Shock and Vibration
Volume 2018 (2018), Article ID 5896270, 1 page
https://doi.org/10.1155/2018/5896270

Corrigendum

Corrigendum to “Investigation of Axial Strengthened Reinforced Concrete Columns under Lateral Blast Loading”

Mohammad Esmaeilnia Omran and Somayeh Mollaei

Department of Civil Engineering, University of Kurdistan, Sanandaj, Iran

Correspondence should be addressed to Mohammad Esmaeilnia Omran; m.esmaeilnia@uok.ac.ir

Received 31 December 2017; Accepted 3 January 2018; Published 18 January 2018

Copyright © 2018 Mohammad Esmaeilnia Omran and Somayeh Mollaei. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Investigation of Axial Strengthened Reinforced Concrete Columns under Lateral Blast Loading” [1], Dr. Somayeh Mollaei was incorrectly listed as the corresponding author. The corresponding author is Dr. Mohammad Esmaeilnia Omran.

References

M. E. Omran and S. Mollaei, “Investigation of axial strengthened reinforced concrete columns under lateral blast loading,” Shock and Vibration, vol. 2017, Article ID 3252543, 18 pages, 2017.