ThrombosisVolume 2012 (2012), Article ID 306263, 4 pagesdoi:10.1155/2012/306263

Clinical Study

Evaluation of RANKL/OPG Serum Concentration Ratio as a New Biomarker for Coronary Artery Calcification: A Pilot Study

Amir Hooshang Mohammadpour,1,2 Jamal Shamsara,³ Saeed Nazemi,⁴ Samira Ghadirzadeh,¹ Shabnam Shahsavand,¹ and Mohammad Ramezani2,5

¹Department of Pharmacodynamy and Toxicology, School of Pharmacy, Mashhad University of Medical Sciences, Mashhad 9188865531, Iran²Pharmaceutical Research Center, Mashhad University of Medical Sciences, P.O. Box 91775-1365, Mashhad 9188865531, Iran³Department of Biotechnology, School of Pharmacy, Mashhad University of Medical Sciences, Mashhad 9188865531, Iran⁴Department of Cardiovascular Diseases, Razavi Hospital, 9148857114, Iran⁵Nanotechnology Research Center, Mashhad University of Medical Sciences, Mashhad 9188865531, Iran

Received 12 November 2011; Revised 20 January 2012; Accepted 24 January 2012

Academic Editor: Giovanni de Gaetano

Copyright © 2012 Amir Hooshang Mohammadpour et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. There is a strong need for biomarkers to identify patients at risk for future cardiovascular events related with progressive atherosclerotic disease. Osteoprotegerin (OPG) protects the skeleton from excessive bone resorption by binding to receptor activator of nuclear factor-B ligand (RANKL) and preventing it from binding to its receptor, receptor activator of nuclear factor-B. However, conflicting results have been obtained about association of serum level of OPG or RANKL with coronary artery disease (CAD). Based on their role in inflammation and matrix degradation and the fact that atherosclerotic plaque formation is an inflammatory process, we hypothesized that RANKL : OPG ratio could be a better biomarker for CAD. Methods. In this cross-sectional study, the correlation between RANKL : OPG ratio serum concentration and coronary artery calcification (CAC) in 50 patients with ischemic coronary disease has been investigated. We used ELISA method for measuring RANKL and OPG serum concentrations. Results. There was a significant correlation between RANKL : OPG serum concentration ratio and CAC in our study population (). Conclusion. Our results suggested that RANKL : OPG ratio concentration has a potential of being used as a marker for coronary artery disease.

1. Introduction

There is a considerable demand for diagnosis and treatment of the pathologic conditions that underlie sudden cardiac events such as acute coronary syndromes and sudden cardiac death. Some people experience a cardiovascular event, while, by Framingham scores, they were not considered to be at high-risk group [1, 2]. Atherosclerotic calcification is a failure that can make the break in the vessels and cause the plaque rupture [3, 4]. Plaque rupture is the most common type of plaque complications. Several retrospective autopsy series and a few cross-sectional clinical studies have suggested that thrombotic coronary death and acute coronary syndromes are caused by the plaque features [5, 6]. This phenomenon is a regular and organized process that is so similar to osteoproduction [7]. Some of the smooth muscle cells along the migration from layer to vascular media layer go osteogenic [8]. These cells continuously express osteoproteins such as RANKL and OPG [4] and start to store the collagenic extracellular matrix in mineralized collections that finally cause vascular calcification [9]. RANKL/RANK/OPG system has an important role in several aspects of the processes leading to calcification [3]. RANKL binds to its membrane receptor RANK and produces several intracellular signals that regulate the fusion, development, function, and survival of the osteoclasts [2, 3]. It also stimulates the gradual development of osteogenic calcification in the vascular smooth muscle cells [10]. OPG as a soluble scavenger presents the RANKL/RANK binding so it inhibits the RANKL function [3]. It has inhibitory effects on osteoclastogenes and osteogenic resorption [2]. Some reports indicated that, in cardiovascular system, serum concentration of OPG increases in clinical cases susceptible to atherosclerosis and unstable vascular calcification [3] OPG secretion probably is an imperfect compensatory mechanism in response to increase of RANKL secretion that could prevent calcification and atherosclerosis [11]. So increased RANKL concentration and decreased OPG level both can lead to vascular calcification. According to this, we evaluated the RANKL/OPG ratio as a diagnostic biomarker to determine the extent of vascular calcification and subsequent coronary disorders such as coronary artery calcification (CAC).

2. Patients and Methods

2.1. Patients

Fifty patients with ischemic coronary disease (37 men and 13 women, age 18–60) were enrolled in this study between November 2008 and September 2009. Patients were from Razavi Hospital in Mashhad. Patients with calcium and phosphorous metabolic failure, parathyroid disease, renal dysfunction, history of osteodisorder, zero calcium score, and vit D consumption were excluded from the study. A questionnaire containing demographic data, laboratory data, drug history, medical history, familial history of CV risk factors was completed for all patients. All patients signed the consent form prior to entry in the study.

2.2. Blood Sampling and Biochemical Assay

Whole blood was collected from patients and centrifuged at 2500 rpm for 10 min. The plasma fraction was isolated and stored at −70°C until required for analysis. Routine biochemical measurements such as plasma glucose, total cholesterol (TC), triglycerides, low density lipoprotein cholesterol (LDL), high-density lipoprotein cholesterol (HDL), serum calcium, phosphorus were carried out by routine laboratory methods.

2.3. Determination of OPG and RANKL Serum Concentration

Serum level of soluble OPG and RANKL was measured with an enzyme-linked immunosorbant assay (ELISA) kit (Apotech, Switzerland); each assay was calibrated using RANKL and OPG standard curve following the manufacturer’s instructions.

2.4. Statistical Analysis

Statistical analysis was carried out by SPSS 11.5. Correlation between serum concentration of RANKL, OPG, and RANKL/OPG ratio with CAC (coronary artery calcification) was analyzed using Pearson correlation. To compare serum concentration of RANKL, OPG, and RANKL/OPG ratio between different groups, one-way ANOVA test was used. Results were considered significant at . All measured values are presented as the mean ± SD.

3. Results

3.1. Characteristics of the Study Population

Demographic data, biochemical data (laboratory tests) including OPG and RANKL levels, and traditional cardiovascular risk factors are summarized in Table 1.

Table 1: Demographic data, laboratory tests, and traditional cardiovascular risk factors of patients.

Age (year)

Female/male ratio
0.35

Mean BMI

Laboratory test

Calcium (ng/dL)

Phosphorous (ng/dL)

HDL cholesterol (mg/dL)

LDL cholesterol (mg/dL)

Total cholesterol (mg/dL)

FBS (mg/dL)
103.28 ± 30

Mean concentration of RANKL (pg/mL) (CV)
(0.16)

Mean concentration of OPG (pg/mL) (CV)
(0.13)

RANKL/OPG ratio (CV)
(0.12)

Total calcification of coronary vessels (agatson)

Calcification in coronary LAD (agatson)

Calcification in coronary RCA (agatson)

Calcification in coronary CX (agatson)

Calcification in coronary LM (agatson)

Traditional cardiovascular risk factors

Hypertension (%)
54.84

Dyslipidemia (%)
73

Positive family history (%)
46

Diabetes (%)
17

Current smoking (%)
13

3.2. Correlation between RANKL : OPG Ratio and Total Coronary Artery Calcification

There was a significant positive correlation between RANKL : OPG ratio and total coronary artery calcification (Table 2 and Figure 1) and negative correlation between OPG and total coronary artery calcification (Table 2). There was no significant correlation between RANKL serum concentration coronary artery calcification (Table 2).

Table 2: Correlation between RANKL : OPG ratio, serum concentration of OPG, and RANKL with LAD, RCA, LMCA, and Cx coronary artery calcification.

Serum RANKL concentration
Serum OPG concentration
RANKL/OPG

value¹
CC²
value
CC
value
CC

Total CAC³
0.2
−0.214
0.03
−0.468
0.01
0.519

CAC of LAD
0.39
−1.44
0.013
−0.4
0.001
0.545

CAC of RCA
0.17
−0.227
0.033
−0.35
0.16
0.234

CAC of LMCA
0.71
−0.62
0.42
−0.135
0.73
0.058

CAC of CX
0.21
−0.208
0.07
−0.298
0.21
0.209

¹Pearson correlation test, ²Correlation coefficient, ³Coronary artery calcification.

Figure 1: Correlation between RANKL : OPG ratio and coronary artery calcification.

4. Discussion

RANKL : OPG ratio showed stronger correlation with CAC than either RANKL or OPG concentration.

Presence and extent of vascular calcification are mainly related to incidence of cardiovascular disorders [11]. RANKL is expressed and secreted in the semisteoblastic cells in atherosclerotic lesions and causes the gradual development of vascular osteogenic calcification [12]. OPG concentration also increases in unstable vascular calcifications and other vascular disorders. Although OPG can prevent the effects of RANKL by anatomization, maybe this increment in OPG serum level, as a protective, is not enough to neutralize the RANKL effects [13, 14]. There are several reports that indicated the relationship between OPG and RANKL effects and vascular calcification [15]. Some studies have shown that OPG can protect large blood vessels from arterial calcification based on the observation of renal and aortic calcifications occurring in OPG knockout mice [16]. Intravascular administration of OPG could prevent the induced calcification by high dose of vit D in rats [17]. It is considered that the serum concentration of RANKL was in the highest level in acute vascular syndromes such as acute myocardial infarction and ischemic cerebral vascular attacks [18]. All of previous studies just evaluated the RANKL or OPG, almost OPG, effects on development of CAC. As these factors, RANKL, RANK, and OPG, are members of one system and strongly associated, the previous results are conflicting. Some studies reported the increased serum level of OPG in CAC, while there are other evidence of inhibitory effects of OPG on vascular calcification [19]. Therefor, it is considered that evaluation of any of these factors alone cannot be useful as a diagnostic biomarker. Our study for the first time determined the changes in RANKL and OPG levels concomitantly and reported the results as RANKL/OPG ratio. As we reported, there is no significant relation between RANKL serum levels and CAC () but there is significant negative relation between OPG serum (, CC = −0.468) and CAC and significant positive relation between RANKL/OPG ratio and CAC. It is important to mention that, in this study, measurement of OPG and RANKL level was performed in stable coronary disorders such as stable angina. In these patients, the less serum OPG levels are, the more calcification intensity occurred; this indicates the protective effects of OPG in vascular calcification. Other reports about these two factors belonged to researches on coronary syndromes such as acute myocardial infarction; therefore, it seems that the results of these two types of studies are not comparable. According to these facts, it is concluded that, in cardiovascular events, OPG serum level as a preventive compensatory mechanism markedly increased but this is not enough to neutralize the RANKL level increment. However, as a main limitation of the cross-sectional design, the RANKl/OPG ratio assessed together with the CAC is not necessarily this occurring at the same time. In conclusion, our study showed that determination of the RANKl/OPG ratio in compare with each of these two factors alone is a better diagnostic indicator for intensity of vascular calcification that leads to coronary disorders such as CAC.

Disclosure

The authors have had no involvements that might raise the question of bias in the work reported or in the conclusions, implications, or opinion stated.

References

M. Abedin, T. Omland, T. Ueland et al., “Relation of osteoprotegerin to coronary calcium and aortic plaque (from the Dallas Heart Study),” American Journal of Cardiology, vol. 99, no. 4, pp. 513–518, 2007.

M. Abedin, Y. Tintut, and L. L. Demer, “Vascular calcification: mechanisms and clinical ramifications,” Arteriosclerosis, Thrombosis, and Vascular Biology, vol. 24, no. 7, pp. 1161–1170, 2004.

D. V. Anand, A. Lahiri, E. Lim, D. Hopkins, and R. Corder, “The relationship between plasma osteoprotegerin levels and coronary artery calcification in uncomplicated type 2 diabetic subjects,” Journal of the American College of Cardiology, vol. 47, no. 9, pp. 1850–1857, 2006.

Y. Asanuma, C. P. Chung, A. Oeser et al., “Serum osteoprotegerin is increased and independently associated with coronary-artery atherosclerosis in patients with rheumatoid arthritis,” Atherosclerosis, vol. 195, no. 2, pp. e135–e141, 2007.

B. F. Boyce and L. Xing, “Biology of RANK, RANKL, and osteoprotegerin,” Arthritis Research and Therapy, vol. 9, supplement 1, article S1, 2007.

M. J. Budoff, S. Achenbach, R. S. Blumenthal et al., “Assessment of coronary artery disease by cardiac computed tomography: a scientific statement from the American Heart Association Committee on Cardiovascular Imaging and Intervention, Council on Cardiovascular Radiology and Intervention, and Committee on Cardiac Imaging, Council on Clinical Cardiology,” Circulation, vol. 114, no. 16, pp. 1761–1791, 2006.

P. Collin-Osdoby, “Regulation of vascular calcification by osteoclast regulatory factors RANKL and osteoprotegerin,” Circulation Research, vol. 95, no. 11, pp. 1046–1057, 2004.

A. Crisafulli, A. Micari, D. Altavilla et al., “Serum levels of osteoprotegerin and RANKL in patients with ST elevation acute myocardial infarction,” Clinical Science, vol. 109, no. 4, pp. 389–395, 2005.

T. M. Doherty, L. A. Fitzpatrick, A. Shaheen, T. B. Rajavashisth, and R. C. Detrano, “Genetic determinants of arterial calcification associated with atherosclerosis,” Mayo Clinic Proceedings, vol. 79, no. 2, pp. 197–210, 2004.

Y. Liu and C. M. Shanahan, “Signalling pathways and vascular calcification,” Frontiers in Bioscience, vol. 16, no. 4, pp. 1302–1314, 2011.

T. C. Gerber, “Diagnostic and prognostic implications of coronary artery calcification detected by computed tomography,” Calcified Tissue International, vol. 91, pp. 123–137, 2009.

J. Golledge, M. McCann, S. Mangan, A. Lam, and M. Karan, “Osteoprotegerin and osteopontin are expressed at high concentrations within symptomatic carotid atherosclerosis,” Stroke, vol. 35, no. 7, pp. 1636–1641, 2004.

P. C. Keelan, L. F. Bielak, K. Ashai et al., “Long-term prognostic value of coronary calcification detected by electron-beam computed tomography in patients undergoing coronary angiography,” Circulation, vol. 104, no. 4, pp. 412–417, 2001.

J. Shamsara, M. Ramezani, and A. H. Mohammadpour, “The RANKL: osteoprotegerin (OPG) ratio as a new biomarker for coronary artery disease,” Iranian Journal of Medical Hypotheses and Ideas, vol. 3, no. 1, 2009.

M. Ketteler and C. Giachelli, “Novel insights into vascular calcification.,” Kidney International. Supplement, no. 105, pp. S5–S9, 2006.

S. Kiechl, G. Schett, J. Schwaiger et al., “Soluble receptor activator of nuclear factor-κB ligand and risk for cardiovascular disease,” Circulation, vol. 116, no. 4, pp. 385–391, 2007.

M. C. L. Lim, T. W. Wong, L. O. Yaneza, C. De Larrazabal, J. K. Lau, and H. K. Boey, “Non-invasive detection of significant coronary artery disease with multi-section computed tomography angiography in patients with suspected coronary artery disease,” Clinical Radiology, vol. 61, no. 2, pp. 174–180, 2006.

C. E. Rackley and N. J. Weissman, “The role of plaque rupture in acute coronary syndromes,” Arteriosclerosis, Thrombosis, and Vascular Biology, vol. 54, pp. 743–759, 2009.

C. E. Rackley, “Pathogenesis of atherosclerosis,” Atherosclerosis, vol. 202, pp. 167–174, 2009.