The Scientific World Journal

Volume 2014 (2014), Article ID 641091, 6 pages

http://dx.doi.org/10.1155/2014/641091

Research Article

Two Mathematical Models for Generation of Crowned Tooth Surface

Laszlo Kelemen and Jozsef Szente

University of Miskolc, Egyetemvaros, Miskolc 3515, Hungary

Received 29 August 2013; Accepted 30 October 2013; Published 21 January 2014

Academic Editors: K. I. Ramachandran and S. Zhang

Copyright © 2014 Laszlo Kelemen and Jozsef Szente. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Gear couplings are mechanical components to connect shaft ends and eliminate the misalignments. The most important element of the gear coupling is the hub which is an external gear having crowned teeth. The crowned teeth on the hub are typically produced by hobbing. The resulting tooth surface depends on several parameters. It is influenced by the size of the hob and the feed. In this paper two mathematical models of the crowned tooth surface are introduced for the generation of the idealized tooth surfaces. These are the profile-shifting and the two-parameter enveloping methods. Our aim is to compare the obtained crowned tooth profiles for the two examined models and to investigate the results. From our numerical results, it was found that the two profiles show indistinguishable differences.

1. Introduction

Figure 1 shows a gear coupling having two hub-sleeve pairs. The sleeve is an internal gear and the hub is an external gear which has crowned teeth. The two toothed components compose a special gear pair, wherein both numbers of teeth are the same. The gear coupling is able to compensate the misalignment of the coupled shafts by the tooth crowning and backlash. Using a single hub and sleeve, the effect of angular misalignment may be eliminated. In the practice, generally two hub-sleeve pairs are built up as it is shown in Figure 1. In this case, the compensation of the offset misalignment is possible in addition to the angular misalignment.

(a)

(b)

Figure 1: Gear coupling (a) and hub with crowned teeth (b).

Gear couplings have been investigated by several researchers. Moked’s paper [1] contains a theoretical analysis of toothed coupling including the kinematics of motion, the optimal backlash, the sliding velocity, the power loss, and the contact stress. Renzo et al. [2] gave a discussion of the operation of gear coupling at angular misalignment. They analyzed mesh, tooth bearing, contact cycles and backlash, load distribution, and special tooth forms. Alfares et al. [3] determined the clearance distribution between meshing teeth of misaligned gear coupling. Yi [4] presented an analysis of three-dimensional meshing of crown gear coupling. The authors of this paper derived the tooth surfaces of the hub and sleeve [5] and analyzed the gear meshing of gear coupling [6] using theory of gearing [7].

The most complicated component of the gear coupling is the hub having crowned tooth surfaces (Figure 1), which basically affects the operation of coupling, load carrying capacity, and ability to compensate the misalignments. A typical solution for the production of tooth surfaces is the hobbing. In view of the fact that the resulting surfaces will vary depending on cutter diameter and the motion parameters, hereinafter we create two approximate models which are based on profile shifting [5] and two-parameter enveloping [7, 8].

2. Gear Manufacturing of the Crowned Hub

The crowned teeth of the coupling hub can be produced in hobbing by coordinated movement of the workpiece and the tool according to Figure 2.

Figure 2: A conceptual sketch for the manufacture of crowned tooth surfaces.

To produce the crowned tooth surfaces the tool moves along a circular path as it is shown in Figure 2. Earlier machine tools have used special-shaped templates for the necessary relative movement. The modern CNC hobbing machines permit the radial motion of the workpiece-table and the axial movement of the tool.

Reference [5] contains an analysis for the manufacture of the hub teeth. During production the centre distance varies continually. The instantaneous value of centre distance is

where and are the current radial and axial positions of the hob, respectively. is the crowning parameter and is the radius of pitch circle for the workpiece.

The maximum value of centre distance is

where is the radius of pitch cylinder for the hob.

The radius of circular arc of the relative movement between the tool and the workpiece can be calculated by the sum of the pitch radius of the hob and the crowning parameter:

3. Mathematical Model for Crowned Tooth Surfaces Using Profile Shifting

Actual shape of the crowned tooth surface depends on the diameter of the hob and the magnitude of tangential, radial, and axial feeds. Accordingly, the real tooth surfaces of the same gear will vary with different values of the said parameters.

To prepare mathematical model for tooth surfaces is needed to determine the load carrying capacity of gear coupling or analyzing the operation. The best solution is a theoretical or ideal surface, which is independent of the mentioned characteristics but gives a good approximation of the real tooth surface.

The first model for idealized tooth surface of crowned gearing will be derived so that involute tooth surfaces having variable profile shifting in parallel transverse planes are assumed [5] (see Figure 3).

Figure 3: Crowned tooth surface.

System of equations of the tooth surface can be described as

where is the arbitrary radius along the tooth profile and is the tooth angle. One can calculate as follows:

where is the tooth thickness along the pitch cylinder, is the pitch radius, is the standard pressure angle, and is the pressure angle at radius . Angle can be determined by the following equation:

Here denotes the radius of base circle. In (5) the stands for the involute function; .

The tooth thickness along the pitch cylinder is expressed by

where is the tooth thickness in the plane .

All these indicate that depends on the radius and the coordinate ; that is, in (4)

4. Mathematical Model for Crowned Tooth Surfaces Using Two-Parameter Enveloping

The second model for idealized tooth surface will be prepared by two-parameter enveloping based on the base profile of involute geometry. The theory of two-parameter enveloping has been introduced and applied by Litvin et al. [7, 8].

4.1. The Generating Surface

The generating surfaces are the planes of generating rack obtained from involute base profile (Figure 4). The tooth surface and the surface normal of generating rack are given by the following equations:

In these equations and are the surface parameters, is the tooth thickness measured on the pitch circle in the central plane, and is the standard pressure angle. Interpretation of the notations is shown in Figure 4. The equations are valid for the right plane, but they can easily be prescribed for the left plane on the basis of the symmetry.

Figure 4: Generating rack.

4.2. Coordinate Systems and the Movement of Members

The applied coordinate systems are shown in Figure 5.

Figure 5: Applied coordinate systems and axes of meshing.

The movement of the members is investigated in the stationary coordinate system (, , , ). Coordinate system (, , , ) has the same origin as system , and axis coincides with coordinate axis . Moreover, is fixed to the hub and it rotates around the axis with constant angular velocity. The instantaneous rotation of the hub is denoted by angle .

Coordinate system (, , , ) is rigidly connected to the generating rack. It has a screw motion around an axis which is parallel to axis and passing through the point . At a given moment the rotation and translation are characterized by angle and distance , respectively. In Figure 5, is the pitch circle radius of the hub and is the crowning parameter.

The relationship between the coordinate systems is given by the following transformation matrices:

where is the transition matrix from to and is the same between and .

4.3. Equation of the Crowned Tooth Surface

The crowned tooth surface will be produced by two independent parameters (, ). The moving generating surface and its normal are given in the coordinate system :

System of (12) expresses family of surfaces with four parameters:

Referring now to the rotating coordinate system , the generating family of surfaces is produced by the following equations:

Using (14) and (15) we can determine the relation between the coordinates and parameters:

System (16) contains four parameters. When one determines the crowned tooth surface, the relationships between the parameters of generating surface and and the parameters of motion and have to be found. More specifically, two additional equations are necessary to define the tooth surface. Formally, these two functions are

The relationship between the parameters is defined by the axes of meshing (see Figure 5). The axis of meshing is a straight line, which is intersected by the common normal of all contact points of the enveloping and enveloped surfaces.

If , the relative motion is rotation around the line, which passes through the point and is parallel to the axis . The axis of relative rotational movement coincides with the axis of meshing. Let us denote the position vector of contact point by , where , , and are the unit vectors of coordinate directions. The point of contact can be obtained through the axis of meshing and the surface normal. This is expressed by the following equation:

where denotes the distance from the origin to the point of intersection along the axis of meshing and is the distance from the intersection point to the point of contact measured in normal direction. Converting (18) to scalar equations, one gets

Eliminating from the second and third equations of (19) and substituting and from (12), it is concluded that there is a solution if ; that is, the surface parameter becomes zero:

(20) corresponds to the first parameter relation, . In this case the generating surface has contact points on the base profile in the plane .

Additional parameter relation can be obtained if . Then the relative motion is a rotation around the line which passes through the point and is parallel to the axis . This line is also an axis of the meshing, so the normal at the contact points intersects it. For any point of contact the connection

exists, where is the distance along the axis of meshing from the origin to the intersection point and is the distance in normal direction from the intersection point to the contact point. By scalar equations we have

Expressing from the first equation of (22) and substituting it to the second equation and taking the expressions of and from (12), we get the following formula:

Equation (23) satisfies the parameter relation in (17). Since from (20), then (23) can be simplified as follows:

Substituting the expressions from (9) into (24) we obtain

which corresponds to parameter relationship.

To determine the meshing surface, the expressions (9) (20), and (24) are substituted into the equations in (12). The meshing surface is given by the following formal parameter relationships:

Equations of the crowned tooth surface are obtained if (9), (12), (20), and (24) are substituted into (15). They are expressed by the following parameters:

The axial profile is given by the following parameter relationship for any axial section :

5. The Comparison of the Two Models

Two types of mathematical models have been developed for the determination of crowned tooth surface of the coupling hub. Calculations were carried out for formulas of both models by Mathcad. The differences between the results have been determined in case of a gear coupling for a given geometry. It is suitable to compare the two profiles of the two different models in any axial section using arbitrary input data. The comparison is performed by polar coordinates, so that both profiles are determined in polar coordinates, and both polar angles are calculated at a given radius. The deviation is measured as the difference between two polar angles. The difference of these angles is calculated so that the polar angle of profile-shifted profile is extracted from polar angle of the two-parameter enveloped profile.

Our applied input parameters of the calculations are the following:

 number of teeth , module , angle of base profile , face width , crowning radius , profile shifting coefficient in central plane .

It was experienced that the two profiles coincide with one another in the central plane. Moving away from the central plane, the difference increases, but the order of error remains insignificant. For example, we get degree in the axial section, when the coordinate , and degree at . Generally, negative values are obtained when the radius is less than the radius of pitch circle () and the positive values appear if .

Figure 6 shows the angle deviation as a function of radius in the axial section . It exhibits that the deviation changes from degree to degree approximately.

Figure 6: Deviation between two profiles at tooth ends.

6. Conclusion

On the base of the performed calculations, it was found that both models can be used for further investigation of the gear coupling. According to our calculations, the difference in the profiles for two examined models is very small. Knowing the teeth surfaces of the hub and the sleeve, it is possible to simulate the operation, to analyze the effect of angular misalignment, to investigate the changes in motion transmission, and to calculate the contact stress using the specified curvatures at the contact points.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This research was carried out as part of the TAMOP-4.2.1.B-10/2/KONV-2010-0001 project with support by the European Union, cofinanced by the European Social Fund.

References

I. Moked, “Toothed couplings—analysis and optimization,” Journal of Engineering for Industry, vol. 90, no. 3, pp. 425–434, 1968.

P. C. Renzo, S. Kaufman, and D. E. De Rocker, “Gear couplings,” Journal of Engineering for Industry, vol. 90, no. 3, pp. 467–474, 1968.

M. A. Alfares, A. H. Falah, and A. H. Elkholy, “Clearance distribution of misaligned gear coupling teeth considering crowning and geometry variations,” Mechanism and Machine Theory, vol. 41, no. 10, pp. 1258–1272, 2006.

C.-Y. Yi, “Analysis of the meshing of crown gear coupling,” Journal of Shanghai University, vol. 9, no. 6, pp. 527–533, 2005.

J. Szente and L. Kelemen, “Mathematical models for tooth surfaces of gear coupling,” Design of Machines and Structures, vol. 2, no. 1, pp. 73–82, 2012.

L. Kelemen and J. Szente, “Analysis of gear meshing for gear coupling,” Advanced Engineering, vol. 6, no. 2, pp. 171–182, 2012.

F. L. Litvin, “Theory of gearing.,” NASA Reference Publication 1212, AVSCOM technical report 88-C-035, pp. 1–490, 1989

F. L. Litvin, N. N. Krylov, and M. L. Erikhov, “Generation of tooth surfaces by two-parameter enveloping,” Mechanism and Machine Theory, vol. 10, no. 5, pp. 365–373, 1975.