RETRACTED

At the request of the authors, the article titled “The Long-Term Settlement Deformation Automatic Monitoring System for the Chinese High-Speed Railway” [1] has been retracted and blanked. The article was found to contain information provided by China Railway Design Group Co., Ltd. The authors did not acknowledge the company’s role in their work. The company believes that this article infringes on their intellectual property.

Shock and Vibration
Volume 2015 (2015), Article ID 147972, 12 pages
http://dx.doi.org/10.1155/2015/147972

Research Article

The Long-Term Settlement Deformation Automatic Monitoring System for the Chinese High-Speed Railway

Xu Wang,1,2 Liangqin Wu,³ Yi Zhou,¹ and Yanru Wang⁴

¹State Key Laboratory Breeding Base of Mountain Bridge and Tunnel Engineering, Chongqing Jiaotong University, Chongqing 400074, China
²Key Laboratory of Structure and Wind Tunnel of Guangdong Higher Education Institutes, Shantou 515063, China
³Department of Civil Engineering and Architecture, East China Jiaotong University, Nanchang 330013, China
⁴Oujiang College, Wenzhou University, Wenzhou 325035, China

Received 20 August 2014; Accepted 31 October 2014

Academic Editor: Bo Chen

Copyright © 2015 Xu Wang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.