Shock and Vibration
Volume 2016 (2016), Article ID 2143575, 9 pages
http://dx.doi.org/10.1155/2016/2143575

Research Article

A Comparative Study of Ground and Underground Vibrations Induced by Bench Blasting

Xiuzhi Shi, Xianyang Qiu, Jian Zhou, Dan Huang, Xin Chen, and Yonggang Gou

School of Resources and Safety Engineering, Central South University, Changsha 410083, China

Received 19 June 2016; Accepted 19 September 2016

Academic Editor: Ivo Caliò

Copyright © 2016 Xiuzhi Shi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Ground vibrations originating from bench blasting may cause damage to slopes, structures, and underground workings in close proximity to an operating open-pit mine. It is important to monitor and predict ground vibration levels induced by blasting and to take measures to reduce their hazardous effects. The aims of this paper are to determine the weaker protection objects by comparatively studying bench blasting induced vibrations obtained at surface and in an underground tunnel in an open-pit mine and thus to seek vibration control methods to protect engineering objects at the site. Vibrations arising from measurement devices at surface and in an underground tunnel at the Zijinshan Open-Pit Mine were obtained. Comparative analysis of the peak particle velocities shows that, in the greatest majority of cases, surface values are higher than underground values for the same vibration distance. The transmission laws of surface and underground vibrations were established depending on the type of rock mass, the explosive charge, and the distance. Compared with the Chinese Safety Regulations for Blasting (GB6722-2014), the bench blasting induced vibrations would not currently cause damage to the underground tunnel. According to the maximum allowable peak particle velocities for different objects, the permitted maximum charges per delay are obtained to reduce damage to these objects at different distances.

1. Introduction

Adverse effects of blasting are one of the fundamental problems in open-pit mines. Generally, only part of the energy released during blasting is utilized directly for breaking rock within a target range, whereas the remainder of the energy is passed to the surrounding rock, structures, and environment in the forms of ground vibration, noise, flying rocks, back break, and air blasts [1–3]. Ground vibration originating from blasting operations, which can cause damage to nearby building structures and residences, is considered as the main blasting hazard [4–7]. Therefore, it is important to monitor, predict, and control ground vibration arising from blasting.

Over the years, many research studies have investigated vibrations induced by blasting in open-pit mines. For instance, Shi and Chen [8] successfully reduced the vibration intensity by controlling maximum charge amount per delay and selecting optimum interval time in an open-pit mine. Simangunsong and Wahyudi [9] and Görgülü et al. [10] studied the ground vibrations induced by open-pit blasting using an artificial neural network. With the increase of open-pit and underground combined mining and the occasional need of open-pit mining, several underground workings may be located in close proximity to an operating open-pit mine. In these cases, ground vibrations generated due to open-pit blasting may be hazardous to the stability of adjoining underground workings as well as surface building structures and residences [11–13]. Different rock mass characteristics at surface and in underground levels cause underground vibration damping [14].

Determination of weaker protection objects at surface and in underground tunnel is of great importance to control vibrations induced by bench blasting. In this study, blast induced ground vibrations obtained at surface and in an underground transport tunnel are comparatively examined and used to determine which are the weaker protection objects that may be damaged by blasting induced vibration. Furthermore, the peak particle velocity (PPV) is estimated depending on the maximum charge amount per delay () and distance (). Finally, according to the Chinese Safety Regulations for Blasting [15], the maximum charge amount per delay is controlled for different protection objects.

2. Description of the Study Area

This study was conducted at the Zijinshan Open-Pit Mine, which is located in Shanghang County, Fujian Province, China. The satellite image of the mine taken from Google Earth is shown in Figure 1. South of the open-pit mine is a village called Chatouping. The distance from the closest building of the village to the open-pit mine is approximately 500 m.

Figure 1: Location of the open-pit mine.

Figure 2 shows the position of the underground transport tunnel, in which the relative position of the underground tunnel and the open-pit mine can be observed. The elevation of the lowest bench is 592 m, and the elevation of the transport tunnel is 517 m.

Figure 2: Transport tunnel position of the open-pit mine.

The rock type of the mine consists of medium grained granite, cryptoexplosive breccia, and porphyritic dacite. The rock is mainly hard rock with some thin layers of local weak rock.

3. Control Parameters and Measuring Equipment

3.1. Blasting Parameters

The main blasting area was bench 628 m. The design parameters generally applied for blasting operations at the mine are given in Table 1.

Table 1: General applied design parameters at the mine.

Parameters
Value

Slope, (°)
75

Diameter, (mm)
165

Hole length, (m)
12~13.5

Bench height, (m)
12

Burden, (m)
6

Spacing, (m)
4

Stemming, (m)
2

Delay time
25 ms (hole), 65 ms (row)

Maximum charge per delay, (kg)
100~200

Explosive
ANFO

3.2. Blasting Vibration Monitoring

To comparatively study the underground and surface vibrations induced by the bench blasting, the vibrations generated by blasting in the mine were recorded both on the surface and underground. The underground and surface measurements were not gathered simultaneously. The underground measurements were collected from September 2013 to November 2013, whereas the surface measurements were collected from November 2013 to July 2014. The charge quantity per delay parameters and the distance between the blasts and the station were carefully recorded. The distances between the shot points and monitor stations were calculated using the coordinates of each location.

A seismic YBJ-1 type of velocity recording instrument supplied by Beijing Instrument Factory was adopted in this study. Blasts were mainly carried out on bench 628 m. At surface, monitoring station points were placed on benches with different elevations in the south of the blasting site. Selected monitoring station points were convenient to the assembled instruments. To monitor the underground vibration induced by the bench blasting, monitoring station points were placed in the underground tunnel, almost the same plane position with the surface (Figure 2). The measurement devices were installed on the middle top of the tunnel by anchors built into the rock. The installation patterns on the bench and in the tunnel are shown in Figure 3. The main vibration measurement parameters were velocity and frequency. Only the vertical velocity measurements were collected in the tunnel, whereas the velocity of three directions was measured on the bench. A number of bench measurement results showed that the peak vertical particle velocities are the largest among the three vibration components of the monitoring points. So, the peak vertical particle velocities of the surface vibration are used in this study.

(a)

(b)

Figure 3: Installation patterns on the bench and in the tunnel. (a) Surface. (b) Underground.

In all, 37 recordings of underground vibrations were made from 17 blasts, and 37 recordings of surface vibrations were made from 16 blasts.

4. Analysis of Ground and Underground Vibrations Induced by Bench Blasting

4.1. Comparative Study of Surface and Underground Vibrations

To intuitively compare vibrations obtained from measurement devices at surface and in underground tunnel, Figure 4 shows the values of PPV per unit charge by delay versus the distances between the blast and the monitor stations both on surface and in tunnel [14]. As shown in Figure 4, the distances from the monitoring stations on the surface to the blasts are universally below 150 m, whereas those underground are above 90 m. To rule out the influence of different distances, only vibrations for distances from 90 to 160 m are to be comparatively studied.

(a)

(b)

Figure 4: Representation of PPV per unit charge versus the distance on surface and underground. (a) Total figure. (b) Partial figure.

From the enlarged view in Figure 4, it can be clearly observed that, in the greatest majority of cases, the values obtained on the surface are higher than those from underground for the same distance. Although the underground and surface measurements were not taken simultaneously, the geological conditions of the mine, the blasting parameters, and other environmental factors that may influence the propagation of vibration waves were almost identical in the measuring period. Therefore, the data obtained from the surface and underground areas in the open-pit mine are evidence of the existence of vibration damping from surface to underground.

4.2. Determination of the Law of Transmission of Vibrations

To prevent and control the vibrations resulting from blasting, the laws of transmission of vibrations were established considering the type of rock mass, the explosive charge, and the distance using the data obtained on the surface and underground.

Peak particle velocity (PPV) is generally a direct function of the maximum charge per delay called “” and is negatively related to the distance between the blasting point and the recording point [16]. To find a mathematical expression of the determination of the laws of transmission of vibrations, the “scaled distance,” which is defined as the relation between the distance and the energy of the explosive charge, was used [17]. The scaled distance was calculated as

where is the scaled distance, is the distance between the emitted point and received point in m, and is the amount of maximum charge per delay in kg.

The empirical relation between the PPV and the scaled distance is then obtained, which takes the following form:

The values obtained for PPV and are plotted to determine the value of the constants and , which will depend on geological conditions. Then, the equation of the regression curve that best fits the plot is obtained. The law of transmission of underground vibration was obtained using the data from Table 2. Figure 5 shows the pairs of values formed by the scaled distance and the PPV. Using the equation of the regression curve in Figure 5, the following transmission law for underground vibration is obtained:

Table 2: Vibration measurements taken in tunnel.

Blast
Bench
, maximum charge by delay (kg)
, distance (m)
PPV (mm/s)
Frequency (Hz)

1
628
174
313
0.7
14.6

2
628
175
102
15.1
31.1

175
132
14.3
32.3

175
172
6.3
32.3

3
628
175
262
1.3
32.9

175
217
2.1
33.9

175
141
5.2
32.9

175
120
3.1
32.3

4
628
175
107
15.0
32.9

175
144
4.7
32.9

175
186
5.8
32.9

5
628
175
335
2.3
31.7

175
228
2.1
32.9

175
207
6.3
32.9

6
628
173
267
1.6
30.5

7
628
175
205
6.2
16.5

175
132
4.3
31.7

175
141
7.6
33.6

8
628
175
259
1.5
29.9

175
211
5.4
33.6

9
628
175
236
2.9
34.3

175
154
3.9
35.4

10
628
175
176
4.5
35.4

11
616
175
140
5.1
35.4

175
127
15.9
33.5

12
628
175
175
3.8
35.4

175
171
3.2
33.6

13
628
173
104
3.9
62.0

173
252
7.1
33.6

14
616
174
141
5.7
32.3

174
108
6.2
35.0

174
95
13.5
33.6

15
628
175
202
4.8
34.2

16
628
173
230
5.5
61.0

173
107
24.5
88.8

173
99
12.5
95.2

17
628
175
194
3.9
34.2

Figure 5: Relations between PPV and the scaled distance for underground vibrations.

The law of transmission of surface vibration was obtained using the data from Table 3. Figure 6 shows the pairs of values formed by the scaled distance and the PPV. Using the equation of the regression curve in Figure 6, the following transmission law for underground vibration is obtained:

Table 3: Vibration measurements taken on surface.

Blast
Bench
, maximum charge by delay (kg)
, distance (m)
PPV (mm/s)
Frequency (Hz)

1
628
350
35
104.9
15.3

350
95
5.1
21.5

2
628
174
35
2.9
30.5

174
65
51.3
33.5

3
628
174
35
59.5
32.9

174
65
36.9
30.5

4
628
175
35
7.0
36.0

175
65
38.7
25.0

5
628
174
105
13.7
31.5

6
628
175
35
69.3
34.2

175
95
64.3
32.3

7
628
175
65
3.2
11.7

175
155
5.6
4.9

8
628
175
97
23.8
16.5

175
126
3.1
12.2

9
628
144
35
72.4
32.9

144
65
4.0
31.7

10
628
132
35
72.4
17.7

132
65
71.3
32.3

132
95
68.0
20.1

11
628
192
35
72.4
17.7

192
65
43.1
23.8

192
95
30.7
32.3

12
628
132
35
71.1
17.1

132
65
59.9
30.5

132
95
4.9
31.7

13
628
144
35
90.5
33.6

144
65
39.8
32.9

144
95
29.9
31.7

14
628
192
35
92.5
38.4

192
65
38.1
32.2

192
95
5.4
29.2

15
628
192
35
21.7
18.3

192
65
70.5
52.5

192
92
71.8
50.7

16
628
168
35
72.4
36.0

168
65
43.9
25.0

Figure 6: Relations between PPV and the scaled distance for surface vibrations.

The fitting coefficients for the transmission laws of the bench blasting induced vibrations measured on the surface and underground are 0.91 and 0.85, respectively. So, the fitting degree for surface vibrations is higher than that for measurements taken underground because surface vibrations are greatly influenced by topographic changes at the surface level; as depth increases, the rock mass is increasingly homogeneous.

5. Maximum Charge Control Based on the Transmission of Vibration

5.1. Distribution of PPV with Frequency Compared with Regulations

Open-pit blasting induced vibrations might affect the transport tunnel and constructional engineering components close to the open-pit mine, so the obtained vibrations are estimated and compared to the Chinese Safety Regulations for Blasting (GB6722-2014) released in 2014 [15].

The permitted peak particle velocities for different structures advised by GB6722-2014 are listed in Table 4. In the Zijinshan Mine, the structures influenced by the surface and underground vibrations are the permanent slope and the underground tunnel, respectively. The standard level for the roadway in the mine is suitable for an underground tunnel in the Zijinshan Mine. Figure 7 shows all pairs of vibration frequency-velocity values on the surface and the permitted peak particle velocities of different frequencies for a permanent slope. It can be observed that all surface recordings of the blasts are situated below the standard level of the permanent slope. However, some recordings are very close to the standard level, which means measures must be taken to reduce the surface vibrations. Figure 8 shows the situation of all pairs of underground vibration frequency-velocity values and the permitted peak particle velocities of different frequencies for the mine roadway. It is clear that all underground recordings of the blasts are situated far below the standard level of the mine roadway. Therefore, the underground vibrations under current blasting design are unlikely to be hazardous to the underground tunnel. Under such conditions, the main objects forced by blasting vibration control are different architecture and structures on the surface.

Table 4: Blasting induced vibration permitted according to Chinese standards.

Protective object
Permitted PPV (mm/s)

<10 Hz
10–50 Hz
>50 Hz

House built of soil or stone
1.5–4.5
4.5–9
9–15

General civil building
15–20
20–25
25–30

Industrial building
25–35
35–45
42–50

Ancient relic
1-2
2-3
3–5

Permanent slope
50–90
80–120
100–150

Roadway in mine
150–180
180–250
200–300

Figure 7: Representation of surface vibration in relation to Chinese standards.

Figure 8: Representation of underground vibration in relation to Chinese standards.

5.2. PPV Estimation of Surface Vibration

Peak particle velocity of the bench blasting induced vibrations in the mine can be estimated according to the transmission law of vibrations. In Figure 9, the peak particle velocity of surface vibration can be estimated depending on the maximum charge amount per delay () and distance (). For structures of a certain distance from the blasting source, the extent of the blasting influence on them can be evaluated by comparing the assessed peak particle velocity to Chinese Safety Regulations for Blasting. For instance, for a 100 kg charge per delay, the peak particle velocity at a distance of 50 m is estimated to be 36.4 mm/s; for 200 kg charge per delay, the peak particle velocity at a distance of 200 m is estimated to be 10.3 mm/s.

Figure 9: Surface PPV dependent on and .

5.3. Maximum Charge Control for Different Protection Objects

According to Chinese Safety Regulations for Blasting in Table 4, the frequencies of recorded surface signals can be classified, thus to determine the maximum allowable peak particle velocities for different protection objects.

The frequencies of recorded peak particle velocities of surface vibration are shown in Figure 10. In all 37 recorded signals, the number of the recorded signals with frequencies less than 10 Hz is 1 and the ratio is 3%. The number of the recorded signals with frequencies between 10 and 50 Hz is 34 and the ratio detonates to 92%. For recorded signals with frequencies more than 50 Hz, the number is 2 and the ratio is 5%. Therefore, the open-pit mine can be classified as a low frequency site where the detonating frequencies are between 10 and 50 Hz. According to Chinese Safety Regulations for Blasting in Table 4, the maximum allowable peak particle velocities for different protection objects are obtained. For example, the maximum allowable peak particle velocity for permanent slope in the site is 150 mm/s, whereas for industrial buildings the velocity is 45 mm/s.

Figure 10: Vibration frequency of recorded events.

Generally, many factors including the blasting source and transmission route influence the blasting vibration effect in an open-pit mine [18]. The transmission route factors are commonly unmanageable, such as distance from blasting, elevation differences, and geological conditions. Adjusting the variable blasting source factors usually reduces the intensity of blasting induced vibration. The blasting source factors include total charge, maximum charge per delay, delay time, direction of the burden, and charge structure. Among all blasting source factors, maximum charge per delay is the most easily controlled factor, which is directly related to the amplitude of blasting vibration [19]. So, control of the maximum charge per delay is studied to mitigate the possible damage to protection objects. The attenuation formula of surface vibration (see (4)) can be changed to the following formula:

The maximum allowable peak particle velocity of different objects is brought into (5), and the permitted maximum charges per delay at different distances are obtained. In Figure 11, to protect the permanent slope at a distance of 40 m, the limited maximum charge per delay is 459.3 kg; for a house built of soil or stone at a distance of 200 m, the maximum charge per delay should not exceed 158.7 kg.

(a)

(b)

Figure 11: Control of maximum charge per delay for different protection objects dependent on . (a) Total figure. (b) Partial figure.

6. Conclusions

Vibrations obtained from measurement devices at surface and in underground tunnel are studied. The comparative analysis of the peak particle velocities shows that, in the greatest majority of cases, the values obtained at surface are higher than the values obtained in underground tunnel at the same distance, which proves the existence of vibration damping from the surface to underground.

The transmission laws of vibrations obtained on the surface and underground were established depending on the type of rock mass, the explosive charge, and the distance. The different fitting degrees for surface and underground vibrations indicate the influence of topographic changes and rock properties on the propagation of blasting induced vibration.

The obtained vibrations are estimated and compared to the Chinese Safety Regulations for Blasting (GB6722-2014). It is shown that the underground vibrations under current blasting design are unlikely to be hazardous for underground mine tunnels.

Peak particle velocity for the bench blasting induced surface vibrations in the mine can be estimated depending on maximum charge per delay () and distance (). Control of the maximum charge per delay is used to mitigate the possible damage to protection objects. Permitted maximum charges per delay are obtained to protect objects at different distances according to the maximum allowable peak particle velocity.

Competing Interests

The authors declare that they have no competing interests.

Acknowledgments

This work was supported by the National 12th Five-Year Science and Technology Supporting Plan of China (2013BAB02B05) and supported by the Fundamental Research Funds for the Central Universities of Central South University (2016zzts094). The authors are grateful to the School of Resources and Safety Engineering of Center South University and Zijin Mining Group Co. Ltd. for their support. The authors are also very grateful to the staff of Zijinshan Gold-Copper Mine for their hospitality and invaluable support during the field investigation.

References

C.-P. Lu, L.-M. Dou, X.-R. Wu, and Y.-S. Xie, “Case study of blast-induced shock wave propagation in coal and rock,” International Journal of Rock Mechanics and Mining Sciences, vol. 47, no. 6, pp. 1046–1054, 2010.

M. Monjezi, M. Ghafurikalajahi, and A. Bahrami, “Prediction of blast-induced ground vibration using artificial neural networks,” Tunnelling and Underground Space Technology, vol. 26, no. 1, pp. 46–50, 2011.

Z. Wang, X. Liang, Y. Chen, F. Li, and G. Liu, “Study of safety evaluation method of blasting vibration based on input energy,” Chinese Journal of Rock Mechanics and Engineering, vol. 29, no. 12, pp. 2492–2499, 2010 (Chinese).

R. Nateghi, “Evaluation of blast induced ground vibration for minimizing negative effects on surrounding structures,” Soil Dynamics and Earthquake Engineering, vol. 43, pp. 133–138, 2012.

C. Kuzu and E. Guclu, “The problem of human response to blast induced vibrations in tunnel construction and mitigation of vibration effects using cautious blasting in half-face blasting rounds,” Tunnelling and Underground Space Technology, vol. 24, no. 1, pp. 53–61, 2009.

H. Ak, M. Iphar, M. Yavuz, and A. Konuk, “Evaluation of ground vibration effect of blasting operations in a magnesite mine,” Soil Dynamics and Earthquake Engineering, vol. 29, no. 4, pp. 669–676, 2009.

J. Zhou, X. Z. Shi, and X. B. Li, “Utilizing gradient boosted machine for the prediction of damage to residential structures owing to blasting vibrations of open pit mining,” Journal of Vibration and Control, vol. 22, no. 19, pp. 3986–3997, 2016.

X. Z. Shi and SH. R. Chen, “Delay time optimization in blasting operations for mitigating the vibration-effects on final pit walls' stability,” Soil Dynamics and Earthquake Engineering, vol. 31, no. 8, pp. 1154–1158, 2011.

G. M. Simangunsong and S. Wahyudi, “Effect of bedding plane on prediction blast-induced ground vibration in open pit coal mines,” International Journal of Rock Mechanics and Mining Sciences, vol. 79, pp. 1–8, 2015.

K. Görgülü, E. Arpaz, A. Demirci, A. Koçaslan, M. K. Dilmaç, and A. Gürkan Yüksek, “Investigation of blast-induced ground vibrations in the Tülü boron open pit mine,” Bulletin of Engineering Geology and the Environment, vol. 72, no. 3, pp. 555–564, 2013.

P. K. Singh, M. P. Roy, R. K. Paswan, R. K. Dubey, and C. Drebenstedt, “Blast vibration effects in an underground mine caused by open-pit mining,” International Journal of Rock Mechanics and Mining Sciences, vol. 80, pp. 79–88, 2015.

P. K. Singh, “Blast vibration damage to underground coal mines from adjacent open-pit blasting,” International Journal of Rock Mechanics and Mining Sciences, vol. 39, no. 8, pp. 959–973, 2002.

P. K. Singh and M. P. Roy, “Damage to surface structures due to blast vibration,” International Journal of Rock Mechanics and Mining Sciences, vol. 47, no. 6, pp. 949–961, 2010.

C. González-Nicieza, M. I. Álvarez-Fernandez, A. E. Alvarez-Vigil, D. Arias-Prieto, F. López-Gayarre, and F. L. Ramos-Lopez, “Influence of depth and geological structure on the transmission of blast vibrations,” Bulletin of Engineering Geology and the Environment, vol. 73, no. 4, pp. 1211–1223, 2014.

AQSIQ and SAC, “Safety regulations for blasting,” Chinese Standard GB6722-2014, China Water Power Press, Beijing, China, 2014 (Chinese).

M. Khandelwal and T. N. Singh, “Evaluation of blast-induced ground vibration predictors,” Soil Dynamics and Earthquake Engineering, vol. 27, no. 2, pp. 116–125, 2007.

W. U. Zhen-zhi, H. U. Guo-xiang, and Z.-W. Deng, “Discussion on the safety criteria for blasting vibration,” Safety and Environmental Engineering, vol. 10, no. 4, pp. 64–66, 2003 (Chinese).

C. Huang, J. Chen, X. Luo, and Z. Rong, “Grey relational analysis on influence factors of blasting vibration in open-pit slope,” Blasting, vol. 27, no. 2, pp. 96–98, 2010 (Chinese).

X. Shi, Study of Time and Frequency Analysis of Blasting Vibration Signal and the Prediction of Blasting Vibration Characteristic Parameters and Damage, Central South University, Changsha, China, 2007 (Chinese).