The Scientific World JournalVolume 2012 (2012), Article ID 146804, 6 pagesdoi:10.1100/2012/146804

Research Article

Determination of the Strength of Adhesion between Lipid Vesicles

Tomáš Mareš,¹ Matej Daniel,¹ Aleš Iglič,² Veronika Kralj-Iglič,³ and Miha Fošnarič²

¹Laboratory of Biomechanics, Faculty of Mechanical Engineering, CTU in Prague, Technická 4, 166 07 Prague 6, Czech Republic²Laboratory of Biophysics, Faculty of Electrical Engineering, University of Ljubljana, Tržaška 25, 1000 Ljubljana, Slovenia³Laboratory of Clinical Biophysics, Faculty of Medicine, University of Ljubljana, Lipičeva 2, 1000 Ljubljana, Slovenia

Received 5 October 2011; Accepted 2 November 2011

Academic Editors: R. D. Byrne, H. M. Chamberlin, and M. Prieto

Copyright © 2012 Tomáš Mareš et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A commonly used method to determine the strength of adhesion between adhering lipid vesicles is measuring their effective contact angle from experimental images. The aim of this paper is to estimate the interobserver variations in vesicles effective contact angle measurements and to propose a new method for estimating the strength of membrane vesicle adhesion. Theoretical model shows for the old and for the new measure a monotonic dependence on the strength of adhesion. Results obtained by both measuring techniques show statistically significant correlation and high interobserver reliability for both methods. Therefore the conventional method of measuring the effective contact angle gives qualitatively relevant results as the measure of the lipid vesicle adhesion. However, the new measuring technique provides a lower variation of the measured values than the conventional measures using the effective contact angle. Moreover, obtaining the adhesion angle can be automatized more easily than obtaining the effective contact angle.

1. Introduction

Adhesion of membranes is ubiquitous in biological, biochemical, and biophysical processes. Therefore many theoretical models and experimental techniques have been developed that use or study membrane adhesion [1–4], an important segment of which is the adhesion of closed vesicles [5–7]. For example, adhesion of a vesicle represents an essential step for efficient drug delivery by small vesicles [8] and for many processes in biological cells, such as endo- and exocytosis or fusion of cells [9].

The range of interactions responsible for membrane adhesion is of the order of several nanometers [5]. If the size of the vesicle is much larger, typically of the order of a micrometer, we can simplify the adhesion potential by an effective contact energy [5]. The energy gain due to adhesion is then simply proportional to the contact area. In experimental practice, a commonly used method to extract the strength of adhesion from experimental images of the two adhering lipid vesicles is measuring the effective contact angle between the adhering vesicles. For example, this method was used to assess the capability of solution to mediate attractive interaction between membranous structures [10–13], since it was suggested that this mechanism suppresses vesiculation by causing the buds to adhere to the mother vesicle [14]. Shedding of microvesicles from cell membranes is an important process in cells [15] leading to cell-cell communication and thereby spreading of tumor and inflammation [16]. Since adhesion of buds to the mother membrane may suppress microvesiculation in vivo, mediated attractive interaction between membranous structures is a possible anticoagulant, anti-metastatic and anti-inflamatory effect [17].

However, the effective contact angle measurements are in practice difficult to perform fully objectively, and we are not aware of any analysis—theoretical or experimental—of the validity and the range of the “subjectivity’’ error of the above measuring technique.

The aim of this paper is to estimate the interobserver variations in effective contact angle measurements and to propose a new method for estimating the strength of membrane vesicle adhesion. The method is developed for phase contrast microscopy images of the two adhering lipid vesicles, but can be applied to other experimental techniques where contour of vesicles can be obtained or the proposed measure can be extracted by other means. In contrast to the conventional method of measuring adhesion through the effective contact angle, the measure proposed in this paper can be automatized more easily.

Both methods are discussed within the frames of a simple theoretical model and tested and compared in practice on a set of independent observers. The results of the statistical analysis of the data and its implications on the validity of both experimental techniques are discussed.

2. Theoretical Model

Let us discuss the experimental methods for determination of the strength of adhesion between two lipid vesicles in the frames of a simple theoretical model. Both vesicles have the same bending rigidities of their membranes, the same membrane areas, and the same vesicle volumes. The vesicles are adhered to each other and are rotationally symmetric around the axis normal to the adhesion plane.

The overall free energy () of the system of two adhering vesicles is taken as the sum of the bending energies () of both membranes of the vesicles and an additional energy gain due to adhesion, where is the adhesion constant and is the contact area. For the bending energy of the th vesicle we use a Helfrich expression for zero spontaneous curvature [18]: where is the bending constant of the lipid membrane, and are the principle curvatures, and the integral runs over the membrane surface of vesicle . The Gaussian contribution [18] to the bending energy is omitted since it is constant for the nonchanging topology of our case.

We introduce the dimensionless reduced adhesion constant, , where is the area of each vesicle. Equation (1) in the dimensionless form is where , and .

The stable configuration of the adhered vesicles is obtained as a shape that minimizes the free energy in (3) for a constant area (.) and volume (.) of each vesicle. The stable configuration depends on the two parameters only: the dimensionless reduced adhesion constant and the relative volume of each vesicle, . For illustration, Figure 1 (left) shows a stable state for and .

Figure 1: Left: a stable state of the two adhering vesicles obtained by minimization of the energy (3) for the relative volume of each vesicle and for the dimensionless reduced adhesion constant . The effective contact angle is defined in the right panel. Right: definition of the effective contact angle. The membrane (shown in gray), has at the contact point the contact curvature . The secant that defines the effective contact angle cuts the membrane at the point of contact and at the distance that should be small, that is, .

In the case of no adhesion, that is, , the vesicles are independent and the contact area tends to zero. In the limit of strong adhesion, that is, , the scale invariant bending energy becomes negligible compared with adhesion energy. In this limit, the shape of each vesicle approaches the shape of a spherical cap.

3. Effective Contact Angle

In the frames of the model described above, the membrane at the contact points, that is, at the rim of the contact area of the vesicles, has one principal curvature zero and the other one—the contact curvature—is determined by the relation [19, 20], where is the radius of contact curvature.

Now let us consider the plane of the contact curvature, that is, the cross-sectional plane of the adhered vesicles that is normal to the contact plane and includes the symmetry axis. In this plane we define a secant that cuts the membrane at the contact point and at some distance from the contact point. For small enough distances, , where the membrane has a shape of an arc of a circle with radius , we can define an effective contact angle (see Figure 1),

Note that in the limit of vanishing distance , the above defined secant becomes a tangent to the membrane in the contact point. Then the effective contact angle tends to zero if the membrane bending energy is not negligible compared with the adhesion energy, or, equivalently, if the vesicles are not very large [5]. However, one can still use the effective contact angle for measuring adhesion also at moderate adhesion strengths. Using the relation for contact curvature from (4) and using it in the above definition of the effective contact angle, we can express the adhesion constant as This relation was the basis for estimating the strength of adhesion between lipid vesicles from confocal microscope images [11, 12].

In (6), the adhesion constant depends on the choice of the distance . Since this distance has to be small, , the value of is in principle difficult to obtain. In practice, one usually draws on the microscope image two secants that appear as tangents to the membrane at the point of contact (see Figure 1). Although with this method the value of is not precisely known, it assures that . And, using the same length scale for different images, it also assures a relatively small variation of for all images. Nevertheless, how to draw the secants remains a subjective decision of the observer.

4. Adhesion Angle

In order to reduce the role of magnification and subjective factors in experimental determination of the adhesion constant , we propose in this work a new measure for the strength of adhesion between two lipid vesicles that can be easily obtained from images where contours of the vesicles can be identified, for example, from the phase contrast microscope images. We propose the following procedure (see Figure 2):(1)on the image locate the axis of the rotational symmetry of the two vesicle system (denoted on Figure 2 as the -axis),(2)on the image locate points , and B₂: point lays in the contact plane (denoted on Figure 2 as the -axis) where the membranes of the two vesicles separate; points B₁ and B₂ are where the membranes are the farthest away from the symmetry axis ;(3)measure the adhesion angle as an angle between lines and .

Figure 2: Phase contrast microscope image of the two adhering giant phospholipid vesicles (with radii of approx. 30 μm). The -axis denotes the symmetry axis and the -axis the contact plane. Points A, B₁, and B₂ are to be located to measure the adhesion angle between lines and . The adhesion angle can be obtained also from measuring lengths: , where , , and points and are projections of points and to the contact plane.

The proposed adhesion angle is relatively simple to obtain, for example by using the ImageJ software [21], where angles can be measured directly and interactively on the image. One can, however, instead of measuring the angle, measure the distances and as defined in Figure 2. By calculating measures and , we can get the adhesion angle from .

Note that for a given value of the dimensionless reduced adhesion constant , the measure is scale invariant and depends only on the relative volume of the vesicles. Therefore, one only needs to obtain the angle of adhesion and the relative volume of the vesicles to extract . The relative volume of the vesicle can be obtained, for example, by extracting the contour of the vesicle from the image through some automated image segmentation method. Then the volume and the area of the vesicle with the rotational symmetry around the -axis are and , where is the distance of the membrane from the -axis and . The relative volume is, as defined in Section 2, .

Let us show that the new proposed measure of adhesion is a monotonically increasing function of the reduced adhesion constant (see (3)) in the frames of a simple theoretical model described in Section 2. There we have a symmetry across the contact plane. Then the adhesion angle can be written as , where due to the symmetry . In the following we will see that is a monotonic function of the reduced adhesion constant , which means that also the adhesion angle itself is a monotonic function of .

Figure 3 shows the dependence of on the dimensionless reduced adhesion constant for different values of the relative volume . The figure was obtained by minimization of the dimensionless overall free energy of the system of the two adhering vesicles (3). The minimization was performed using the Surface Evolver software [22], and the data was then fitted using the least square method on the function where and .

Figure 3: Measure , where is the adhesion angle, as a function of dimensionless reduced adhesion constant for the vesicle relative volumes –0.95. Curves show the fits of function from (7) where only is a free parameter. The inset shows the fit, where the constraint is released, and the data is fitted using the function defined in (7) for the two free parameters: and .

In Figure 3, the curves are a fit using (7) where is obtained from the case of zero tension, and from the strong adhesion limit, where the bending energy becomes irrelevant compared with adhesion energy and the shape of each vesicle approaches the shape of the spherical cap (see page 92 in [5]). Then the adhesion angle depends only on the relative volume of the vesicle through a geometric relation Therefore, only is a free parameter for fitting the curve in (7). For illustration, the inset shows the fit where the constraint is released, and the data is fitted using the function defined in (7) for the two free parameters: and .

Note also that in the strong adhesion limit the vesicle obtains a shape of a spherical cap. Then the effective contact angle is nonzero also for and can be defined independently of as . The geometry of a spherical cap yields a relation between the adhesion angle and the effective contact angle in the limit of strong adhesion: .

The proposed measure of adhesion is applicable to vesicles of all sizes above a few hundreds of nanometers in diameter. This limit is set by the fact that the range of interactions responsible for membrane adhesion (several nanometers) has to be much smaller than the size of the vesicle, so that the adhesion potential can be simplified by an effective contact energy [5].

5. Measuring Techniques in Practice

Determination of the strength of adhesion between the vesicles was tested in practice for a conventional technique using the effective contact angle and for the technique introduced in this work that uses the adhesion angle.

For that purpose, the effective contact angle and the adhesion angle between two lipid vesicles were measured by five independent observers on a set of 100 phase contrast microscope images. Giant phospholipid vesicles with various lipid compositions were prepared and recorded using an inverted microscope with phase-contrast optics, as in details explained elsewhere [12]. Only images with two adhering vesicle were selected, with vesicles various in size (10 μm–100 μm) and relative volume. All observers were involved in the studies of cell mechanics and were familiar with the vesicle adhesion measurements. The effective contact angle and the adhesion angle were measured independently on both sides of the vesicles in the image plane. measurements were performed using the ImageJ software [21].

Each observer provided 200 measurements for each type of the measured angle. Intraclass correlation coefficients (ICC) were calculated as a measure of interobserver reliability [23]. The ICC takes values between 0 and 1 and is close to 1 when the differences between paired measurements are very small compared to the differences between subjects. ICC was calculated according to Shrout and Fleiss schema [24].

Values of ICC in Table 1 indicate that both methods are significantly reliable with respect to the interobserver variability. However, the adhesion angle has statistically significant higher () interobserver reliability in comparison to the conventional measurements of the effective contact angle.

Table 1: Intraclass correlation coefficient (ICC) as a measure of interobserver reliability. The values and the 95% confidence intervals for both types of the measured angles are also shown.

Method
ICC

95% conf. interval

Eff. contact angle ()
0.7620

0.7182 to 0.8028

Adhesion angle ()
0.8440

0.8126 to 0.8725

As is shown in Figure 4, the adhesion angle measurement technique provides considerable lower variations in values measured by different observers than the effective contact angle measurement technique.

Figure 4: A histogram of the differences between the measured angles, , measured on the sample of intervesicle contacts by raters and the average value of all raters for the given angle, . Empty (white) bars represent measurements of the effective contact angle, the conventional measure of adhesion, and solid (gray) bars represent the measures of the adhesion angle, the new measure of adhesion proposed in this work. Solid lines represent best fit of the normal distribution.

Figure 5 shows that new proposed method is consistent with the conventional measurements of the effective contact angle, as can be seen from significant correlation between the values obtained by both methods (Pearson correlation coefficient 0.80791, , 95% confidence interval 0.78076 to 0.83202).

Figure 5: Correlation between the measured values of the effective contact angle (conventional method for measuring adhesion) and the adhesion angle (here proposed measure of adhesion).

Based on the definition, the new proposed measure of adhesion provides for the adhesion angle higher values then the conventional method for the effective contact angle.

6. Conclusion

Adhesion of biological and lipid vesicle membranes is an important biological, biochemical, and biophysical process. In experimental practice, one possible method to extract the strength of adhesion from experimental images of the two adhering lipid vesicles is measuring the effective contact angle between the adhering vesicles.

However, there are drawbacks measuring the effective contact angle, since the secants of the membrane that define the effective contact angle have to be very close to the tangents to the membrane at the contact point. How to draw this secants remains a subjective decision of the observer and depends on the length scale of the image. For the above reasons, measuring of the effective contact angle is not easily amendable for automation.

Therefore we proposed in this work a new—simple and objective—method to extract the strength of adhesion from experimental images of two adhering lipid vesicles. The method is developed for images obtained by phase contrast microscopy, but can be applied to other experimental techniques where contour of vesicles can be obtained or the proposed measure can be extracted by other means.

The new measure was tested within a simple theoretical model of the two identical adhering vesicles. The model yields the monotonic dependence of the proposed measure on the reduced adhesion constant and is therefore an appropriate measure for the strength of adhesion.

Both methods—the new and the conventional one—were also tested in practice on a set of independent observers using the same set of phase contrast microscope images. Statistical analysis of the measured data shows significant correlation between the methods and high interobserver reliability of both methods. Therefore, we can conclude that the conventional method of measuring the effective contact angle gives qualitatively relevant results. However, the new measuring technique provides a lower variation of the measured values than the conventional measures using the effective contact angle. And, obtaining the adhesion angle can be automatized more easily than the effective contact angle.

Acknowledgments

The authors would like to thank to the Slovenian research Agency and the Czech Ministry of Education for the financial support through the Czech-Slovenian bilateral Grants MEB091143 and MEB090901 and Grants J3-2120 and J3-9219. T. Mareš and M. Daniel would like to acknowledge the support through MSM6840770012.

References

L. V. Chernomordik and M. M. Kozlov, “Mechanics of membrane fusion,” Nature Structural and Molecular Biology, vol. 15, no. 7, pp. 675–683, 2008.

E. H. Chen, E. Grote, W. Mohler, and A. Vignery, “Cell-cell fusion,” FEBS Letters, vol. 581, no. 11, pp. 2181–2193, 2007.

R. Blumenthal, M. J. Clague, S. R. Durell, and R. M. Epand, “Membrane fusion,” Chemical Reviews, vol. 103, no. 1, pp. 53–69, 2003.

Y. Sun, C. C. Lee, and H. W. Huang, “Adhesion and merging of lipid bilayers: a method for measuring the free energy of adhesion and hemifusion,” Biophysical Journal, vol. 100, no. 4, pp. 987–995, 2011.

U. Seifert, “Configurations of fluid membranes and vesicles,” Advances in Physics, vol. 46, no. 1, pp. 13–137, 1997.

S. Das and Q. Du, “Adhesion of vesicles to curved substrates,” Physical Review E, vol. 77, no. 1, Article ID 011907, 2008.

H. Schönherr, J. M. Johnson, P. Lenz, C. W. Frank, and S. G. Boxer, “Vesicle adsorption and lipid bilayer formation on glass studied by atomic force microscopy,” Langmuir, vol. 20, no. 26, pp. 11600–11606, 2004.

D. Lasic, Structure and Dynamics of Membranes, Elsevier, New York, NY, USA, 1995.

B. Alberts, A. Johnson, J. Lewis, M. Raff, K. Roberts, and P. Walter, Molecular Biology of the Cell, Garland Science, 5th edition, 2007.

R. Janša, V. Šuštar, M. Frank et al., “Number of microvesicles in peripheral blood and ability of plasma to induce adhesion between phospholipid membranes in 19 patients with gastrointestinal diseases,” Blood Cells, Molecules, and Diseases, vol. 41, no. 1, pp. 124–132, 2008.

M. Frank, M. Manček-Keber, M. Kržan et al., “Prevention of microvesiculation by adhesion of buds to the mother cell membrane—a possible anticoagulant effect of healthy donor plasma,” Autoimmunity Reviews, vol. 7, no. 3, pp. 240–245, 2008.

M. Frank, S. Sodin-Šemrl, B. Rozman, M. Potočnik, and V. Kralj-Iglič, “Effects of low-molecular-weight heparin on adhesion and vesiculation of phospholipid membranes,” Annals of the New York Academy of Sciences, vol. 1173, no. 1, pp. 874–886, 2009.

V. Šuštar, R. Janša, M. Frank et al., “Suppression of membrane microvesiculation—a possible anticoagulant and anti-tumor progression effect of heparin,” Blood Cells, Molecules, and Diseases, vol. 42, no. 3, pp. 223–227, 2009.

J. Urbanija, N. Tomšič, M. Lokar et al., “Coalescence of phospholipid membranes as a possible origin of anticoagulant effect of serum proteins,” Chemistry and Physics of Lipids, vol. 150, no. 1, pp. 49–57, 2007.

I. Junkar, V. Šuštar, M. Frank, et al., “Blood and synovial microparticles as revealed by atomic force and scanning electron microscope,” Open Autoimmunity Journal, vol. 1, no. 1, pp. 50–58, 2009.

T. H. Lee, E. D'Asti, N. Magnus, K. Al-Nedawi, B. Meehan, and J. Rak, “Microvesicles as mediators of intercellular communication in cancer—the emerging science of cellular “debris”,” Seminars in Immunopathology, vol. 33, no. 5, pp. 455–467, 2011.

V. Šuštar, A. B. Zavec, R. Štukelj, et al., “Nanoparticles isolated from blood: a reflection of vesiculability of blood cells during the isolation process,” International Journal of Nanomedicine, vol. 6, pp. 2737–2748, 2011.

W. Helfrich, “Elastic properties of lipid bilayers: theory and possible experiments,” Zeitschrift für Naturforschung, vol. 28, no. 11, pp. 693–703, 1973.

U. Seifert and R. Lipowsky, “Adhesion of vesicles,” Physical Review A, vol. 42, no. 8, pp. 4768–4771, 1990.

H. Duwe, J. Kaes, and E. Sackmann, “Bending elastic moduli of lipid bilayers: modulation by solutes,” Journal de Physique, vol. 51, no. 10, pp. 945–961, 1990.

W. Rasband, “ImageJ—image processing and analysis in java,” 1997.

K. Brakke, “The surface evolver,” 1991.

P. E. Shrout and J. L. Fleiss, “Intraclass correlations: uses in assessing rater reliability,” Psychological Bulletin, vol. 86, no. 2, pp. 420–428, 1979.

F. Schoonjans, A. Zalata, C. E. Depuydt, and F. H. Comhaire, “MedCalc: a new computer program for medical statistics,” Computer Methods and Programs in Biomedicine, vol. 48, no. 3, pp. 257–262, 1995.