Shock and Vibration
Volume 2018 (2018), Article ID 1063645, 12 pages
https://doi.org/10.1155/2018/1063645

Research Article

Feature Extraction Strategy with Improved Permutation Entropy and Its Application in Fault Diagnosis of Bearings

Fan Jiang,1,2 Zhencai Zhu,¹ Wei Li,¹ Bo Wu,¹ Zhe Tong,¹ and Mingquan Qiu¹

¹Key Laboratory of Mechanical and Electrical Equipment of Jiangsu Province, School of Mechatronic Engineering, China University of Mining and Technology, Xuzhou 221116, China
²Postdoctoral Research Station of Computer Science and Technology, China University of Mining and Technology, Xuzhou 221116, China

Correspondence should be addressed to Fan Jiang; jiangfan25709@163.com

Received 26 May 2018; Accepted 25 July 2018; Published 4 September 2018

Academic Editor: Daniele Baraldi

Copyright © 2018 Fan Jiang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Feature extraction is one of the most difficult aspects of mechanical fault diagnosis, and it is directly related to the accuracy of bearing fault diagnosis. In this study, improved permutation entropy (IPE) is defined as the feature for bearing fault diagnosis. In this method, ensemble empirical mode decomposition (EEMD), a self-adaptive time-frequency analysis method, is used to process the vibration signals, and a set of intrinsic mode functions (IMFs) can thus be obtained. A feature extraction strategy based on statistical analysis is then presented for IPE, where the so-called optimal number of permutation entropy (PE) values used for an IPE is adaptively selected. The obtained IPE-based samples are then input to a support vector machine (SVM) model. Subsequently, a trained SVM can be constructed as the classifier for bearing fault diagnosis. Finally, experimental vibration signals are applied to validate the effectiveness of the proposed method, and the results show that the proposed method can effectively and accurately diagnose bearing faults, such as inner race faults, outer race faults, and ball faults.

1. Introduction

In the process of intelligent manufacturing, the reliability of the equipment determines the final product quality and operational safety. Meanwhile, rolling element bearings are commonly employed in rotary machinery, such as motors, mine hoists, and turbines, and their fault diagnoses will affect the normal operation of rotating machinery. Once a bearing fails, it will lead to performance degradation of the entire machine that could potentially lead to disastrous accidents [1, 2]. It is well known that bearing faults are one of the most common sources of machine failures, and recent studies show that more than 50% of machinery failures are related to various bearing defects [3]. Therefore, it is necessary to design an effective fault diagnosis method for rolling element bearings. A complete rolling element bearing usually comprises an inner race, outer race, a rolling element, and a retainer, and its major fault sources are defects on the inner race, outer race, or one of the rolling elements. Once any of the above components has a defect, various types of sensor data can be collected for fault diagnosis, such as temperature, acoustics, and vibration [4]. As vibration data are easily collected, and also contain abundant information regarding bearing faults, they are extensively used to diagnose mechanical faults [5–7].

Suitable feature extraction can improve the diagnosis results of bearing faults, and numerous scholars have proposed a large number of effective methods to extract features from vibration signals, such as Fourier-based methods, Wigner–Ville distribution (WVD), wavelet transform-based (WT) methods, empirical mode decomposition (EMD), and EEMD. In [8], the zoom fast Fourier transform (ZFFT) technique was employed for fault diagnosis of three-phase induction machines that elicited an improvement in frequency resolution. Antoni and Randall [9] used short-time Fourier transforms (STFT) to conduct fault diagnosis of rotating machines. In [10], a cyclic spectral density-based WVD was proposed to diagnose faults of rolling element bearings. Kankar et al. [11] presented a method for rolling element bearing fault diagnosis using continuous wavelet transforms (CWT) and SVM classifiers, achieved a higher accuracy of fault diagnosis by extracting useful features from the original data, and removed irrelevant features. Zarei and Poshtan [12] used wavelet packet transforms (WPT) to develop a fault diagnosis method, and accurately detected the faults of two holes on the outer race and one hole on other bearing parts by analyzing the stator currents. In [13], the redundant second-generation wavelet packet transform (RSGWPT) was introduced to improve kyrtograms for weak fault-feature extraction in rolling element bearings.

Unlike the above traditional signal processing methods, EMD, a self-adaptive time-frequency analysis algorithm, was presented in [14], and it has been extensively used in mechanical fault diagnosis. In [15], a new fault diagnosis method was proposed based on EMD and yielded estimates of the parameters of the alpha stable distribution (ASD) using vibration analysis for fault diagnosis of low-speed rolling bearings by filtering the trend and noise components of EMD. Jiang et al. [16] developed a new fault diagnosis method based on EMD and singular value decomposition (SVD) to diagnose faults in a roller-bearing system. Ricci and Pennacchi employed EMD and Hilbert–Huang spectrum analyses to diagnose faults in gears [17]. A fault detection method for roller-bearing systems was constructed using a wavelet denoising scheme and proper orthogonal values (POV) of an intrinsic mode function (IMF) covariance matrix [18]. Although the EMD is extensively used for mechanical fault diagnosis, traditional EMD could suffer from mode-mixing problems when is used to analyze complex signals. To overcome this issue, EEMD was proposed by Wu and Huang [19] and is frequently used for mechanical fault diagnoses. For example, an EEMD based on a multiscale, independent component analysis (ICA), multivariate-monitoring approach, was proposed for slewing bearing fault detection and diagnosis [20]. A similar fault diagnosis based on EEMD and principal component analysis (PCA)/kernel principal component analysis (KPCA) was presented in [21, 22]. A new improved version of a multifault diagnosis method for axle bearings was introduced by using EEMD and Hilbert marginal spectrum analysis [23]. In this method, an IMF confidence index was designed to realize the aim of adaptive self-selection of the useful IMFs. Apart from the above studies, some other EEMD-based fault diagnosis methods can be found in [24–26].

In addition to the above signal processing method, other indices should be employed to characterize the collected vibration signal to complete the bearing fault diagnosis. As we know, when a bearing is under a failure state, its vibration signal will change in complexity synchronously. As a result, the vibration signals of various types of bearing fault types will have different complexities. If the complexity of the vibration signal can be effectively represented, then the bearing fault can be accurately diagnosed. Permutation entropy (PE), which was proposed by Bandt and Pompe [27], can analyze the complexity of signals in time series by utilizing the comparison of neighboring values. Since PE is simple and invariant with respect to nonlinear monotonous transformations, it has been introduced to mechanical fault diagnosis, signal complexity analysis, and other application fields [28, 29]. In [30], the PE was investigated as a tool to predict the absence of seizures of genetic absence epilepsy rats from Strasbourg (GAERS) by using electroencephalographic (EEG) recordings. Meanwhile, PE has also been employed to improve fetal behavioral state classification by heart rate analysis from biomagnetic recordings in near-term fetuses [31]. In [32], the algorithm of PE was used to detect dynamic changes using a well-known nonlinear logistic map, and a nonlinear statistical measure method was proposed for status characterization of rotary machines. Yi et al. [33] presented a PE-based tensor singular spectrum decomposition algorithm and successfully applied it in bearing fault diagnosis. Shi et al. [34] designed an improved local mean decomposition (LMD) based on the self-similarity of vibration signals, and then combined PE and an optimized K-means clustering algorithm to diagnose bearing faults. Zhang et al. [28] integrated PE, EEMD, and optimized SVM, for bearing fault diagnosis. However, noise interference may also cause the complexity of vibration signal changes. That is to say, the PE values extracted at various time periods may exhibit random fluctuations that will ultimately reduce fault diagnostic accuracy [16].

In this study, a new diagnostic parameter, referred to as improved permutation entropy (IPE), is proposed for bearing fault diagnosis with support vector machines (SVM). First, a set of IMFs can be decomposed from vibration signals based on EEMD. Second, a feature extraction strategy based on statistical analysis is then presented for IPEs. Third, the obtained IPE-based samples are put into an SVM model, and a trained SVM can then be constructed as the classifier for bearing fault diagnosis. Finally, experiments are carried out on simulators to collect real vibration data to validate the effectiveness of the proposed method. The rest of this study is structured as follows: Section 2 introduces the basic theories that include the EEMD algorithm and the definition of traditional permutation entropy. The proposed method and experimental research are described in Sections 3 and 4, respectively. The conclusions are presented in Section 5.

2. Materials and Methods

2.1. EEMD

The traditional EMD method is associated with a mode-mixing problem when employed to analyze complex vibration signals. To overcome this, EEMD, an improved version of the EMD technique, was proposed by Wu and Huang in 2009 [19]. The fundamental steps of EEMD are presented below [19–26]:

(1)Determine the decomposition number , and add noise with an amplitude , thus yielding a new signal

where is white noise.(2)Decompose the noise-added vibration signal standard EMD and then obtain,

where and are the IMF and residual signals of the th EMD decomposition, respectively.(3)Repeat steps (1) to (3) times, and obtain the final IMFs in accordance to

(4)The original signal can then be decomposed as,

2.2. Permutation Entropy

Permutation entropy (PE), was proposed by Bandt and Pompe [27], and can analyze the complexity of signals in time series by utilizing the comparison of neighboring values. Its advantages are simplicity, robustness, and invariance, with respect to nonlinear monotonous transformations [28]. Therefore, it has been employed in numerous fields for evaluating the dynamic characteristics of various signals. The mathematical theory of PE is described briefly below [27–34].

For a time series , its -dimensional embedding vector with time delay s can be written as

All the elements in the embedding vector can then be ranked from the smaller to the larger as

where and the rank discussed above is the permutation of the embedding vector , marked as .If two or more elements of the embedding vector are equal, we order them by their corresponding index value . When there is an equality case, e.g., , if , then these two elements are ordered as .

Herein, we can obtain the relative frequency of the permutation using

Subsequently, the PE with dimension is defined as

The maximum value of is when all possible permutations have the same probability. Therefore, the normalized permutation entropy (NPE) can be obtained as

According to the definition of PE and its calculation process, the selection of the time lag and the embedding dimension influences the final result. Therefore, the method that is used to choose suitable parameters is one important step for PE. The choice of excessively large values will make the correlation of all points to be too small and cannot reflect the dynamic characteristics of the measured object. When the embedding dimension is set to take values that are too small, the reconstructed vector contains little information, and it may be difficult for the elicited PE to reveal the real features of a complex signal. Large values will not only be time-consuming, but also difficult to reflect the subtle changes in the time series. In [27], Bandt and Pompe suggested the selection of an embedded dimension , whereby the value of the time lag was equal to unity. In this study, we mainly planned to use statistical averaging analysis to reduce the impact of noise on traditional PE features when PE was applied as a distinguishing feature for mechanical fault diagnosis. Therefore, we set and .

3. Bearing Fault Diagnosis Based on IPE and SVM

In this study, a new diagnostic parameter, called improved permutation entropy (IPE), is proposed for bearing fault diagnosis. The proposed method includes three steps: vibration signals decomposed by EEMD, IPE feature extraction, and SVM-based fault diagnosis. Its implementation process is shown in Figure 1.

Figure 1: Flowchart of the proposed method.

3.1. PE Calculation Based on EEMD

In this study, EEMD is used to process the vibration signals to obtain IMFs for PE values and its two critical parameters need to be established: the ensemble number and the amplitude of the added noise. To make the EEMD more effective, Wu and Huang [19] suggested that the amplitude of the added noise is 0.2 times the standard deviation of the signal, and the value of the ensemble number is a few hundred units. Note that after the added noise amplitude is determined, the larger the ensemble number is, the smaller the decomposition error will be [19]. However, increasing the ensemble number above 100 will marginally improve the error, with a large increase in the required computational time [35]. Therefore, in our study, the ensemble number and the amplitude of the added white noise are set to 100 and to 0.2 times the standard deviation of the signal, respectively.

In this study, only the vibration signals of one sensor are considered. When one data segment of the vibration signal is processed by EEMD, a set of IMF decomposition components can be obtained, and each one can be used to calculate a PE value. Therefore, if there are type I data segments, we can obtain

where , which is defined as the PE set of the data segment, is the PE value calculated from the IMF component of the data segment.

3.2. Definition and Extraction of IPE

Different types of bearing faults have vibration signals of differing complexity. The traditional PE, proposed by Bandt and Pompe [27], can quickly show the complexities of vibration signals in the time domain by utilizing the comparison of neighboring values. However, noise interference causes the features extracted from the vibration signals over different time periods to display random fluctuations in some degree, which directly affects the accuracy of the bearing fault diagnosis. In other words, directly employing PE as a feature for fault diagnosis with an SVM-based classifier may result in a lower diagnostic accuracy. Therefore, it is needed to develop a method to extract suitable features with a smaller wave range in the feature level.

The law of large numbers is a particularly important theory in mathematical statistics, and it shows that the mean of a random event is equal to the average value in experiments with a large number of measurements [36]. In probability statistics, the central limit theorem (CLT) shows that for a large number of repeated measurements of a physical quantity, their arithmetic average value is distributed in accordance with the standard normal distribution [37]. Therefore, in theory, using the mean forms of original features to construct a classifier may reduce the fluctuating range of the values of these features.

Although the averaged PE values can be used to reduce the fluctuating range of features to improve fault diagnosis effects, the optimal number of original PE values to obtain an accurate average PE remains to be solved. In this section, a solution is designed for this issue and its main steps are shown below:

(1)Set and the termination condition, such as the total number of iterations , or the threshold value of diagnostic accuracy (2)Calculate averaged PE values to construct the feature set, whereby each averaged PE value is the mean of original PE values(3)Divide these obtained averaged PE values into two parts to construct a train sample set and a pretest sample set(4)Put the train sample set into an SVM model and obtain a trained classifier. Subsequently, put the pretest samples into the obtained classifier and record its diagnostic accuracy value (5)Determine whether the stop condition is satisfied: if , the program terminates, and the averaged PE with the largest diagnostic accuracy is defined as the IPE; if the values of , , and , are equal to/larger than the preset threshold , the program also automatically terminates, and . It is then set to the optimal number of original PE values for the averaged PE, and the calculated result is the IPE. Otherwise, , and the above steps are repeated until the termination condition is satisfied

The above two stop conditions may also be set at the same time. If either is met, then the program terminates. Meanwhile, the search for the optimal value can be carried out offline so that the termination conditions can be set with large values. As long as the optimal m is found, the IPE value of the j-th IMF of IVMD can then be calculated using , where the PE values are randomly selected from the original feature set obtained using Equation (10).

3.3. SVM-Based Fault Diagnosis

After extracting the IPE values, the next step is to construct a classifier. In this section, an SVM-based fault diagnosis method is introduced. First, considering the common faults in bearings, four bearing health conditions are considered, including the normal (S1), inner race fault (S2), ball fault (S3), and outer race fault (S4), and their goal outputs are set as “1,” “2,” “3,” and “4.” Other parameters of the SVM are set as the default values in [38] and part of them are (a) the kernel function is polynomial, (b) the punishment factor C is equal to 10, (c) the degree in kernel function is set to three, and (d) the type of SVM is C–SVC. The obtained IPEs are then input to an SVM model, and a trained SVM model can be constructed as the classifier for bearing fault diagnosis. Finally, experiments are carried out on simulators to collect real vibration signals to validate the effectiveness of the proposed method.

4. Experimental Evaluation

4.1. Experiment 1: Fault Diagnosis with the Online Bearing Datasets

4.1.1. Experiment Setup

To verify the effectiveness of the proposed method based on EEMD, IPE, and SVM, an experimental research is carried out using the vibration signals collected by the bearing data center of Case Western Reserve University [39]. The experimental bench is shown in Figure 2. As shown in this figure, this bench is consisted of a three-phase induction motor, a torque transducer, an encoder, shaft, a dynamometer, and rolling element bearings. The motor is used to drive the shaft on which a torque transducer and an encoder are installed. For conducted tests, single-point damages of the drive-end bearing (SKF deep-groove ball bearings: 6205-2RS JEM) were seeded on the rolling elements, inner race, and outer race, using an electro-discharge machining method. Therefore, the considered operating states of the bearing are normal operation and three types of faults (0.014 inches), including the inner race fault, ball fault, and the outer race fault. The sampling frequency used was 12 kHz, and the corresponding vibration signals were collected by accelerometers and were attached to the housing with magnetic bases using a 16-channel data recorder when the bearings were rotated at speeds of 1797 rpm or less. Each feature was calculated from 2000 sampling points. Other information regarding the experimental instruments can be found in [39]. Figure 3 shows the waves of the vibration signals based on the consideration of the four bearing conditions in the time and frequency domains.

Figure 2: Experimental bench. 1: fan-end bearing; 2: drive-end bearing; 3: motor; 4: torque transducer and encoder; 5: shaft; and 6: dynamometer.

(a)

(b)

Figure 3: Waves of vibration signals in the (a) time and (b) frequency domains.

Figure 4 shows the IMFs of these original vibration signals plotted in Figure 3. In this figure, (a), (b), (c), and (d), are plots of the IMFs of the bearing under normal, inner race, ball, and outer race faults, respectively. From these figures, it is difficult to diagnose the bearing conditions by directly using these plots without professional knowledge, even if some differences exist in the amplitudes and distributions of the IMFs at various health conditions. Conversely, there is noise in the collected vibration signals, and the IMF signals of the same bearing statue may also be different. Therefore, these so-called differences may also be changed, or appear at different times. At the same time, each IMF contains many data points, and use of all the decomposed components to conduct fault diagnosis will increase the computational load of the model. For different bearing faults, the detail compositions of their vibration signals may also have some differences. That is to say, these decomposed components of EEMD have characteristics that can reflect the fault types of the rolling element bearing.

(a)

(b)

(c)

(d)

Figure 4: Decomposed IMFs of the four bearing operating conditions: (a) normal, (b) inner race fault, (c) ball fault, and (d) outer race fault.

Figure 5 shows the comparative results of various features. In Figure 5(a), the original features are shown, while each of the features plotted in (b)–(d) correspond to the mean of three, five, and ten original PEs, respectively. To ensure the randomness of the original features, the data segments for the original features are randomly extracted from the vibration signals. In Figure 5(a), the amplitude values of these original features range from 0.985 to 0.995, and the major features appear to be around 0.989, i.e., these original features fluctuate within a certain range. Similar to the original features, the averaged features in Figure 5(b) fluctuate in the range of 0.988 to 0.991, and features also appear mainly around 0.989. Analyzing Figures 5(c) and 5(d) shows that these averaged features also appear around 0.989. Based on the comparisons and analyses of these feature values and their standard deviations plotted in Figure 5, it can be observed that the fluctuation range of Figure 5(d) is the smallest, and the ranking of the fluctuation ranges in accordance to the order of (d)<(c)<(b)<(a). Since each averaged PE value is the arithmetic mean value of a set number of original PEs, it will be closer to the real expectation of these features compared with that for most of the original features. Therefore, as the number of the original PEs used for an averaged PE increases, the fluctuation range of the averaged PEs will become smaller.

(a)

(b)

(c)

(d)

Figure 5: Comparative results of various features: (a) original features, (b)–(d) average features which are the means of three, five, and ten original features, respectively. The red solid lines are the mean values of these features plotted in the corresponding plots; std is the abbreviation of standard deviation.

As it is known, these fluctuations of the same feature values will affect the accuracy of the bearing fault diagnosis, and it is difficult to use these features with large fluctuations to construct a stability classifier with increased accuracy of fault diagnosis. To overcome this issue, a feature extraction strategy based on statistical analysis is presented in subsection 3.2. That is, the averaged PEs will have less noise interference and can improve fault diagnosis. To ensure the randomness of original PE features, the corresponding data segments are extracted randomly from these vibration signals collected by accelerometers. Correspondingly, a feature dataset can be obtained for IPE.

4.1.2. Results and Discussion

In the optimal number of the selection stage of the original PEs, various IPE feature sets calculated by different numbers of original PE values are used to obtain training and pretest sample sets. In this study, the number of samples in the training sample set and pretest sample set were 20 and 60, respectively. For the sake of the descriptions outlined herein, the sample set is defined as the averaged PE value estimated as the mean of original PE values and the diagnostic accuracy of the pretest sample set is marked as . In addition, the termination condition of iterations , and the threshold value of diagnostic accuracy , were preset to 25 and 100%, respectively. According to the principle defined in subsection 3.2, the termination condition is defined as either the iteration number when the latter is larger than 25, or when the diagnostic accuracy values of the , (i − 1)th and (i − 2)th samples are all equal to 100%.

Figure 6 shows the diagnostic accuracy values of the pretest sample sets in the selection stage of the optimal number. In this figure, the x-axis is the serial number of the pretest sample set, which indicates the number of used original PE values for a specific IPE value. For example, “5” implies that each averaged PE value in the pretest sample is calculated using five original PE values. That is to say, when the serial number is “1,” the feature is the original PE value. As observed in this figure, the diagnostic accuracy of the original PE values is clearly less than those of the averaged PE values. This shows that the proposed averaged PE values can improve the bearing fault diagnosis results without optimizing the classifier. Further analyses of these diagnostic results of the averaged PE values reveal that the diagnostic precision increases gradually as the serial number increases and that the diagnostic accuracy values, shown in green in Figure 6, become 100% when the serial numbers are equal to four and five. However, the diagnostic precision then decreases when the serial number becomes equal to six. In simpler term, four, five, and six are not the optimal numbers of the original PE values for IPE. Nevertheless, it can be found that the diagnostic accuracy values are 100% when the serial numbers become equal to seven, eight, and nine. According to the algorithm defined in subsection 3.2, the serial number seven is the optimal number for the original PE values for the averaged PE. In other words, the IPE in experiment 1 should be calculated using seven original PE values.

Figure 6: Diagnosis accuracy values of pretest sample sets in experiment 1.

Based on the simulator shown in Figure 2, 100 IPE-based samples are extracted for each bearing condition, of which 20 samples are used to train the SVM model, and the remaining 80 ones are used to test the trained SVM model. In accordance with the principle of IPE, there are 700 original PE values obtained for each bearing condition. To verify the effectiveness of the proposed method for feature extraction and fault diagnosis, two comparative experiments were carried out: “PE-based sample set (1) and SVM” and “PE-based sample set (2) and SVM.” The former experiment used original PE-based samples and the same number of training and testing samples as the proposed method. The latter also employed PE-based samples, but all the original PE values used for the IPE values were applied to construct samples. Therefore, each bearing condition had 700 samples. As the same allocation proportion of the proposed method and each IPE value needed seven PE values, there were 140 (20 × 7) and 560 (80 × 70) PE-based samples that were used to construct the training sample set and the testing sample set in the second comparative experiment. The fault diagnosis results of the proposed and comparative methods are shown in Figure 7.

(a)

(b)

(c)

Figure 7: Fault diagnosis results of the proposed method and comparative methods: (a) PE-based sample set (1) with the use of an SVM. (b) PE-based sample set (2) with the use of an SVM, and (c) the proposed method.

As it can be observed in Figure 7(a), in the case of the test samples with inner race and outer race faults, the test outputs do not all match the corresponding goal outputs, i.e., the diagnostic accuracies of the comparison method “PE-based sample set (1) and SVM” are not 100%. The same issue also occurs in Figure 7(b), and the test outputs of these test samples with sample number 561 to 1120 are not equal to the goal outputs. Additionally, some test samples with outer race faults also elicit erroneous test outputs. Therefore, these two comparative methods all contain some misdiagnosed samples. When analyzing Figure 7(c), it can be observed that the outputs are all consistent with the goal outputs, that is, the diagnostic accuracy of the proposed method is 100%.

Table 1 shows the fault diagnosis results of the proposed and comparison methods, where “4” indicates the types of the bearing conditions considered in this study. From the test results in Table 1, the proposed method has the highest diagnostic accuracy, and a shorter test time. This proves that the proposed IPE can be used for bearing fault diagnosis with increased accuracy.

Table 1: Diagnosis results of comparison experiments.

Items
Training samples
Test samples
Time (train and test) (s)
Total (%)

PE-based sample set (1) and SVM
20 × 4
80 × 4
0.0018
92.1875 (295/320)

PE-based sample set (2) and SVM
20 × 7 × 4
80 × 7 × 4
0.0075
98.9286 (2216/2240)

Proposed method
20 × 4
80 × 4
7.00e − 04
100 (320/320)

4.2. Experiment 2: Fault Diagnosis with the Bearing Datasets of Mine Hoist Simulator

Mine hoist is an especially important equipment in vertical shaft and undertakes the transport task of personnel, materials, equipment, and coal, between underground and ground. Given the execution of frequent start-stop operations, high speeds, and heavy loads, the mine hoist will cause a fatal crash once the mine hoist experiences a bearing fault, such as an inner race, a ball, or outer race faults. Correspondingly, this will affect the safety of the mine and the efficiency of the production. Therefore, it is significant to diagnose the bearing faults that occur in the working mine hoist.

The above experiment is conducted in an indoor laboratory, and its noise may not be as loud as that of an actual operating equipment. To further illustrate the effectiveness of the proposed method, an outdoor experiment was conducted, and the test bench was a simulated mine hoist, as shown in Figure 8. This bench mainly consists of derrick and driving systems. The derrick system is powered by a driving system. Thus, the driving system is important for a mine hoist. The driving system induces a motor, a gear box, two couplings, and two bearings (#1 and #2). As shown in Figure 9, in this experiment, the considered conditions of test bearing #2 are: normal (S1), inner race fault (S2), ball fault (S3), and outer race fault (S4). The sampling frequency used was 2 kHz, and the corresponding vibration signals were collected by an accelerometer, attached to the bearing housing with magnetic base, when the shaft was rotating at a speed of 180 rpm.

(a)

(b)

Figure 8: Simulation platform of mine hoist.

(a)

(b)

(c)

(d)

Figure 9: Photographs of four bearing conditions, where (a) to (d) denote the conditions (S1) to (S4), respectively.

Figure 10 shows the selection results of the optimal number of PEs for the IPE in experiment 2. It can be observed that the diagnostic accuracy values are 100% when the serial numbers become equal to 12, 13, and 14, as shown in these red dots plotted in Figure 10. According to the algorithm defined in Subsection 3.2, the optimal number of original PE values for IPE equals 12. In other words, the so-called IPE value of this experiment is calculated using 12 original PE values. From the comparison and analyses of Figures 6 and 10, it can be found that the IPE features of Figure 10 require an additional number of original PE values to realize the same diagnostic accuracy compared with that required by Figure 6. Therefore, more intense noise may need more original PE values to calculate one IPE feature.

Figure 10: Diagnostic accuracy values of various pretest sample sets in experiment 2.

Based on this simulation platform of mine hoist shown in Figure 8, a total of 60 IPE-based samples are extracted for each bearing condition, of which 20 are used to train the SVM model. An SVM-based classifier is then constructed, and the rest of the samples are used to test the trained SVM model. The two comparative experiments shown in Figure 7 are also considered in this experiment. Since the optimal number of original PE values for IPE equals 12, each IPE value requires 12 PE values. Therefore, each IPE-based sample can produce 12 PE-based samples. The fault diagnosis results of the proposed method and comparison methods are presented in Table 2. In conjunction with the diagnostic results shown in Table 2, the proposed method has the highest diagnostic accuracy, and is associated with a shorter test time. This proves that the proposed method is effective in diagnosing bearing faults.

Table 2: Diagnosis results of comparison experiments.

Items
Training samples
Test samples
Time (train and test) (s)
Total (%)

PE-based sample set (1) and SVM
20 × 4
40 × 4
0.0022
52.5 (84/160)

PE-based sample set (2) and SVM
20 × 12 × 4
40 × 12 × 4
0.0455
67.5521 (1297/1920)

Proposed method
20 × 4
40 × 4
8.55e-04
96.875 (155/160)

5. Conclusions

Vibration signal analysis is an effective way of diagnosing rolling element bearing faults. However, noise interference causes the same features that are extracted from these collected vibration signals over different time periods to vary, which directly affects the accuracy of bearing fault diagnosis. To solve this problem, a new diagnostic parameter was designed for bearing fault diagnosis using SVM, referred to as the IPE. First, a set of IMFs was decomposed from vibration signals using EEMD. Second, a feature extraction strategy based on statistical analysis was designed for IPEs. Third, the obtained IPE-based samples were input to an SVM model, and a trained SVM was then constructed as the classifier for bearing fault diagnosis. Finally, an experiment with real vibration signals was executed to validate the effectiveness of the proposed method. The experimental results showed that the proposed method can effectively and accurately diagnose bearing faults. However, the opposing fault diagnoses methods with traditional PE features and SVM not only have higher misdiagnosis rates but also consume more training and testing time than the proposed method. Therefore, this study provided a new diagnostic parameter for bearing fault diagnosis.

Data Availability

The vibration data supporting the analysis of experiment 1 was supplied by Case Western Reserve University, and its free download website has been cited. The other datasets used in experiment 2 are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work is supported by the Fundamental Research Funds for the Central Universities (2017QNA17), and the project was funded by the Priority Academic Program Development of the Jiangsu Higher Education Institutions (PAPD).

References

J. Rafiee, M. A. Rafiee, and P. W. Tse, “Application of mother wavelet functions for automatic gear and bearing fault diagnosis,” Expert Systems with Applications, vol. 37, no. 6, pp. 4568–4579, 2010.

R. B. Randall and J. Antoni, “Rolling element bearing diagnostics-a tutorial,” Mechanical Systems and Signal Processing, vol. 25, no. 2, pp. 485–520, 2011.

R. Randall, Vibration-Based Condition Monitoring, Wiley, New York, NY, USA, 2011.

T. P. Banerjee and S. Das, “Multi-sensor data fusion using support vector machine for motor fault detection,” Information Sciences, vol. 217, pp. 96–107, 2012.

S. Fei, “Fault diagnosis of bearing based on relevance vector machine classifier with improved binary bat algorithm for feature selection and parameter optimization,” Advances in Mechanical Engineering, vol. 9, no. 1, 2017.

Y. Imaouchen, M. Kedadouche, R. Alkama, and M. Thomas, “A frequency-weighted energy operator and complementary ensemble empirical mode decomposition for bearing fault detection,” Mechanical Systems and Signal Processing, vol. 82, pp. 103–116, 2017.

X. Zhang, N. Hu, L. Hu, L. Chen, and Z. Cheng, “A bearing fault diagnosis method based on the low-dimensional compressed vibration signal,” Advances in Mechanical Engineering, vol. 7, no. 7, 2015.

A. Yazidi, H. Henao, G. Capolino, M. Artioli, and F. Filippetti, “Improvement of frequency resolution for three-phase induction machine fault diagnosis,” IEEE IAS Annual Meeting, vol. 1, no. 145, pp. 20–25, 2005.

J. Antoni and R. B. Randall, “The spectral kurtosis: application to the vibratory surveillance and diagnostics of rotating machines,” Mechanical Systems and Signal Processing, vol. 20, no. 2, pp. 308–331, 2006.

Y. Zhou, J. Chen, G. M. Dong, W. B. Xiao, and Z. Y. Wang, “Wigner-Ville distribution based on cyclic spectral density and the application in rolling element bearings diagnosis,” Proceedings of the Institution of Mechanical Engineers, Part C: Journal of Mechanical Engineering Science, vol. 225, no. 12, pp. 2831–2847, 2011.

P. K. Kankar, S. C. Sharma, and S. P. Harsha, “Fault diagnosis of ball bearings using continuous wavelet transform,” Applied Soft Computing Journal, vol. 11, no. 2, pp. 2300–2312, 2011.

J. Zarei and J. Poshtan, “Bearing fault detection using wavelet packet transform of induction motor stator current,” Tribology International, vol. 40, no. 5, pp. 763–769, 2007.

X. Chen, F. Feng, and B. Zhang, “Weak fault feature extraction of rolling bearings based on an improved kurtogram,” Sensors, vol. 16, no. 9, pp. 1–20, 2016.

N. Huang, Z. Shen, S. Long et al., “The empirical mode decomposition and the Hilbert spectrum for nonlinear and non-stationary time series analysis,” Proceedings of the Royal Society of London. Series A: Mathematical, Physical and Engineering Sciences, vol. 454, no. 1971, pp. 903–995, 1998.

Q. Xiong, Y. Xu, Y. Peng, W. Zhang, Y. Li, and L. Tang, “Low-speed rolling bearing fault diagnosis based on EMD denoising and parameter estimate with alpha stable distribution,” Journal of Mechanical Science and Technology, vol. 31, no. 4, pp. 1587–1601, 2017.

F. Jiang, Z. C. Zhu, W. Li, G. B. Zhou, and G. A. Chen, “Fault diagnosis of rotating machinery based on noise reduction using empirical mode decomposition and singular value decomposition,” Journal of Vibroengineering, vol. 17, no. 1, pp. 164–174, 2015.

R. Ricci and P. Pennacchi, “Diagnostics of gear faults based on EMD and automatic selection of intrinsic mode functions,” Mechanical Systems and Signal Processing, vol. 25, no. 3, pp. 821–838, 2011.

J. H. Ahn, D. H. Kwak, and B. H. Koh, “Fault detection of a roller-bearing system through the EMD of a wavelet denoised signal,” Sensors, vol. 14, no. 8, pp. 15022–15038, 2014.

Z. Wu and N. E. Huang, “Ensemble empirical mode decomposition: a noise-assisted data analysis method,” Advances in Adaptive Data Analysis, vol. 1, no. 1, pp. 1–41, 2009.

M. Žvokelj, S. Zupan, and I. Prebil, “EEMD-based multiscale ICA method for slewing bearing fault detection and diagnosis,” Journal of Sound and Vibration, vol. 370, pp. 394–423, 2016.

M. Žvokelj, S. Zupan, and I. Prebil, “Non-linear multivariate and multiscale monitoring and signal denoising strategy using kernel principal component analysis combined with ensemble empirical mode decomposition method,” Mechanical Systems and Signal Processing, vol. 25, no. 7, pp. 2631–2653, 2011.

M. Žvokelj, S. Zupan, and I. Prebil, “Multivariate and multiscale monitoring of large-size low-speed bearings using ensemble empirical mode decomposition method combined with principal component analysis,” Mechanical Systems and Signal Processing, vol. 24, no. 4, pp. 1049–1067, 2010.

C. Yi, J. Lin, W. Zhang, and J. Ding, “Faults diagnostics of railway axle bearings based on IMF’s confidence index algorithm for ensemble EMD,” Sensors, vol. 15, no. 5, pp. 10991–11011, 2015.

Y. Amirat, V. Choqueuse, and M. Benbouzid, “EEMD-based wind turbine bearing failure detection using the generator stator current homopolar component,” Mechanical Systems and Signal Processing, vol. 41, no. 1-2, pp. 667–678, 2013.

H. Chen, P. Chen, W. Chen, C. Wu, J. Li, and J. Wu, “Wind turbine gearbox fault diagnosis based on improved EEMD and Hilbert square demodulation,” Applied Sciences, vol. 7, no. 2, p. 128, 2017.

H. Li, M. Li, C. Li, F. Li, and G. Meng, “Multi-faults decoupling on turbo-expander using differential-based ensemble empirical mode decomposition,” Mechanical Systems and Signal Processing, vol. 93, pp. 267–280, 2017.

C. Bandt and B. Pompe, “Permutation entropy: a natural complexity measure for time series,” Physical Review Letters, vol. 88, no. 17, 2002.

X. Zhang, Y. Liang, J. Zhou, and Y. Zang, “A novel bearing fault diagnosis model integrated permutation entropy, ensemble empirical mode decomposition and optimized SVM,” Measurement, vol. 69, pp. 164–179, 2015.

M. Riedl, A. Müller, and N. Wessel, “Practical considerations of permutation entropy: a tutorial review,” European Physical Journal: Special Topics, vol. 222, no. 2, pp. 249–262, 2013.

X. Li, G. Ouyang, and D. A. Richards, “Predictability analysis of absence seizures with permutation entropy,” Epilepsy Research, vol. 77, no. 1, pp. 70–74, 2007.

B. Frank, B. Pompe, U. Schneider, and D. Hoyer, “Permutation entropy improves fetal behavioural state classification based on heart rate analysis from biomagnetic recordings in near term fetuses,” Medical and Biological Engineering and Computing, vol. 44, no. 3, pp. 179–187, 2006.

R. Yan, Y. Liu, and R. X. Gao, “Permutation entropy: a nonlinear statistical measure for status characterization of rotary machines,” Mechanical Systems and Signal Processing, vol. 29, pp. 474–484, 2012.

C. Yi, Y. Lv, M. Ge, H. Xiao, and X. Yu, “Tensor singular spectrum decomposition algorithm based on permutation entropy for rolling bearing fault diagnosis,” Entropy, vol. 19, no. 4, p. 139, 2017.

Z. Shi, W. Song, and S. Taheri, “Improved LMD, permutation entropy and optimized K-means to fault diagnosis for roller bearings,” Entropy, vol. 18, no. 3, p. 70, 2016.

W. Guo and P. W. Tse, “A novel signal compression method based on optimal ensemble empirical mode decomposition for bearing vibration signals,” Journal of Sound and Vibration, vol. 332, no. 2, pp. 423–441, 2013.

A. R. John, Mathematical Statistics and Data Analysis, Duxbury Press, New York, NY, USA, 2nd edition, 1995.

T. P. Ryan, Modern Engineering Statistics, John Wiley & Sons Inc, Hoboken, NJ, USA, 2007.

C. C. Chang and C. J. Lin, “LIBSVM—a library for support vector machines,” June 2017, https://www.csie.ntu.edu.tw/∼cjlin/libsvm/.

K. A. Loparo, “Bearings vibration data set,” Case Western Reserve University, March 2018, http://csegroups.case.edu/bearingdatacenter/home.