The Scientific World Journal

Volume 2013 (2013), Article ID 636912, 6 pages

http://dx.doi.org/10.1155/2013/636912

Research Article

Optimal Design of an Ultrasmall SOI-Based 1 × 8 Flat-Top AWG by Using an MMI

Hongqiang Li,¹ Yaoting Bai,¹ Xiaye Dong,¹ Enbang Li,² Yang Li,¹ Yu Liu,¹ and Wenqian Zhou¹

¹School of Electronics and Information Engineering, Tianjin Polytechnic University, No. 399 Binshuixi Road, Xiqing District, Tianjin 300387, China

²School of Physics, Faculty of Engineering, University of Wollongong, Wollongong, NSW 2522, Australia

Received 5 June 2013; Accepted 8 July 2013

Academic Editors: V. M. N. Passaro and M. Strojnik

Copyright © 2013 Hongqiang Li et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Four methods based on a multimode interference (MMI) structure are optimally designed to flatten the spectral response of silicon-on-insulator- (SOI-) based arrayed-waveguide grating (AWG) applied in a demodulation integration microsystem. In the design for each method, SOI is selected as the material, the beam propagation method is used, and the performances (including the 3 dB passband width, the crosstalk, and the insertion loss) of the flat-top AWG are studied. Moreover, the output spectrum responses of AWGs with or without a flattened structure are compared. The results show that low insertion loss, crosstalk, and a flat and efficient spectral response are simultaneously achieved for each kind of structure. By comparing the four designs, the design that combines a tapered MMI with tapered input/output waveguides, which has not been previously reported, was shown to yield better results than others. The optimized design reduced crosstalk to approximately −21.9 dB and had an insertion loss of −4.36 dB and a 3 dB passband width, that is, approximately 65% of the channel spacing.

1. Introduction

A wearable optical fiber-grating- (FBG-) based sensor in intelligent clothing for human body temperature measurement has previously been demonstrated [1]. Likewise, we designed an arrayed-waveguide grating (AWG) demodulation integration microsystem (Figure 1) with a new kind of FBG demodulation scheme, and an ultrasmall silicon-on-insulator- (SOI-) based 1 × 8 normal AWG without flat spectral response [2], which is a key component in demodulation microsystems, is designed.

Figure 1: FBG demodulation system based on AWG.

Based on spectral response, an AWG can be classified as a Gaussian type or a flat-top type. The application of Gaussian-type AWGs is limited by the influence of external factors because of their small 3 dB bandwidth. By contrast, flat-top type devices have numerous advantages, such as the facilitation of high-speed modulation and insensitivity to center wavelength shift. A large number of methods have been introduced to achieve a flattened AWG spectral response [3–7] in silica- or InP-based AWGs, but rarely demonstrated in SOI-based AWGs, where the very high contrast makes the design of such MMI couplers and AWGs difficult. These methods have a number of limitations, such as an increase in the size or the insertion loss of the device. Among these methods, the connection of an MMI section to the end of the input waveguide of an AWG is relatively simple and effective. In 2003, Dai introduced a method wherein a tapered MMI, which was connected to the end of the input waveguide of the AWG, was used to flatten the passband of an AWG. Insertion loss and crosstalk were −2.35 dB and −35.6 dB, respectively. The 3 dB passband width was approximately 80% of the channel spacing [8]. In 2005, Khan reported on the passband broadening of an AWG demultiplexer on Si/SiO₂ with a tapered output waveguide and an MMI coupler connected to the end of a tapered input waveguide. The crosstalk level was below −30 dB. The insertion loss was approximately 5.6 dB for the central channel. The 3 dB passband width was approximately 42% of the channel spacing [9]. In 2006, An et al. designed a flat-response silica-based AWG with 40 channels using a symmetrical MMI attached to the end of an input waveguide. The insertion loss ranged from 5.2 dB to 7.5 dB, and the crosstalk was less than −20 dB [10]. In 2012, Pathak et al. reported on an ultrasmall AWG on SOI with flattened spectral response that employs an MMI aperture with insertion loss of −3.29 dB and crosstalk of −17 dB [11].

In this paper, we design four optimized MMI-based methods to achieve a flattened spectral response of compact silicon AWGs used in an AWG demodulation integration microsystem. SOI is selected as the material during design to produce compact silicon AWGs [12]. The flattened AWGs are simulated using the beam propagation method (BPM). For each method, performance parameters such as insertion loss, crosstalk, and 3 dB bandwidth are obtained. We then analyzed and compared the four methods.

2. Design and Optimization

2.1. Use of a Symmetrical MMI to Flatten the Spectral Response

The structure of an MMI-AWG demultiplexer is shown in Figure 2. An AWG comprises an input waveguide, numerous output waveguides, two free propagation regions (FPRs), and arrayed waveguides. To broaden the spectral response of an AWG demultiplexer, a symmetrical MMI coupler (with length ) is connected to the end of the input waveguide. The input light is radiated to the first FPR to excite the arrayed waveguides. After traveling through the arrayed waveguides, the light beam constructively interferes at one focal point in the second FPR. The location of the focal point depends on the wavelength.

Figure 2: Schematic diagram of an MMI-AWG.

According to the self-image theory, a twofold image can be formed in the MMI output surface region. For MMI imaging, the effective width for each order mode is approximately equal to that for the fundamental mode. The effective width is given by

where is the width of the MMI section, is the wavelength in vacuum, (for the TE case) or 1 (for the TM case), and and are the refractive indexes for the core and the cladding, respectively. For a high refractive index difference, . When

an -fold image will be produced, where is given by

Thus, the twofold image is formed at the end of the MMI section with the following length:

The given formula can be used to determine the values of the major parameters and for the design of the MMI. First, based on the requirements of 3 dB bandwidth, is set to 3 μm. Then, according to formula (4), is found to be approximately 10.05 μm. MMI is simulated by using the BPM method, and optical field distribution is shown in Figure 3. From the figure, distinct image points are evident.

Figure 3: Optical field distribution of an MMI.

Two 1 × 8 AWGs, a normal AWG and an MMI-AWG, both having the same structure except for the input region, are designed and calculated. The widths and heights of the AWG waveguides are 0.35 and 0.22 μm, respectively. The other AWG parameters are given in Table 1. Based on the simulation and analysis of AWGs, the optimized size of the MMI is set to 3 μm × 13 μm. The single-channel output spectrum contrast of the same AWG device with and without MMI is shown in Figure 4. The result shows that the passband is flattened to 1.28 nm at 3 dB. The insertion loss and crosstalk are increased to −5.76 and −19.54 dB, respectively.

Table 1: Parameter optimization results of the SOI-based AWG.

Parameters
Parameters value

Wavelength
1550.918 nm

Number of output waveguides
8

Number of arrayed waveguides
30

Path length difference
19.76 m

Length of free propagation region
67 m

Diffraction order
40

Wavelength spacing
2 nm

Figure 4: Contrast of single-channel output spectrum.

2.2. Use of a Tapered MMI to Flatten the Spectral Response

To increase the design degrees of freedom to obtain a superior flattened spectrum, a tapered MMI (Figure 5) is used to flatten the passband of an AWG.

Figure 5: Geometrical configuration of a tapered MMI.

The width of a tapered MMI is given by

where is along the propagation direction, is the length of the tapered MMI, and and are the entrance and exit widths of the tapered MMI, respectively, (Figure 5). Thus, yields the following expression:

Considering that the separation between the two image peaks is mainly determined by and are expressed using and tapering angle . The following expressions are thus derived:

In the proposed design, the AWG parameters are the same as those shown in Table 1. According to the 3 dB bandwidth requirements, the exit width is fixed at 3.2 μm. Then the width of the whole structure is then determined by the tapering angle (7). is plotted as the tapering angle varies (Figure 6). Figure 6 shows that the length can be significantly reduced as the tapering angle increases. In the following section, we analyze how the tapering angle affects the performance (including the crosstalk and insertion loss) of a flat-top AWG.

Figure 6: The length of the tapered MMI as the tapering angle varies.

Crosstalk is a key parameter for a dense wavelength division multiplexing device. For a practical device, a low crosstalk level must be ensured. For a flat-top AWG, crosstalk increases as the spectral response broadens. Thus, the crosstalk for a flat-top AWG is usually higher than that for a Gaussian-type AWG. Figure 7 shows the crosstalk as the tapering angle varies. When the tapering angle increases from −0.2° to 0.9°, the crosstalk decreases from approximately −16 dB to −21.7 dB.

Figure 7: Crosstalk as the tapering angle varies.

Low insertion loss is also important for a practical device. Figure 8 shows the insertion loss at the central wavelength as the tapering angle varies. Compared with the case of a conventional MMI (), the insertion loss is reduced by approximately 1 dB when the tapering angle increases to 0.9°.

Figure 8: Insertion loss as the tapering angle varies.

Figure 9 gives the spectral responses when the tapering angle , 0.6°, and 0.9°. This figure shows that the spectral response can be improved by adjusting the tapering angle . When the tapering angle reaches 0.9°, the spectral response is significantly improved compared with the other cases. Moreover, transition is sharpened, crosstalk is reduced to approximately −21.4 dB, insertion loss is −5.11 dB, and the 3 dB passband width is flattened to 1.3 nm. Finally, the device is structured with of 2.88 μm and of 10.27 μm. Optical field distribution of the tapered MMI is shown in Figure 10. From the figure, distinct image points are evident. In conclusion, the structure parameters of tapered MMI are advisable.

Figure 9: Spectral responses when the tapering angle , 0.6°, 0.9°.

Figure 10: Optical field distribution of a tapered MMI ().

2.3. Use of a Combination of a Tapered MMI and Tapered Input/Output Waveguides to Flatten the Spectral Response

This section presents a new kind of structure that can flatten the spectrum while ensuring good planarization with low insertion loss and crosstalk. The improvements based on the structure presented in Section 2.2 include a tapered waveguide inserted before the tapered MMI, such that a preexpanded structure and a tapered waveguide are connected to the output waveguide inlet end. Figure 11 shows that and are the exit width and length of the input tapered waveguide, respectively, whereas is the entrance width of the output tapered waveguide.

(a)

(b)

Figure 11: Structure used to flatten spectral responses: (a) section between the input waveguide and FPR1 and (b) section between the output waveguide and FPR2.

In the proposed design, the parameters of the ready-to-use AWG are the same as those listed in Table 1. The structure of the tapered MMI is similar to that designed in Section 2.2. Considering that the interval of the AWG output waveguide is 1 μm,  μm is selected. To ensure minimal tapering and conversion of the loss of mold spots, is optimally designed at 13 μm. A comparison of the single-channel output spectra of flattened and unflattened AWGs is shown in Figure 12. The result shows that the passband is flattened to 1.31 nm at 3 dB. The insertion loss is decreased to −4.36 dB, and the crosstalk is approximately −21.9 dB.

Figure 12: Comparison of single-channel output spectra of flattened and unflattened AWGs.

2.4. Use of a Combination of a Symmetrical MMI and Tapered Input/Output Waveguides to Flatten the Spectral Response

Similar to the improvements on the design discussed in Section 2.3, a tapered waveguide is inserted before the MMI and is then connected to the output waveguide inlet end (Figure 13).

(a)

(b)

Figure 13: Structure used to flatten spectral responses: (a) section between the input waveguide and FPR1 and (b) section between the output waveguide and FPR2.

The parameters of the sample AWG are similar to those listed in Table 1. The design process is similar to that reported in Section 2.3. Based on the calculation by using BPM and the optimized design parameters given by (1) and (4), we derive the results shown in Figure 14. The 3 dB passband is 1.3 nm at 65% of channel spacing, insertion loss is −4.66 dB, and crosstalk is approximately −21.5 dB.

Figure 14: Transmission spectra simulation of a flat-top AWG.

3. Conclusion

In this paper, the design processes of four kinds of methods used to flatten the spectral response are presented. Through a calculation and simulation conducted by using BPM, the structure is found to be optimally designed, and the 3 dB passband is broadened effectively from 40% to more than 60% of channel spacing for each method. Table 2 shows a comparison of the four methods. By comparing the four designs, the one reported in Section 2.3 is found to obtain better results than the others, achieving a crosstalk reduction to approximately −21.9 dB, insertion loss of −4.36 dB, and the 3 dB passband width of approximately 1.31 nm, which is 65.5% of channel spacing. Moreover, the design in Section 2.3 has better crosstalk characteristic, simpler, and smaller device structure but little worse insertion loss than the performance reported in [11]. Generally speaking, the designed structures are generally highly compact and exhibit low loss and a wide bandwidth. The designs can thus meet optoelectronic integration requirements.

Table 2: Comparison of the four methods.

Methods to flatten spectral response
Crosstalk 

(dB)
Insertion loss 

(dB)
3 dB passband width 

(nm)

Using a symmetrical MMI
−19.54
−5.76
1.28

Using a tapered MMI
−21.4
−5.11
1.3

Using combination of a tapered MMI and input/output tapered waveguide
−21.9
−4.36
1.31

Using combination of a symmetrical MMI and input/output tapered waveguide
−21.5
−4.66
1.3

Acknowledgments

This paper is supported by the National Natural Science Foundation of China (no. 61177078, 31271871) and the Specialized Research Fund for the Doctoral Program of Higher Education of China (no. 20101201120001).

References

H. Li, H. Yang, E. Li, Z. Liu, and K. Wei, “Wearable sensors in intelligent clothing for measuring human body temperature based on optical fiber Bragg grating,” Optics Express, vol. 20, no. 11, pp. 11740–11752, 2012.

H. Li, E. Li, Z. Liu, K. Wei, X. Dong, and Y. Bai, “Design of 1 × 8 silicon nanowire arrayed waveguide grating for on-chip arrayed waveguide grating demodulation integration microsystem,” Optical Engineering, vol. 51, no. 12, Article ID 123001, 5 pages, 2012.

Y. P. Ho, H. Li, and Y. J. Chen, “Flat channel-passband-wavelength multiplexing and demultiplexing devices by multiple-rowland-circle design,” IEEE Photonics Technology Letters, vol. 9, no. 3, pp. 342–344, 1997.

A. Rigny, A. Bruno, and H. Sik, “Multigrating method for flattened spectral response wavelength multi/demultiplexer,” Electronics Letters, vol. 33, no. 20, pp. 1701–1702, 1997.

J.-J. He, “Phase-dithered waveguide grating with flat passband and sharp transitions,” IEEE Journal on Selected Topics in Quantum Electronics, vol. 8, no. 6, pp. 1186–1193, 2002.

Q. Fang, F. Li, and Y. Liu, “Compact SOI arrayed waveguide grating demultiplexer with broad spectral response,” Optics Communications, vol. 258, no. 2, pp. 155–158, 2006.

K. Maru and Y. Abe, “Low-loss, flat-passband and athermal arrayed-waveguide grating multi/demultiplexer,” Optics Express, vol. 15, no. 26, pp. 18351–18356, 2007.

D. Dai, W. Mei, and S. He, “Using a tapered MMI to flatten the passband of an AWG,” Optics Communications, vol. 219, no. 1-6, pp. 233–239, 2003.

S. N. Khan, D. Dai, L. Liu, L. Wosinski, and S. He, “Optimal design for a flat-top AWG demultiplexer by using a fast calculation method based on a Gaussian beam approximation,” Optics Communications, vol. 262, no. 2, pp. 175–179, 2006.

J. An, Y. Wu, J. Li, B. Xing, X. Hu, and Q. Liang, “Flat-top silica-based arrayed waveguide grating with 40-channels,” Optoelectronics Letters, vol. 2, no. 5, pp. 323–325, 2006.

S. Pathak, E. Lambert, P. Dumon, D. van Thourhout, and W. Bogaerts, “Compact SOI-based AWG with flattened spectral response using a MMI,” in Proceedings of the 8th IEEE International Conference on Group IV Photonics (GFP '11), pp. 45–47, September 2011.

W. Bogaerts, S. K. Selvaraja, P. Dumon et al., “Silicon-on-insulator spectral filters fabricated with CMOS technology,” IEEE Journal on Selected Topics in Quantum Electronics, vol. 16, no. 1, pp. 33–44, 2010.