The Scientific World JournalVolume 2012 (2012), Article ID 498345, 14 pagesdoi:10.1100/2012/498345

Research Article

Synthesis of Nanoscale and Study of the Effect of Their Crystal Structure on Single Cell Response

Z. R. Ismagilov,¹ N. V. Shikina,¹ N. A. Mazurkova,² L. T. Tsikoza,¹ F. V. Tuzikov,¹ V. A. Ushakov,¹ A. V. Ishchenko,¹ N. A. Rudina,¹ D. V. Korneev,² and E. I. Ryabchikova³

¹Boreskov Institute of Catalysis, Siberian Branch of RAS, 5, Pr. Akad. Lavrentieva, Novosibirsk 630090, Russia²The Vector State Research Center of Virology and Biotechnology, Rospotrebnadzor, Korp. 12, Novosibirsk oblast, Koltsovo 630559, Russia³Institute of Chemical Biology and Fundamental Medicine, Siberian Branch of RAS, 8, Pr. Akad. Lavrentieva, Novosibirsk 630090, Russia

Received 31 October 2011; Accepted 15 December 2011

Academic Editor: Jose Eleazar Barboza-Corona

Copyright © 2012 Z. R. Ismagilov et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

To study the effect of nanoscale titanium dioxide (TiO₂) on cell responses, we synthesized four modifications of the TiO₂ (amorphous, anatase, brookite, and rutile) capable of keeping their physicochemical characteristics in a cell culture medium. The modifications of nanoscale TiO₂ were obtained by hydrolysis of TiCl₄ and Ti(i-OC₃H₇)₄ (TIP) upon variation of the synthesis conditions; their textural, morphological, structural, and dispersion characteristics were examined by a set of physicochemical methods: XRD, BET, SAXS, DLS, AFM, SEM, and HR-TEM. The effect of synthesis conditions (nature of precursor, pH, temperature, and addition of a complexing agent) on the structural-dispersion properties of TiO₂ nanoparticles was studied. The hydrolysis methods providing the preparation of amorphous, anatase, brookite, and rutile modifications of TiO₂ nanoparticles 3–5 nm in size were selected. Examination of different forms of TiO₂ nanoparticles interaction with MDCK cells by transmission electron microscopy of ultrathin sections revealed different cell responses after treatment with different crystalline modifications and amorphous form of TiO₂. The obtained results allowed us to conclude that direct contact of the nanoparticles with cell plasma membrane is the primary and critical step of their interaction and defines a subsequent response of the cell.

1. Introduction

Nanoscale titanium dioxide (TiO₂) attracts considerable attention due to its unique physicochemical and catalytic properties, which found application in various fields including photocatalysis, electrochemistry, synthesis of catalysts and supports for environmental remediation, and production of pigments, cosmetics, and medicinal preparations [1–10]. Pigment-grade form of TiO₂ (spheres larger than 200 nm) was considered safe for humans for a long time and widely used in pharmaceutical compositions and cosmetics [11, 12]. Usage of nanoscale TiO₂ in these fields seems promising, so the possibility of nanoscale TiO₂ application in therapy [13–15] and microbiology [16–18] was examined. The ability of 4-5 nm TiO₂ nanocomposites including those with oligonucleotides to penetrate into cells [19–21] served as a background to expect that nanoscale TiO₂ can provide a new class of advanced biologically active substances. However, there is no complete sureness in biological safety of nanoscale TiO₂. Some studies showed that nanoscale TiO₂ kept its inert properties in animals [22, 23] and humans [11, 24]. In contrast, other researchers found a clear toxic effect of nanoscale TiO₂ both for cell cultures and animals [25–30]. Most publications relate toxic effects of TiO₂ nanoparticles with their intrinsic capacity to generate reactive oxygen species (ROS), which could damage cell structures [31, 32]. Toxic effect of TiO₂ nanoparticles depends on their shape, size, agglomeration state, surface chemistry, and concentration [31, 33, 34], and some papers reported different influence of rutile and anatase TiO₂ on cell viability [25–28, 30]. Indeed, the size of nanoparticles allows them to approach the cell surface at distances of 1–100 nm, thus providing fundamentally new types of interaction of inorganic substances with the cell surface [35, 36]. The problem to catch and study these interactions makes special requirements for the stability of nanoscale TiO₂ physicochemical properties. The requirements on the stability of physicochemical properties of nanoscale TiO₂ sharply increase when they are used in biological studies. The need of physiological pH (7.2–7.4) and water-soluble preparations can cause great difficulties in the synthesis of nanoparticles. In addition, nanoparticles should be dissolved in physiological solutions for biological experiments, and this can induce agglomeration and changes of their morphology [37, 38]. It is evident that synthesis of nanoscale TiO₂ must provide high level of their physicochemical stability sufficient for biological experiments.

Nanoscale TiO₂ sols are synthesized mostly by two kinds of the sol-gel method differing in the chemical nature of titanium precursor: (1) with the use of alkoxides (most often, titanium isopropoxide or isobutoxide) and (2) with titanium tetrachloride, TiCl₄ [39]. The goal of the present work was to obtain nanoscale TiO₂ sols having stable physicochemical properties suitable for biological studies. To achieve this goal, we examined the effect of precursor nature and synthesis conditions on the textural, structural, and dispersion properties of titanium dioxide nanoparticles and their stability. The TiO₂ nanoparticles were also characterized by a set of physicochemical methods (XRD, IR spectroscopy, BET, SAXS, DLS, SEM, TEM, AFM). We were able to choose the optimal conditions for preparation of different forms of nanoscale TiO₂ with similar dispersion characteristics and stable morphology for the study of the influence of their modification on cell responses.

The most interesting questions are how discrete nanoparticles interact with cell plasma membrane and is there any difference in this interaction between different forms of TiO₂? To answer these questions we used electron microscopy which allows us to see and study both nanoparticles and cellular structures in the nanometer scale. Several electron microscopic studies have been performed with commercial TiO₂ (10–50 nm) nanoparticles and cells using a period of 24–48 h incubation [30, 40–42]. As shown in our previous studies, it is precisely the early steps of the nanoscale TiO₂ interaction with a cell that can determine the cell response to nanoparticles [43]. Here, we report principal data of electron microscopic study on the interaction of 3–5 nm TiO₂ of different modifications (amorphous, anatase, rutile, and brookite) with a single cell.

2. Materials and Methods

2.1. Materials

Chemicals and materials were obtained from commercial suppliers: TiCl₄ (99.6%), Ti(i-OC₃H₇)₄ (98%) (Alfa Aesar), 2-isopropanol, acetylacetone (99%) (Sigma-Aldrich), NaOH, HNO₃ (Merck), cellulose membrane (ZelluTrans T1, Roth).

2.2. Preparation of TiO₂ Nanoparticles

Samples of series 1 were obtained by simultaneous batching of TiCl₄ in hydrochloric acid HCl (5 mol/L) and ammonia solutions (3.5 mol/L) or a NaOH solution (2.5 mol/L) into reaction vessel with deionized water under intense stirring at a specified temperature of 4, 20, or 70°C and constant pH kept at 3 ÷ 4, 6 ÷ 7, or 9 ÷ 10. The resulting colloidal solutions with a loose white sediment were stirred for 1 h, kept at room temperature for 5 h, washed with deionized water to remove Cl⁻¹ and Na⁺¹() ions, and stored at 4°C (samples 1.1–1.9 in Table 1).

Table 1: Synthesis conditions of titanium dioxide samples and their properties.

Samples
Hydrolysis conditions
Textural and structural-dispersion properties of TiO₂

T, °C
pH
, m²·g⁻¹
, cm³·g⁻¹
Phase composition
Crystallite size, nm
D, nm (SAXS)

1.1
4
3-4
330
0.2
Anatase
5.4
5.8

1.2
4
6-7
360
0.6
X-ray amorphous
—
7.0

1.3
4
9-10
420 (400)a
0.5
X-ray amorphous
—
5.0

1.4
20
3-4
350 (330)a
0.3
Anatase
5.4
5.2

1.5
20
6-7
400
0.5
X-ray amorphous
—
5.0

1.6
20
9-10
495
0.4
X-ray amorphous
—
5.3

1.7
70
3-4
380
0.6
Anatase
4.3
6.1

1.8
70
6-7
510
0.5
X-ray amorphous
—
5.6

1.9
70
9-10
525
0.4
X-ray amorphous
—
5.4

2.1
4
0.2
70 (850)a
0.05
Brookite (the main phase)
2.3
2.2

2.2
70/1 h
0.2
100
0.1
Brookite + anatase
2.8
3.1

2.3
70/5 h
0.2
175 (200)a
0.17
Rutile
7.0
7.0

3.1
20
1.2
2
0.01
Anatase
3.0
3.0

3.2
50
1.2
60
0.04
Anatase
4.2
4.5

3.3
70
1.2
185 (300)a
0.10
Anatase
4.7
5.2

3.4
95
1.2
230
0.13
Anatase
5.4
5.8

3.5
60
1.2
1.8 (530)a
0.01
Anatase
3.3
2.8

a.

Samples of series 2 were obtained by hydrolysis of TiCl₄ in cold water at 3-4°C and . One sample was dialyzed against deionized water at 3-4°C up to pH values 3.3–3.5. This gave a transparent sol, which was stored at 4°C. Another sample after hydrolysis was diluted by 1.6 M HCl and heated to 70°C under constant stirring for 1–5 h. After 1 h heating, the solution turned into a transparent sol, whereas the long heating resulted in a colloidal solution with sediment. The sediment was washed with deionized water at 3-4°C up to pH values 3.3–3.5 and stored at 4°C (samples 2.1–2.3 in Table 1).

To synthesize series 3 samples, we used a mixture of titanium tetraisopropoxide (Ti(i-OC₃H₇)₄, TIP) and isopropyl alcohol with the volume ratio of components 6 : 1; the mixture was added dropwise under intense stirring to an aqueous solution of nitric acid taking [H⁺]/[Ti] = 0.2 and [H₂O]/[Ti] = 200 [15]. The sol was stirred for 7 h at a specified temperature 20, 50, 70, or 95°C and then cooled to room temperature. One sample was obtained by introduction of acetylacetone ([ACAC]/[Ti] = 2) [44] to the initial mixture of titanium tetraisopropoxide and isopropyl alcohol, other conditions of nitric acid hydrolysis being equal. The sol was stirred for 7 h at 60°C and then cooled to room temperature. The sols of series 3 were dialyzed against deionized water at 3-4°C up to pH values 3.3–3.5 and stored at 4°C (samples 3.1–3.5 in Table 1).

For XRD and BET studies, samples were dried at room temperature and under an IR lamp at 70°C. The samples for SAXS, DLS, AFM, SEM, TEM, and HR-TEM studies were used without drying. For experiments with MDCK cell culture, the samples were neutralized and cleaned by dialysis.

2.3. X-Ray Powder Analysis

X-ray diffraction (XRD) patterns were recorded over a 2θ = 20–85° range using an HZG-4C diffractometer (Freiberger Prazisionsmechanik, Germany) with CoKα (λ = 1.59021 Å) irradiation. The crystal sizes of TiO₂ were estimated in accordance with Sherrer equation [45] applied to the (101) reflection at 2θ= 29.46° (anatase), the (121) reflection at 2θ= 35.95° (brookite), and the (110) reflection at 2θ= 31.0° (rutile).

2.4. Nitrogen Adsorption

To analyze the textural characteristics of TiO₂, low-temperature (77 K) nitrogen adsorption-desorption isotherms were recorded using a Micromeritics ASAP 2400 (Micromeritics, USA). The specific surface area SBET was calculated according to standard BET method. The incremental pore and size distributions were calculated by the Barrett-Joyner-Halenda method.

2.5. Scanning Electron Microscopy (SEM)

The study of TiO₂ morphology was performed using a JSM 6460LV (JEOL, Japan) scanning electron microscope with accelerating voltage 25 kV. Samples were fixed on a copper holder with conductive glue or scotch tape. Preliminarily, a 5–10 nm thick conductive layer of gold was sprayed on the samples surface in a special vacuum unit to eliminate charging effects.

2.6. Small-Angle X-Ray Scattering (SAXS)

SAXS patterns from the samples of colloidal solutions and sols were measured on the small-angle X-ray diffractometers (Siemens, Germany and Hecus, Austria), which provide sample thermostabilization within 0 to 70°C and the accuracy of ±0.1°C. X-ray tubes with copper anode were used as a source of irradiation ( Å).

For analysis, samples were placed in a special cuvette made of 1 mm thick quartz capillary with 0.01 mm walls. As a background scattering we measured scattering from cuvettes filled with the liquid phase whose composition was close to that of mother liquor of the sol under study. SAXS measurements were made at 24°C over the angle range 2θ = 0.17 ÷ 2.34° (adjusted for absorption of X-rays, collimation of X-ray beam and background scattering).

After instrumental correction, the obtained experimental SAXS data were used to calculate the functions of TiO₂ nanoparticle size distribution (inhomogeneities of electron density) ((R)) in the form of histograms, prevailing radius of the particles (R), and specific surface area (S/V). To determine referred to TiO₂ weight, the value of S/V was corrected with regard to the true density of different titanium dioxide modifications, which is equal to 3.95 g/cm³ for anatase, 4.10 g/cm³ for brookite, 4.23 g/cm³ for rutile, and 3.39 g/cm³ for amorphous TiO₂.

2.7. Dynamic Laser Scattering (DLS)

Hydrodynamic diameter of TiO₂ particles was measured with a NICOMP 380ZLS instrument (Particle Sizing Systems, USA). The instrument calculates diffusivity and size of the particles by equation (D = kT/6πηR, where D is hydrodynamic diameter of the particles; k is diffusivity of the particles; T is temperature; η is viscosity of solution; R is gas constant). Measurements were made in a 1 × 1 × 5 cm cuvette at 23°C, which corresponds to viscosity index for water 0.933 cP and refractive index 1.333; signal accumulation time was 10 min.

2.8. Atomic Force Microscopy (AFM)

Atomic force microscopy images were carried out on a SolverP47Bio atomic force microscope (Zelenograd, Russia) in a semicontact mode. Samples were diluted in deionized water to a desired concentration. Then, a 20 μL drop was placed on a fresh mica sheet with the surface area of ca. 25–30 mm². Adsorption was carried out for 1 h at room temperature, and then residual liquid was removed with filter paper.

2.9. High-Resolution Transmission Electron Microscopy (HR-TEM)

HR-TEM images were taken on a JEM 2010 electron microscope (JEOL, Japan) with lattice resolution 0.14 nm at accelerating voltage 200 kV. Samples were deposited by an ultrasonic disperser onto standard carbon-coated copper grids, which were fixed in a holder and introduced in the chamber of electron microscope.

2.10. Transmission Electron Microscopy of MDCK Cell Culture Treated with Nanoscale TiO₂ (TEM)

MDCK cell culture originated from Madin Darby canine kidneys and are epitheliod cells growing in monolayer. MDCK cell culture for electron microscopy was seeded on 6-well plates at a density of 1.0–1.5 × 105 cells/mL in 3 mL culture medium to each well and was propagated to full monolayer confluence in SFM4MegaVir (Invitrogen, Paisley, UK) cell culture medium supplemented with 2% Gibco fetal bovine serum (USA), at 37°C in the presence of 5% CO₂, 100 U/mL of penicillin, and 100 μg/mL streptomycin. The nanoparticles were diluted to 100 and 300 μg/mL with the same cell culture medium. The cells were treated with amorphous, anatase, rutile, and brookite TiO₂ nanoparticles in both concentrations after washing with fresh cell culture medium. Then the cells were incubated during 1, 3, and 5 h at 37°C in the dark, washed with fresh cell culture medium, collected in plastic tubes, and centrifuged at 3000 rpm. The pellets were fixed by 4% paraformaldehyde, routinely processed for electron microscopy, and embedded in an Epon-Araldite resin mixture. Ultrathin sections were routinely stained with uranyl acetate and lead citrate and examined on a JEM 1400 (JEOL, Japan) transmission electron microscope at 80 kV. Digital images were collected by Veleta 3 CCD camera (SIS, Germany).

3. Results and Discussion

Synthesis conditions of freshly prepared TiO₂ sols and their textural and structural-dispersion properties such as pore volume , specific surface area , phase composition, and particle size are presented in Table 1.

3.1. XRD Analysis

All the samples were tested by XRD method. Radiographic examination showed that phase state and particle size of TiO₂ depend on conditions of hydrolysis of the both type precursors. At hydrolysis of TiCl₄ (series 1), the dependence of TiO₂ structural modification on pH of reaction medium is highly pronounced. Neutral or alkaline medium yields X-ray amorphous titanium dioxide. The pH value equal to 3-4 leads to preferential formation of the anatase phase with the particle size 4–6 nm; traces of brookite with the particle size less than 3 nm are observed. The amount of the brookite phase increases with a decrease in the synthesis temperature. As pH decreases below 1 (series 2), this results in the formation of brookite, which turns into rutile upon long-term heating at 70°C. The hydrolysis of Ti(i-OC₃H₇)₄ under varying temperature (series 3) provides formation of the anatase phase, whose particle size has a weak tendency to increase with elevating temperature of the synthesis. TIP modification with acetylacetone (sample 3.5) produces no changes in the phase composition of hydrolysis products and facilitates the formation of the most dispersed particles of the anatase.

Diffraction patterns of some samples with different structure are presented in Figure 1. The pattern of X-ray amorphous titanium dioxide (sample 1.5) shows a broad peak in the angle region 25–40°, which is typical of this phase. Brookite has a peak in the region of 29.53–35.95° (sample 2.1); however, the presence of anatase cannot be ruled out in this sample, its most strong line being superimposed with the brookite line in the region of 29.46°. Main distinction of the brookite diffraction pattern from that of anatase is asymmetry of the peak in the region of 29–31° and appearance of line (121) at 36°. Other lines of anatase show peaks in the angle regions of 44.22, 45.14, 56.47, and 63.54°. These regions correspond to peaks on the curves of samples 1.7 and 3.3; diffraction patterns of the samples obtained from different precursors, TiCl₄ and Ti(i-OPr)₄, are identical. Sample 2.3 is characterized by peaks in the angle regions of 31.56, 42.11, 48.04, and 63.80°, which correspond to rutile according to JCPDS radiographic database.

Figure 1: Diffraction patterns of titanium dioxide samples of different structure: (1) X-ray amorphous, (2) brookite, (3) anatase (from TiCl₄), (4) anatase (from TIP), and (5) rutile.

Our data showed that nanoscale TiO₂ sols of different structure can be obtained with equal ease from titanium tetraisopropoxide or titanium tetrachloride used as a Ti precursor. pH of the medium and temperature were found to affect the formation of TiO₂ structure. Low pH (3-4) results in the formation of anatase phase, whereas neutral and alkaline values of pH lead to X-ray amorphous TiO₂. Hydrolysis of TiCl₄ in cold water at pH <1 yields highly disperse brookite sols; long-term heating of brookite transforms it into rutile.

3.2. N₂ Adsorption

Differential curves of the pore size distribution in the dried samples of series 1 (Figures 2(a)–2(c)) indicate a fine-pore structure with the prevailing pore size of 3-4 nm. However, some of the samples obtained in neutral and alkaline medium (T = 4°C, Figure 2(a)—■, ∆) or in acid medium (°C, Figure 2(c)—○) have a broad set of pores with the size ranging from 3 to 30 nm. Therewith, in all temperature groups of the samples, specific surface area increases with raising the synthesis temperature and pH (Table 1), which agrees with the classic concept of fresh sediment texture formation. At the synthesis temperatures of 4 and 20°C, pore volume has a maximum at pH = 6-7, whereas at 70°C it decreases monotonically with increasing pH (Table 1). An increase in the pore volume and formation of heterogeneous pore structure are related with the formation of bigger particles at these conditions of synthesis, which is confirmed by the SAXS data (Table 1). Samples obtained by drying the sols of series 3, also irrespective of the synthesis temperature, have even a more distinct homogeneous pore structure with the pore diameter 1-2 nm (Figure 2(d)) and a small pore volume, which points to a compact packing of the particles with close sizes. Pore size distribution for sample 3.1 is not shown because of too low dV/dD values. According to BET data, samples of series 3 are characterized by a proportional increase of specific surface area and pore volume as the synthesis temperature rises from 20 to 95°C and particle size grows (Table 1).

(a)

(b)

(c)

(d)

Figure 2: Differential curves of the pore size distribution in series 1 samples obtained by hydrolysis of TiCl₄ under the following conditions: (a) samples 1.1–1.3, T = 4°C; (b) samples 1.4–1.6, T = 20°C; (c) samples 1.7–1.9, T = 70°C (pH: ○—3 ÷ 4, ■—6 ÷ 7, ∆—9 ÷ 10); and (d) series 3 samples obtained by hydrolysis of TIP (: ■—50°C, ∆—70°C, □—95°C). Pore size distribution was determined by BET.

3.3. SEM

The BET data indicating that porosity of xerosols increases with elevation of the TIP hydrolysis temperature are supported by the SEM study of morphological structure of TiO₂ films. The SEM images of dried sols, which were obtained at different temperatures of Ti(i-OC₃H₇)₄ hydrolysis (samples 3.1 and 3.4), having the crystallite size 3.0 and 5.4 nm, respectively, are shown in Figure 3. The sample with small particle size (Figure 3(a)) has a vitreous morphology with practically nonporous structure ( for this sample is very low, 2 m²/g, Table 1), whereas another sample shows a clearly defined porous structure (Figure 3(b)).

(a)

(b)

Figure 3: SEM images. Surface morphology of the dried samples of TiO₂ sols obtained by hydrolysis of TIP at 20°C (a) and 95°C (b).

3.4. SAXS

A comparison of specific surface areas determined by BET and SAXS methods shows that in some cases both methods give close values for samples of series 1 (1.3–420 and 400 m²/g; 1.4–350 and 330 m²/g) and sample 2.3 (175 and 200 m²/g); however, for highly dispersed sols the values of strongly exceed those of (samples 2.1, 3.3, 3.5, Table 1). These distinctions may be caused by ultramicropores in xerosols, which are inaccessible to nitrogen molecules at 77 K due to activated diffusion or their complete blocking (the presence of perfectly isolated pores).

Examination of the particle size in TiO₂ samples of all series revealed that, according to SAXS patterns (not shown), the analyzed TiO₂ nanoparticles in sols are represented to a first approximation by equiaxed (with the axial ratio lower than 3 : 1) homogeneous spheres [46]. Histograms of the particle size distribution for series 1 samples, which are colloids with a sediment, are close to each other (Figure 4) and indicate the presence of TiO₂ nanoparticles with the size of 4 to 40 nm and prevailing average diameter D = 5-6 nm (Table 1). Hydrolysis of TiCl₄ in water at low pH and temperature 3-4°C (sample 2.1) results in the formation of a sol with virtually monodisperse particle size distribution (Figure 5). Histograms of all samples of series 3 indicate the presence of particles with size 2–20 nm and prevailing D = 3–5 nm. For sample 3.5 obtained by hydrolysis of Ti(i-OC₃H₇)₄ in the presence of acetylacetone, even a more narrow distribution is observed (Figure 6): particles with the size above 10 nm are virtually absent, and prevailing diameter of the particles is equal to 4 nm. After drying and repulping of this sample, dispersion characteristics of the secondary and initial sols are almost identical. No significant changes of the characteristics were observed upon centrifugation of the secondary sol and particles sedimentation.

Figure 4: SAXS histogram of the particle size distribution in amorphous sample obtained by hydrolysis of TiCl₄ in the presence of ammonia.

Figure 5: SAXS histogram of the particle size distribution in brookite sample obtained by hydrolysis of TiCl₄ in cold water.

Figure 6: SAXS histogram of the particle size distribution in anatase samples obtained by hydrolysis of TIP in the presence of acetylacetone: black bars-initial sol after synthesis; grey bars-secondary sol obtained from dry initial sol after repulping in water; white bars-sol obtained from the secondary sol after centrifuging at 3000 rpm.

Hydrolysis of TiCl₄ in cold water and hydrolysis of TIP in acid medium yield highly disperse sols (brookite and anatase forms). However, the need of neutralization of TiO₂ sols to reach the physiological pH (7.2–7.4) not far from its isoelectric point can entail agglomeration of the particles. In experiments with neutralized samples, the SAXS data indicated an increase in the mean diameter of brookite from 2.2 to 4 nm and marginal changes in the size of series 1 and 3 samples (not shown).

It should be noted that due to high resolving power of SAXS method, the obtained data may reflect the size distribution of primary TiO₂ nanoparticles separated by a boundary in the agglomerates. Thus, the question concerning the extent of particles agglomeration in the sols under study and the size of agglomerates still remains problematic.

3.5. DLS

The method of dynamic laser scattering, assessing the modulation frequency of scattered light from moving particles, can determine the hydrodynamic diameter of both the primary particles separated by a disperse medium and the aggregated entities.

Table 2 shows the mean hydrodynamic diameter of different forms of TiO₂ particles before and after their neutralization and cleaning by dialysis. Besides, to conclude more reliably on the presence or absence of TiO₂ particles aggregation in the initial sols, all samples were tested after their ultrasonic treatment (US) at 22 kHz for 10 min. The hydrolysis of TiCl₄ in the presence of alkalies (sample 1.5) yields large TiO₂ agglomerates of the size exceeding 10 μm (Table 2). The ultrasonic treatment decomposes these agglomerates into particles with the size of ca. 200 nm, which in their turn may be the agglomerates of 5-6 nm nanoparticles detected in these samples by SAXS (Table 1). DLS data for brookite well correlate with the XRD and SAXS measurements. This sol consists of small agglomerates with the prevailing size below 20 nm, which separate into 2.2 nm particles under the ultrasonic treatment. Rutile samples showed clear differences between DSL, SAXS, and XRD data: they were composed only from large particles regardless of the treatment conditions. TiO₂ nanoparticles obtained by hydrolysis of titanium tetraisopropoxide have sizes typical of primary particles (3 nm, sample 3.5) or small agglomerates (7–10 nm, samples 3.2, 3.3). Ultrasonic treatment of these samples leads to a minor coarsening of the particles, probably due to an increase of their collision frequency in sols.

Table 2: Hydrodynamic diameters of TiO₂ particles in freshly prepared and neutralized sols.

Samples
Particle size (nm) in fresh sols
Particle size (nm) in neutralized sols

Before US
After US
After US

Amorphous (1.5)
12000
202
200

Brookite (2.1)
20
2.2
50

Rutile (2.2)
1200
1200
1200

Anatase (3.2)
10
12
90

Anatase (3.3)
7
13
40

Anatase (3.5)
3
9
50

A significant increase of hydrodynamic diameters for acid sols of highly disperse brookite and anatase was observed after their neutralization, whereas the large amorphous and rutile particles did not change. Anatase samples 3.3 and 3.5 formed similar agglomerations under neutral conditions (Table 2); however, sample 3.3 seems more attractive for subsequent operations because sample 3.5 contains acetylacetonate groups, which can affect the pattern of nanoparticles interaction with a cell.

3.6. AFM

The results of AFM, which provides visualization of nanoparticles (Figure 7), fully confirmed the data obtained by other methods. AFM images of sample 3.3 (used as example) clearly showed that TiO₂ acid sol (Figures 7(a) and 7(b)) consists of isolated particles with size 5–8 nm, while the neutralized sample consists of small chain-like agglomerates 20–60 nm in size (Figures 7(c) and 7(d)).

(a)

(b)

(c)

(d)

Figure 7: AFM images of anatase sample 3.3: 2D (a) and 3D (b) view of the freshly prepared acid sol; 2D (c) and 3D (d) view of the neutralized sol.

3.7. TEM

Morphology and stability of different TiO₂ forms in a cell culture medium amorphous (1.5), brookite (2.1), rutile (2.3), and anatase (3.3), were studied by transmission electron microscopy using routine dispersion (Figure 8) and ultrathin sections (Figure 9). The first allowed us to see particles of amorphous sample, which earlier were found to be large agglomerates (Figure 8(a)) consisting of the 5–10 nm particles (Figure 8(b)). The samples of brookite (Figure 8(c)) and anatase (Figure 8(e)) were represented by almost rounded nonagglomerated or weakly agglomerated particles with a narrow size distribution. Discrete small particles of brookite 3-4 nm in size and particles of anatase having a 4-5 nm size are presented in Figures 8(d) and 8(f). The rutile particles clearly differed in morphology from others: there were dendrites forming a “fan” of needle crystals 500–1500 nm in length (Figure 8(g)). Planes (110) are marked with an arrow in Figure 8(h). The needle crystals consist of coherently spliced crystallites having the size of 5-6 nm along plane (100) and 4-5 nm along plane (110).

(a)

(b)

(c)

(d)

(e)

(f)

(g)

(h)

Figure 8: HR-TEM micrograph of nanoscale titanium dioxide samples of different structure: amorphous (a, b), brookite (c, d), anatase (e, f), and rutile (g, h). Arrows indicate planes of the aggregate formed by spliced particles. The needle crystals consist of coherently spliced crystallites having the size of 5-6 nm along plane (100) and 4-5 nm along plane (110).

(a)

(b)

(c)

(d)

Figure 9: TEM images of TiO₂ nanoparticles of different crystalline modification in ultrathin sections: amorphous (a), anatase (b), brookite (c), and rutile (d). Ultrathin sections.

Thus, three crystal modifications of TiO₂ (anatase, brookite, and rutile) have similar crystallite sizes (3–5 nm) equal to the particle size of amorphous sample. Although rutile is represented by strongly aggregated particles, diameter of the needle crystals is nanoscale and comparable with the size of other TiO₂ forms.

It was interesting to compare TEM images of nanoscale TiO₂ dispersed on grids and the same particles in ultrathin sections (thickness of a section is 50–60 nm). Nanoscale TiO₂ in ultrathin sections are more distinct, so it was possible to clearly discern single nanoparticles. Thus, amorphous nanoparticles had spherical shape and their size was 4-5 nm; rare particles had the size of 5–10 nm. Particles formed the band-like agglomerations with different electron density depending on the mass of particles in a section (Figures 9(a) and 10(a)). Anatase and brookite nanoparticles had distinct needle-like shapes, each needle lying separately and forming the branched structures that looked as a delicate lace (Figures 9(b), 10(b), 9(c), and 10(c)). Thus, the method of ultrathin sections gave an opportunity to easily recognize the morphology of anatase and brookite single particles and their spatial organization in comparison with dispersion on a grid, which is widely used in nanoparticle studies. Rutile morphology in ultrathin section was identical to those revealed by dispersion method (Figures 9(d) and 10(d)). The dendrites were 4-5 nm in diameter and formed aggregates resembling the palm-leaved or fan-like structures with sizes up to 30–50 nm. The appearance of rutile aggregates depended on the plane of ultrathin section, such aggregates could look formless.

(a)

(b)

(c)

(d)

Figure 10: Interaction of MDCK cells with TiO₂ nanoparticles: amorphous (a), anatase (b), brookite (c), and rutile (d). Inserts show direct contact of the nanoparticles with cell plasma membrane. Ultrathin sections. Transmission electron microscopy.

The morphology and sizes of all the examined forms of nanoscale TiO₂ in ultrathin sections corresponded to those determined by other methods in this work. Our study demonstrated that treatment of the samples for ultrathin sectioning preserves the TiO₂ nanoparticle morphology and the 1 h incubation with living cells has no effect on nanoparticles. It can be concluded that TiO₂ samples prepared in this work are stable enough and the ultrathin sections method can be used successfully for examination of nanoparticle size and morphology. Moreover, it could be particularly useful for studies of very small nanoparticles (less that 5 nm).

3.8. Electron Microscopic Study of Nanoscale TiO₂ Interaction with MDCK Cells

Amorphous TiO₂ nanoparticles in ultrathin sections covered large areas of MDCK cell surface and directly contacted with the cell surface, filled all folds and cavities formed by the cell plasma membrane, and thereby deeply penetrated into the cell after 1 h incubation (Figure 10(a)). More details of the interaction of amorphous and other modifications of TiO₂ nanoparticles with the cell plasma membrane were described elsewhere [43].

Similar to amorphous form, the anatase TiO₂ nanoparticles also penetrated into MDCK cells through folds and invaginations. The bulk of anatase directly contacted with the cell surface via single “needles” (Figure 10(b)). Some anatase nanoparticles entered the cells via the clathrin-mediated (receptor-mediated) endocytosis. The involvement of clathrin-mediated endocytosis in anatase internalization was shown recently by other authors [35, 47, 48]. Exploitation of the endocytosis pathway resulted in anatase accumulation in endosomes and phagosomes after 1 h incubation.

Brookite TiO₂ nanoparticles directly contacted with the plasma membrane via single needles in the same manner as anatase; however, brookite nanoparticles remained on the MDCK cell surface after 1 h incubation (Figure 10(c)). In contrast to amorphous and anatase TiO₂, brookite-treated cells were rounded and did not have invaginations and folds. No brookite nanoparticles were found in endosomes and phagosomes. Many brookite-treated MDCK cells showed pathological changes, which progressed to necrosis. All damaged cells had close contact with brookite nanoparticles, but no nanoparticles were detected inside the cells. There are no publications in relevant literature describing the interaction of brookite TiO₂ nanoparticles with cells or animals. Our study found that the nanoscale brookite possesses properties clearly differing from those of anatase and amorphous TiO₂, despite identical sizes and similar shapes.

Examination of MDCK cells treated with rutile nanoparticles for 1 h revealed aggregations located on the cell surface and in large and small vacuoles (Figure 10(d)). These vacuoles could form by buckling under the weight of rutile or perhaps by active cell uptake. We did not observe any contact of individual rutile particles with the cell surface; this TiO₂ modification interacted with the cells like macroparticles. Rutile caused damage of some MDCK cells; however, their number was incomparably less than in brookite-treated samples.

Thus, the identical size TiO₂ nanoparticles, namely, amorphous, anatase, brookite, and rutile, showed different patterns of interaction with a cell. Incubation of MDCK cells with these nanoparticles for 3 and 5 h did not change the patterns; meanwhile, amorphous and anatase nanoparticles accumulated inside cells. Most of brookite-treated cells showed no signs of nanoparticles internalization after 3 h incubation, whereas few cells had small surface folds and invaginations containing the nanoparticles. Nanoparticles lying inside the invaginations were located closer to each other as compared to those lying outside the cells; nevertheless, there was no agglutination of the needles. MDCK cells penetrated with folds and invaginations containing the nanoparticles increased in number after 5 h incubation, whereas about 50% of the cells maintained their structure and did not internalize the nanoparticles.

Incubation of MDCK cells with all studied modifications of TiO₂ nanoparticles for 3 and 5 h resulted in a definite increase of the number of damaged cells. Toxic effects of these nanoscale TiO₂ modifications on cells and their discussion were reported earlier [43].

Our study clearly demonstrated that transmission electron microscopy of ultrathin sections is a good tool to examine the interaction of individual nanoparticles with cells and evaluate their effects. We observed the direct contact of single TiO₂ nanoparticles with the cell surface and the effect of nanoparticle modification on the nature of such contact. This means that nanoscale nonorganic substances are able to affect directly the cell functions probably due to their extremely close nanoscale contact with the cells. Distinct differences in cell response to different TiO₂ nanoparticles could be attributed to two main factors. First, direct contact of amorphous, anatase, and brookite individual nanoparticles with the cell plasma membrane may alter its function by a simple mechanical binding to membrane macromolecules. Thus, contact with brookite could decrease the liquidity of the cell plasma membranes; they become “hardened” and unable to form invaginations. Amorphous and anatase TiO₂ nanoparticles are likely to increase the liquidity of cell plasma membrane, allowing it to readily form deep invaginations providing the penetration of nanoparticles into the cell.

Another mechanism of cell plasma membrane alteration could be related to chemical interaction between its macromolecules and TiO₂ nanoparticles, which are able to generate free radicals, including oxygenated free radicals , , , and carbon-centered radicals, causing cleavage of C–H bonds in organic molecules. These reactions can occur even in the dark and serve as the first step of oxidative damage of biological molecules [49, 50]. The possibility of direct chemical interaction of TiO₂ with the cell membrane molecules also cannot be excluded.

Different modifications of TiO₂ can induce different chemical reactions, thus leading to different alterations in macromolecular structure of the cell membrane. We believe that direct contact of TiO₂ nanoparticles with the cell plasma membrane is the primary and basic step of cell damage, operating for all modifications of nanoparticles whose sizes allow direct contact with the membrane. Pathological changes found in MDCK cells treated with TiO₂ nanoparticles represent an impairment of the water-ion balance, which could be the first consequence of plasma membrane damage by TiO₂ nanoparticles and the start of alterations in other cellular pathways. The features of the interaction of TiO₂ nanoparticles having different crystalline modifications with the cells identified in our work indicate the need of careful selection of the type of nanoparticles for construction of the means to influence a living cell, in particular for the delivery of biologically active substances.

Thus, our study demonstrated that crystalline modification of nanoscale TiO₂ can determine the pattern of cell response to the treatment. This is the first direct evidence in favor of the early proposed statement that nanosizes and nanodistances could generate principally new types of cell responses to inorganic substances.

4. Summary

We synthesized nanoscale TiO₂ sols with different textural and structural-dispersion characteristics of nanoparticles by varying the nature of TiO₂ precursor and conditions of hydrolysis and made their comparative analysis using a set of physicochemical methods. pH of the medium and temperature were shown to be the key factors determining the formation of TiO₂ structure during hydrolysis of TiO₂ precursor. The selected methods of synthesis make it possible to prepare the amorphous, anatase, brookite, and rutile modifications of TiO₂ nanoparticles with prevailing diameter 3–5 nm. All modifications of TiO₂ nanoparticles have similar dispersion and morphological characteristics (apart from rutile), which do not change in a cell culture medium. A comparison of the particle size measured by XRD, SAXS, DLS, AFM, and HR-TEM showed good agreement between data obtained by these methods. The data are complementary and provide comprehensive and reliable information on the particle size and morphological features.

Electron microscopy of ultrathin sections of MDCK cells incubated with different forms of TiO₂ nanoparticles revealed the direct contact of single amorphous, anatase, and brookite nanoparticles with the cell surface and subsequent different cell responses to the treatment. The TiO₂ modification determines the pattern of cell reaction to the nanoparticles. Direct contact of amorphous, anatase, and brookite single nanoparticles with the cell plasma membrane could alter its function by a simple mechanical binding to membrane macromolecules. However, the influence of TiO₂ nanoparticles on cell functions is related most likely to the chemical reactions between the particles and cell membrane macromolecules. We suppose that direct contact of the nanoparticles with cell plasma membrane is the primary and critical step of their interaction, which determines a subsequent response of the cell.

Acknowledgments

This paper was prepared with financial support from the Russian Foundation for Basic Research (Project no. 11-04-01408), Siberian Branch of the Russian Academy of Sciences (Integration Project no. 61), and Programs of the Ministry for Education and Science of the Russian Federation (Projects no. 2.1.1/5642 and no. 16.512.11.2267). Authors thank S. I. Moseenkov and K. V. Obida for DLS and SAXS measurements.

References

T. Moritz, J. Reiss, K. Diesner, D. Su, and A. Chemseddine, “Nanostructured crystalline TiO₂ through growth control and stabilization of intermediate structural building units,” The Journal of Physical Chemistry B, vol. 101, no. 41, pp. 8052–8053, 1997.

J. Karch, R. Birringer, and H. Gleiter, “Ceramics ductile at low temperature,” Nature, vol. 330, no. 6148, pp. 556–558, 1987.

M. R. Hoffmann, S. T. Martin, W. Choi, and D. W. Bahnemann, “Environmental applications of semiconductor photocatalysis,” Chemical Reviews, vol. 95, no. 1, pp. 69–96, 1995.

A. Fujishima and K. Honda, “Electrochemical photolysis of water at a semiconductor electrode,” Nature, vol. 238, no. 5358, pp. 37–38, 1972.

M. A. Fox and M. T. Dulay, “Heterogeneous photocatalysis,” Chemical Reviews, vol. 93, no. 1, pp. 341–357, 1993.

R. J. Gonzalez, R. Zallen, and H. Berger, “Infrared reflectivity and lattice fundamentals in anatase TiO₂,” Physical Review B, vol. 55, no. 11, pp. 7014–7017, 1997.

K.-N. P. Kumar, K. Keizer, and A. J. Burggraaf, “Textural evolution and phase transformation in titania membranes: part 1. unsupported membranes,” Journal of Materials Chemistry, vol. 3, no. 11, pp. 1141–1149, 1993.

R. Wang, K. Hashimoto, A. Fujishima et al., “Light-induced amphiphilic surfaces,” Nature, vol. 388, no. 6641, pp. 431–432, 1997.

Y. Qiao, S.-J. Bao, C. M. Li, X.-Q. Cui, Z.-S. Lu, and J. Guo, “Nanostructured polyaniline/titanium dioxide composite anode for microbial fuel cells,” ACS Nano, vol. 2, no. 1, pp. 113–119, 2008.

G. J. de, E. L. Crepaldi, D. Grosso, and C. Sanchez, “Block copolymer-templated mesoporous oxides,” Current Opinion in Colloid and Interface Science, vol. 8, no. 1, pp. 109–126, 2003.

E. M. Ophus, L. E. Rode, B. Gylseth, G. Nicholson, and K. Saeed, “Analysis of titanium pigments in human lung tissue,” Scandinavian Journal of Work, Environment & Health, vol. 5, no. 3, pp. 290–296, 1979.

R. C. Lindenschmidt, K. E. Driscoll, M. A. Perkins, J. M. Higgins, J. K. Mourer, and K. A. Belfiore, “The comparison of a fibrogenic and two non-fibrogenic dusts by bronchoalveolar lavage,” Toxicology and Applied Pharmacology, vol. 102, no. 2, pp. 268–281, 1990.

J.-W. Seo, H. Chung, M.-Y. Kim, I.-H. Choi, and J. Cheon, “Development of water-soluble single-crystalline TiO₂ nanoparticles for photocatalytic cancer-cell treatment,” Small, vol. 3, no. 5, pp. 850–853, 2007.

Y. Harada, K. Ogawa, Y. Irie et al., “Ultrasound activation of TiO₂,” Journal of Controlled Release, vol. 149, no. 2, pp. 190–195, 2011.

A. P. Zhang and Y. P. Sun, “Photocatalytic killing effect of TiO₂ nanoparticles on Ls-174-t human colon carcinoma cells,” World Journal of Gastroenterology, vol. 10, no. 21, pp. 3191–3193, 2004.

B. J. Jones, M. J. Vergne, D. M. Bunk, L. E. Locascio, and M. A. Hayes, “Cleavage of peptides and proteins using light-generated radicals from titanium dioxide,” Analytical Chemistry, vol. 79, no. 4, pp. 1327–1332, 2007.

G. Gogniat and S. Dukan, “TiO₂ photocatalysis causes DNA damage via Fenton reaction generated hydroxyl radicals during recovery period,” Applied and Environmental Microbiology, vol. 73, no. 23, pp. 7740–7743, 2007.

N. A. Mazurkova, Y. E. Spitsyna, N. V. Shikina, Z. R. Ismagilov, S. N. Zagrebel'nyi, and E. I. Ryabchikova, “Interaction of titanium dioxide nanoparticles with influenza virus,” Nanotechnologies in Russia, vol. 5, no. 5-6, pp. 417–420, 2010.

T. Paunesku, T. Rajh, G. Wiederrecht, et al., “Biology of TiO₂-oligonucleotide nanocomposites,” Nature Materials, vol. 2, no. 5, pp. 343–346, 2003.

T. Paunesku, S. Vogt, B. Lai, et al., “Intracellular distribution of TiO₂−DNA oligonucleotide nanoconjugates directed to nucleolus and mitochondria indicates sequence specificity,” Nano Letters, vol. 7, no. 3, pp. 596–601, 2007.

V. F. Zarytova, V. V. Zinoviev, Z. R. Ismagilov, et al., “An examenation of the ability of titanium dioxide nanoparticles and its conjugates with oligonucleotides to penetrate into eucariotis cells,” Nanotechnologies in Russia, vol. 4, no. 9-10, pp. 732–735, 2009.

K. P. Lee, H. J. Trochimowicz, and C. F. Reinhardt, “Pulmonary response of rats exposed to titanium dioxide (TiO₂) by inhalation for two years,” Toxicology and Applied Pharmacology, vol. 79, no. 2, pp. 179–192, 1985.

K. P. Lee, W. H. Henry III, H. J. Trochimowicz, and C. F. Reinhardt, “Pulmonary response to impaired lung clearance in rats following exessive TiO₂ dust deposition,” Environmental Research, vol. 41, no. 1, pp. 144–167, 1986.

L. E. Rode, E. M. Ophus, and B. Gilseth, “Massive pulmonary deposition of rutile after titanium dioxide exposure,” Acta Pathologica et Microbiologica Scandinavica Section A Pathology, vol. 89, no. 6, pp. 455–461, 1981.

D. B. Warheit, T. R. Webb, K. L. Reed, S. Frerichs, and C. M. Sayes, “Pulmonary toxity study in rats with three forms of ultrafine-TiO₂ particles: differential responses related to surface properties,” The Journal of Toxicological Sciences, vol. 77, pp. 347–357, 2004.

D. B. Warheit, T. R. Webb, K. L. Reed, S. Frerichs, and C. M. Sayes, “Pulmonary toxicity study in rats with three forms of ultrafine-TiO₂ particles: differential responses related to surface properties,” Toxicology, vol. 230, no. 1, pp. 90–104, 2007.

J. R. Gurr, A. S. Wang, C. H. Chen, and K. Y. Jan, “Ultrafine titanium dioxide particles in the absence of photoactivation can induce oxidative damage to human bronchial epithelial cells,” Toxicology, vol. 213, no. 1-2, pp. 66–73, 2005.

G. C. M. Falck, H. K. Lindberg, S. Suhonen et al., “Genotoxic effects of nanosized and fine TiO₂,” Human and Experimental Toxicology, vol. 28, no. 6-7, pp. 339–352, 2009.

J. J. Wang, B. J. Sanderson, and H. Wang, “Cyto- and genotoxicity of ultrafine TiO₂ particles in cultured human lymphoblastoid cells,” Mutation Research, vol. 628, no. 2, pp. 99–106, 2007.

C. Jin, Y. Tang, F. G. Yang et al., “Cellular toxicity of TiO₂ nanoparticles in anatase and rutile crystal phase,” Biological Trace Element Research, vol. 141, no. 1–3, pp. 3–15, 2011.

A. Nel, T. Xia, L. Madler, and N. Li, “Toxic potential of materials at the nanolevel,” Science, vol. 311, no. 5761, pp. 622–627, 2006.

T. Xia, M. Kovochich, J. Brant et al., “Comparison of the abilities of ambient and manufactured nanoparticles to induce cellular toxicity according to an oxidative stress paradigm,” Nano Letters, vol. 6, no. 8, pp. 1794–1807, 2006.

Y. Duan, J. Liu, L. Ma et al., “Toxicological characteristics of nanoparticulate anatase titanium dioxide in mice,” Biomaterials, vol. 31, no. 5, pp. 894–899, 2010.

J. X. Wang, G. Q. Zhou, C. Y. Chen et al., “Acute toxicity and biodistribution of different sized titanium dioxide particles in mice after oral administration,” Toxicology Letters, vol. 168, no. 2, pp. 176–185, 2007.

S. M. Hussain, L. K. Braydich-Stolle, A. M. Schrand et al., “Toxicity evaluation for safe use of nanomaterials: recent achievements and technical challenges,” Advanced Materials, vol. 21, no. 16, pp. 1549–1559, 2009.

R. Landsiedel, L. Ma-Hock, A. Kroll et al., “Testing metal-oxide nanomaterials for human safety,” Advanced Materials, vol. 22, no. 24, pp. 2601–2627, 2010.

P. Bihari, M. Vippola, S. Schultes et al., “Optimized dispersion of nanoparticles for biological in vitro and in vivo studies,” Particle and Fibre Toxicology, vol. 5, article 14, 2008.

R. C. Murdock, L. Braydich-Stolle, A. M. Schrand, J. J. Schlager, and S. M. Hussain, “Characterization of nanomaterial dispersion in solution prior to in vitro exposure using dynamic light scattering technique,” Toxicological Sciences, vol. 101, no. 2, pp. 239–253, 2008.

Z. R. Ismagilov, L. T. Tsikoza, N. V. Shikina, V. F. Zarytova, V. V. Zinoviev, and S. N. Zagrebelnyi, “Synthesis and stabilization of nano-sized titanium dioxide,” Russian Chemical Reviews, vol. 78, no. 9, pp. 873–885, 2009.

C. Y. Jin, B. S. Zhu, X. F. Wang, and Q. H. Lu, “Cytotoxicity of titanium dioxide nanoparticles in mouse fibroblast cells,” Chemical Research in Toxicology, vol. 21, no. 9, pp. 1871–1877, 2008.

B. L'Azou, J. Jorly, D. On et al., “In vitro effects of nanoparticles on renal cells,” Particle and Fibre Toxicology, vol. 5, article 22, 2008.

W. Vevers and N. Awadhesh, “Genotoxic and cytotoxic potential of titanium dioxide (TiO₂) nanoparticles on fish cells in vitro,” Ecotoxicology, vol. 17, no. 5, pp. 410–420, 2008.

E. I. Ryabchikova, N. A. Mazurkova, N. V. Shikina, and Z. R. Ismagilov, “The cristalline forms of titanium dioxide nanoparticles affect their interactions with individual cells,” Journal of Medical Chemical, Biological and Radiological Defense, vol. 8, 2010, http://www.jmedcbr.org/issue_0801/Ryabchikova/Ryabchikova_Nano_10_2010.pdf

T. Matsunaga, R. Tomoda, T. Nakajima, and H. Wake, “Photoelectrochemical sterilization of microbial cells by semiconductor powders,” FEMS Microbiology Letters, vol. 29, no. 1-2, pp. 211–214, 1985.

C. J. Doss and R. Zallen, “Raman studies of sol-gel alumina: finite-size effect in nano crystallline aluminium oxide hydroxide (AlO(OH)),” Physical Review B, vol. 48, pp. 15626–15637, 1993.

F. V. Tuzikov, V. V. Zinoviev, V. I. Vavilin, and E. G. Malygin, “Application of the small-angle X-ray scattering technique for the study of two-step equilibrium enzyme-substrate interactions,” Biopolymers, vol. 38, no. 2, pp. 131–139, 1996.

H. Zhou, A. Imrich, and L. Kobzik, “Characterization of immortalized MARCO and SR-AI/II-deficient murine alveolar macrophage cell lines,” Particle and Fibre Toxicology, vol. 5, article 7, 2008.

S. A. Thakur, R. Hamilton Jr., T. Pikkarainen, and A. Holian, “Differential binding of inorganic particles to MARCO,” Toxicological Sciences, vol. 107, no. 1, pp. 238–246, 2009.

X. Chen and S. S. Mao, “Titanium dioxide nanomaterials: synthesis, properties, forms, and applications,” Chemical Reviews, vol. 107, no. 7, pp. 2891–2959, 2007.

I. Fenoglio, G. Greco, S. Livraghi, and B. Fubini, “Non-UV-induced radical reactions at the surface of Tio₂ nanoparticles that may trigger toxic responses,” Chemistry, vol. 15, no. 18, pp. 4614–4621, 2009.