The Scientific World Journal

Volume 2013 (2013), Article ID 560694, 12 pages

http://dx.doi.org/10.1155/2013/560694

Research Article

Energy-Saving Analysis of Hydraulic Hybrid Excavator Based on Common Pressure Rail

Wei Shen,¹ Jihai Jiang,¹ Xiaoyu Su,² and Hamid Reza Karimi³

¹School of Mechatronics Engineering, Harbin Institute of Technology, Harbin 150080, China

²College of Automation, Harbin Engineering University, Harbin 150001, China

³Faculty of Technology and Science, University of Agder, 4898 Grimstad , Norway

Received 3 July 2013; Accepted 25 August 2013

Academic Editors: C.-M. Kao, M.-H. Shih, W.-P. Sung, and D. Tsang

Copyright © 2013 Wei Shen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Energy-saving research of excavators is becoming one hot topic due to the increasing energy crisis and environmental deterioration recently. Hydraulic hybrid excavator based on common pressure rail (HHEC) provides an alternative with electric hybrid excavator because it has high power density and environment friendly and easy to modify based on the existing manufacture process. This paper is focused on the fuel consumption of HHEC and the actuator dynamic response to assure that the new system can save energy without sacrificing performance. Firstly, we introduce the basic principle of HHEC; then, the sizing process is presented; furthermore, the modeling period which combined mathematical analysis and experiment identification is listed. Finally, simulation results show that HHEC has a fast dynamic response which can be accepted in engineering and the fuel consumption can be reduced 21% to compare the original LS excavator and even 32% after adopting another smaller engine.

1. Introduction

The demand for fuel efficient and low-emission hydraulic excavators has been improved due to the increasing energy crisis and environmental deterioration recently [1, 2]. Hence, reducing the fuel consumption of excavators has become a hot topic for the manufacturers and researchers, and some useful conclusions are made until now [3–6]. The main methods include positive flow rate control [7], negative flow rate control and load sensing control systems [8–10], and so forth. Each system has its own characteristics; however, their basic theory is similar. Most of them adopt the use of multivalves to control the speed of actuators and by sensing the pilot system pressure to control the displacement of the main pump so as to make the output power of engine match the load power. So, these systems can reduce overflow loss. They are always combined with constant power control for the engine in order to avoid the engine shutdown; for example, the pump should reduce the displacement when the output power exceeds the setting power. But the common disadvantages of these systems are huge metering losses and an inability to recover energy. The first is because multi-valves are using throttling to control flow rate. The other one is due to the aiding energy being dissipated in heat during excavator working cycle. For example when the swing is braking or the boom is lowering during every cycle, the braking energy and the gravitational energy are wasted by converting into heat. One more drawback is that it needs a large cooling system to decrease system temperature, but it deteriorates the energy consumption more. Since there is the energy recuperation potential, especially hybrid technology which is already used widely in the hybrid vehicle [11–13], hybrid excavators that make use of batteries or capacitors may be used [14–17]. For example the parallel architecture from Komatsu Company [18, 19], output power from engine is balanced by using the electric motor/generator. Furthermore, the swing hydraulic motor is replaced by an electric motor which can eliminate the metering loss for the swing system. Braking and gravitational energy can be converted to electrical energy and stored in a battery, and the energy can be used in the next cycle by converting to hydraulic energy again. Later, some famous excavator manufacturers such as Kobelco [20], Hitachi, and Sony [21] introduced their own electric hybrid prototype, and in these settings, series and even series-parallel configuration are used. An electric hybrid excavator is a good taste for reducing the fuel consumption because it can eliminate throttling loss in some range and make energy recuperation possible. But it needs to be noticed that an electric hybrid excavator consists of hydraulic and electric actuators, and the energy needs to be converted among mechanical, hydraulic, and electric energy which will result in low efficiency; besides, adding electric actuators is difficult for modifying based on the existing manufacturing process. Moreover, it does not cancel the multi-valves as flow control component for the cylinder, so the metering loss remains. One alternative for hybrid excavators is hydraulic hybrid excavator based on common pressure rail (HHEC) adopting hydraulic accumulators as the storing component [22–24]. It not only eliminates the theoretical metering loss but can also recover energy. In particular, the most significant advantage of using hydraulic accumulators is the seamless interface (hydraulic energy) during recovering and reusing, so the efficiency of the circuit is high.

2. Machine Description

The simplified schematic of HHEC is shown in Figure 1 [25, 26]. Common pressure rail (CPR) is composed of high pressure pipeline and low pressure pipeline, which is similar to the grid system that is composed of high-voltage line and low-voltage line [27]. Electric equipment is connected to the grid in parallel. In CPR, the constant pressure variable pump and hydraulic accumulator constitute the high pressure oil sources, and multiple different loads connect in parallel between the high pressure and the low pressure pipeline, in which rotational load and linear load are driven by a motor/pump and a cylinder, respectively. When the load changes, the pressure of system has a small fluctuation while the flow varies with the load, and the load can be adapted by regulating the displacement of the hydraulic pump/motor. The 4-quarter working principle of motor/pump can make energy recovery possible. For the cylinder, that is hard to change displacement normally, the hydraulic transformer (HT) is used to control the cylinder. Traditional hydraulic transformers can accomplish the aim of transforming from the hydraulic constant pressure end to the load end, but it is massive, expensive, and has low efficiency. The new HT merges two components connected with the shaft into one component. There are three ports in the port plate which is linked with the high pressure line, the load, and the tank, respectively. And the pressure is varied by regulating the angle of the port plate [28, 29]. Figure 2(a) shows the structure of the swash plate type hydraulic transformer (SHT) which is modified by axial piston pump, and it is the second HT at Harbin Institute of Technology [30, 31]. The whole HT can be divided into two parts which are axial piston pump and swing motor. The former port plate is changed, and Figure 2(b) shows the section of port plate [29], which is also rigidly fixed with the swing motor, and in this picture, α,  β  and  γ  are the length of the A, B, and T ports, respectively. So, we can control the motor rotation angle by turning the port plate angle. Both swash plate of motor/pump and the port plate of SHT are controlled by servo valves. Because the flow rate (10 L/min) is so little, the energy consumption can be accepted.

Figure 1: Simplified schematic of HHEC.

(a)

(b)

Figure 2: Structure of SHT. Case of original pump. Block of original pump. New port plate. Case of swing motor. Rotor of swing motor. Stator of swing motor. Rear cover of swing motor.

3. Sizing of HHEC

It is noticed that this paper is to compare the fuel consumption between HHEC and the original systems during one digging cycle. The digging cycle includes an excavator digging a bucket of dirt, rotating and releasing the load onto a pile and then returning to its initial position. It can be found that the travel system is not involved in the cycle, so the sizing process and simulation will not include it. The design assumption is decided that the original hydraulic cylinders would maintain their original dimensions. This decision is useful for comparing the original system, and it will simplify the development of a prototype machine. In future work, the travel system can be integrated easily, so that we can use SHTs which are used for controlling the boom and stick to control travel motors because the travel system and other actuators are not usually used simultaneously [32].

3.1. Specifying the Accumulator

The maximum pressure of the hydraulic accumulator should be chosen lower than the maximum system pressure which also should be safe for all components in system. So we choose the maximum system pressure according to the original system,

where is the maximum pressure of hydraulic accumulator; is the maximum system pressure.

Volume selection of the hydraulic accumulator should follow the rule that it is enough to absorb the braking and gravitational energy. The swing and boom are the two biggest potential; hence, the maximum recovery energy can be calculated by

where is the rotational inertia of cabin; is the average angular velocity of the swing mechanism; is the mass of boom; is the boom speed.

The volume of hydraulic accumulator is equal to

where is the initial air pressure of the accumulator and is the minimum of system pressure; is the gas changeful index.

3.2. Sizing the Volume of SHT

We define the relative volume which means that the three ports A, B, and T have their own volume with the rotation of the port plate. So the volumes are [29]

where is the total volume of SHT and is the rotation degree of port plate.

Equation (4) means that we can calculate the volume of the SHT if the and are confirmed. We use iterative trial and error method to calculate the volume. The detailed flow chat is shown in Figure 3.

Figure 3: Flow chart of sizing SHT.

Firstly, the transformer ratio can be determined through the maximum the force on cylinder and the minimum pressure of high pressure pipe line (PHP); then, can be obtained by (5) [29]. One constraint is needed, so that the reasonable range for is from 0 to 100 degrees [33]. Secondly, can be obtained according to the cylinder speed; the maximum rotation speed should be assumed during this step. The final step is to check whether the numbers make sense. Because the SHT is modified from the swash plate axial piston pump, the standard document from manufacturers can be a criterion. If the numbers do not match the document, the sizing progress should go back to the setting of maximum rotation speed. Furthermore, since the sum torque for driving the block is generated from every port of the SHT, the rotation speed should change during the operation process. The dynamic response of rotation speed must be considered. Figure 4 shows the relationship between and with the blue curve, and the red curve represents the relation between and (the rotation speed is assumed constant). The results show that reduces fast after is bigger than 1 and small values of will result in slow response. Hence, after the volume and rotation speed are chosen, the dynamic response should also be obtained through simulation. The method can be found in [33]. And if the result does not meet the dynamic requirement, the sizing should also go back to the setting of maximum rotation speed until the parameters meet all demands, consider

Figure 4: Curves of and change corresponding to different values of .

3.3. Volume Sizing of the Main Pump

The main pump is one critical component for keeping the pressure of the high pressure line quasiconstant. So the main pump should supply enough flow for system. The critical parameter for main pump is volume, which should meet the two requirements in the aspects of flow rate and power:

where is the maximum flow rate of boom, and , , , and represent the maximum flow rate of swing motor, arm cylinder, bucket cylinder, and travel motor, respectively,

where is the engine power, is engine rotation speed.

4. Modeling Process

A whole model which intergraded with mechanical, hydraulic, and control systems is needed to simulate the actuators dynamic response and fuel consumption.

4.1. Mechanical Model of HEEC

The 3D solid mechanical model is constructed by Solidworks and input Simulation X; then, the material and density are also input. Figure 5 shows the model.

Figure 5: Mechanical model of HEEC.

4.2. Hydraulic Model of HEEC

4.2.1. Engine Model

The dynamic response of engine is calculated by

where is the throttle, represents the maximum engine output torque, and is the friction torque. The sum torque of load is presented by , and the initial of engine is .

is estimated according to [34], and the equation is

where is the piston speed.

The sum of torque load is equal to the sum of the main pump output torque and loss torque

4.2.2. The Displacement Control System of Pump and SHT

The common control architecture in HHEC is using servo valves to control the position of the cylinder or motor. For the main pump and motor/pump, Figure 6 shows the principle. For the SHT, the cylinder and swash plate are replaced by the motor and port plate, respectively. Hence, the model is similar. One assumption is also made that the pressure in the link tank is zero.

Figure 6: Displacement control mechanism of the main pump and motor/pump.

The dynamic characteristics of the servo valve are simplified as a 2nd-order transfer function, and the numbers are from catalog data. So the relation between output flow rate of the servo valve and the input current signal is

where is the flow gain of the servo valve; and are natural frequency as well as damping ratio.

The pressure build-up in the high pressure chamber is calculated using the following equation:

where represents bulk modulus of the fluid; is the initial position of cylinder (in the middle); is the hydraulic capacitance; is the coefficient of internal leakage and the external leakage is ignored.

For the swing motor which drives the port plate, the pressure build-up equation is

In above equation, is the swing motor volume, and are the internal and external leakage coefficients of the swing motor, respectively; is also the hydraulic capacitance including the initial volume of motor and pipe.

A force balance is applied to the cylinder and results in the following:

where represents the equivalent mass of cylinder module; is the coefficient of viscous friction; is the spring stiffness of central spring in the cylinder, and is the equivalent load which is applied to the cylinder.

The similar torque balance equation for the swing motor is calculated by

where is the coefficient of viscous friction of swing motor; represents the swing angle of the swing motor (equal to angle of port plate of SHT); is the coefficient of elasticity; is the equivalent load torque; is the equivalent moment of inertia of cylinder module.

4.2.3. The Efficiency Models of Main Pump and Motor/Pump

The main pump and motor/pump belong to the axial piston component and are very complicated to be described as mathematical equations. To make the model precise and easy to use, this paper adopts the method and date in [35]. An empirical model based on data from steady-state measurements is used to predict the complicated volumetric and torque loss characteristics, and the scale rule is also applied to simulate different sizes of axial piston components. A three-dimensional surface to volumetric or torque loss is created as a function of the pump pressure, rotation speed, and displacement. One condition is selected to show the losses in Figure 7. Consider

(a)

(b)

Figure 7: Torque loss and volumetric loss under different conditions. , and when  Mpa.

According to the above equation, we can calculate the real output flow and torque after inputing the three parameters: pump pressure, rotation speed, and displacement [35].

4.2.4. The Subsystem of SHT Control Cylinder

The displacement control system is introduced in Section 4.2.2. The following part is focused on the SHT control cylinder and motor/pump control cabin. In the HHEC, the boom, arm, and bucket are all controlled by SHTs. They have the same modeling method. An arm subsystem is chosen for presenting the procedure because it behaves the most complicated working condition.

The block of the SHT is driven by the sum of toque which is generated by the three ports of the SHT. The sum of torque among three ports is as follows:

where is the moment of inertia of hydraulic transformer; is angular speed of the block of SHT.

In the above equation, the torque of each port is followed:

Figure 8 redraws the principle of the SHT control cylinder. Newton’s second law is used to obtain the force balance equation. Therefore,

where and are the areas of the arm cylinder, is equivalent mass of the arm and load, presents the displacement of arm cylinder, is friction force, and is a viscous damping coefficient, and represents the load which is applied on the cylinder.

Figure 8: Schematic of SHT control cylinder.

For the arm cylinder, the flow rate goes into the bore side of cylinder, and moves out of the rod side of cylinder are calculated by

where is the flow rate which goes into the bore side of the arm cylinder from the SHT, represents the flow rate out from the rod side of the cylinder to the PHP, and is the internal leakage coefficient of the arm cylinder.

For the flow rate of the SHT, the flow goes into the A port and out from the B port of SHT which follows the equations below:

where is the internal leakage coefficient of the SHT and means the external leakage coefficient.

After combining the above equations, we can get the pressure build-up equation for the B port of the SHT:

where is the hydraulic capacitance including the B port of the SHT, on the bore side of the arm cylinder and the pipe volume between them.

4.2.5. The Subsystem Dynamic Model of Motor/Pump

In the HHEC, the rotation load is driven by the motor/pump, and the dynamic equation is

where is the pressure of the PHP, and is the maximum displacement of the motor/pump; represents the mechanical efficiency of the gear box; is the equivalent moment of inertia of cabin.

4.2.6. The Pressure of PHP

The PHP contains a main pump, hydraulic accumulator, and the actuators. The pressure of the PHP is calculated by the following equation, and it is noticed that again travel motors are omitted in the part:

where represents the index of each actuator, such as bucket, arm, and boom cylinder; is the total capacity which includes each A port of the SHTs, every cylinder volume of the rod side, and the pipe line volume; the initial volume of the motor/pump is represented as ; is the stroke of each cylinder and is the displacement of every cylinder; represents the output flow rate of the main pump; is the A port flow rate of the SHT; is the flow rate which goes into the motor/pump; is the rod side flow rate of each cylinder, and is the total flow rate of leakage.

Also, in the above equation, is defined as the capacity of the accumulator which is the function [32]:

5. Control Strategy and Simulation Model

The controller design includes two aspects: the first one is in order to accomplish the speed control by regulating the swash plate angle and the port plate angle of the SHT, and the other is by controlling both engine speed and the displacement of the main pump to reduce the fuel consumption. However, recalling the object of the paper is to study the fuel consumption of the HHEC under the condition which maintained the performance. Hence, to make the comparison fairly, we still adopt the previous constant speed control for the engine which is used universally among construction machinery. It means that the speed governor will regulate the throttle when load changes so as to keep the engine speed constant. Therefore, the controller design for the second part will focus on the displacement control of the main pump.

Rule  1. The highest pressure control is used which limits the maximum pressure at the pump outlet within the pump’s control range, which is showed by Figure 9. It means when system pressure exceeds the setting pressure, the displacement of the main pump will reduce so as to avoid the reliving loss and keep system pressure constant. The relationship between pressure and displacement is input into the whole simulation model according to the manufacture document.

Figure 9: Relationship between pressure and setting displacement of main pump.

Rule  2. To avoid shutting down the engine due to the slow dynamic response, the maximum displacement of the main pump is restricted according to the maximum torque under different engine speed. So the maximum displacement of the main pump is calculated by Figure 10 which shows the maximum torque and the equation below, and the engine data is from [35] as follows:

Figure 10: Maximum output torque of engine.

In the above equation, is the maximum torque which is obtained by Figure 8, and the engine speed is obtained from the sensor; is the safe coefficient and in this setting the value is 0.9.

The final command value of the displacement of the main pump is to compare two rules and choose the smaller one. The rules are integrated in the module “main pump displacement control”, and the whole control flow chat is plotted in Figure 10. Figure 11 also shows the speed control principle of the HEEC; the deviation of joystick command speed and the real actuators speed signals are used to control the angle of the swash plate or port plate. Only one control circle for the SHT control cylinder is drawn in Figure 10 for clarity; however, there are three circles which include the boom, arm, and bucket in the real controller.

Figure 11: Control principle of HEEC.

6. Simulation Results

The whole simulation model is constructed according to the equations above and built by the Simulink software. In addition, the mechanical model which is designed by software simulation X is integrated, and Figure 12 shows the top module lever of the model. A typical excavator digging cycle was selected for simulation which means an excavator digging a bucket of dirt, rotating, and releasing the dirt onto a pile, finally, returning to its initial position. The simulation date is from reference [36]. In order to make a precise simulation, we choose the same procedure with it, and the measurement speed is input into the simulation model as the command speed, and at the same time the load is also input into the mechanical model which is corresponding to the measurement speed.

Figure 12: Top module of the whole simulation model.

6.1. Speed Response of Each Actuator

The speed response of each actuator is shown in Figure 13, and the red curve is real speed; the other one is command. It can be found that the actuator speed can track the speed command and the performance is acceptable for engineering purposes. However, two problems could be pointed out: one is that the speed oscillation during the initial part. This is because it needs time for pressure build-up of the process. This issue can be addressed by adding a pilot check valve to hold the load during the pressure build-up. Furthermore, speed fluctuates substantially when the load changes violently. The problem is because we only use the simple PI control for the speed control system. The performance can be improved by using an advanced control algorithm. This is also one of the main topics for future work. Moreover, the pressure change of the PHP is plotted in Figure 14.

Figure 13: Speed response of each actuator.

Figure 14: Pressure change of PHP.

We can find that the pressure of the PHP ranges from 26 to 27 MPa (10⁶ Pa), and recall that the setting pressure of main pump is 26 MPa. It means that the PHPE is a quasi-constant pressure system which is beneficial to enhance the control performance of the actuators. There are two main reasons for the quasi-constant system pressure. The first one is for the high power of the engine which can keep the displacement of the pump large enough to the supply flow rate. The other reason is because of the accumulator. It can increase the capacity of the PHP so as to balance the flow rate. Actually, the second reason is also influenced by the first since it will also reduce the engine power, but the original engine power seems higher. Of course, this kind of sizing and control strategy is not optimal. So the long-term future objective of this project is to reduce the fuel consumption by reducing the engine power. Then the engine and accumulator can work together; for example, the main pump and accumulator will supply the flow rate together when the system requirement is large; for example otherwise, the redundant flow rate can be stored in the accumulator. For this setting, the smaller engine can work around the minimum fuel consumption area.

6.2. Fuel Consumption of HEEC

According to Figure 15(a), we can know that the speed of engine can run around 2200 rpm and the torque is less than the maximum torque which can avoid engine shutdown. However, the majority of them are located in the small power area. This means that the HHEC can balance the system power requirement, and the rated engine power can be reduced. Recalling the objective of this paper is to compare the fuel consumption fairly, so the engine power is not chosen and smaller than the original. Then, we choose one smaller engine whose power is 25 kW and the fuel consumption areas are reduced by a scale, too. The simulation is run again and the result is plotted by Figure 15(b). It can be seen that the engine operating points distribute more uniformly. All of the three settings are listed in Table 1. The result shows that the fuel consumption can be reduced 21% compared with the original system and 32% after reducing the rated engine power.

Table 1: Fuel consumption values of different system settings.

System type
Engine rated power (kW)
Fuel consumption (g)
Fuel saving ratio (compared with the LS system)

LS system
35
45
—

HEEC
35
35.6
21%

HEEC
25
20.5
32%

(a)

(b)

Figure 15: Engine operating point during cycle.

It needs to be noticed that in the whole cycle, there are no actuator movement commands during the first 6 s, and the main engine power is used to charge the accumulator. So, with the more cycles’ work, the average fuel consumption can be reduced further. Hence, it can be expected that the average fuel consumption can be reduced further after running more cycles. Of course, the engine operating points do not lie in the optimal fuel consumption area which should be located along with the line tangent of equal power contour line and equal fuel consumption contour line. So the future objective of this project is to finish the optimal control by controlling engine speed and displacement of the main pump simultaneously.

7. Conclusion

This paper focuses on the fuel consumption of the hydraulic hybrid excavator based on CPR under the precondition of maintaining the control performance. After introducing the principle of CPR and the hydraulic transformer which we have designed, the sizing procedure is finished. Then, a comprehensive excavator model including mechanical, hydraulic, and control systems has been developed by using Simulink. Simulation results show that the new speed control system has a good servo capability. However, it is also necessary to study some advanced control method to enhance the actuator control performance. Moreover, the fuel consumption is reduced 21% compared with the original system, and the result also can be even reduced 32% after adopting one smaller engine. The reasons for improving the fuel consumption are due to the elimination of metering losses and the ability to recover the added power. It is also necessary to notice that the source for reduced fuel consumption is from the operating point of the engine, so the future research will also consider control of the engine’s operating point so as to minimize fuel consumption.

Acknowledgments

The authors acknowledge the contribution of National Natural Science Foundation of China (50875054, 51275123) and Open fund of State Key Laboratory of Fluid Power Transmission and Control, Zhejiang University (GZKF-2008003).

References

J. Yang, L. Quan, and Y. Yang, “Excavator energy-saving efficiency based on diesel engine cylinder deactivation technology,” Chinese Journal of Mechanical Engineering, vol. 25, no. 5, pp. 897–904, 2012.

P. W. Griffin, G. P. Hammond, K. R. Ng, and J. B. Norman, “Impact review of past UK public industrial energy efficiency RD&D programmes,” Energy Conversion and Management, vol. 60, no. 8, pp. 243–250, 2012.

H. Kim, J. Choi, and K. Yi, “Development of supervisory control strategy for optimized fuel consumption of the compound hybrid excavator,” Journal of Automobile Engineering, vol. 226, no. 12, pp. 1652–1666, 2012.

T. Lin, Q. Wang, B. Hu, and W. Gong, “Development of hybrid powered hydraulic construction machinery,” Automation in Construction, vol. 19, no. 1, pp. 11–19, 2010.

T. Lin, S. Jiao, X. Wang, and J. Li, “Fuzzy adaptive energy-saving technology for static hydraulic grader,” in Proceedings of the International Conference on Mechatronic Science, Electric Engineering and Computer (MEC '11), pp. 109–113, Jilin, China, August 2011.

H. Han, M. Liu, and X. Cao, “Research of electronic energy saving control technology in construction machinery,” Advanced Materials Research, vol. 443-444, pp. 272–276, 2012.

S. Cetinkunt, U. Pinsopon, C. Chen, A. Egelja, and S. Anwar, “Positive flow control of closed-center electrohydraulic implement-by-wire systems for mobile equipment applications,” Mechatronics, vol. 14, no. 4, pp. 403–420, 2004.

X. Fang, “Analysis and computing of load sensing system in hydraulic excavator,” Journal of Tongji University, vol. 29, no. 9, pp. 1097–1100, 2001.

I. Y. Jong, K. K. Ahn, and Q. T. Dinh, “A study on an energy saving electro-hydraulic excavator,” in Proceedings of the International Joint Conference on Control, Automation and Systems and Annual Conference of the Society of Instrument and Control Engineers (ICCAS-SICE '09), pp. 3825–3830, Fukuoka, Japan, August 2009.

R. Finzel, S. Helduser, and D. S. Jang, “Electro-hydraulic control systems for mobile machinery with low energy consumption,” in Proceedings of the 7th International Conference on Fluid Power Transmission and Control, pp. 214–219, 2009.

T. Wakui, N. Wada, and R. Yokoyama, “Feasibility study on combined use of residential SOFC cogeneration system and plug-in hybrid electric vehicle from energy-saving viewpoint,” Energy Conversion and Management, vol. 60, no. 8, pp. 170–179, 2012.

P. Fisher, J. Jostins, S. Hilmansen, and K. Kendall, “Electronic integration of fuel cell and battery system in novel hybrid vehicle,” Journal of Power Sources, vol. 220, pp. 114–121, 2012.

T. Katrašnik, “Energy conversion phenomena in plug-in hybrid-electric vehicles,” Energy Conversion and Management, vol. 52, no. 7, pp. 2637–2650, 2011.

Q. Xiao, Q. Wang, and Y. Zhang, “Control strategies of power system in hybrid hydraulic excavator,” Automation in Construction, vol. 17, no. 4, pp. 361–367, 2008.

D. Lee, N. Kim, H. Seo, S. W. Cha, and W. Lim, “Fuel consumption analysis of hybrid excavator using electric swing motor,” in Proceedings of the 24th International Battery, Hybrid and Fuel Cell Electric Vehicle Symposium and Exhibition, vol. 2, pp. 879–886, 2009.

M. Kagoshima, T. Sora, and M. Komiyama, “Development of hybrid power train control system for excavator,” in Proceedings of the Society of Automotive Engineers of Japan Annual Congress, vol. 86, pp. 1–6, 2003.

A. Tsutsui, T. Nanjyo, and T. Yoshimatsu, “Development of the electro hydraulic actuator system on hybrid excavator,” in Proceedings of the Society of Automotive Engineers of Japan Annual Congress, vol. 86, pp. 7–12, 2003.

Komatsu Company, “PC200-8 hybrid hydraulic excavator contributes to reducing CO₂ emissions,” Komatsu Corporate Profile, vol. 3, pp. 4–5, 2008.

“Komatsu launches world's first hybrid excavator,” Down to Earth, vol. 7, no. 48, article 23, 2008.

Hitachi Construction Machinery, “Dvelopment of battery driven construction machinery for CO₂ reduction,” Tech. Rep., Development of Technical Measure for Global Warming Control, 2005.

M. Kagoshima, M. Komiyama, T. Nanjo, and A. Tsutsui, “Development of new kind of hybrid excavator,” Kobelco Technology Review, vol. 27, pp. 39–42, 2007.

W. Shen and J.-H. Jiang, “Analysis of energy recovery efficiency of hydraulic hybrid excavator,” Journal of South China University of Technology, vol. 40, no. 1, pp. 82–87, 2012.

S. Sgro, M. Inderelst, and H. Murrenhoff, “Energy efficiency of mobile working machines,” in Proceedings of the 7th International Fluid Power Conference, 2010.

K. K. Ahn, H. O. TH, and Q. T. Dinh, “A study on energy saving potential of hydraulic on energy saving potential of hydraulic control system using switching type closed loop constant pressure system,” in Proceedings of the 7th JFPS International Symposium on Fluid Power, pp. 317–322, Toyama, Japan, September 2008.

R. A. H. Malsen, P. A. J. Achten, and G. E. M. Vael, “Design of dynamic and efficient hydraulic systems around a simple hydraulic grid,” SAE Paper 2002-01-1432, 2002.

J. Jiang, A. Yu, and W. Shen, “The review of full hydraulic hybrid excavator based on common pressure rail network,” Chinese Hydraulics and Pneumatics, vol. 9, pp. 44–49, 2010.

W. Shen and J. Jiang, “Analysis and development of the hydraulic secondary regulation system based on the CPR,” in Proceedings of the International Conference on Fluid Power and Mechatronics (FPM '11), pp. 117–122, Beijing, China, August 2011.

P. A. J. Achten, G. E. M. Vael, and F. Zhao, “The Innas hydraulic transformer—the key to the hydrostatic Common Pressure Rail,” SAE Paper 2000-01-2561, 2000.

P. A. J. Achten, F. Zhao, and G. E. M. Vael, “Transforming future hydraulics: a new design of a hydraulic transformer,” in Proceedings of the 5th Scandinavian International Conference on Fluid Power, 1997.

C.-Q. Liu and J.-H. Jiang, “Flow characteristic of inclined plate and axial plunger type hydraulic transformer,” Journal of Jilin University, vol. 42, no. 1, pp. 85–90, 2012.

H. Lu, Theoretical analysis and experiment of electric control bent axial piston hydraulic transformer [Ph.D. thesis], Harbin Institute of Technology Press, 2008.

J. Zimmerman, R. Hippalgaonkar, and M. Ivantysynova, “Optimal control for the series-paralleld displacement controlled hydraulic hybrid excavator,” in Proceedings of the ASME Dynamic Systems and Control Conference, pp. 1–8, 2011.

W. Shen, J. Jiang, and K. Wang, “Dynamic analysis of boom system based on hydraulic transformer,” Transactions of the Chinese Society for Agricultural Machinery, no. 4, pp. 27–32, 2013.

J. Heywood, Internal Combustion Engine Fundamentals, McGraw-Hill, 1988.

C. Williamson, Power management for multi-actuator mobile machines with displacement controlled hydraulic actuators [dissertations], Purdue University, 2010.

J. Zimmerman and M. Ivantysynova, “The effect of system pressure level on the energy consumption of displacement controlled actuator systems,” in Proceedings of the 5th Initiative of Fluid Power Net International (FPNI-PhD '08), pp. 77–92, 2008.