The Scientific World Journal

Volume 2014 (2014), Article ID 256919, 10 pages

http://dx.doi.org/10.1155/2014/256919

Research Article

Toxicity Effect of Silver Nanoparticles in Brine Shrimp Artemia

Chinnasamy Arulvasu, Samou Michael Jennifer, Durai Prabhu, and Devakumar Chandhirasekar

Department of Zoology, Unit of Aquaculture and Animal Tissue Culture, University of Madras, Guindy Campus, Chennai 600 025, India

Received 21 August 2013; Accepted 19 October 2013; Published 2 January 2014

Academic Editors: D. Endoh, B. Soto-Blanco, and A. Takagi

Copyright © 2014 Chinnasamy Arulvasu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The present study revealed the toxic effect of silver nanoparticles (AgNPs) in Artemia nauplii and evaluated the mortality rate, hatching percentage, and genotoxic effect in Artemia nauplii/cysts. The AgNPs were commercially purchased and characterized using field emission scanning electron microscope with energy dispersive X-ray spectroscopy. Nanoparticles were spherical in nature and with size range of 30–40 nm. Artemia cysts were collected from salt pan, processed, and hatched in sea water. Artemia nauplii (II instar) were treated using silver nanoparticles of various nanomolar concentrations and LC₅₀ value (10 nM) and mortality rate (24 and 48 hours) was evaluated. Hatching percentage of decapsulated cysts treated with AgNPs was examined. Aggregation of AgNPs in the gut region of nauplii was studied using phase contrast microscope and apoptotic cells in nauplii stained with acridine orange were observed using fluorescence microscope. DNA damage of single cell of nauplii was determined by comet assay. This study showed that as the concentration of AgNPs increased, the mortality rate, aggregation in gut region, apoptotic cells, and DNA damage increased in nauplii, whereas the percentage of hatching in Artemia cysts decreased. Thus this study revealed that the nanomolar concentrations of AgNPs have toxic effect on both Artemia nauplii and cysts.

1. Introduction

Nanotechnology is the development and manufacture of materials in the nanometer size range (at least one dimension less than 100 nm) and their application [1]. Nanoparticles (NPs) have become a part of our daily life, in the form of cosmetics [2], drug delivery systems [3], therapeutics [4], and biosensors [5]. However, little is known about their biodistribution and bioactivity. The various interactions of NPs with fluids, cells, and tissues need to be considered, starting at the portal of entry and then via a range of possible pathways towards target organs. A discipline of nanotoxicology would make an important contribution to the development of a sustainable and safe nanotechnology. Silver nanoparticles have gained much popularity on account of their antimicrobial properties [6, 7]. They are extensively used in detergents and wound dressings, which end up in the environment during waste disposal [8]. The release of silver nanoparticle as discrete particles or as composite colloids, and of Ag+ from various types of textiles [9, 10] and paints used for outdoor facade applications, was observed [11]. However, quantitative data on the release of AgNPs into the aquatic environment and measured environmental concentrations of AgNPs are not currently available. Consequently, the entering of AgNPs into the aquatic environment can only be predicted by models that consider the AgNPs life-cycle from their production till their disposal [12–16]. The most relevant processes that govern the stability and mobility of AgNPs in the aquatic environment are AgNPs agglomeration, aggregation, dispersion, sedimentation, and dissolution. These processes are dependent on the particle physicochemical properties that are in turn influenced by environmental parameters such as pH, temperature, ionic strength, and presence of ligands or natural organic matter [17–19].

Artemia (brine shrimp) is zooplankton that is used to feed larval fishes [20]. Artemia present one common characteristic, that is, their strong adaptability to hypersaline environments, such as permanent salt lakes, coastal lagoons, and man-made salt pans. They play an important role in the energy flow of the food chain in marine environment [21–24]. Artemia use in toxicology poses a reasonable number of answerable questions, namely, practical considerations of laboratory culture and attainment of cyst, ecological relevance, systematic use, and practical conditions of maintenance and sustainability of laboratory conditions of animal model, thus making achievable a sustainable development of Artemia-based bioassays [25].

2. Materials and Methods

2.1. Chemicals

Silver nanoparticles were purchased as a synthetic source from ALDRICH SIGMA CHEMICALS of molecular weight 107.87 g/mL and 0.02 mg/mL concentration diluted in aqueous buffer and containing sodium citrate as stabilizer.

2.2. Field Emission Scanning Electron Microscope (FESEM) with Energy Dispersive X-Ray Spectroscopy (EDX)

The morphology and size of silver nanoparticles were measured by field emission scanning electron microscope (HITACHI SU6600). A minute drop of nanoparticles solution was cast on aluminum foil and subsequently dried in air before transferring it to the microscope. An energy dispersive X-ray detection instrument (EDX) (HORIBA 8121-H) was used to examine the elemental composition of the sample.

2.3. Artemia Cyst Collection, Processing, and Hatching Procedure

Artemia cysts were collected from salt pan of Kelambakkam, Chennai, using net of pore size 150–200 micrometer. Cysts were cleaned and they were filtered and spread on the paper which absorbs water and kept for shadow drying for one night [20]. Decapsulation is the removal of the outer membrane of a cyst called the chorion by dissolution in sodium hypochlorite, without affecting the viability of the embryo. Before hatching procedure the cysts were decapsulated using sodium hypochlorite. Approximately 2 g of the precleaned cysts was incubated in 1 L seawater in a conical plastic contained with graduations at 30 ± 1°C. 1,500 lux light intensity was provided continuously by a fluorescent lamp. Aeration was maintained by a small line extending to the bottom of the hatching device from an aquarium air pump. Under these conditions, Artemia cysts were hatched within 24 hours.

2.4. Mortality Rate of Artemia nauplii

The acute toxicity was determined by measuring the adverse effect of various concentrations of silver nanoparticle on brine shrimp Artemia nauplii growth, survival and mortality under intermittent flow-through conditions. The study commenced with <24-hour-old nauplii and continued and exposed for 24 and 48 hours. Experiment was performed in 12-well plate. In each well containing 2 mL of 33 ppt of saline water along with control (without silver nanoparticles) about 10 nauplii were transferred with the addition of desired concentration of AgNPs such as 2 nM, 4 nM, 6 nM, 8 nM, 10 nM, and 12 nM, respectively [26]. Each test concentration along with the control should be carried out for three replicates in 12-well plate. The experimental setup was allowed to remain 24 hours in darkness and nauplii were counted after incubation time. The LC₅₀ value after 24 hours and percentages of mortality after 24 and 48 hours for various test concentrations of silver nanoparticles were determined and compared with the control. Results were tabulated and plotted as a graph.

Percentage mortality was calculated by following the formulae

2.5. Hatching Percentage of Artemia Cyst

Brine shrimp Artemia cysts were collected and processed and were used for testing the percentage of hatching. Before performing the test, the cysts were decapsulated using sodium hypochlorite for 15 minutes. Experiment was performed in 12-well plates. And in each well containing 2 mL of 33 ppt in saline water along with control (without AgNPs), about 20 Artemia cysts were transferred with the addition of desired concentration of AgNPs such as 2 nM, 4 nM, 6 nM, 8 nM, 10 nM, and 12 nM. Each test concentration along with the control was carried out in three replicates in 12-well plate. The experimental setup was allowed to remain 24 hours in shaker for aeration and the experimental set up was exposed to light to provide favorable environment for the cyst to hatch out. Hatched cysts were counted after the incubation period of 24 hours. Percentages of hatching for various test concentrations of silver nanoparticles were determined.

Percentages of hatching for various test concentration of silver nanoparticle were calculated by the following formula:

where is the hatching percentage, is the number of hatched cysts, including the umbrella stage, and is the decapsulated full cysts.

Results were tabulated and plotted as a graph.

2.6. Morphological Variations of Artemia nauplii

The morphological variations in Artemia nauplii treated with various concentrations of silver nanoparticles and control alone were observed using inverted phase contrast microscope (RADICAL).

2.7. Apoptosis Analysis: Acridine Orange Staining

To investigate the role of apoptosis by AgNPs toxicity, acridine orange staining of nanoparticle-treated Artemia nauplii was performed. Artemia nauplii treated with various concentrations of silver nanoparticles were gently placed in the cavity slides. 10 μL of acridine orange stain from the stock of 5 μg/mL was added to the nauplii for 20 minutes at room temperature. Artemia nauplii were washed in phosphate buffer saline (1X PBS, pH 7.4). Stained samples were observed under inverted fluorescence microscope (RADICAL).

2.8. Single-Cell Gel Electrophoresis (Comet Assay)

A comet assay was performed to determine the DNA damage [27]. Approximately 200 Artemia nauplii were collected 24 hours after treatment from the control and LC₅₀ value and were pooled for a comet assay. Treated organisms were placed in 1 mL of phosphate-buffered saline (PBS) containg 20 mM ethylene diamineni tetraacetic acid (EDTA) and 10% dimethyl sulfoxide (DMSO) and disintegrated mechanically by mincing. Cell suspension was precipitated by vortexing and then immediately mixed with 100 μL of 1% low melting agarose (LMA) at 39°C and spread on a fully frosted microscopic slide precoated with 200 μL of 1% normal melting agarose. After the solidification of agarose, slides were covered with another 75 μL of 0.5% LMA and then immersed in lysis solution (2.5 M NaCl, 10 mM Na-EDTA, 10 mM Tris, 1% Trion X100 and 10% DMSO, pH 10) for 1 hour at 4°C. The slides were then placed in a gel electrophoresis apparatus (containing 300 mM NaOH and 10 mM Na-EDTA, pH 13) for 40 minutes to allow unwinding of DNA and the alkali labile damage. Next, an electrical field (3000 mA, 25 V) was applied for 20 min at 4°C to draw the negatively charged DNA toward an anode. After electrophoresis, slides were washed thrice for 5 min at 4°C in a neutralizing buffer (0.4 M Tris, pH 7.5), followed by staining with 75 μL of propidium iodide (40 μg/mL) and then the slides were observed using fluorescence microscopy.

3. Results

3.1. FESEM/EDAX Investigation

Field emission scanning electron microscope was used to investigate the morphology and size of the silver nanoparticles. The AgNPs obtained with the sodium citrate reduction method were predominantly spherical with diameters ranging from a few nanometers to 30–40 nm (Figure 1). EDAX spectrum recorded on the experimental sample is shown as three peaks located between 2 KeV and 10 KeV. Those maxima are directly related to the silver characterized lines K and L. The maximum peak located on the spectrum at 0.2 KeV clearly coming from aluminum. The second maximum peak located on the spectrum at 0.3 KeV clearly indicates comes from silver. Third peaks located at 0.1 KeV are connected with the oxygen characteristics line (Figure 2).

Figure 1: Photomicrograph showing spherical shape of silver nanoparticles using field scanning electron microscope.

Figure 2: Energy dispersive X-ray spectrum of silver nanoparticles.

3.2. Mortality Rate of Artemia nauplii

The nanoparticle aggregates to elevated levels such that the guts were filled with particles showing significant mortality within 24 hours of exposure. The results were found to be in such a way that in the control the mortality was about 6% which was negligible. In minimum concentration of 2 nM the mortality was 16% and as the concentration increases from 4 nM, 6 nM, and 8 nM the mortality was about 33%, 36.6%, and 43%. About 53.3% and 66.6% of the population of Artemia nauplii were found to be dead as the concentration increased to the maximum in the test concentrations of 10 nM and 12 nM. The LC₅₀ value was obtained around 10 nM concentration.

And further extended exposure to 48 hours did induce high mortality. After 48 hours the mortality rate was twice the results of the 24-hour mortality rate and even in 2 nM concentration about 60% mortality was observed and in concentration between 4 nM, 6 nM, and 8 nM the mortality increased to 83.3%, 86.6% and 90% which was twice the mortality rate of 24-hour exposure. And the mortality was found to be above 90% at 10 nM and 93% at 12 nM concentration. However, these effects were most likely due to the lack of food uptake since the guts were completely filled with the aggregates of silver nanoparticles (Table 1 and Figure 3).

Table 1: The result for mortality rate (24 and 48 hours) of brine shrimp Artemia nauplii treated with various nanomolar concentrations of silver nanoparticles.

Parameter
Concentration levels in nanomolar (nm)
Initial number of Artemia nauplii
Number of nauplii dead after 24 hours
Number of nauplii dead after 48 hours
% of mortality after 24 hours (mean ± SD)
% of mortality after 48 hours (mean ± SD)

Mortality rate after 24 and 48 hours
Control
30
2
11

2
30
5
18

4
30
10
25

6
30
11
26

8
30
13
27

10
30
16
27

12
30
20
28

Figure 3: Bar diagram shows results for mortality rate (24 and 48 hours) of brine shrimp Artemia nauplii treated with various nanomolar concentrations of silver nanoparticles.

3.3. Hatching Percentage of Artemia nauplii

This study reveals that the silver nanoparticles have an effect not only on the alive animal but also on cysts. It is due to the diffusion of silver nanoparticles through the smooth outer layer of the decapsulated cysts. The results were found after 24 hours to be in such a way that in the control the percentage of hatching was more than 70% which was normal. In minimum concentration of 2 nM the percentage of hatching was 56% and as the concentration increases from 4 nM, 6 nM, and 8 nM, the percentage of hatching was about 50%, 41.6%, and 36%, correspondingly. The percentage of hatching was very low as 31.6% and 21.6% as the concentration increased to the maximum such as 10 nM and 12 nM. Hence the results revealed that as the concentration of the silver nanoparticles increases, the effect of toxicity increases and the hatching percentage of Artemia cysts decreases (Table 2 and Figure 4).

Table 2: Hatching percentage of Artemia cysts treated with various nanomolar concentrations of silver nanoparticles.

Parameter
Concentration levels in nanomolar (nm)
Initial number of Artemia cyst
Number of cysts hatched after 24 hours
Number of cysts unhatched

after 24 hours
Hatching percentage (mean ± SD)

Hatching efficiency after 24 hours
Control
60
43
17

2
60
34
26

4
60
30
30

6
60
25
35

8
60
22
38

10
60
18
42

12
60
13
47

Figure 4: Hatching percentage of Artemia cysts treated with various nanomolar concentrations of silver nanoparticles.

3.4. Morphological Variation of Artemia nauplii Treated with Silver Nanoparticles

The aggregations of silver nanoparticles inside the gut of Artemia nauplii were clearly observed under the phase contrast microscope and the images were photographed. As Artemia generally exhibits nonselective filter feeding behavior, it consumes all particles that are below 50 microns in size. The amount of aggregation not only depends on the amount of concentration, but also depends on the amount of consumption of nanoparticles by each individual animal in various concentrations.

In this study the Artemia nauplii were treated with various nanomolar concentrations of AgNPs such as 2 nM, 4 nM, 6 nM, 8 nM, 10 nM, and 12 nM and after 48 hours of treatment they were observed under the phase contrast microscope and results were photographed. The results showed that in control the animal did not show any trace of aggregation; the mouth parts and the gut region appeared clear (Figure 5(a)). In minimum concentration (2 nM) the aggregation of silver nanoparticles was found around the mouth parts and some regions of the gut (Figure 5(b)), whereas in higher concentration (10 nM), the entire gut region was accumulated with silver nanoparticles (Figure 5(c)). And in maximum concentration (12 nM) the gut was completely filled with silver nanoparticle; due to the effect of high toxicity of silver nanoparticles the tissue of the animal started to degrade (Figure 5(d)).

(a)

(b)

(c)

(d)

Figure 5: Morphological variations of Artemia nauplii treated with silver nanoparticle observed using inverted phase contrast microscope (20x magnification): control (a), 2 nM concentration of AgNPs (b), LC₅₀ concentration (10 nM) of AgNPs (c), and 12 nM concentration of AgNPs (d).

3.5. Apoptosis Analysis: Acridine Orange Staining

The observations were in accordance with in vitro toxicity study on silver nanoparticle, where higher concentrations had more apoptotic cells and necrotic cells than lower concentrations of silver nanoparticle. In order to study the occurrence of apoptosis, Artemia nauplii treated with various concentrations of silver nanoparticles were stained using acridine orange and observed under the fluorescence microscope. At higher concentration such as 12 nM, Artemia nauplii exhibited bright green spots all over the body (Figure 6(d)). In lower concentrations only few green spots were visible in the animal body (Figures 6(b) and 6(c)). And in control there was no appearance of green spots in animal body, as there were no apoptotic cells damaged due to silver nanoparticle (Figure 6(a)). This is due to the condition that as the concentration increases the amount of cell damage increases and the emission of fluorescence by acridine orange stain is proportional to the amount of necrotic cells due to the effect of toxicity of silver nanoparticles. Hence in the animal body the region that emits fluorescence reveals the condition of apoptosis due to toxicity of silver nanoparticles.

(a)

(b)

(c)

(d)

Figure 6: Acridine orange stained Artemia nauplii treated with silver nanoparticles observed using fluorescence microscope (20x magnification): control (a), 2 nM concentration of AgNPs (b), LC₅₀ concentration (10 nM) of AgNPs (c), and 12 nM concentration of AgNPs (d).

3.6. Single Cell Gel Electrophoresis Analysis

In this present study the control result shows that relatively undamaged cells give comets consisting of a compact head with or without a very short tail, indicating double-stranded DNA. Comets originating from damaged cells (LC₅₀ and 12 nM concentration) have a distinct head with a tail. The most basic way of viewing the data from the comet assay is the distribution of cells according to the percentage of DNA in tail moment. The tail DNA of the LC₅₀ and 12 nM concentration results was compared with appropriate control. It can be seen from Table 3 that control did not evoke a significant effect on tail DNA damage of about 3.2%. In minimum concentration of 2 nM the tail DNA damage was observed to be 9.9% and LC₅₀ concentration (10 nM) evoked an increase in percentage of tail DNA damage of 25.5% and at the maximum concentration of 12 nM the increase in tail DNA damage of about 47.9% was compared with the control. Thus in this regard the results of our study clearly indicate that silver nanoparticle used as commercial formulation of above 12 nM concentration will cause high level of DNA damage to the Artemia due to the toxicological effect (Table 3 and Figure 7).

Table 3: Comet assay parameters using CASP software of comet assay.

Comet assay parameter
Control
Minimum concentration (2 nM)
LC₅₀ value (10 nM)
Maximum concentration (12 nM)

Length of head
171
57
39
189

Length of tail
19
14
9
56

Length of comet
190
71
48
245

Head DNA (%)
96.738
90.0932
74.404
52.0968

Tail DNA (%)
3.26201
9.90679
25.596
47.9032

Tail movement
0.619783
1.38695
2.30364
26.8288

Olive tail movement
2.61229
3.0077
4.99172
25.4624

(a)

(b)

(c)

(d)

Figure 7: Fluorescence microscope images (comets) of the propidium iodide stained DNA of Artemia nauplii cells exposed to LC₅₀ concentration of 10 nM AgNPs (c), minimum concentration of 2 nM AgNPs (b), and maximum concentration of 12 nM AgNPs (d) as compared with the control (a) (40x magnification).

4. Discussion

Nanoparticles deserve special attention, because compounds in this miniature size range have chemical properties that differ from those of their larger counterparts [28]. Artemia is one of the most valuable test organisms available for marine ecotoxicity testing as it is widely used as a nutritious live food source to the larvae of a variety of marine organisms, which makes them the most convenient, least labor-intensive live food available for aquaculture and will be impacted greatly by the release of nanoparticles into aquatic systems because of their high levels of interaction with the environment through nonselective filter feeding [29].

In this present study the bioassay lethality test obtained LC₅₀ value at 10 nM concentration among the various concentrations such as 2 nM, 4 nM, 6 nM, 8 nM, 10 nM, and 12 nM [30]. The previous results suggest that the toxicity of silver nanoparticles to aquatic species depends on a concentration-dependent manner [31].

In the present findings, the nanoparticle aggregates to elevated levels of guts that were filled with particles showed significant mortality within 24 hours exposure. The results were found to be in such a way that in the control the mortality was about 6% which was negligible. More than half of the population of nauplii was found to be dead as the concentration increased to the maximum concentrations of 10 nM and 12 nM. And after 48 hours the mortality rate was more than 60% in lower concentrations (<6 nM) and 90% of mortality in higher concentrations of 10 nM and 12 nM. However, these effects were most likely due to the lack of food uptake since the guts were completely filled with the aggregates of silver nanoparticles. The previous study has reported a reduction in hatching percentage of Artemia franciscana cysts exposed to mercury at a concentration as low as 10 nM Hg. The emergence and hatching curves crossed later in the mercury-exposed cysts than in the controls, with the delay being longer in cysts exposed to higher concentrations. This study reveals that the silver nanoparticles have effect not only on the alive animal but also on cysts [32]. Hence in this present study the results revealed that as the concentration of the silver nanoparticles increases (10 nM and 12 nM) the effect of toxicity increases and the percentage of hatching of the Artemia cysts decreases to 20%.

Accumulation of TiO₂ NPs was performed qualitatively on each group at the conclusion of the exposure under a phase contrast microscope equipped with a digital camera. The ingested TiO₂ particles appeared as a long strip of particles suggesting that even larger aggregates of TiO₂ formed inside the guts [33]. And in the present study the aggregation of silver nanoparticles inside the gut of Artemia nauplii was clearly observed under the phase contrast microscope. The results showed that in control the animal did not show any trace of aggregation; the mouth parts and the gut region appeared clear. And in maximum concentration (12 nM) the gut was completely filled with silver nanoparticle; due to the effect of high toxicity of silver nanoparticles the tissue of the animal started to degrade.

The toxicity study of silver nanoparticles in Zebra fish embryos revealed that the acridine orange staining to study apoptosis showed no significant staining in control embryos whereas the Ag-BSA and Ag-starch treated embryos showed green fluorescent spots on the body, which could be explained using the decomposition of body parts [31]. In the present findings acridine orange staining to study apoptosis showed no significant staining in control nauplii as there is no such effect of toxicity of silver nanoparticles. The region in the animal body that emits fluorescence reveals the condition of apoptosis due to toxicity of silver nanoparticles. This is due to the condition that as the concentration increases the amount of cell damage increases and the emission of fluorescence by acridine orange stain is proportional to the amount of apoptotic cells due to the effect of toxicity of silver nanoparticles. And the maximum emission of fluorescence was observed in 12 nM concentration.

The single-cell gel electrophoresis was done in human lymphocytes treated with pesticides such as isomalathion and compared with the control. Isomalathion evoked an increase in comet length at concentration of 200 μM and the increase was 72% as compared with the control [34]. Sun-Young et al. [35] who have reported comet assay have performed an in vitro system from aquatic species; BPA exerts a genotoxic effect on D. magna and C. tentans, given that DNA strand breaks increased in both species exposed to this compound, whereas NP- and CP-induced DNA damage occurred only in C. tentans. In this present study the control result shows that relatively undamaged cells give comets consisting of a compact head with or without a very short tail, indicating double-stranded DNA. Control did not evoke a significant effect on tail DNA damage of about 3.2%. In minimum concentration of 2 nM the tail DNA damage was observed to be 9.9% and LC₅₀ concentration (10 nM) evoked an increase in tail DNA damage of 25.5% and at the maximum concentration of 12 nM the increase in tail DNA damage of about 47.9% was compared with the control. Thus, in this regard the results of our study clearly indicate that silver nanoparticle used as commercial formulation of the above 12 nM concentration will cause high level of DNA damage to the Artemia due to the toxicological effect.

Understanding the potential impacts of these particles can help in identifying the most appropriate nanotechnology that will preserve the marine aquatic environment while also advancing medical and environmental technology. This result also is attributed to our limited knowledge regarding the overall implications of nanoparticles on marine ecosystems as the nanoparticles have proved to be detrimental in this acute toxicity test; its effect in the long run is to be carefully analyzed. Considering that the smaller nanoparticles turned out to be toxic in the present test, it cannot be excluded that the overall toxicological potential will increase in the future. Hence it can be concluded that the uncontrolled and unobserved release of these nanoparticles, either as byproducts or medical wastes, could have a large negative consequence on the aquatic, terrestrial organisms and also on humans. Hence, studies on the fate and effects of nanoparticles in the environment and in the living organisms are needed to more clearly define the benefits and potential risks of this promising technology.

Conflict of Interests

The authors declare that there is no conflict of interests.

Acknowledgments

The authors are thankful to UGC-SAP Programme, New Delhi, India, for financial assistance. The authors are grateful to the National Centre for Nanoscience and Nanotechnology, University of Madras, Chennai, for field emission scanning electron microscope facility.

References

K. Schmid and M. Riediker, “Use of nanoparticles in swiss industry: a targeted survey,” Environmental Science and Technology, vol. 42, no. 7, pp. 2253–2260, 2008.

P. Perugini, S. Simeoni, S. Scalia et al., “Effect of nanoparticle encapsulation on the photostability of the sunscreen agent, 2-ethylhexyl-p-methoxycinnamate,” International Journal of Pharmaceutics, vol. 246, no. 1-2, pp. 37–45, 2002.

S. Jin and K. Ye, “Nanoparticle-mediated drug delivery and gene therapy,” Biotechnology Progress, vol. 23, no. 1, pp. 32–41, 2007.

J. Czupryna and A. Tsourkas, “Suicide gene delivery by calcium phosphate nanoparticles: a novel method of targeted therapy for gastric cancer,” Cancer Biology and Therapy, vol. 5, no. 12, pp. 1691–1692, 2006.

T. Prow, R. Grebe, C. Merges et al., “Nanoparticle tethered biosensors for autoregulated gene therapy in hyperoxic endothelium,” Nanomedicine: Nanotechnology, Biology and Medicine, vol. 2, no. 4, article 276, 2006.

K.-Y. Yoon, J. Hoon Byeon, J.-H. Park, and J. Hwang, “Susceptibility constants of Escherichia coli and Bacillus subtilis to silver and copper nanoparticles,” Science of the Total Environment, vol. 373, no. 2-3, pp. 572–575, 2007.

J. Tian, K. K. Y. Wong, C.-M. Ho et al., “Topical delivery of silver nanoparticles promotes wound healing,” ChemMedChem, vol. 2, no. 1, pp. 129–136, 2007.

J. Asz, D. Asz, R. Moushey, J. Seigel, S. B. Mallory, and R. P. Foglia, “Treatment of toxic epidermal necrolysis in a pediatric patient with a nanocrystalline silver dressing,” Journal of Pediatric Surgery, vol. 41, no. 12, pp. e9–e12, 2006.

T. M. Benn and P. Westerhoff, “Nanoparticle silver released into water from commercially available sock fabrics,” Environmental Science and Technology, vol. 42, no. 11, pp. 4133–4139, 2008.

L. Geranio, M. Heuberger, and B. Nowack, “The behavior of silver nanotextiles during washing,” Environmental Science and Technology, vol. 43, no. 21, pp. 8113–8118, 2009.

R. Kaegi, B. Sinnet, S. Zuleeg et al., “Release of silver nanoparticles from outdoor facades,” Environmental Pollution, vol. 158, no. 9, pp. 2900–2905, 2010.

S. A. Blaser, M. Scheringer, M. MacLeod, and K. Hungerbühler, “Estimation of cumulative aquatic exposure and risk due to silver: contribution of nano-functionalized plastics and textiles,” Science of the Total Environment, vol. 390, no. 2-3, pp. 396–409, 2008.

N. C. Mueller and B. Nowack, “Exposure modeling of engineered nanoparticles in the environment,” Environmental Science and Technology, vol. 42, no. 12, pp. 4447–4453, 2008.

F. Gottschalk, T. Sonderer, R. W. Scholz, and B. Nowack, “Modeled environmental concentrations of engineered nanomaterials (TiO₂, ZnO, Ag, CNT, fullerenes) for different regions,” Environmental Science and Technology, vol. 43, no. 24, pp. 9216–9222, 2009.

F. Gottschalk, T. Sonderer, R. W. Scholz, and B. Nowack, “Possibilities and limitations of modeling environmental exposure to engineered nanomaterials by probabilistic: material flow analysis,” Environmental Toxicology and Chemistry, vol. 29, no. 5, pp. 1036–1048, 2010.

F. Gottschalk and B. Nowack, “The release of engineered nanomaterials to the environment,” Journal of Environmental Monitoring, vol. 13, no. 5, pp. 1145–1155, 2011.

R. D. Handy, F. von der Kammer, J. R. Lead, M. Hassellöv, R. Owen, and M. Crane, “The ecotoxicology and chemistry of manufactured nanoparticles,” Ecotoxicology, vol. 17, no. 4, pp. 287–314, 2008.

E. Navarro, A. Baun, R. Behra et al., “Environmental behavior and ecotoxicity of engineered nanoparticles to algae, plants, and fungi,” Ecotoxicology, vol. 17, no. 5, pp. 372–386, 2008.

J. Fabrega, S. N. Luoma, C. R. Tyler, T. S. Galloway, and J. R. Lead, “Silver nanoparticles: behaviour and effects in the aquatic environment,” Environment International, vol. 37, no. 2, pp. 517–531, 2011.

P. Sorgeloos, “Availability of reference Artemia cysts,” Marine Ecology Progress Series, vol. 3, pp. 363–364, 1980.

P. Vanhaecke and G. Persoone, “Report on an intercalibration exercise on a short-term standard toxicity test with Artemia nauplii (ARC-test),” INSERM 106: 359-376, 1981

S. Sánchez-Fortún, F. Sanz, A. Santa-María et al., “Acute sensitivity of three age classes of Artemia salina larvae to seven chlorinated solvents,” Bulletin of Environmental Contamination and Toxicology, vol. 59, no. 3, pp. 445–451, 1997.

B. S. Nunes, F. D. Carvalho, L. M. Guilhermino, and G. van Stappen, “Use of the genus Artemia in ecotoxicity testing,” Environmental Pollution, vol. 144, no. 2, pp. 453–462, 2006.

A. Kanwar, “Brine shrimp (Artemia salina) a marine animal for simple and rapid biological assays,” Journal of Chinese Clinical Medicine, vol. 2, pp. 236–240, 2007.

C. Blaise, “Microbiotesting: an expanding field in aquatic toxicology,” Ecotoxicology and Environmental Safety, vol. 40, no. 1-2, pp. 115–119, 1998.

X. Liu, M. Atwater, Q. Wang, and J. Juo, “Colloid and surfaces B,” Biointerfaces, vol. 58, pp. 3–7, 2007.

N. P. Singh, M. T. McCoy, R. R. Tice, and E. L. Schneider, “A simple technique for quantitation of low levels of DNA damage in individual cells,” Experimental Cell Research, vol. 175, no. 1, pp. 184–191, 1988.

J. F. Banfield and H. Zhang, “Nanocrystals and the environment—an introduction,” in Nanoparticles and the Environment, Reviews in Mineralogy and Geochemistry, J. F. Banfield and A. Navrotsky, Eds., vol. 44, pp. 11–13, 2001.

S. R. Radhika Rajasree and V. Ganesh Kumar, “Studies on the toxicological effects of engineered nanoparticles in environment—a review,” International Journal on Applied Bioengineering, vol. 4, no. 2, pp. 44–53, 2010.

P. Kumar, S. Senthamilselvi, A. Lakshmi prabha, and S. Selvaraj, “Antibacterial activity and In-vitro cytotoxicity assay against brine shrimp using silver nanoparticles synthesized from Sargassum iliifolium,” Digest Journal of Nanomaterials and Biostructures, vol. 7, no. 4, pp. 1447–1455, 2012.

P. V. Asharani, Y. Lian Wu, Z. Gong, and S. Valiyaveettil, “Toxicity of silver nanoparticles in zebrafish models,” Nanotechnology, vol. 19, no. 25, Article ID 255102, 2008.

E. C. Go, A. S. Pandey, and T. H. MacRae, “Effect of inorganic mercury on the emergence and hatching of the brine shrimp Artemia franciscana,” Marine Biology, vol. 107, no. 1, pp. 93–102, 1990.

M. Ates, J. Daniels, Z. Arslan, and I. O. Farah, “Effects of aqueous suspensions titanium dioxide nanoparticles on Artemia salina: assessment of nanoparticle aggregation, accumulation and toxicity,” Environmental Monitoring and Assessment, vol. 185, no. 4, pp. 3339–3348, 2012.

J. Błasiak and A. Trzeciak, “Single cell gel electrophoresis (comet assay) as a tool for environmental biomonitoring. An example of pesticides,” Polish Journal of Environmental Studies, vol. 7, no. 4, pp. 189–194, 1998.

P. Sun-Young, L. Si Won, and C. Jinhee, “Evaluation of genetic toxicity from environmental pollutants in Daphnia magna and Chironomus tentans for application in ecological risk assessment,” Environmental Engineering Research, vol. 11, no. 5, pp. 277–284, 2006.