The Scientific World Journal

Volume 2014 (2014), Article ID 572165, 8 pages

http://dx.doi.org/10.1155/2014/572165

Research Article

Electronically Tunable Quadrature Oscillator Using Grounded Components with Current and Voltage Outputs

Hua-Pin Chen

Department of Electronic Engineering, Ming Chi University of Technology, New Taipei, Taiwan

Received 22 April 2014; Revised 26 June 2014; Accepted 26 June 2014; Published 10 July 2014

Academic Editor: Soliman A. Mahmoud

Copyright © 2014 Hua-Pin Chen. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The electronically tunable quadrature oscillator using a single multiple-output current controlled current differencing transconductance amplifier (MO-CCCDTA) and grounded passive components is presented. The proposed configuration uses a single MO-CCCDTA, two grounded capacitors and one grounded resistor. Two high-output impedance quadrature current signals and two quadrature voltage signals with 90° phase difference. The oscillation condition and oscillation frequency of the proposed quadrature oscillator are independently controllable. The use of only grounded passive components makes the proposed circuit ideal for integrated circuit implementation.

1. Introduction

At present, there is a growing interest in designing analogue current-mode signal-processing circuits. Various new current-mode active building blocks have received considerable attentions owing to their larger dynamic range, greater linearity, wider bandwidth, and low power consumption with respect to operational amplifier-based circuits [1–6]. As a result, current-mode active components have been increasingly used to realize active filters and sinusoidal oscillators. Single-element-controlled sinusoidal oscillators find numerous applications in communication, control systems, signal processing, instrumentation, and measurement systems as test oscillators or signal generators [7–11]. A quadrature oscillator is used because the circuit simultaneously provides two sinusoids with 90° phase difference for a variety of applications, such as in telecommunications for quadrature mixers, in single-sideband generators, and in direct-conversion receivers or for measurement purposes in vector generators or selective voltmeters [11]. Quadrature signals are an essential part of modern RF-communication architectures such as zero-IF and image-reject receivers [12]. The quadrature oscillator described in [13] was developed for its possible use within a soil-impedance measurement system.

In 2003, a new current-mode active element that is called current differencing transconductance amplifier (CDTA) was introduced [14]. It has a pair of low-impedance current inputs and and an auxiliary terminal , whose outgoing current is the difference of input currents [15]. Owing to the current conveying, the CDTA is one of the modifications of the current conveyor. This element, connected with some external passive components, makes it possible to build many important applications like filters [16, 17] and oscillators [18, 19]. Many modifications of CDTA structure can be found in the literature. For example, duplication of the terminal is discussed in [20, 21], replacement of the transconductance amplifier with the voltage follower is discussed in [22], and replacement of the current differencing stage with the current buffer is discussed in [23]. In 2011, a new kind of resistorless voltage-mode and current-mode quadrature sinusoidal oscillator using a single differential voltage current-controlled conveyor transconductance amplifier (DVCCTA) and two grounded capacitors has been proposed [24]. The circuit provides two explicit quadrature current outputs and two quadrature voltage outputs, simultaneously. The oscillation condition and oscillation frequency are independently controllable. However, no voltage-mode and current-mode quadrature oscillator circuit based on single multiple-output current controlled current differencing transconductance amplifier (MO-CCCDTA) has been proposed which simultaneously provides two explicit quadrature current outputs and two quadrature voltage outputs in the same configuration. Recently, an electronically controllable current-mode quadrature oscillator using a single MO-CCCDTA as the active element has been introduced [25], in which the operational transconductance amplifiers (OTAs) at the two output ports can be controlled by an external bias current. This proposed circuit employs a single MO-CCCDTA, two grounded capacitors, and one grounded resistor and offers the advantages of (i) independent control of condition of oscillation (CO) and frequency of oscillation (FO) and (ii) low active and passive sensitivities. However, one of the current outputs is available on a grounded capacitor. One requires additional current follower for sensing and taking out the quadrature current output therein. The use of additional current follower with the virtual grounded input may result in floating capacitor realization for what is originally described as grounded capacitor realization.

In this paper, the author also proposes another simple electronically controllable grounded capacitor quadrature oscillator using a single MO-CCCDTA. The proposed circuit has all of the advantages by Prasad et al. [25] in addition to one more advantage of high-output impedance current outputs without using additional current followers. Both current-mode and voltage-mode quadrature signals can be simultaneously obtained in the proposed circuit. Sinusoidal oscillators which produce both current and voltage output signals are useful for their versatility. Since the proposed circuit consists of single MO-CCCDTA and all grounded passive components, it is more suitable for integrated circuit implementation.

2. Proposed Current-Mode and Voltage-Mode Quadrature Oscillator

MO-CCCDTA is relatively new active element [25] and has received considerable attention as current-mode active element. The MO-CCCDTA design concept originated from the CDTA [14]. The circuit symbol of the MO-CCCDTA is shown in Figure 1 [25]. It consists of two well-known and mutually independent building blocks, namely, copy CDTA and dual-output OTA. OTA is relatively independent. The MO-CCCDTA with multiple and terminals has been used to create the quadrature oscillator. The terminal characteristics of the MO-CCCDTA are given by , , , , , and , where and is the external impedance connected to the terminal of the CDTA [25]. and indicated in Figure 1 show the external bias currents which control the transconductances to make the circuit electronically controllable [25]. The proposed current-mode and voltage-mode quadrature oscillator is shown in Figure 2. It is based on a single MO-CCCDTA, two grounded capacitors, and one grounded resistor. The use of only grounded passive components makes the proposed circuit ideal for integrated circuit implementation. Routine analysis of the proposed oscillator circuit of Figure 2 yields the following characteristic equation:

Figure 1: MO-CCCDTA symbol [25].

Figure 2: The proposed current-mode and voltage-mode quadrature oscillator.

From (1), the CO is

and the FO is

As indicated by (2) and (3), the CO can be controlled independently of FO by changing ; the FO can be controlled by and hence it is current controllable by bias current . From Figure 2, under steady state, the relationships between output currents and are

ensuring the currents and to be in quadrature.

The relationships between output voltages and are

ensuring the voltages   and to be in quadrature.

Clearly, the current-mode and voltage-mode quadrature signals can be simultaneously obtained from Figure 2. Because the output impedances of the currents and in Figure 2 are very high, the two output terminals, and , can be directly connected to the next stage. It should be noted that the two quadrature voltages are to be buffered before use. This would require larger area on the chip and more power consumption. To the best of author’s knowledge, no single active element oscillator is proposed till date that simultaneously provides explicit quadrature current outputs and buffered voltage outputs, without using external voltage buffers.

3. Nonideality Analysis and Design Considerations

Taking the nonidealities of the MO-CCCDTA into account, the relationship of the terminal voltages and currents can be rewritten as for , , , , , and . represents the nonideal current transfer gain from the terminal to the terminal of the MO-CCCDTA, denotes the nonideal current transfer gain from the terminal to the terminal of the MO-CCCDTA, is the transconductance inaccuracy factor from the terminal to the terminal of the MO-CCCDTA, and is the transconductance inaccuracy factor from the terminal to the terminal of the MO-CCCDTA. Considering them, the modified CO and FO are given as

The active and passive sensitivities are obtained as

The active and passive sensitivities remain less than unity and hence the circuit exhibits a satisfactory sensitivity performance.

A study is next carried out on the effects of various parasitics of the MO-CCCDTA used in the proposed circuit. A practical MO-CCCDTA device can be modeled as ideal MO-CCCDTA with finite parasitic resistances and capacitances. Figure 3 shows the nonideal MO-CCCDTA model including its parasitic elements. The nonzero parasitic input impedances at terminals and of the MO-CCCDTA are represented by and , respectively. The parasitic resistance and parasitic capacitance appear between the high-impedance terminals of the MO-CCCDTA and grounded. The parasitic resistance and parasitic capacitance appear between the high-impedance terminals of the MO-CCCDTA and grounded. It is further noted that the proposed circuit employs external capacitors and parallel connecting to the terminals and , respectively. As a result, the effects of the parasitic capacitances and can be absorbed, due to the fact that , and . To alleviate the effects of parasitic impedance at terminal , the MO-CCCDTA should be designed to have a very low input parasitic resistance at terminal . In the ideal case, the value of input parasitic resistance at terminal is zero and terminal is virtually grounded. Thus, the parasitic impedance at terminal is connected between a virtual grounded resistance and a true grounded impedance . This fact affects the operating frequency in the high frequency region. To reduce its effect, one possible solution is to make the operating frequency . The parasitic capacitance can be absorbed in the external capacitance , but the presence of parasitic resistance at terminal would change the type of the impedance, which should be of a purely capacitive character. To alleviate the effects of the parasitic resistance , the operating frequency should be chosen such that . In addition, the parasitic capacitance (or ) and parasitic resistance (or ) appear between the high-impedance (or ) terminal and ground. These parasitic components will affect the phase difference between the output currents. To reduce its effect, a possible solution is to make the operating frequency . Therefore, the useful oscillation frequency range of the proposed oscillator is limited by the following conditions:

Hence, the design procedure must satisfy the conditions , ,   , and (8) to minimize the influence of the nonideal effects on the proposed circuit.

Figure 3: Nonideal equivalent circuit model of the MO-CCCDTA.

4. Simulation Results

In order to verify the theoretical analysis, the proposed oscillator has been simulated using HSPICE program by using TSMC 0.18 µm CMOS process technology process parameters. The CMOS implementation of the MO-CCCDTA is shown in Figure 4 [25]. The aspect ratios (W/L) of the MOS transistors were taken as 8.75/0.18 for M1–M7; 17.5/0.18 for M8–M10; 10/0.5 for M11–M14; 25/0.8 for M15–M26; 8/0.8 for M27–M34; and 35/0.25 for M35–M38. It may be noted that some of the MOS transistors were used with large widths. This would occupy large area on the chip. The supply voltages are  V; the biasing currents are  μA and = 96.5 μA ( μS). and are the biasing currents for the device to perform the current differencing operation, while MO-CCCDTA transconductances are controlled by and . The two capacitors in Figure 2 were set to be equal by  pF. was adjusted to 5.02 kΩ to start the oscillations. The theoretical oscillation frequency using this design was 3.183 MHz. The startup output waveforms for both the quadrature voltages and currents were shown in Figures 5 and 6, respectively. The steady state output waveforms for both the quadrature voltages and currents were shown in Figures 7 and 8, respectively. The frequency spectrums for both the quadrature voltages and currents were shown in Figures 9 and 10, respectively. From the simulation results, the oscillation frequency of  MHz is obtained, which agrees very well with the theoretical analysis. The total harmonic distortions for voltage and current outputs , , , and are 1.02%, 0.91%, 1.01%, and 0.87%, respectively. Figure 11 shows the variation of the transconductance value by changing from 5 to 150 μA. The electronic tuning of the oscillation frequency with the bias current was shown in Figure 12. These simulations results are close to the theoretical prediction and confirm the feasibility of the proposed configuration. In addition, the effect of mismatch errors of the current mirror on the performance of the proposed circuit is investigated by setting the value of  μA with errors of −10%, −5%, +5%, and +10%, respectively. Simulation results show the slight oscillation frequencies which are approximately 3.09 MHz, 3.13 MHz, 3.21 MHz, and 3.25 MHz, respectively, all of which are less than ±3% in disagreement with the designed oscillation frequency of  MHz. Compared with the designed oscillation frequency,  MHz, the frequency deviation due to mismatch error of the current mirror is acceptable. Figure 13 shows the phases of quadrature voltage and current outputs. In Figure 13, the output files of Fourier analysis from simulation results were used for calculating the phase error. Figure 14 shows the total harmonic distortion values of voltage and current output signals. It can be seen that the total harmonic distortion values of output voltages and currents are less than 3.6%. The proposed sinusoidal oscillator has a simple topology and provides voltage-mode and current-mode operation with electronically tunable properties. The power dissipation is 1.427 mW.

Figure 4: CMOS implementation of MO-CCCDTA [25].

Figure 5: Transient amplitudes of the waveforms of (blue) and (red).

Figure 6: Transient amplitudes of the waveforms of (blue) and (red).

Figure 7: Simulated quadrature voltage output waves of (blue) and (red).

Figure 8: Simulated quadrature current output waves of (blue) and (red).

Figure 9: The simulated frequency spectrum of (blue) and (red).

Figure 10: The simulated frequency spectrum of (blue) and (red).

Figure 11: Variation of transconductance with bias current .

Figure 12: Oscillation frequency against the bias current of the circuit (o, simulated frequency, theoretical curves).

Figure 13: Phase error as a function of oscillation frequency (blue: phase error versus and and red: phase error versus and ).

Figure 14: Total harmonic distortion (THD) as a function of oscillation frequency (blue: ; red: ; pink: ; and green: ).

5. Conclusion

In this paper, a new quadrature oscillator circuit using a single MO-CCCDTA, two grounded capacitors, and one grounded resistor is presented. The oscillation condition and oscillation frequency of the proposed quadrature oscillator have the advantage of being independently controllable. Two high-output impedance sinusoid currents with a 90° phase difference are available in the proposed configuration. The use of all grounded passive elements makes the proposed circuit ideal for integrated circuit implementation. Both current-mode and voltage-mode quadrature signals can be simultaneously obtained in the proposed circuit. HSPICE simulation results have confirmed the workability of the circuit.

Conflict of Interests

The author declares that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The author is thankful to the anonymous reviewers for their suggestions to improve the paper. The author is also grateful to Professor Soliman A. Mahmoud, Editor, for recommending this paper.

References

B. Wilson, “Recent developments in current conveyors and current-mode circuits,” IEE Proceedings G Circuits, Devices and Systems, vol. 137, no. 2, pp. 63–77, 1990.

T. M. Hassan and S. A. Mahmoud, “Fully programmable universal filter with independent gain- ω ₀-Q control based on new digitally programmable CMOS CCII,” Journal of Circuits, Systems and Computers, vol. 18, no. 5, pp. 875–897, 2009.

T. M. Hassan and S. A. Mahmoud, “New CMOS DVCC realization and applications to instrumentation amplifier and active-RC filters,” AEU—International Journal of Electronics and Communications, vol. 64, no. 1, pp. 47–55, 2010.

S. Maheshwari, “Current conveyor all-pass sections: brief review and novel solution,” The Scientific World Journal, vol. 2013, Article ID 429391, 6 pages, 2013.

J. Mohan and S. Maheshwari, “Cascadable current-mode first-order all-pass filter based on minimal components,” The Scientific World Journal, vol. 2013, Article ID 859784, 5 pages, 2013.

P. Beg, “Tunable first-order resistorless all-pass filter with low output impedance,” The Scientific World Journal, vol. 2014, Article ID 219453, 6 pages, 2014.

R. Senani, “New types of sine wave oscillators,” IEEE Transactions on Instrumentation and Measurement, vol. 34, no. 3, pp. 461–463, 1985.

R. Senani and D. R. Bhaskar, “Single op-amp sinusoidal oscillators suitable for generation of very low frequencies,” IEEE Transactions on Instrumentation and Measurement, vol. 40, no. 4, pp. 777–779, 1991.

D. R. Bhaskar and R. Senani, “New CFOA-based single-element-controlled sinusoidal oscillators,” IEEE Transactions on Instrumentation and Measurement, vol. 55, no. 6, pp. 2014–2021, 2006.

I. A. Khan and S. Khwaja, “An integrable gm-C quadrature oscillator,” International Journal of Electronics, vol. 87, no. 11, pp. 1353–1357, 2000.

R. Holzel, “Simple wide-band sine wave quadrature oscillator,” IEEE Transactions on Instrumentation and Measurement, vol. 42, no. 3, pp. 758–760, 1993.

T. Djurhuus, V. Krozer, J. Vidkjær, and T. K. Johansen, “Nonlinear analysis of a cross-coupled quadrature harmonic oscillator,” IEEE Transactions on Circuits and Systems I: Regular Papers, vol. 52, no. 11, pp. 2276–2285, 2005.

B. Linares-Barranco, T. Serrano-Gotarredona, J. Ramos-Martos, J. Ceballos-Cáceres, J. Miguel Mora, and A. Linares-Barranco, “A precise 90° quadrature OTA-C oscillator tunable in the 50–130-MHz range,” IEEE Transactions on Circuits and Systems I: Regular Papers, vol. 51, no. 4, pp. 649–663, 2004.

D. Biolek, “CDTA–building block for current-mode analog signal processing,” in Proceedings of the European Conference on Circuit Theory and Design (ECCTD '03), vol. 3, pp. 397–400, Krakow, Poland, 2003.

A. Ü. Keskin and D. Biolek, “Current mode quadrature oscillator using current differencing transconductance amplifiers (CDTA),” IEE Proceedings: Circuits, Devices and Systems, vol. 153, no. 3, pp. 214–218, 2006.

A. Uygur and H. Kuntman, “Seventh-order elliptic video filter with 0.1 dB pass band ripple employing CMOS CDTAs,” AEU—International Journal of Electronics and Communications, vol. 61, no. 5, pp. 320–328, 2007.

D. Prasad, D. R. Bhaskar, and A. K. Singh, “Universal current-mode biquad filter using dual output current differencing transconductance amplifier,” International Journal of Electronics and Communications, vol. 63, no. 6, pp. 497–501, 2009.

A. Lahiri, “New current-mode quadrature oscillators using CDTA,” IEICE Electronics Express, vol. 6, no. 3, pp. 135–140, 2009.

J. Horng, H. Lee, and J. Wu, “Electronically tunable third-order quadrature oscillator using CDTAs,” Radioengineering, vol. 19, no. 2, pp. 326–330, 2010.

W. Jaikla, M. Siripruchyanun, J. Bajer, and D. Biolek, “A simple current-mode quadrature oscillator using single CDTA,” Radioengineering, vol. 17, no. 4, pp. 33–40, 2008.

A. Lahiri and A. Chowdhury, “A novel first-order current-mode all-pass filter using CDTA,” Radioengineering, vol. 18, no. 3, pp. 300–305, 2009.

J. K. Pathak, A. K. Singh, and R. Senani, “Systematic realisation of quadrature oscillators using current differencing buffered amplifiers,” IET Circuits, Devices & Systems, vol. 5, no. 3, pp. 203–211, 2011.

B. Singh, A. K. Singh, and R. Senani, “New universal current-mode biquad using only three ZC-CFTAs,” Radioengineering, vol. 21, no. 1, pp. 273–280, 2012.

W. Jaikla, M. Siripruchyanun, and A. Lahiri, “Resistorless dual-mode quadrature sinusoidal oscillator using a single active building block,” Microelectronics Journal, vol. 42, no. 1, pp. 135–140, 2011.

D. Prasad, D. R. Bhaskar, and A. K. Singh, “Electronically controllable grounded capacitor current-mode quadrature oscillator using single MO-CCCDTA,” Radioengineering, vol. 20, no. 1, pp. 354–359, 2011.