The Scientific World Journal

Volume 2014 (2014), Article ID 270939, 7 pages

http://dx.doi.org/10.1155/2014/270939

Research Article

Solution of AntiSeepage for Mengxi River Based on Numerical Simulation of Unsaturated Seepage

Youjun Ji,1,2 Linzhi Zhang,² and Jiannan Yue²

¹State Key Laboratory of Oil and Gas Reservoir Geology and Exploitation (Southwest Petroleum University), Chengdu 610500, China

²School of Civil Engineering and Architecture, Southwest Petroleum University, Chengdu 610500, China

Received 8 September 2013; Accepted 13 November 2013; Published 24 February 2014

Academic Editors: C. W. Chang-Jian, A. Esmaeily, and A. Rodríguez-Castellanos

Copyright © 2014 Youjun Ji et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Lessening the leakage of surface water can reduce the waste of water resources and ground water pollution. To solve the problem that Mengxi River could not store water enduringly, geology investigation, theoretical analysis, experiment research, and numerical simulation analysis were carried out. Firstly, the seepage mathematical model was established based on unsaturated seepage theory; secondly, the experimental equipment for testing hydraulic conductivity of unsaturated soil was developed to obtain the curve of two-phase flow. The numerical simulation of leakage in natural conditions proves the previous inference and leakage mechanism of river. At last, the seepage control capacities of different impervious materials were compared by numerical simulations. According to the engineering actuality, the impervious material was selected. The impervious measure in this paper has been proved to be effectible by hydrogeological research today.

1. Introduction

There are problems of leakage in mass of rivers, lakes, reservoir, and irrigation canals, which bring serious waste of water. The ground water and soil will be polluted when the industrial sewage leaks into soil. Most of the areas of earth surface are located in the arid or semiarid area, so soil in most projects is unsaturated [1–4]. Leakage of river is typical unsaturated seepage. Considering unsaturated seepage in seepage calculation of ground water is much more practical than just thinking of saturated seepage. The boundary of conventional seepage calculation is free water surface and unsaturated seepage is ignored. Mathematic description and parameter determination are complex for unsaturated seepage [5–7].

Study was focused on analytical solution of unsaturated seepage in the 1970s. With the popularization of computer technology, numerical method of unsaturated seepage appeared in the 1980s. From the 1990s, researchers realized that permeability played an important role in improving accuracy of numerical method. The permeability of unsaturated soil had become a hotspot [8, 9].

2. Mathematical Model of Ground Water Seepage

In 1856, H. Darcy conducted permeability test of saturated soil and developed Darcy’s law 1. Richards thought that Darcy’s law was applicative for unsaturated soil but the permeability coefficient was variable, which was the function of moisture volume percentage 2 [10–12]. The equations of motion for unsaturated seepage are

where is the velocity of the , and directions, respectively, and is water head.

While ignoring the deformation of unsaturated porous medium, according to principle of mass conservation [13, 14], the equation of continuity is

By substituting (1) in (2), we obtain the fundamental equation of unsaturated seepage, which is

where is moisture volume percentage and is permeability coefficient.

3. Numerical Model of Leakage

The Mengxi River is located in Chengdu Plain which is in the southwest of China. The Mengxi River is artificial river in the campus of Southwest Petroleum University, whose length is 2 kilometers. The biggest width of river is 15 meters and the smallest width is 2 meters. The water level was 5 meters at first and then leakage phenomenon was serious. The satellite imagery of Mengxi River is shown in Figure 1 and red arrow points to the study area. Figure 2 is true scene of Mengxi River.

Figure 1: Satellite imagery.

Figure 2: Satellite imagery of study area.

In order to measure the topographical map of the Mengxi River, more than 100 points were measured. The place of measuring points and boreholes is shown in Figure 3. Figure 4 is the interpolated topographic map. There are 18 boreholes, which are evenly distributed among the study area. The study area consists of miscellaneous fill, plain fill, silty clay, sandy silt, fine sand, medium sand, and gravel layer.

Figure 3: Arrangement plan of measuring points and boreholes.

Figure 4: Interpolated topographic map.

The three-dimensional geological model was established on the basis of topographic map and geologic examination. The numerical calculation model is shown in Figure 5. The grid number of each direction is 50, 50, and 10.

Figure 5: Numerical calculation model.

The double-ring infiltrometer is common instrument to measure permeability of unsaturated soil on the spot. The double-ring infiltrometer has a higher accuracy than single-ring infiltrometer and test hole. A new simple apparatus of double-ring infiltrometer was developed to test the permeability of soil and 24 pairs of trials were conducted. The simple apparatus is shown in Figure 6. Data in Table 1 is some experimental data of various trials.

Table 1: Experimental data.

Volume of inject water/mL
Time/min

10
20
30
40
50
60
70
80
90
100

Number 1 hole
235
250
180
200
220
250
220
225
200
190

Number 2 hole
180
260
275
270
265
275
270
280
270
270

Number 3 hole
170
260
270
260
245
300
290
150
200
225

Number 4 hole
155
205
215
210
190
185
190
175
180
170

Figure 6: Simple apparatus of double-ring infiltrometer.

The gas-water two-phase flow experiments of unsaturated hydraulic conductivity were carried out by testing instrument of state key laboratory of oil and gas reservoir geology and exploitation, and the characteristic curves of unsaturated seepage were acquired by the experiments. In numerical simulation, instead of the curve of conductivity versus matric suction and the curve volumetric water content of soil versus matric suction, we use the relative permeability curves of water and gas, which simplified the computational process and improved the speed of calculation. On the other hand, the leakage quantity was acquired accurately by integral calculation of seepage velocity. Comparing the calculation result with data of hydrologic exploration, the simulation results are very close to actual situation.

As referred to the flow of gas and water in the porous media, the velocity of each phase depends on the their relative volume, which can be described as the relative permeability curve of water and gas, through the equipment (shown in Figure 7) from State Key Laboratory of Oil and Gas Reservoir Geology and Exploitation (Southwest Petroleum University); the results is shown in Figure 8.

(a)

(b)

(c)

Figure 7: The sketch of equipment.

Figure 8: The relative permeability of water versus gas.

4. Results and Discussion

The water saturation and pore pressure change with the leakage of water. The initial water saturation of model is 32% and the initial pore pressure is 55 kPa, supposing the water level of the Mengxi River is 3 meter.

Figure 9 shows the initial distribution of water saturation. Figures 10 and 11 show the distribution of water saturation after 100 days and 245 days, respectively. By Figures 9, 10, and 11, it is obvious that the water saturation increases. The water saturation of area increases from 32% to 65%. The water saturation of area above water level decreases slightly. Reason for this phenomenon is that water in the river and surface soil leaks continuously and the water of lower soil get recharged.

Figure 9: Initial water saturation distribution.

Figure 10: The water saturation after 100 days.

Figure 11: The water saturation after 245 days.

Figure 12 shows the pore pressure after 100 days and Figure 13 shows the pore pressure after 245 days. With reference to Figures 12 and 13 we can see that pore pressure increases along with depth direction. Another conclusion is that the farther away from the river is, the smaller the pore pressure is. The biggest pore pressure is in the bottom and it runs up to as much as 59 kPa.

Figure 12: The pore pressure after 100 days.

Figure 13: The pore pressure after 245 days.

Figure 14 shows the velocity vector diagram. The water leaks around from river. The seepage velocity decreases with the increase of distance. Leakage leads to the change of water saturation and pore pressure.

Figure 14: The flow vector of water under river.

In order to harness the leakage and decrease seepage, the performance of seepage prevention of asphalt and antiseepage film was compared in the study. The biggest water saturation is 51% when the river bed and bank have a superstratum of asphalt shown in Figure 15. The biggest water saturation is 37.4% when the river bed and bank have a superstratum of antiseepage film shown in Figure 15. Figure 16 shows the curve of monthly drawdown after antiseepage measure. Figure 17 shows the reduction of water level under different conditions.

Figure 15: Water saturation with asphalt superstratum.

Figure 16: Water saturation with antiseepage film superstratum.

Figure 17: The reduction of water level.

5. Conclusion

(1)The hydraulic conductivity of the soil in Mengxi River was tested by double-ring infiltrometer. The total station was applied to measure the topography of the ground surface surrounding the river. The geological model of Mengxi River was set up by the combination of strata data.(2)Based on seepage mechanics, fluid mechanics, and soil mechanics, the model considering unsaturated seepage of the ground water was established, combined with the hydrological and geological conditions of Mengxi River; the numerical model was built.(3)The leakage of water from Mengxi River was simulated and the results indicate that the leakage was serious. After 245 days, the saturation of the soil under the river increased by 33%, from 32% to 65%; the saturation of soil in the riverbed and slope goes up obviously.(4)The asphalt and impermeable membrane were paved, respectively, to prevent the leakage of water; both of them can reduce the water loss in river, but the effect of the latter is better than the former; when the impermeable membrane was used as waterproof material, the maximal value of soil’s saturation under the river only reached 37.4% which is far below the saturation of soil on condition of asphalt as waterproof material.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was financially supported by the Open Foundation Project from State Key Laboratory of Oil and Gas Reservoir Geology and Exploitation of Southwest Petroleum University (Grant no. PLN1131), reconstruction method of pore scaled model for coal bed rock (Grant no. KSZ1211), effective development technology of ultralow permeability reservoir (Grant no. 2011ZX05013004), the Key Project (Grant no. 13ZA0189) from Education Department of Sichuan Province, the Open Experiment Project Leakage Analysis and Prevention Methods of the MENGXI River Located in Southwest Petroleum University (Grant no. KSZ1128) from Southwest Petroleum University, Natural Science Foundation of China (Grant no. 51074137 and no. 51174170), major projects (09ZA139, 12ZA197) from the Education Department of Sichuan Province, the key project (Grant no. 2012XJZ027) from Science and Technology Fund of Southwest Petroleum University, and the SWPU Geotechnical Mechanics and Engineering Science & Technology Innovation (Cultivation) Youth Team (no. 2013XJZT006).

References

C. X. Mao, Calculation and Control of Leakage, China Water Conservancy Press, Beijing, China, 1990.

S. Song, X.-L. Zheng, F.-D. Li, S.-B. Tian, and G.-Q. Lin, “Flood routing simulation and system customization for a high-leakage river channel in China,” Journal of Hydraulic Engineering, vol. 139, no. 6, pp. 656–663, 2013.

D. H. White, N. Beynon, and O. Kingma, “Identifying opportunities for achieving water savings throughout the Murray-Darling Basin,” Environmental Modelling and Software, vol. 21, no. 7, pp. 1013–1024, 2006.

C. F. Knutson, D. D. Gonzales, J. B. Weeks, J. E. Weir Jr., F. A. Welder, and J. D. Bredehoeft, “Hydrology of the Rio Blanco site,” Transactions of the American Nuclear Society, vol. 17, pp. 19–20, 1973.

H.-Y. Gao, Q.-B. Huang, D.-Z. Wang, and Y. Yi, “A study of design parameters for the tunnels of the Xi’an metro line 3 passing obliquely through active ground fissure zones,” Modern Tunnelling Technology, vol. 49, no. 6, pp. 128–131, 2012.

J.-J. Liu and G.-H. Pei, “Analysis on the fluid-solid coupled flow in low permeability fractured reservoir,” Chinese Journal of Applied Mechanics, vol. 21, no. 1, pp. 36–39, 2004.

J.-H. Liu and Z.-Y. Guo, “Based on the theory of unsaturated soil drainage design method for highway,” Journal of Tongji University, vol. 34, no. 2, pp. 21–20, 2006.

Y.-J. Ji, J.-J. Liu, and L.-S. Cheng, “Numerical simulation of tunnel excavation considering fluid solid coupling,” Rock and Soil Mechanics, vol. 32, no. 4, pp. 1229–1233, 2011.

X.-M. Ji, “Discussion on the research of coupled solid and fluid flow in tunnel engineering,” Chinese Journal of Underground Space and Engineering, vol. 2, no. 1, pp. 149–154, 2006.

Z. M. Yin and Z. C. Liu, “Changes of rock structure after water flooding in Ansai oil field,” Scientia Geologica Sinica, vol. 8, no. 3, pp. 321–330, 1999.

Y. J. Ji, L. S. Cheng, J. J. Liu, L. Y. Ye, and D. Liu, “A simulation of casing damage considering THM coupling,” Petroleum Science and Technology, vol. 29, no. 10, pp. 977–987, 2011.

G. H. Mao, W. Y. Shao, and Y. Zhang, Application of Fluid Mechanics, Higher Education Press, Beijing, China, 2001.

Z. S. Li, S. Z. Wu, Z. Yang, and Z. H. Zhao, Engineering Fluid Mechanics and Applications, China's Building Materials Industry Press, Beijing, China, 2001.

T.-C. Li, S.-C. Li, W.-Z. Chen, and X.-B. Qu, “Coupled fluid-mechanical analysis of Xiamen subsea tunnel,” Chinese Journal of Geotechnical Engineering, vol. 26, no. 3, pp. 397–401, 2004.