The Scientific World Journal

Volume 2014 (2014), Article ID 796371, 9 pages

http://dx.doi.org/10.1155/2014/796371

Research Article

A Neural-Network-Based Approach to White Blood Cell Classification

Mu-Chun Su,¹ Chun-Yen Cheng,¹ and Pa-Chun Wang²

¹Department of Computer Science & Information Engineering, National Central University, Jhongli 32001, Taiwan

²General Hospital, Taipei 10656, Taiwan

Received 7 August 2013; Accepted 20 October 2013; Published 30 January 2014

Academic Editors: C.-C. Liu and C. H. Yeang

Copyright © 2014 Mu-Chun Su et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This paper presents a new white blood cell classification system for the recognition of five types of white blood cells. We propose a new segmentation algorithm for the segmentation of white blood cells from smear images. The core idea of the proposed segmentation algorithm is to find a discriminating region of white blood cells on the HSI color space. Pixels with color lying in the discriminating region described by an ellipsoidal region will be regarded as the nucleus and granule of cytoplasm of a white blood cell. Then, through a further morphological process, we can segment a white blood cell from a smear image. Three kinds of features (i.e., geometrical features, color features, and LDP-based texture features) are extracted from the segmented cell. These features are fed into three different kinds of neural networks to recognize the types of the white blood cells. To test the effectiveness of the proposed white blood cell classification system, a total of 450 white blood cells images were used. The highest overall correct recognition rate could reach 99.11% correct. Simulation results showed that the proposed white blood cell classification system was very competitive to some existing systems.

1. Introduction

The microscopic inspection of blood smears provides diagnostic information concerning patients’ health status. The inspection results of the differential blood count reveal a wide range of important hematic pathologies. For example, the presence of infections, leukemia, and some particular kinds of cancers can be diagnosed based on the results of the classification and the count of white blood cells. The traditional method for the differential blood count is performed by experienced operators. They use a microscope and count the percentage of the occurrence of each type of cell counted within an area of interest in smears. Obviously, this manual counting process is very tedious and slow. In addition, the cell classification and counting accuracy may depend on the capabilities and experiences of the operators. Therefore, the necessity of an automated differential counting system becomes inevitable.

There are two kinds of techniques to implement an automated differential counting system. While the first and the dominant technique is based on the flow cytometry, the other technique is based on image processing. There are many commercially available systems which adopt the flow cytometry technique for counting cells. The flow-cytometry-based systems have an advantage (i.e., they can offer high throughput), but they suffer from one drawback (i.e., they cannot produce the images of the blood samples for further chance of verification in case some abnormal conditions were detected). Recently, several different approaches to implement an image-processing-based white blood cell recognition system have been proposed [1–11].

White blood cells can be categorized into several classes according to the morphology of their contours and their nuclei. The classification of white blood cells usually involves the following three stages: the segmentation of a white blood cell from a smear image, the extraction of effective features, and the design of a classifier. For example, Young adopted four features and the minimum distance classifier for classifying 5 types of cells [4]. Sheikh et al. used wavelet transform coefficients and artificial neural networks for recognizing the white blood cell, the red blood cells, and platelets [8]. Bikhet et al. selected 10 features and adopted the minimum-distance classifier for constructing an automatic classification system which achieved the rate of 91% correct classification for a database consisting of 71 white blood cells [6]. Piuri and Scotti proposed an automatic detection and classification system based on 23 morphological features and a neural classifier [7]. A classification system based on eigen-cell and parametric features was proposed in [5]. A system which achieved a classification rate of 77% for classifying bone marrow white blood cells was reported in [9]. Nilufar et al. proposed a classification system based on joint histogram-based features and a support vector machine [10]. Osowski et al. presented the application of a genetic algorithm and a support vector machine to the recognition of bone marrow blood cells [11]. Rezatofighi et al. adopted morphological features and textural features extracted by local binary pattern (LBP) and then trained two types of neural networks for classification [1]. Tabrizi et al. adopted principal component analysis for features selection and used a learning vector quantization neural network for classifying 5 types of white blood cells [2]. Ghosh et al. fed four statistical significant features to Naïve Bayes classifier for classifying five types of white blood cells with 83.2% overall accuracy [3]. Each approach has its own considerations for adopting what kinds of features and classifier.

To a certain extent, the performance of an automatic white blood cell classification system depends on a good segmentation algorithm for segmenting white blood cells from their background. There are many different approaches (e.g., clustering [8], thresholding [5, 6, 10], morphological operator [11, 12], Gram-Schmidt orthogonalization method [1], edge detection [13], region growing [14], watershed [15], colors [16–18], and support vector machine (SVM) [19]) to segment white blood cells from the background. Each approach has its advantages and disadvantages. For example, the conventional color-based methods and the thresholding method are simple but are not able to accurately segment the white blood cells from the background. Some approaches (e.g., the SVM method and the region growing method) can provide reasonably accurate segmentation results, but they are either costly to be implemented or require high computational resources. A review on some of the general segmentation methods can be found in [20]. While some color-based segmentation methods (e.g., [17]) were directly conducted on the RGB color space, some approaches (e.g., [16, 18]) adopted the color space (especially on the component). In general, the -component-based methods outperformed the RGB-based methods. In [16], the accuracy performance varied from 98.0% to 99.54% for the acute myeloid leukemia type and from 94.24% to 99.13 for the acute lymphocytic leukemia type.

In this paper, we propose a new approach to implementing an automatic white blood cell classification system. First of all, we try to identify the color characteristics of the pixels of the nucleus and granule of cytoplasm of white blood cells in the color space. Based on the found discriminating region and a morphological process, we can segment a white blood cell from a smear image. In the following, we extract three kinds of features (i.e., geometrical features, color features, and LDP-based texture features) from the segmented cell region. These features are fed into three different neural networks for classifying five types of the white blood cells. The proposed system will be introduced in Section 2. The experimental results are given in Section 3. Finally, Section 4 concludes the paper.

2. The Proposed Automatic White Blood Cell Classification System

The proposed automatic white blood cell classification system involves the following three stages: the segmentation of a white blood cell, the extraction of effective features, and the design of a classifier.

2.1. Stage 1. The Segmentation

In this paper, we propose a new color-based approach to segment five types of white blood cells from their background. This new color-based method is based on the idea of constructing a discriminating region for the scatter plot of pixels belonging to white blood cells. Via checking whether a pixel lies inside the discriminating region, white blood cells can be effectively segmented from the background. The database of the white blood cells used in this paper was downloaded from the CellaVision Competency Software Databases which contain slides stained with either a May Grünwald Giemsa (MGG) or a Wright staining protocol [21]. Figure 1(a) shows a sample of the images. First of all, an expert was asked to manually segment the white blood cells from the background to provide ground truth information. We then collected a set of pixels belonging to white blood cells. Figure 1(b) shows the scatter plot of these collected pixels on the color space. Obviously, most of these pixels are clustered inside a rotated ellipsoid. We can use the principal component analysis (PCA) method to find the principal axes of these pixels on the original space and then use the principal axes information to rotate the ellipsoid to be parallel to the new coordinate system as shown in Figure 1(c). Finally, the discriminating region for white blood cell pixels can be described by the following equations:

where the matrix is a rotation matrix, the vector is the rotated version of the original color vector , the parameter is the rotated ellipsoid center, and the parameters , , and are the three semiprincipal axes of length. The appropriate values of the rotation matrix, the three semiprincipal axes, and the center may vary with the stain used to generate the blood cell images.

(a)

(b)

(c)

Figure 1: Blood cell images. (a) The original image. (b) The scatter plot of the collected pixels of the white blood cells in the color space. (c) The scatter plot rotated to a new coordinate system.

We may then use the ellipsoidal equations defined in (1) to verify whether a pixel belongs to a white blood cell. If the information of a pixel satisfies (1), then it will be claimed to be a white blood cell pixel. Some detected cells images are shown in Figure 2(a). Obviously, the segmented white blood cells are broken and noisy; therefore, we still need to adopt some morphological operators (e.g., dilation, closing, and a median filter) to remove unwanted small noisy regions and fill holes in the detected cell region as shown in Figure 2(b).

(a)

(b)

Figure 2: The detected white blood cell. (a) The detected cell based on the result of (1). (b) The detected cell after the morphological operators.

2.2. Stage 2. Feature Extraction

The feature extraction plays an important role in the performance of an automatic white blood cell classification system. Most of the existing methods adopt the following features such as geometrical features (e.g., area, radius, perimeter, convex area, major axis length, compactness, and orientation), textural features (e.g., momentum, contrast, entropy, and kewness), and color features (e.g., color distribution and histogram). For example, Piuri and Scotti greatly depended on the geometrical features [7]. Tabrizi et al. adopted both geometrical features and textural features [2]. Osowski et al. integrated all those three kinds of features to form 164 features for their classifiers [11].

In this paper, three kinds of features are extracted for classification. The first kind of features is the geometrical features consisting of the area feature, Area, the length feature, Lengthvar, and the compactness feature, Comp. The area feature, Area, is the amount of pixels which belong to the segmented cell region. As for the last two features, Lengthvar and the compactness, Comp, are computed as follows:

  Lengthvar:

where represents the length between the th pixel on the cell boundary and the cell center. The parameter represents the mean of those lengths. And

  Comp:

The color features, Huevar, Saturationvar, and Intensityvar, are the three variances of the hue, saturation, and intensity components of the pixels belonging to the white cell.

As for the textural features, there are different ways to compute textural features. For example, Osowski et al. computed the angular second momentum, contrast, entropy, and so forth [11]. Rezatofighi et al. introduced the textural features extracted by local binary pattern (LBP) and cooccurrence matrix [1]. They found that the performance of the cooccurrence matrix-based features had better performance in comparison with the LBP-based features; however, the computational time for computing the cooccurrence matrix-based features was significantly higher than the time required by the computations of the LBP-based features.

Based on the aforementioned discussions, we proposed the use of the local-directional-pattern- (LDP-) based features to make a tradeoff between the computational time and the performance. The LBP operator, a gray-scale invariant texture primitive, was originally proposed by Ojala et al. [22]. Later on, the local-directional-pattern- (LDP) was proposed to overcome the disadvantages of LBP (e.g., nonmonotonic illumination variation and random noise). The LDP is an eight bit binary code and is obtained by computing the relative edge response value of a pixel in all eight directions at each pixel position [23].

In our system, we were interested at the three most prominent directions in order to generate the LDP. Figures 3(a)-3(b) illustrate an example of transforming a windowed image into a LDP code. We then use the LDP operator to transform a gray image to a LDP labeled image where the value of each pixel is the computed LDP code corresponding to the pixel at the same position at the original gray image as shown in Figure 3(b). In the following, we can use a so-called “LDP histogram” with 218 bins (i.e., from 00000111(= 7) to 11100000(=224)) to represent this LDP labeled image as shown in Figure 3(c). The LDP histogram represents the relative frequency of occurrence of the various LDP codes in the LDP labeled image. Figure 3(d) shows the average LDP histogram computed from 60 cell images consisting of 5 types of white blood cell images. We found that bins, 19, 25, 35, 38, 49, 50, 70, 76, 98, 100, 137, 140, 145, and 196, are the 14 bins with the 14 largest values which are larger than a threshold, 400. These 14 bins accounted for a very large proportion of the relative frequency of occurrences. Therefore, we decided to use a reduced histogram with those 14 especially important bins to represent a LDP labeled image as shown in Figure 3(e).

(a)

(b)

(c)

(d)

(e)

Figure 3: LDP-based features. (a) The Kirsch edge masks used for detecting the 8 directions. (b) The LDP code. (c) The LDP histograms with 218 bins. (d) The average LDP histogram. (e) The reduced LDP histogram with 14 bins for representing the cell image.

In total, we have extracted 20 features for the classification purpose, Area, Lengthvar, Comp, Huevar, Saturationvar, Intensityvar, LDP₁₉, LDP₂₅, LDP₃₅, LDP₃₈, LDP₄₉, LDP₅₀, LDP₇₀, LDP₇₆, LDP₉₈, LDP₁₀₀, LDP₁₃₇, LDP₁₄₀, LDP₁₄₅, and LDP₁₉₆.

2.3. Stage 3. Classification

After the set of features have been extracted, we proceed to the design of classifiers. Three different kinds of neural-network-based classifiers were employed in the design of classifiers.

2.3.1. The Multilayer Perceptron

Multilayer perceptrons (MLPs), one of the most popular neural networks, have been applied successfully to solve many difficult and diverse problems by using the well-known backpropagation algorithm to train them [24]. The performance of a trained MLP depends on its architecture, initial weights, and the number of training epochs. From many simulations, an MLP with the architecture was constructed.

2.3.2. The Support Vector Machine

The support vector machine (SVM) is another widely adopted neural network [24]. It is a linear machine with powerful learning ability and good generalization capability. The design of a successful SVM classifier involves the choice of the so-called kernel functions. In our system, we employed the use of the radial-basis functions (RBFs). The number of RBFs and their centers are automatically set by the number of support vectors and their values.

2.3.3. Hyperrectangular Composite Neural Networks

The class of hyperrectangular composite neural networks (HRCNNs), a kind of hybrid networks developed by our previous work [25–28], integrates the paradigms of neural networks with the rule-based approach. The values of the synaptic weights of a trained HRCNN can be interpreted as a set of crisp If-Then rules. In addition, a specially designed training algorithm can achieve 100% correct recognition rate for the training set [25–28]. The mathematical description of a two-layer HRCNN with hidden nodes is given as follows:

where and are adjustable synaptic weights of the th hidden node, is an input pattern, is the dimensionality of input variables, is a small positive real number, and is the output function of a two-layer HRCNN with hidden nodes.

3. Experimental Results

The database of the white blood cells used in the experiments was downloaded from the CellaVision Competency Software Databases which contain slides stained with either a May Grünwald Giemsa or a Wright staining protocol [21]. The databases contain 9-10 slides each having approximately 100 white blood cell images and a large RBC overview image for RBC characterization. There are five types of white blood cells (e.g., lymphocyte, monocyte, eosinophil, basophil, and neutrophil). There were 450 white blood cell images used in our experiments. These 450 images came from two different data sets. The difference between these two data sets was the colorant used to stain cells. Figure 4 shows some examples from the two data sets. The color of the white blood cells which came from data set 2 looks more near purple than the cells from data set 1. Table 1 tabulates the number of cell images for each type of white cells.

Table 1: The number of cell images for each kind of white cells.

Lymphocyte
Monocyte
Basophil
Eosinophil
Neutrophil
Total

Set 1
12
12
12
12
12
60

Set 2
83
31
2
5
269
390

Total
95
43
14
17
281
450

(a)

(b)

Figure 4: Samples of white cell images from the CellaVision Competency Software Databases. From left to right, lymphocyte, monocyte, eosinophil, basophil, and neutrophil. (a) Data set 1. (b) Data set 2.

3.1. Experiment One: The Cell Segmentation

In this experiment, we would like to test the performance of the proposed segmentation algorithm introduced in the first stage of the proposed automatic white blood cell classification system. Since the preparation of staining procedure and blood concentration of individual may result in the inconsistency of color in cell images, we constructed one discriminate region of white blood cell tones particularly suitable for each data set. The two discriminating regions were constructed based on 500 and 800 pixels which were randomly selected from the images from the two data sets, respectively. The found discriminating region for each data set was given as follows:

for data set 1,

for data set 2,

The evaluation of the proposed segmentation algorithm was based on the computations of the sensitivity and specificity rates:

While the sensitivity rate relates to the test’s ability to identify positive results (i.e., white blood cell pixels), the specificity rate relates to the test’s ability to identify negative results (i.e., background pixels). Table 2 tabulates the segmentation results. For the four types, lymphocyte, monocyte, eosinophil, and neutrophil, the sensitivity and specificity rates were all above 0.97. It indicated that the segmentation results were good. As for the basophil type, the specificity rate was still high (i.e., 0.993), but the sensitivity rate was only 0.794 (for data set 1) and 0.867 (for data set 2). It indicated that the basophil type was a little undersegmented. We found that the low sensitivity may be due to the large amount of red granules in a basophil. The segmentation performance was not 100% correct; however, the classification performance could be high if the most important regions of the cells were correctly segmented. The classification performance was validated at the second experiment.

Table 2: The segmentation results.

Data set
1
2

Cell type
Sensitivity
Specificity
Sensitivity
Specificity

Lymphocyte
0.995
0.994
1.000
0.986

Monocyte
0.997
0.988
0.999
0.983

Basophil
0.970
0.992
0.999
0.970

Eosinophil
0.794
0.994
0.867
0.993

Neutrophil
0.990
0.990
1.000
0.978

Average
0.949
0.992
0.973
0.982

3.2. Experiment Two: The Classification Comparisons

The 450 images were split into a training set consisting of 299 images and a testing set consisting of 151 images. The classification results for these three types of classifiers were tabulated in Table 3 based on the average of the classification rates of all classes. While the SVM and the HRCNN could achieve 100% correct rate for the training set, the MLP could reach the highest rate for the testing data set. The MLP outperformed the other two classifiers based on the comparisons of the overall correct rate.

Table 3: The classification results of the three neural-network-based classifiers.

Classifier
Training set
Testing set
Overall

MLP
99.67%
98.01%
99.11%

SVM
100.0%
92.72%
97.55%

HRCNN
100.0%
66.90%
88.89%

The comparisons of our proposed white cell recognition system with other white cell classification systems were shown in Table 4. Those existing systems constructed their own databases instead of using a public database as we did. The rightest column shows the number of images used in their experiments. Among these systems, we used the largest amount of images to evaluate the proposed system. In addition, based on the comparisons of the overall rate, our proposed system incorporated with a trained MLP achieved the highest correct rate.

Table 4: The comparisons of the classification rates among different classification systems.

Method
Number of types
Segmentation
Classifier
Overall rate
Number of images

Ours
5
Discriminating region
MLP
99.11%
450

Ours
5
Discriminating region
SVM
97.55%
450

Ours
5
Discriminating region
HRCNN
88.89%
450

Rezatofighi et al. [1]
5
Gram-Schmidt orthogonalization and snake
SVM
86.10%
400

Tabrizi et al. [2]
5
Gram-Schmidt orthogonalization and snake
LVQ
94.10%
400

Ghosh et al. [3]
5
Watershed
Bayes classifier
83.2%
150

Young [4]
5
Histogram threshold
Distance classifier
92.46%
199

Yampri et al. [5]
5
Automatic thresholding and adaptive contour
Minimized error
96.0%
100

Bikhet et al. [6]
5
Entropy threshold and iterative threshold
Distance classifier
90.14%
71

Piuri and Scotti [7]
5
Opening and Canny edge detector
KNN, FF-NN, and RBF
92%~82%
113

Most of the systems shown in Table 4 did not mention the information about the computational time. While Rezatofighi et al. [1] reported that it took 16 minutes for the differential counting of 100 white cells with the image size on a Pentium-4 PC at 3.2 GHz with 1 GB RAM, our system took 0.88 seconds (from segmentation to classification) to classify a cell image with the size on a Pentium-4 PC at 2.6 GHz with 2 GB RAM.

4. Conclusions

In this paper, we proposed a new segmentation algorithm for segmenting a white cell from a smear image. This segmentation algorithm is based on finding a discriminating region of white blood cell tones in the color space. The found discriminating region can be described by a 3D ellipsoid. Then we proposed the use of 20 features consisting of 3 geometrical features, 3 color features, and 14 LDP features. Finally, three different neural-network-based classifiers were adopted for classifying white blood cells into one of the five types. Compared to other systems tabulated in Table 4, our proposed system incorporated with a trained MLP could reach the highest performance. The performance was evaluated on a public database.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This paper was partly supported by the National Science Council, Taiwan, under NSC 101-2221-E-008-124-MY3, 101-2911-I-008-001, the CGH-NCU Joint Research Foundation Project no. 102 NCU-CGH A4, and the LSH-NCU Joint Research Foundation Project no. 102- NCU-LSH-102-A-018.

References

S. H. Rezatofighi, K. Khaksari, and H. Soltanian-Zadeh, “Automatic recognition of five types of white blood cells in peripheral blood,” in Proceedings of the International Conference of Image Analysis and Recognition, vol. 6112, pp. 161–172, 2010.

P. R. Tabrizi, S. H. Rezatofighi, and M. J. Yazdanpanah, “Using PCA and LVQ neural network for automatic recognition of five types of white blood cells,” in Proceedings of the 32nd Annual International Conference of the IEEE Engineering in Medicine and Biology Society (EMBC '10), pp. 5593–5596, September 2010.

M. Ghosh, D. Das, S. Mandal et al., “Statistical pattern analysis of white blood cell nuclei morphometry,” in Proceedings of the IEEE Students' Technology Symposium (TechSym '10), pp. 59–66, April 2010.

I. T. Young, “The classification of white blood cells,” IEEE Transactions on Biomedical Engineering, vol. 19, no. 4, pp. 291–298, 1972.

P. Yampri, C. Pintavirooj, S. Daochai, and S. Teartulakarn, “White blood cell classification based on the combination of eigen cell and parametric feature detection,” in Proceedings of the 1st IEEE Conference on Industrial Electronics and Applications (ICIEA '06), pp. 1–4, May 2006.

S. F. Bikhet, A. M. Darwish, H. A. Tolba, and S. I. Shaheen, “Segmentation and classification of white blood cells,” in Proceedings of the IEEE Interntional Conference on Acoustics, Speech, and Signal Processing, vol. 4, pp. 2259–2261, June 2000.

V. Piuri and F. Scotti, “Morphological classification of blood leucocytes by microscope images,” in Proceedings of the IEEE International Conference on Computational Intelligence for Measurement Systems and Applications (CIMSA '04), pp. 103–108, July 2004.

H. Sheikh, B. Zhu, and E. M. Tzanakou, “Blood cell identification using neural networks,” in Proceedings of the IEEE 22nd Annual Northeast Bioengineering Conference, pp. 119–120, March 1996.

N. T. Umpon and S. Dhompongsa, “Morphological granulometric features of nucleus in automatic bone marrow white blood cell classification,” IEEE Transactions on Information Technology in Biomedicine, vol. 11, no. 3, pp. 353–359, 2007.

S. Nilufar, N. Ray, and H. Zhang, “Automatic blood cell classification based on joint histogram based feature and Bhattacharya Kernel,” in Proceedings of the 42nd Asilomar Conference on Signals, Systems and Computers (ASILOMAR '08), pp. 1915–1918, October 2008.

S. Osowski, R. Siroic, T. Markiewicz, and K. Siwek, “Application of support vector machine and genetic algorithm for improved blood cell recognition,” IEEE Transactions on Instrumentation and Measurement, vol. 58, no. 7, pp. 2159–2168, 2009.

C. Di Rubeto, A. Dempster, S. Khan, and B. Jarra, “Segmentation of blood images using morphological operators,” in Proceedings of the 15th International Conference on Pattern Recognition, pp. 397–400, 2000.

I. Cseke, “A fast segmentation scheme for white blood cell images,” in Proceedings of the 11th IAPR International Conference on Pattern Recognition, Conference C: Image, Speech and Signal Analysis, pp. 530–533, 1992.

J. M. Chassery and C. Garbay, “An iterative segmentation method based on contextual color and shape criterion,” IEEE Transactions on Pattern Analysis and Machine Intelligence, vol. 6, no. 6, pp. 794–800, 1984.

K. Jiang, Q. M. Liao, and S. Y. Dai, “A novel white blood cell segmentation scheme using scale-space filtering and watershed clustering,” in Proceedings of the 2nd International Conference on Machine Learning and Cybernetics, vol. 5, pp. 2820–2825, November 2003.

N. Hazlyna and M. Y. Mashor, “Segmentation technique for acute leukemia blood cells images using saturation component and moving l-mean clustering procedures,” International Journal of Electrical, Electronic Engineering and Technology, vol. 1, pp. 23–35, 2011.

J. Wu, P. Zeng, Y. Zhou, and C. Oliver, “A novel color image segmentation method and its application to white blood cell image analysis,” in Proceedings of the 8th International Conference on Signal Processing (ICSP '06), vol. 2, pp. 245–248, 2006.

A. N. A. Salihah, M. Y. Mashor, N. H. Harun, A. A. Abdullah, and H. Rosline, “Improving colour image segmentation on acute myelogenous leukaemia images using contrast enhancement techniques,” in Proceedings of the IEEE EMBS Conference on Biomedical Engineering and Sciences (IECBES '10), pp. 246–251, December 2010.

N. Guo, L. Zeng, and Q. Wu, “A method based on multispectral imaging technique for white blood cell segmentation,” Computers in Biology and Medicine, vol. 37, no. 1, pp. 70–76, 2007.

R. Adollah, M. Y. Mashor, N. F. Mohd Nasir, H. Rosline, H. Mahsin, and H. Adilah, “Blood cell image segmentation: a review,” in Proceedings of the 4th Kuala Lumpur International Conference on Biomedical Engineering (Biomed '08), pp. 141–144, June 2008.

CellaVision Inc., 2011, http://www.cellavision.com/

T. Ojala, M. Pietikäinen, and T. Mäenpää, “Multiresolution gray-scale and rotation invariant texture classification with local binary patterns,” IEEE Transactions on Pattern Analysis and Machine Intelligence, vol. 24, no. 7, pp. 971–987, 2002.

T. Jabid, H. Kabir, and O. Chaei, “Local Directional Pattern (LDP) for face recognition,” in Proceedings of the International Conference on Consumer Electronics (ICCE '10), pp. 329–330, January 2010.

S. Haykin, Neural Networks: A Comprehensive Foundation, Prentice Hall, New York, NY, USA, 2nd edition, 1999.

M. C. Su, “Use of neural networks as medical diagnosis expert systems,” Computers in Biology and Medicine, vol. 24, no. 6, pp. 419–429, 1994.

M. C. Su, C. T. Hsieh, and C. Chin, “A neuro-fuzzy approach to speech recognition without time alignment,” Fuzzy Sets and Systems, vol. 98, no. 1, pp. 33–41, 1998.

M. C. Su, “Neural-network-based fuzzy model and its application to transient stability prediction in power systems,” IEEE Transactions on Systems, Man and Cybernetics C, vol. 29, no. 1, pp. 149–157, 1999.

J. H. Chen, M. C. Su, C. Y. Chen, F. H. Hsu, and C. C. Wu, “Application of neural networks for detecting erroneous tax reports from construction companies,” Automation in Construction, vol. 20, no. 7, pp. 935–939, 2011.