figure 6. The delay-margin is 13.9 msec.

(a)

(b)

Figure 5: Step response of the closed-loop FE model using the integer PID controller: (a) tip position, (b) control signal.

(a)

(b)

Figure 6: Bode characteristic of the open-loop transfer function based on the integer PID controller and the FE model: (a) magnitude, (b) phase.

Step 3. Replace the integrator of the tuned integer-order controller by a fractional-order integrator. The transfer function of the controller becomes

where is the fractional order. Here, was chosen.

Step 4. Tune the parameters of the fractional-order controller from Step 3 with the FE model. Similar to Step 2, the parameters were found to be , , and . A step response of the fractional-order control system based on the FE model is shown in Figure 7. The result shows that the control response meets the objective with less initial oscillation compared to those of the integer-order controller. The Bode characteristic of the open-loop system is shown in Figure 8. The delay-margin was increased to 20.8 msec.

(a)

(b)

Figure 7: Step response of the closed-loop FE model using the fractional PID controller: (a) tip position, (b) control signal.

(a)

(b)

Figure 8: Bode characteristic of the open-loop transfer function based on the fractional PID controller and the FE model: (a) magnitude, (b) phase.

6. Experimental Results

The integer-order controller (15) and the fractional-order controller (16) were implemented on the experimental beam for comparison. The parameters of the controllers used in the experiments were obtained in the previous section and are summarized in Table 3. The controllers were implemented digitally on the PC. The control laws were written in . The control sampling period was 1 msec for all experiments.

Table 3: Parameters for the controllers.

Integer-order controller
Fractional-order controller

= 1300
= 600

= 3100
= 3100

= 70
= 40

= 0.85

The control response of the integer-order controller is shown in Figure 9, which shows satisfactory step response. Note that the oscillatory behavior in the experiment is greater than that in the FE model. This is due to the effect of the measurement noise and the uncertainties of the system’s parameters.

(a)

(b)

Figure 9: Step response of the closed-loop experimental system using the integer-order controller: (a) tip position, (b) control signal.

After that, we added a 1.5-gram mass to the tip of the beam to examine the stability robustness of the controller. We found that the control system is unstable as shown in Figure 10. This is due to the delay (the effect of the noncollocated configuration). This implies that the closed-loop system does not have sufficient delay-margin.

(a)

(b)

Figure 10: Step response of the closed-loop experimental system with the added mass using the integer-order controller: (a) tip position, (b) control signal.

Now, the fractional-order controller is evaluated. The continued fraction expansion (CFE) of the Al-Alaoui operator [16] is used to discretize the controller. The control response of the fractional-order controller is shown in Figure 11, which provides the same satisfactory response compared to those of the integer-order controller. Moreover, there is no marked difference compared to the FE result. This implies that the fractional-order controller is more robust to the noise and the uncertainties than the integer-order counterpart.

(a)

(b)

Figure 11: Step response of the closed-loop experimental system with the fractional-order controller: (a) tip position, (b) control signal.

Finally, we evaluated the stability robustness of the fractional-order controller by adding the 1.5-gram mass to the tip of the beam (in the same way that we did with the integer-order case). In this case, the control response is stable, as shown in Figure 12. This is due to the larger delay-margin provided by the fractional-order controller.

(a)

(b)

Figure 12: Step response of the closed-loop experimental system with the added mass using the fractional-order controller: (a) tip position, (b) control signal.

7. Conclusions

This paper presented the position control of a piezo-actuated flexible beam using a fractional-order PID controller. The control employed a noncollocated configuration, which always produces input-output delay. The fractional-order controller was designed to increase delay-margin of the closed-loop system. Experimental results show that the fractional-order controller provides better stability robustness than the integer-order counterpart.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This work was supported by the Royal Golden Jubilee Ph.D. Program of the Thailand Research Fund.

References

C. C. Fuller, Active Control of Vibration, Academic Press, 1996.

A. Preumont, Vibration Control of Active Structures, Kluwer Academic Publishers, 2004.

S. V. Gosavi and A. G. Kelkar, “Modelling, identification, and passivity-based robust control of piezo-actuated flexible beam,” Journal of Vibration and Acoustics, vol. 126, no. 2, pp. 260–271, 2004.

Z. Zhang, Y. Chen, H. Li, and H. Hua, “Simulation and experimental study on vibration and sound radiation control with piezoelectric actuators,” Shock and Vibration, vol. 18, no. 1-2, pp. 343–354, 2011.

Z. Qiu, J. Han, X. Zhang, Y. Wang, and Z. Wu, “Active vibration control of a flexible beam using a non-collocated acceleration sensor and piezoelectric patch actuator,” Journal of Sound and Vibration, vol. 326, no. 3-5, pp. 438–455, 2009.

C. Spier, J. C. Bruch, J. M. Sloss, I. S. Sadek, and S. Adali, “Effect of vibration control on the frequencies of a cantilever beam with non-collocated piezo sensor and actuator,” IET Control Theory and Applications, vol. 5, no. 15, pp. 1740–1747, 2011.

I. Podlubny, Fractional Differential Equations, Academic Press, 1999.

D. Cafagna, “Fractional calculus: a mathematical tool from the past for present engineers,” IEEE Industrial Electronics Magazine, vol. 1, no. 2, pp. 35–40, 2007.

C. A. Monje, B. M. Vinagre, V. Feliu, and Y. Chen, “Tuning and auto-tuning of fractional order controllers for industry applications,” Control Engineering Practice, vol. 16, no. 7, pp. 798–812, 2008.

T. Sangpet and S. Kuntanapreeda, “Force control of an electrohydraulic actuator using a fractional order controller,” Asian Journal of Control, vol. 15, no. 3, pp. 764–772, 2013.

B. Bandyopadhyay, T. C. Manjunath, and M. Umapathy, Modeling, Control and Implementation of Smart Structures: A FEM-State Space Approach, Spinger, Berlin, Germany, 2007.

Z. Qiu, X. Zhang, and C. Ye, “Vibration suppression of a flexible piezoelectric beam using BP neural network controller,” Acta Mechanica Solida Sinica, vol. 25, no. 4, pp. 417–428, 2012.

V. Y. Perel and A. N. Palazotto, “Finite element formulation for dynamics of delaminated composite beams with piezoelectric actuators,” International Journal of Solids and Structures, vol. 39, no. 17, pp. 4457–4483, 2002.

S. Y. Wang, “A finite element model for the static and dynamic analysis of a piezoelectric bimorph,” International Journal of Solids and Structures, vol. 41, no. 15, pp. 4075–4096, 2004.

D. L. Logan, A First Course in the Finite Element Method, Wadsworth Group, 2002.

B. M. Vinagre, I. Podlubny, A. Hernandez, and V. Feliu, “Some approximations of fractional order operators used in control theory and applications,” Fractional Calculus and Applied Analysis, vol. 3, pp. 231–248, 2000.