The Scientific World Journal

Volume 2014 (2014), Article ID 435816, 5 pages

http://dx.doi.org/10.1155/2014/435816

Research Article

Influence of the Feed Moisture, Rotor Speed, and Blades Gap on the Performances of a Biomass Pulverization Technology

Siyi Luo,¹ Yangmin Zhou,¹ Chuijie Yi,¹ Yin Luo,² and Jie Fu³

¹School of Environmental and Municipal Engineering, Qingdao Technological University, Qingdao 266033, China

²State Key Laboratory of Pharmaceutical Biotechnology, School of Life Sciences, Nanjing University, Nanjing 210093, China

³Environmental Engineering Program, Department of Civil Engineering, Auburn University, Auburn, AL 36849, USA

Received 28 August 2013; Accepted 17 November 2013; Published 22 January 2014

Academic Editors: T. Phuoc and S. Poncet

Copyright © 2014 Siyi Luo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Recently, a novel biomass pulverization technology was proposed by our group. In this paper, further detailed studies of this technology were carried out. The effects of feed moisture and crusher operational parameters (rotor speed and blades gap) on product particle size distribution and energy consumption were investigated. The results showed that higher rotor speed and smaller blades gap could improve the hit probability between blades and materials and enhance the impacting and grinding effects to generate finer products, however, resulting in the increase of energy consumption. Under dry conditions finer particles were much more easily achieved, and there was a tendency for the specific energy to increase with increasing feed moisture. Therefore, it is necessary for the raw biomass material to be dried before pulverization.

1. Introduction

Concerns about the depletion of fossil fuel reserves and the pollution caused by continuously increasing energy demands have made biomass an attractive alternative energy source [1]. However, the disadvantages of raw materials (i.e., variability of quality and calorific value, difficulty in controlling the rate of burning and in mechanizing continuous feeding) limit the industrial application of biomass [2, 3]. Several disadvantages may be attributed to the adverse effect of heterogeneity, which could be eliminated by pulverization pretreatment [4].

Several types of size reduction units are in common use for the pulverization of biomass, such as cutter mill [5], vibration mill [6], and refiner. Cutter mill relies on shear force; vibration mill bases on impact and shear stress; refiner works through grinding force. The above pulverization technologies can crush biomass into micron dimension products; however, the energy consumption of these processes was very high [6]. At present, research activities mainly focus on the development of novel biomass pulverization technology with higher efficiency and lower energy consumption.

In our previous work [7], a novel biomass pulverization technology was developed, which can break wood chip (22 mm) into wood powder (150 μm) with lower energy consumption (80 kWht⁻¹). The novel crushing system was mainly composed of primary crusher, advanced crusher, cyclone dust extractor, bag filter for collection of products, fan, and so forth (shown in Figure 1).

Figure 1: The schematic of the biomass crushing system: 1: primary crusher, 2: advanced crusher, 3: cyclone dust extractor, 4: fan, and 5: bags filter.

The production procedure was as follows [7]. The raw biomass materials were firstly crushed in the primary crusher, where particles with particle size less than 5 mm were generated, and then they were automatically pushed into the advanced crusher by the driving force from the fan. After further pulverization in the advanced crusher, the fine particles with particle size below 250 μm were driven into cyclone dust extractor and bag filter in sequence by the driving force from the fan, while the coarser particles stayed in the crusher for further fragmentation.

It is very important for maximizing energy utilization to optimize the operation conditions of the crushing system. Because the crushing forces in the crusher are shearing force, impacting force, and grinding force, blades gap and rotor speed are key influencing factors for energy efficiency and product quality [8]. In addition, the effect of raw material characteristics should also be taken into account. Feed moisture, a widely concerned parameter when referring to parameters optimization, showed a significant effect on the behavior of crusher in our previous study [9]. Some researches indicate that at high moisture content, the materials tend to absorb the impact energy of the crusher and deform rather than break. High feed moisture also has adverse effect on products quality.

The present work is mainly concerned with detailed studies of the effects of feed moisture and crusher operational parameters (rotor speed and blades gap) on product size distribution and energy consumption. The results would be helpful in the design of high-efficiency crushing system and the selection of technical parameters for minimal energy consumption under pulverization.

2. Experimental

2.1. Material

Approximately 100 kg of raw material for pulverization tests was cotton stalk, obtained from Qingdao City, China. In order to eliminate the adverse effects of material properties on experimental repeatability, the cotton stalk was artificially broken into about 500 mm in length. Then the crushed cotton stalk was solar dried for 2–7 days. According to the difference in drying time, the raw material was separated into four groups, with the moisture levels being 10.6%, 16.1%, 18.8%, and 24.2%, respectively.

2.2. Equipment

The lab-scale crushing system was mainly composed of primary crusher, advanced crusher, cyclone dust extractor, bag filter for collection of products, fan, and so forth. The structures of primary and advanced crushers were specifically described in the previous paper [7]. The technical parameters of the crushing system are shown in Table 1.

Table 1: Technical parameters of the lab-scale crushing system.

Parameter
Primary crusher
Advance crusher

Drive power/KW
10
15

Rotation speed/rpm/min
2000
3000

Number of rotating blades
8
12

Length of rotating blade/mm
400
450

Working load/kg/h
50
50

Blades gap/mm
50
20

2.3. Procedure

During pulverization tests, all operating parameters were recorded, including rotor speed, blades gap, energy consumption of power equipment (like primary crusher, advanced crusher, fan, etc.), and output rate. As the effects of primary crusher on specific energy and product size distribution are less pronounced, this paper mainly focused on the discussion of operating parameters of advanced crusher. The rotor speed and blades gap of primary crusher were kept constant at 2000 rpm/min and 50 mm, respectively. The experimental conditions were summarized in Table 2.

Table 2: Operation conditions of advanced crusher.

Run number
Rotor speed/r/min
Blades gap/mm
Feed moisture/%

1
3000
20
10.6

2
3600
20
10.6

3
4200
20
10.6

4
4200
10
10.6

5
4200
8
10.6

6
4200
5
10.6

7
4200
10
16.1

8
4200
10
18.8

9
4200
10
24.2

2.4. Analysis

To assess the performance of the crushing system, the following variables are defined and determined.

2.4.1. Specific Energy

The driving motors of primary crusher and advanced crusher were coupled to commercial wattmeter to measure the consumed power online, P P and P A, respectively. Based on the power plots shown on the wattmeter screen, the net exposure time, t E, could be estimated. The total power (P N) was estimated as follows:

where P F was the power of the driving motor of fan. The specific energy E N was given by

where m M represented the product mass.

2.4.2. Particle Size Distribution

The collected products were sieved in a commercial mechanical sieve shaker. The duration of sieving was 10 min for each sample, which was previously determined through trials to be optimal. After sieving, the mass retained on each sieve was weighed.

3. Results and Discussion

3.1. Effects of Rotor Speed

Drobny et al. [10] indicated that with hammer mill higher rotor speed generated finer particles with higher energy consumption. The same results were achieved by Fitzgerald and Themelis [8] on size reduction of municipal solid waste (MSW), which showed that the specific energy could be optimized by lowering rotor speed.

The particle size distribution and specific energy consumption obtained with different rotor speeds are shown in Figure 2 and Table 3, respectively. Different rotate speeds were achieved by changing the belt pulley diameter ratio of rotor to motor.

Table 3: Effect on rotor speed of advanced crusher on specific energy consumption.

Rotor speed/r/min
Specific energy/kWht⁻¹

3000
72.0

3600
83.4

4200
88.1

Figure 2: Product size distribution of pulverized biomass as a function of rotor speed of advanced crusher.

The trend shown in Figure 2 was similar with the results reported in the previous studies. The products size distribution became much finer with increasing rotor speed, which can be explained as follows: higher rotor speed improved the hit probability between the blades and materials, enhancing the impacting and grinding effects. The variation of specific energy with rotor speed showed an increasing trend (Table 3). The specific energy consumption changed from 72.0 kWht⁻¹ at 3000 rpm/min to 88.1 kWht⁻¹ at 4200 rpm/min and increased by 22.4%. It can be explained as follows: up to 20% of high speed crusher power was wasted on bearing friction and windage of the rotor; meanwhile many interspaces between raw materials and discontinued feeding lead to the blades idling, increasing energy consumption consequently. And the trend became much more pronounced at higher rotor speed. In general, it is necessary to choose a proper rotor speed based on reasonable energy costs and the desired products size distribution in industrial production.

3.2. Effects of Blades Gap

The particle diameter distribution and specific energy were plotted against the blades gap in Figures 3 and 4, respectively.

Figure 3: Product size distribution of pulverized biomass as a function of blades gap of advanced crusher.

Figure 4: Effect on blades gap of advanced crusher on specific energy consumption.

As shown in Figure 3, the smaller the blades gap, the finer the products size distribution was. As the blades gap was 20 mm, 42.8% of biomass powders were below 106 μm in size, and for the blades gap of 8 mm the value was 71.5%. In the unconfined crushing system the energy transfer is a hit-or-miss proposition [11]; the narrow spaces between blades increase the density of particles in crushing chamber and intercollision proposition, as well as enhancing meshing and grinding effects between blades and particles. Alternatively the increase of blades gap makes the material easy to rotate under fragmentation due to increased torque, causing the decline of products quality.

As torque was kept constant, the decrease of blades gap can result in the increase of shear stress. This was illustrated in Figure 4, which showed that with the decrease of blades gap, the energy consumption appears to be an increasing trend.

It can also be seen in Figure 3 that the effect of blades gap on particles size became less significant when the blades gaps was below 8 mm. The finer products (particle size below 106 μm) percentages were 71.5% and 75.3%, respectively, as blades gap were 8 mm and 5 mm, while the specific energy went on increasing. Consequently, there existed an optimum value of blades gap for the pulverization of cotton stalk in the crusher, and 8 mm was an optimal value for blades gap in this test.

3.3. Effects of Feed Moisture

The particle size distribution and specific energy, as a function of feed moisture were shown in Figures 5 and 6, respectively.

Figure 5: Effect of feed moisture on particle size distribution of pulverized biomass.

Figure 6: Effect of feed moisture on specific energy.

The results presented in Figure 5 indicated that there was a pronounced effect of feed moisture on product size distribution. As can be observed, a coarser product size distribution can be achieved at higher moisture contents. An explanation may be that volume and surface fragmentation occurs by impact and grind method, and the addition of water in material lowers the strength of crushing forces due to lubrication.

With respect to specific energy, the value steadily increased with the increase of feed moisture, which can be seen in Figure 6. As shown in (1), residence time (net explore time t E) is a key factor influencing specific energy. The residence time of particles in crushing chamber is decided by the flow rate of the fan and coarser particles content. Higher feed moisture causes the products to contain large amounts of coarser particles, resulting in the increases of residence time and energy consumption.

In summary, the drying process is necessary for the pulverization of biomass and the drying conditions (like temperature and time, etc.) are decided based on comprehensive consideration of energy costs and product size requirements. For the pulverization of cotton stalk in the crushing system, the feed moisture should be below 16%. Factually, in other pulverization processes, such as preshredding of MSW [12], a predrying process is usually needed prior to pulverization operation.

4. Conclusions

In the paper, a novel biomass pulverization technology was introduced, and the effects of feed moisture and crusher operation parameters (rotor speed and blades gap) on product size distribution and energy consumption were discussed.

Higher rotor speed generated much finer particles with higher energy consumption. Decreasing blades gap can improve products quality; however, it resulted in the increase of specific energy. The effect became less significant when the blades gap was below 8 mm. Higher feed moisture resulted in the decline of products quality and the increase of energy consumption. Thus, it is necessary for the raw biomass material to be dried before pulverization.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors would like to acknowledge the financial support received from a project of Qingdao Science and Technology Program (13-1-4-175-jch), a project of Shandong Province Higher Educational Science and Technology Program (J12LC03), and the Natural Science Foundation of Shandong Province (no. ZR2011EEQ016).

References

F. McGowan, “Controlling the greenhouse effect: the role of renewables,” Energy Policy, vol. 19, no. 2, pp. 110–118, 1991.

C. Ryu, Y. B. Yang, A. Khor, N. E. Yates, V. N. Sharifi, and J. Swithenbank, “Effect of fuel properties on biomass combustion: part I. Experiments—fuel type, equivalence ratio and particle size,” Fuel, vol. 85, no. 7-8, pp. 1039–1046, 2006.

A. A. Khan, W. de Jong, P. J. Jansens, and H. Spliethoff, “Biomass combustion in fluidized bed boilers: potential problems and remedies,” Fuel Processing Technology, vol. 90, no. 1, pp. 21–50, 2009.

T. G. Bridgeman, L. I. Darvell, J. M. Jones et al., “Influence of particle size on the analytical and chemical properties of two energy crops,” Fuel, vol. 86, no. 1-2, pp. 60–72, 2007.

L. S. Esteban and J. E. Carrasco, “Evaluation of different strategies for pulverization of forest biomasses,” Powder Technology, vol. 166, no. 3, pp. 139–151, 2006.

N. Kobayashi, P. Guilin, J. Kobayashi, S. Hatano, Y. Itaya, and S. Mori, “A new pulverized biomass utilization technology,” Powder Technology, vol. 180, no. 3, pp. 272–283, 2008.

S. Luo, C. Liu, B. Xiao, and L. Xiao, “A novel biomass pulverization technology,” Renewable Energy, vol. 36, no. 2, pp. 578–582, 2011.

G. C. Fitzgerald and N. J. Themelis, “Techanical and economic impacts of pre-shredding the MSW feed to moving grate WTE boilers,” in Proceedings of the 17th Annual North American Waste to Energy Conference (NAWTEC '09), pp. 243–249, Chantilly, Va, USA, May 2009.

S. Luo, B. Xiao, and L. Xiao, “A novel shredder for municipal solid waste (MSW): influence of feed moisture on breakage performance,” Bioresource Technology, vol. 101, no. 15, pp. 6256–6258, 2010.

N. L. Drobny, H. E. Hull, and R. F. Testin, Recovery and Utilization of MSW, U.S. Public Health Service Publication, 1971.

P. C. Kapur, O. Gutsche, and D. W. Fuerstenau, “Comminution of single particles in a rigidly-mounted roll mill part 3: particle interaction and energy dissipation,” Powder Technology, vol. 76, no. 3, pp. 271–276, 1993.

S. Y. Luo, X. H. Yang, X. C. Tao, Y. Luo, and J. Fu, “Research on the optimization of a novel municipal solid waste shredder,” Journal of Renewable and Sustainable Energy, vol. 5, Article ID 013111, 2013.