The Scientific World JournalVolume 2012 (2012), Article ID 708213, 6 pagesdoi:10.1100/2012/708213

Research Article

Removal Efficiency of Cr⁶⁺ by Indigenous Pichia sp. Isolated from Textile Factory Effluent

Pablo M. Fernández,¹ María M. Martorell,¹ Julia I. Fariña,¹ and Lucia I. C. Figueroa1,2

¹Planta Piloto de Procesos Industriales Microbiológicos PROIMI-CONICET, Avenida Belgrano y Caseros, Tucumán T4001MVB, Argentina²Microbiología Superior, Facultad de Bioquímica, Química y Farmacia, Universidad Nacional de Tucumán UNT, Tucumán 4000, Argentina

Received 13 October 2011; Accepted 24 November 2011

Academic Editors: A. Akcil and M. C. Yebra-Biurrun

Copyright © 2012 Pablo M. Fernández et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Resistance of the indigenous strains P. jadinii M9 and P. anomala M10, to high Cr⁶⁺ concentrations and their ability to reduce chromium in culture medium was studied. The isolates were able to tolerate chromium concentrations up to 104 μg mL⁻¹. Growth and reduction of Cr⁶⁺ were dependent on incubation temperature, agitation, Cr⁶⁺ concentration, and pH. Thus, in both studied strains the chromium removal was increased at C with agitation. The optimum pH was different, with values of pH 3.0 and pH 7.0 in the case of P. anomala M10 and pH 7.0 using P. jadinii M9. Chromate reduction occurred both in intact cells (grown in culture medium) as well as in cell-free extracts. Chromate reductase activity could be related to cytosolic or membrane-associated proteins. The presence of a chromate reductase activity points out a possible role of an enzyme in Cr⁶⁺ reduction.

1. Introduction

Heavy metals found in wastewaters are harmful to the environment and their effects on biological systems are very severe. Chromium is one of the most widely used metals in industry, such as steel production, alloy preparation, wood preservation, leather tanning, metal corrosion inhibition, paints pigments, metal plating, tanning, and other industrial applications [1]. Chromium exists in several oxidation states from Cr²⁺ to Cr⁶⁺. In nature, trivalent and hexavalent forms are the dominant oxidation states. The toxicity of chromium is dependent on its oxidation state, Cr³⁺ is rather benign and easily adsorbed in soils and waters; whereas Cr⁶⁺, which is the toxic form, is not readily adsorbed and is soluble [2]. Thus, Cr⁶⁺, a carcinogenic element, is highly toxic to all forms of life but Cr³⁺, an essential micronutrient for many higher organisms, is relatively insoluble in water and 100 times less toxic than Cr⁶⁺ [3]. Chromium hexavalent toxicity is believed to be caused by the negatively charged chromate oxyanion, which can be easily transported into microbial cells. Once inside the cells, the oxyanion is believed to undergo immediate reduction reactions leading to the formation of various reactive intermediates, which are harmful to the cell organelles, proteins, and nucleic acids [4].

For that reason, it is important to develop an innovative, low cost, and ecofriendly method for the toxic heavy metal removal from the wastewater, instead of the conventional physical-chemical ones [1, 5]. Several microorganisms have the exceptional ability to adapt to and colonize the noxious metal-polluted environments. These microorganisms have developed the capabilities to protect themselves from heavy metal toxicity by various mechanisms such as adsorption, uptake, methylation, oxidation, and reduction.

Yeasts are known for playing an important role in the removal of toxic heavy metals [4, 6, 7]. Furthermore, the occurrence of indigenous Cr⁶⁺ reducing eukaryotic microorganisms, including those not related with Cr⁶⁺ contamination, has emerged as an important nonconventional yeasts-based bioremediation method with significant biological relevance and biotechnological applications.

Microbial Cr⁶⁺tolerance and Cr⁶⁺reduction are independent events. However, for the Cr⁶⁺-reduction cells must tolerate Cr⁶⁺, otherwise the cell growth is inhibited. Some authors argue that the microbial reduction of Cr⁶⁺ can be considered as an additional mechanism of resistance to chromate, which is usually not encoded in plasmids [8]. The enzymatic biospeciation of Cr⁶⁺ to Cr³⁺ with eukaryotic microorganisms was reported in Candida maltose [9], C. utilis [10], fungi Hypocrea tawa [11], and Aspergillus [12]. But it was not possible to continue with the purification and characterization of the protein involved, therefore available information is scarce. In this context, the study of specific chromate reductases is meaningful to understand the cellular mechanisms in future bioremediation processes.

The present study deals with the ability of P. jadinii M9 and P. anomala M10 to grow and remove chromium in batch cultures and using cell-free extracts. The effects of different factors on Cr⁶⁺ removal, including pH, temperature, agitation, and initial Cr⁶⁺ concentration were also considered and optimum removal parameters were established.

2. Materials and Methods

2.1. Yeast Strains and Culture Conditions

Chromate-resistant yeasts Pichia jadinii M9 and Pichia anomala M10, previously isolated from textile factory effluents (Tucumán, Argentina) were used [13]. For the inocula, the yeast strains were grown in 500 mL-Erlenmeyer flasks containing 100 mL of Czapek malta medium using methodology described by Fernández et al. [13].

Chromium removal experiments were performed using YNB’ medium amended with Cr⁶⁺ and inoculated with a constant biomass. YNB’ medium was chosen based on previous assays that confirmed lower interferences of this medium during Cr-bioremediation and Cr⁶⁺-quantification by 1,5-diphenylcarbazide (DPC) [14]. YNB’ composition (in g L⁻¹) was 10 × yeast nitrogen base (YNB w/o amino acids and ammonium sulfate; Difco), 10% (v v⁻¹); sucrose, 50; ammonium sulfate, 0.6; pH 5.0. All the experimental sets were performed on a rotary shaker (250 rev min⁻¹) at 25°C in 250 mL Erlenmeyer flasks containing 50 mL of culture medium, unless otherwise stated.

The Cr⁶⁺ (as K₂Cr₂O₇ or K₂CrO₄) stock solution (5,200 μg mL⁻¹) was prepared in bidistilled water and filter-sterilized (0.2 μm-cellulose acetate membrane filter; Sartorius).

2.2. Effect of Cr⁶⁺ on Yeasts Growth

Chromate resistance test and growth curves were determined in YNB’ medium supplemented with the desired Cr⁶⁺ concentration and without chromium (control). Growth was monitored at specific time intervals by biomass dry weight (BDW). Samples from culture were spun down at 10,000× g for 10 min. The distilled water suspended pellet was filtered through a 0.45 μm cellulose acetate membrane filter (Sartorius) and dried at 85°C until constant weight to determine BDW in g L⁻¹ [13]. For determination of Cr⁶⁺ concentration, a miniaturized protocol was developed as follows: to 50 μL of sample supernatant, 50 μL of 0.2 N H₂SO₄ were added and the volume was made up to 2 mL with distilled water. After mixing with 40 μL of 5 mg DPC mL⁻¹ acetone, the mixture was allowed to stand for 10 min and spectrophotometric determinations were performed at 540 nm (Beckman DU640) against a reagent blank. Cr⁶⁺ concentrations were quantified by the use of an external K₂Cr₂O₇ standard with a 7-point calibration curve [14].

2.3. Factors Affecting Cr⁶⁺ Removal

To characterize the Cr⁶⁺-reduction efficiency by strains M9 and M10, the effects of temperature (10, 20, 25, 30°C), initial pH (3.0, 5.0, 7.0, 9.0), agitation (0, 150, 250 rev min⁻¹), and initial Cr⁶⁺ concentration (26–104 μg mL⁻¹) were investigated. Cr⁶⁺ reduction was studied in aerobic batch cultures. The following set of standard conditions was chosen as the starting point: 52 μg mL⁻¹ of initial Cr⁶⁺ concentration, pH 5.0, 25°C and 250 rev min⁻¹. Samples were withdrawn at defined times and analyzed for disappearance of Cr⁶⁺ as described above. In order to monitor any abiotic Cr⁶⁺ reduction, cell-free control experiments were carried out for each assayed condition.

2.4. Preparation of Cell-Free Extract and Enzymatic Determinations

To prepare the crude cell-free extract, the yeast cultures were grown in 200 mL YNB’ medium for 48 h at 25°C with 52 μg mL⁻¹ Cr⁶⁺ and without chromium (control). Cells were harvested by centrifugation at 10,000 ×g for 10 min. Pellets were washed twice with 50 mM phosphate-citrate buffer (pH 5.0) and suspended in the same buffer with protease inhibitor cocktail (SET1; Calbiochem) plus a volume of sterilized glass beads. Cells were disrupted by sonication for 5 min in cold environment conidtions (5 cycles: 59 seg on, 30 seg off; Sonics Vibra Cell VCX 130). The homogenate was centrifuged at 10,000 ×g for 10 min at 4°C to remove cell walls and unbroken cells. The supernatant filtered through a 0.2 μm cellulose acetate membrane filter was used as a crude extract and called cell-free extract (CFE). Decrease of chromate concentration by CFE was assayed after 30 min at 30°C using 50 μL of sample preparation in 0.25 mL reaction mixtures containing (to a final concentration): 50 mM phosphate-citrate buffer (pH 5.0), 26 μg mL⁻¹ K₂CrO₄, 1 mM NADH; these concentrations were saturating and noninhibitory under these conditions. The reaction was started by addition of chromate to the reaction mixture. Hexavalent chromium was spectrophotometrically quantified, as previously described. Protein was determined using Bicinchoninic Acid Kit (BCA, Sigma), with BSA as standard.

3. Results and Discussion

3.1. Effect of Initial Cr⁶⁺ Concentration on Cells Growth

Cr⁶⁺ resistance of P. jadinii M9 and P. anomala M10 was evaluated by growth response of the strains under different concentrations of Cr⁶⁺. Growth curves of yeast isolates with or without Cr⁶⁺ were plotted (Figures 1(a), 1(b)). The cells grew well in the medium with a range of initial Cr⁶⁺ concentration of 26–104 μg mL⁻¹. However, the growth curves of P. jadinii M9 and P. anomala M10 in the medium containing Cr⁶⁺ did not follow the same growth pattern as the control, indicating a possible toxic effect of Cr⁶⁺ on the cells. It was obvious that the growth of cells was heavily influenced by Cr⁶⁺ at a concentration of 104 μg mL⁻¹ (biomass concentration drop a 63% and 56% for P. jadinii M9 and P. anomala M10, resp.), but it did not suppressed the cells growth. The experiments conducted with Cr⁶⁺ concentrations of 26, 52, 78 μg mL⁻¹ had only slight effects on the growth (Figures 1(a), 1(b)). The P. jadinii M9 and P. anomala M10 strains completely reduced all Cr⁶⁺ concentrations tested; thus, overall efficiency of Cr⁶⁺ reduction (100%) was not affected by initial Cr⁶⁺ concentration. The highest concentration of Cr⁶⁺ (104 μg mL⁻¹) that allowed growth and was completely reduced by P. jadinii M9 and P. anomala M10 was much higher than concentrations commonly found to be reduced by bacteria [15], yeasts [9], and filamentous fungi [16]. However, it is important to consider that the microbial chromate-resistance and chromate-reduction parameters are correlated with medium composition and cell density [13]. The real toxicity of Cr⁶⁺ could be masked or underestimated due to complexation of Cr⁶⁺ with organic components. The minimal medium used in our study eliminated/minimized the possible complexation of Cr⁶⁺ with media components and allowed the assessment of the toxicity of Cr⁶⁺ more accurately.

(a)

(b)

Figure 1: Growth curves of P. jadinii M9 (a) and P. anomala M10 (b) at varying Cr⁶⁺ concentrations as K₂Cr₂O7.

In both strains, it was observed that, although residual Cr⁶⁺ concentration decreased as incubation progressed, total chromium in solution remained virtually constant (data not showed, Fernández et al., unpublished) and chromium did not accumulate in the cell, which indicates that P. jadinii M9 and P. anomala M10 were able to reduce chromium to forms of lower valency. Taking into consideration that the more stable forms of chromium are the trivalent and hexavalent ones [17], it seems most likely that the M9 and M10 strains were capable of transforming the highly toxic and soluble hexavalent chromium to the less toxic and mobile trivalent form.

Hexavalent chromium reduction potential of P. jadinii M9 and P. anomala M10 was assessed with two kinds of Cr⁶⁺ salts, K₂CrO₄ (chromate), and K₂Cr₂O₇ (dichromate). Cr⁶⁺ (at initial concentration of 52 μg mL⁻¹) was reduced up to 100% by both strains within 48 h (Figure 2). Importantly, Cr⁶⁺ occurs in aquatic environment either as or [18] and the strains used in this study were able to reduce both forms of hexavalent chromium.

Figure 2: Cr⁶⁺-removal yield by P. jadinii M9 and P. anomala M10 exposed to different forms of Cr⁶⁺ (chromate: and dichromate: ) at 52 μg mL⁻¹ initial Cr⁶⁺ concentration during 48 h.

3.2. Factors Affecting Cr⁶⁺ Reduction

The effect of initial Cr⁶⁺ concentration on Cr⁶⁺ reduction was investigated over a range of 26–104 μg mL⁻¹ under aerobic conditions. As shown in Table 1, Cr⁶⁺ reduction occurred even at the highest concentration of 104 μg mL⁻¹, and the time taken for total reduction of Cr⁶⁺ increased with increasing concentration of Cr⁶⁺. Complete Cr⁶⁺ reduction was observed at 96 and 72 h, for P. jadinii M9 and P. anomala M10, respectively. Megharaj et al. [19] also observed that the time required for total Cr⁶⁺ reduction increased with increasing initial Cr⁶⁺ concentration. The Pseudomonad strain CRB5 showed complete reduction of 20 μg mL⁻¹ of chromate after 120 h [18], whilst B. sphaericus AND303 failed to completely reduce 10 μg mL⁻¹ of Cr⁶⁺ [20].

Table 1: The effect of factors on Cr⁶⁺ removal, including pH, temperature, agitation, and initial Cr⁶⁺ concentration.

Parameters
Time for complete Cr⁶⁺ removal (h)

Strains

Initial Cr⁶⁺ concentration (μg mL⁻¹)
P. jadinii M9
P. anomala M10

26
12
8

52
48
24

78
48
48

104
96
72

Temperature (°C)

10
+120
72

20
48
24

25
48
24

30
24
8

Agitation (rev min⁻¹)

0
48
72

150
48
24

250
48
24

pH

3
+120
8

5
48
24

7
12
12

9
+120
48

Reference +120: complete Cr⁶⁺ removal was not achieved after 120 h culture.

Initial culture medium pH was considered as a relevant factor for growth and Cr⁶⁺ removal by strains M9 and M10. The time required for complete removal of Cr⁶⁺ in every experimental set is listed in Table 1. The optimum pH for the strain P. jadinii M9 was pH 7.0. In the case of P. anomala M10, the optimum pH for Cr⁶⁺ reduction was pH 3.0. Nonetheless, strain M10 was also capable of reducing Cr⁶⁺ in the range of 3.0–9.0 with an appreciable efficiency at neutral pH. Some authors have reported that reduction of chromium in various fungal strains, such as Rhizopus nigricans [21], R. arrhizus [22], and Mucor hiemalis [23] occurred at pH 2.0-3.0. It is known that a drop in pH causes the protonation of the adsorbent surface, inducing a strong attraction of negatively charged Cr⁶⁺-ions. Accordingly, biosorption increased with increasing acidity of the solution. The opposite would occur with increasing pH, inducing changes in the adsorbent surface, thereby preventing the Cr⁶⁺-ion biosorption. On the other side, Farrell and Ranallo [24] noted that in enzymatic Cr⁶⁺ reduction, changes in pH affect the degree of enzyme ionization, with protein conformation and enzyme activity modifications. This would explain why the acidity is not absolutely critical for a better Cr⁶⁺ removal. Related, P. anomala M10 showed two optimum pH values. The lowest (pH 3.0) could be related to stimulation of the biosorption phenomena, while pH 7.0 could be linked to improved enzymatic Cr⁶⁺ reduction. No measurable changes in Cr⁶⁺ concentrations were detected after 120 h of incubation in cell-free controls at the different pH values assayed. These results suggest that Cr⁶⁺ removal by medium components was not significant in these experiments and also indicate that Cr⁶⁺ reduction observed in the Cr⁶⁺ removal experiments conducted with cells was not due to the pH changes that occurred as result of metabolic activity of the growing cells.

Temperature was also an important factor on microbial Cr⁶⁺ removal. Chromate removal, by strains P. jadinii M9 and P. anomala M10 was evaluated under four different temperatures: 10, 20, 25, and 30°C for 120 h. These strains reduced Cr⁶⁺ in the culture medium more rapidly with an increment in temperature, with an optimum value of 30°C, as shown in Table 1. Generally, an increase in temperature increases the Cr⁶⁺-removal rate and reduces the contact time required for metal-removal, which is due to a direct increase in the rate of redox reaction [25]. Similarly, the optimum temperature for Cr⁶⁺ reduction by Bacillus sp. [26] and Pseudomonad strain CRB5 was 30°C [27].

The results of shaken versus stationary cultures are presented in Table 1. Generally, Cr⁶⁺ removal was enhanced by shaking the cultures, but strains P. jadinii M9 and P. anomala M10 could achieve a complete removal (100%) of the metal, both at stationary and shaken states. The aeration and the cell/metal contact are directly related to the removal of it. However, the alternative to remediate Cr⁶⁺ without agitation is particularly important for in situ bioremediation applications and may represent a valuable advantage from the economic point of view.

3.3. Chromate Reduction by Cell-Free Extract (CFE)

Yeast cells recovered from cultures grown in the presence of 52 μg mL⁻¹ of Cr⁶⁺ and without Cr⁶⁺ (control) were tested for chromate reductase activity. The concentration of protein obtained in CFE from cultures with Cr⁶⁺ was two times higher than the control ones (Figure 3(a)). The chromate reductase specific activity in the CFE of P. jadinii M9 was higher in cultures with Cr⁶⁺, which could be interpreted as an induction by the metal present in the culture medium. In the case of P. anomala M10, there were no significant differences in chromate reductase specific activity between the different CFEs (Figure 3(b)). Das and Chandra [28] studied a strain of Streptomyces sp. M3 and noticed an increase in the chromate reductase activity when working in cultures with Cr⁶⁺. These same authors found that enzyme-expression was constitutive. Chromate reductase enzymes with constitutive expression were also discovered in Bacillus species [29, 30]. In the case of constitutive expression, it could be possible that the activity was not specific for this metal and, therefore, normally expressed in cells. It could also take place by induction of some other components of the culture medium with or without Cr⁶⁺. Kwak et al. [31] reported the presence of chromate reductase activity in V. harveyi, which also had nitroreductase activity. In P. denitrificans, the iron reductase (Ferb) also showed chromate reductase activity [32].

(a)

(b)

Figure 3: Total proteins (a) and chromate reductase-specific activity (b) in cell-free extract of P. jadinii M9 and P. anomala M10 grown with or without Cr⁶⁺. The reaction was started by addition of chromate, and the mixture was incubated at 30°C for 30 min.

It is important to point out that the specific chromate reductase activity in the cells from cultures with Cr⁶⁺ could be masked by an increase in the concentration of other proteins not related with the metal reduction. That could be happening in the case of P. anomala M10 (Figure 3(b)). This protein could be part of a protective mechanism in response to the stress suffered in the presence of Cr⁶⁺. However, to date most of the proteins that undergo changes in presence of Cr⁶⁺ have not yet been identified, and therefore, its particular function could not be determined.

These data indicate that the chromate reductase activity present in CFE of P. jadinii M9 and P. anomala M10 could be related with cytosolic or associated membrane proteins, which in this respect resembles the activity found in chromate-resistant bacteria [30], and Candida maltosa RR1 [9].

4. Conclusions

Environmental isolates P. jadinii M9 and P. anomala M10 can be exploited for bioremediation of hexavalent chromium, since they are chromate-resistant yeasts and possess the capability to reduce the toxic hexavalent form to its nontoxic trivalent form. The results obtained may provide useful information for the removal of chromate under a wide range of environmental conditions. Systematic studies are needed to determine the real nature of activities so far called as chromate reductases. A future communication will deal with the chromate reductase activities characterization. This information will greatly facilitate the use of the involved proteins to enhance the chromate remediation potential of P. jadinii M9 and P. anomala M10.

Acknowledgments

Financial support was provided by Agencia Nacional de Promoción Científica y Tecnológica-FONCYT (PICT-2007-568 Préstamo BID) and Consejo de Investigaciones de la Universidad Nacional de Tucumán, CIUNT (D-415). Pablo M. Fernández and María M. Martorell equally contributed to this work.

References

J. K. Tseng and A. R. Bielefeldt, “Low-temperature chromium(VI) biotransformation in soil with varying electron acceptors,” Journal of Environmental Quality, vol. 31, no. 6, pp. 1831–1841, 2002.

J. Kotaś and Z. Stasicka, “Chromium occurrence in the environment and methods of its speciation,” Environmental Pollution, vol. 107, no. 3, pp. 263–283, 2000.

L. Morales-Barrera and E. Cristiani-Urbina, “Removal of hexavalent chromium by Trichoderma viride in an airlift bioreactor,” Enzyme and Microbial Technology, vol. 40, no. 1, pp. 107–113, 2006.

H. Ksheminska, D. Fedorovych, L. Babyak, D. Yanovych, P. Kaszycki, and H. Koloczek, “Chromium(III) and (VI) tolerance and bioaccumulation in yeast: a survey of cellular chromium content in selected strains of representative genera,” Process Biochemistry, vol. 40, no. 5, pp. 1565–1572, 2005.

J. Juvera-Espinosa, L. Morales-Barrera, and E. Cristiani-Urbina, “Isolation and characterization of a yeast strain capable of removing Cr(VI),” Enzyme and Microbial Technology, vol. 40, no. 1, pp. 114–121, 2006.

F. M. Guillén-Jiménez, L. Morales-Barrera, L. Morales-Jiménez, C. H. Hernández-Rodríguez, and E. Cristiani-Urbina, “Modulation of tolerance to Cr(VI) and Cr(VI) reduction by sulphate ion a Candida yeast strain isolated from tannery wastewater,” Journal of Industrial Microbiology and Biotechnology, vol. 35, pp. 1277–1287, 2008.

L. B. Villegas, P. M. Fernández, M. J. Amoroso, and L. I. C. De Figueroa, “Chromate removal by yeasts isolated from sediments of a tanning factory and a mine site in Argentina,” BioMetals, vol. 21, no. 5, pp. 591–600, 2008.

C. Cervantes, J. Campos-García, S. Devars et al., “Interactions of chromium with microorganisms and plants,” FEMS Microbiology Reviews, vol. 25, no. 3, pp. 335–347, 2001.

R. Ramírez-Ramírez, C. Calvo-Méndez, M. Ávila-Rodríguez et al., “Cr(VI) reduction in a chromate-resistant strain of Candida maltosa isolated from the leather industry,” Antonie van Leeuwenhoek, vol. 85, no. 1, pp. 63–68, 2004.

O. Muter, A. Patmalnieks, and A. Rapoport, “Interrelations of the yeast Candida utilis and Cr(VI): metal reduction and its distribution in the cell and medium,” Process Biochemistry, vol. 36, no. 10, pp. 963–970, 2001.

L. Morales-Barrera, F. D. M. Guillén-Jiménez, A. Ortiz-Moreno et al., “Isolation, identification and characterization of a Hypocrea tawa strain with high Cr(VI) reduction potential,” Biochemical Engineering Journal, vol. 40, no. 2, pp. 284–292, 2008.

S. Srivastava and I. S. Thakur, “Isolation and process parameter optimization of Aspergillus sp. for removal of chromium from tannery effluent,” Bioresource Technology, vol. 97, no. 10, pp. 1167–1173, 2006.

P. M. Fernández, J. I. Fariña, and L. I. C. Figueroa, “The significance of inoculum standardization and cell density on the Cr(VI) removal by environmental yeast isolates,” Water, Air, and Soil Pollution, vol. 212, no. 1-4, pp. 275–279, 2010.

P. M. Fernández, L. I. C. Figueroa, and J. I. Fariña, “Critical influence of culture medium and Cr(III) quantification protocols on the interpretation of Cr(VI) bioremediation by environmental fungal isolates,” Water, Air, and Soil Pollution, vol. 206, no. 1–4, pp. 283–293, 2010.

K. H. Cheung and J. D. Gu, “Reduction of chromate (CrO₄ ²⁻) by an enrichment consortium and an isolate of marine sulfate-reducing bacteria,” Chemosphere, vol. 52, no. 9, pp. 1523–1529, 2003.

F. J. Acevedo-Aguilar, A. E. Espino-Saldaña, I. L. Leon-Rodriguez et al., “Hexavalent chromium removal in vitro and from industrial wastes, using chromate-resistant strains of filamentous fungi indigenous to contaminated wastes,” Canadian Journal of Microbiology, vol. 52, no. 9, pp. 809–815, 2006.

M. QuiIntana, G. Curutchet, and E. Donati, “Factors affecting chromium(VI) reduction by Thiobacillus ferrooxidans,” Biochemical Engineering Journal, vol. 9, no. 1, pp. 11–15, 2001.

J. Mclean and T. J. Beveridge, “Chromate reduction by a Pseudomonad isolated from a site contaminated with chromated copper arsenate,” Applied and Environmental Microbiology, vol. 67, no. 3, pp. 1076–1084, 2001.

M. Megharaj, S. Avudainayagam, and R. Naidu, “Toxicity of hexavalent chromium and its reduction by bacteria isolated from soil contaminated with tannery waste,” Current Microbiology, vol. 47, no. 1, pp. 51–54, 2003.

A. Pal and A. K. Paul, “Aerobic chromate reduction by chromium-resistant bacteria isolated from serpentine soil,” Microbiological Research, vol. 159, no. 4, pp. 347–354, 2004.

S. Bai R and T. E. Abraham, “Biosorption of Cr (VI) from aqueous solution by Rhizopus nigricans,” Bioresource Technology, vol. 79, no. 1, pp. 73–81, 2001.

Y. Saǧ and Y. Aktay, “Kinetic studies on sorption of Cr(VI) and Cu(II) ions by chitin, chitosan and Rhizopus arrhizus,” Biochemical Engineering Journal, vol. 12, no. 2, pp. 143–153, 2002.

N. Tewari, P. Vasudevan, and B. K. Guha, “Study on biosorption of Cr(VI) by Mucor hiemalis,” Biochemical Engineering Journal, vol. 23, no. 2, pp. 185–192, 2005.

S. O. Farrell and R. T. Ranallo, Experiments in Biochemistry. A Hands-On Approach, Saunders College Publishing, Orlando, Fla, USA, 2000.

P. R. Wittbrodt and C. D. Palmer, “Effect of temperature, ionic strength, background electrolytes, and Fe(III) on the reduction of hexavalent chromium by soil humic substances,” Environmental Science and Technology, vol. 30, no. 8, pp. 2470–2477, 1996.

Y. T. Wang and C. Xiao, “Factors affecting hexavalent chromium reduction in pure cultures of bacteria,” Water Research, vol. 29, no. 11, pp. 2467–2474, 1995.

J. S. McLean, T. J. Beveridge, and D. Phipps, “Isolation and characterization of a chromium-reducing bacterium from a chromated copper arsenate-contaminated site,” Environmental Microbiology, vol. 2, no. 6, pp. 611–619, 2000.

S. Das and A. L. Chandra, “Chromate reduction in streptomyces,” Experientia, vol. 46, no. 7, pp. 731–733, 1990.

A. Pal, S. Dutta, P. K. Mukherjee, and A. K. Paul, “Occurrence of heavy metal-resistance in microflora from serpentine soil of Andaman,” Journal of Basic Microbiology, vol. 45, no. 3, pp. 207–218, 2005.

C. Desai, K. Jain, and D. Madamwar, “Evaluation of in vitro Cr(VI) reduction potential in cytosolic extracts of three indigenous Bacillus sp. isolated from Cr(VI) polluted industrial landfill,” Bioresource Technology, vol. 99, no. 14, pp. 6059–6069, 2008.

Y. H. Kwak, D. S. Lee, and H. B. Kim, “Vibrio harveyi nitroreductase is also a chromate reductase,” Applied and Environmental Microbiology, vol. 69, no. 8, pp. 4390–4395, 2003.

J. Mazoch, R. Tesařík, V. Sedláček, I. Kučera, and J. Turánek, “Isolation and biochemical characterization of two soluble iron(III) reductases from Paracoccus denitrificans,” European Journal of Biochemistry, vol. 271, no. 3, pp. 553–562, 2004.