The Scientific World Journal
Volume 2015 (2015), Article ID 376702, 11 pages
http://dx.doi.org/10.1155/2015/376702

Research Article

Ionospheric Correction Based on Ingestion of Global Ionospheric Maps into the NeQuick 2 Model

Xiao Yu,1,2 Chengli She,3,4 Weimin Zhen,1,2 Nava Bruno,⁵ Dun Liu,² Xinan Yue,⁶ Ming Ou,1,2 and Jisheng Xu¹

¹School of Electronic Information, Wuhan University, No. 129 Luoyu Road, Wuhan 430079, China
²China Research Institute of Radiowave Propagation, No. 36 Xianshandong Road, Qingdao 266107, China
³University of Chinese Academy of Sciences, Beijing 100029, China
⁴Key Laboratory of Earth and Planetary Physics, Institute of Geology and Geophysics, Chinese Academy of Sciences, Beijing 100029, China
⁵The Abdus Salam International Center for Theoretical Physics, T-ICT4D Laboratory, 34100 Trieste, Italy
⁶The Constellation Observing System for Meteorology, Ionosphere, and Climate Program Office, University Corporation for Atmospheric Research, Boulder, CO 80303, USA

Received 18 June 2014; Revised 18 August 2014; Accepted 19 August 2014

Academic Editor: Zhaojin Rong

Copyright © 2015 Xiao Yu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The global ionospheric maps (GIMs), generated by Jet Propulsion Laboratory (JPL) and Center for Orbit Determination in Europe (CODE) during a period over 13 years, have been adopted as the primary source of data to provide global ionospheric correction for possible single frequency positioning applications. The investigation aims to assess the performance of new NeQuick model, NeQuick 2, in predicting global total electron content (TEC) through ingesting the GIMs data from the previous day(s). The results show good performance of the GIMs-driven-NeQuick model with average 86% of vertical TEC error less than 10 TECU, when the global daily effective ionization indices (Az) versus modified dip latitude (MODIP) are constructed as a second order polynomial. The performance of GIMs-driven-NeQuick model presents variability with solar activity and behaves better during low solar activity years. The accuracy of TEC prediction can be improved further through performing a four-coefficient function expression of Az versus MODIP. As more measurements from earlier days are involved in the Az optimization procedure, the accuracy may decrease. The results also reveal that more efforts are needed to improve the NeQuick 2 model capabilities to represent the ionosphere in the equatorial and high-latitude regions.

1. Introduction

The ionosphere, the ionized part of the atmosphere extending from ~60 to several thousand kilometers above the Earth surface, can affect the radiowave signals travelling through it in different ways, such as Faraday rotation, doppler frequency shift, ray path bending, carrier phase advance and pseudorange group delay, and fluctuations of signal intensity and phase (ionospheric scintillation) [1–4]. Regarding the L band of the Global Navigation Satellite System (GNSS) signal, the major influence of the ionosphere is the carrier phase advance and pseudorange group delay on ranging signals depending on the ionospheric total electron content (TEC, Unit: TECU, 1 TECU = 10¹⁶ el/m²). For code measurements, the consequent pseudorange delay due to the ionosphere Ig[m] can be described as a first approximation by

Here, the slant TEC (sTEC) is defined as the integral of the electron density along the path from the transmitter to the receiver. As it is well known, the GNSS single frequency receivers have to compensate for the unwanted term Ig, before solving the navigation equations. In this case an explicit estimate of the TEC is usually obtained by means of an ionospheric model.

Several models that could be used to calibrate the ionospheric term have been developed and are still hot topics of investigation for navigation-related applications. The GPS ionospheric correction algorithm (ICA), known as Klobuchar model [5], designed on the basis of the Bent model, introduces many geometric approximations aiming at reducing the receiver computational load. The Klobuchar model provides a daily vertical TEC (vTEC) profile consisting of a cosine representation during the day and a constant value during the night. Both the amplitude and period of the cosine term are represented by four broadcast coefficients defining a third order polynomial of the geomagnetic latitude. The phase of the maximum is fixed at 14:00 local time. Through a thin shell ionosphere assumption, a suitable mapping function is applied to convert the vertical time delay at the pierce point to a slant delay along a given ray path. The GPS ICA is supposed to provide a 50% correction of the ionospheric time delay and the interested reader is referred to [5] for a detailed description of the algorithm.

The Galileo ICA can be described as follows. The effective ionization parameter (Az) at each monitoring station is determined through minimizing the differences between observed and NeQuick modeled slant TEC values for the given day (it is assumed that Az will be valid for the following day). From the calculated Az at different monitoring stations, a global Az is determined as a function of Modip using a 2nd degree polynomial determining a set of 3 coefficients. Then the satellite transmits the relevant Az in the navigation message in terms of 3 coefficients. The receiver calculates slant TEC using NeQuick with the broadcast ionization parameters and corrects the ionospheric delay at the specific frequency [6–10].

Some excellent work about the performance of the Galileo-like model in providing the ionospheric delay predictions has been published [7–10]. In these assessment studies, some IGS stations were used as reference stations to create the broadcast message and the others were used as test stations to obtain the slant TEC mismodeling. In [7], the performance in the equatorial region and northern mid-latitude region during May 2000 is given by the probability density function of residual error. In [8], a comparison of the results obtained by the GPS and Galileo operational models with observations is presented in terms of the year 2000 daily 65 percentile and 95 percentile of the absolute values of the mismodelings. In [9], the performance of the NeQuick model in correcting the ionospheric delay was obtained by comparing its predictions with Topex/Poseidon TEC data of 3 March 2000. In [10], slant TEC data for the year 2002 were ingested into NeQuick for a dozen locations around the world where colocated ionosonde and GPS receiver allow comparing measured and modeled TEC values. The dataset used by these studies covers a single day, a whole month or year during high solar activity, and their results indicate that the performance of Galileo ICA is better than GPS ICA and can be used to correct the observed ionospheric delay in a realistic way.

In the present work, a long history (over 13 years) of global ionospheric maps (GIMs) is adopted as the primary source of data to investigate the capabilities of NeQuick 2 model in providing global daily TEC prediction in a statistical way. Section 2 gives a short description of NeQuick 2 model and dataset. Section 3 describes the ionospheric correction algorithm based on NeQuick 2 adaption to GIMs in a Galileo-like mode and the criteria used to carry out the assessment. Section 4 presents and discusses the results and also a test study to improve the model performance further. Conclusions are then drawn in Section 5.

2. NeQuick 2 Model and Dataset

NeQuick 2 [11] is the latest version of a quick-run ionospheric electron density model particularly tailored for transionospheric propagation applications, developed at the Aeronomy and Radio Propagation Laboratory (ARPL, now T/ICT4D) of The Abdus Salam International Center for Theoretical Physics (ICTP), Trieste, Italy, and at the Institute for Geophysics, Astrophysics and Meteorology (IGAM) of the University of Graz, Austria.

To describe the electron density of the ionosphere, the NeQuick model uses a DGR profile formulation, which is proposed by di Giovanni and Radicella [12] and subsequently modified by Radicella and Zhang [13] and Radicella and Leitinger [14]. The model describes the ionosphere separately for the bottomside and the topside. The bottomside goes from 60 km to the F2-layer peak and consists of a sum of five semi-Epstein layers. The topside is above the F2 peak layer and it is described by means of a semi-Epstein layer with a height-dependent thickness parameter. To compute the thickness parameters and the peak electron density and height for the Epstein layers, NeQuick employs the ionosonde parameters which can be modeled or experimentally derived. The major changes in the representation of the topside and bottomside in NeQuick 2 can be found from [15, 16].

NeQuick 2 outputs the ionospheric electron density and TEC as well for the given location, time of the day, season, and solar activity indices. In order to improve the model performance and prediction capabilities, data ingestion and assimilation techniques have been implemented [6–10, 17–20], which replace the standard solar activity indices with different “effective” parameters that allow adapting a model to a specific data set. These techniques become part of COST296 Action course [21–23].

In this study, GIMs are chosen as measured values for convenience [24–27]. GIMs are computed based on the International GNSS Service (IGS) network where GPS receivers are distributed worldwide. There are at least five analysis centers that generate and deliver long-term GIMs: CODE, EMR, ESA, JPL, and UPC. Different agencies may use different reference frames and techniques to estimate vTEC and differential code biases (DCB). After computation, three validation centers (JPL, ESA, and UPC) combine them into a common IGS GIM. The global accuracy of this combined TEC is about 2–8 TECU depending on the epoch in the solar cycle, season, latitude, and proximity of available GPS receivers [28].

We choose GIMs computed by JPL (Jet Propulsion Laboratory) and CODE (Center for Orbit Determination in Europe) as measured values. GIMs generated at both agencies use data from more than 100 GPS sites of the IGS and other institutions. At JPL, the vertical TEC is modeled in a solar-geomagnetic reference frame using bicubic splines on a spherical grid, and a Kalman filter is used to solve simultaneously instrumental biases and vTEC on the grid (as stochastic parameters). More details about the JPL GIM algorithm and daily process can be found in [29–31]. At CODE, the vertical TEC is modeled in a solar-geomagnetic reference frame using a spherical harmonics expansion, and piecewise linear functions are used for the representation in the time domain. Daily DCB for all GPS satellites and ground stations are estimated simultaneously as constant values for each day. More details about the CODE GIM algorithm and daily process can be found in [32–34].

At both agencies, the GIMs are computed every 2 hours. From its beginning to 3 November 2002, the GIMs represented global TEC distribution at odd-hours and then they switched to even-hours. The vertical TEC values in the grids are given along the geographic latitude and longitude, from 87.5°S to 87.5°N and 180°W to 180°E, with intervals of 2.5° and 5°, respectively. The period of data used in this paper spans from its beginning to 31 December 2011. The CODE GIMs start from 28 March 1998 and the dataset is perfectly complete and spans 5027 days. The JPL GIMs start from 28 August 1998 and are not available on several days and they span 4856 days.

As an example, Figure 1 presents 12 JPL GIMs on 15 March 2006 (10.7 = 73.4, low solar activity), where the features of equatorial anomaly are quite evident. In each panel, the -axis and -axis represent geographic longitude and latitude, respectively, and the color scale indicates the TEC in TECU.

Figure 1: 12 JPL GIMs on 15 March 2006. In each panel, the -axis and -axis represent geographic longitude and latitude, respectively, and the color scale indicates the TEC in TECU.

3. Ionospheric Correction Algorithm

Considering the criteria expressed in [6–10], an ionospheric correction algorithm based on ingestion of GIMs into NeQuick 2 model has been implemented. To generate the Galileo-like ionospheric correction parameters, the following two procedures are considered. First of all, NeQuick 2 is optimized as a function of the daily effective ionization level (Az) to be adapted to the measured vTEC values. Following the Galileo ICA, Az is applicable for a period of 24 hours forecasting. The root mean square of TEC differences at a given grid point is defined as TEC residual errors which is called TEC. It is calculated as follows:

Here, is the number of individual observations during the day and TECobserved and TECmodeled are the TEC values given by GIMs and NeQuick 2, respectively. At a given time and for a given ray path, the TEC value obtained from the integral of NeQuick 2 electron density profile depends monotonously on the solar flux input. Therefore, there should be an optimum solar flux input value, defined as daily effective “ionization level” parameter (Az), to minimize the mismodeling of NeQuick 2 at the grid point.

As an example, Figure 2 illustrates how TEC (defined in (2)) changes versus 10.7 at a grid point (45°N, 0°E) for a given day (30 May 2004). The TEC observations are from JPL GIMs. It can be seen that TEC decreases from 10.67 TECU to 2.80 TECU when 10.7 increases from 63 to 127.7. By contrast, as 10.7 increases from 127.7 to 193, TEC increases from 2.80 TECU to 13.54 TECU. Thus the residual error of NeQuick 2, defined as TEC, reaches a minimum when 10.7 approaches to 127.7; the daily Az value for the grid point is therefore defined to be 127.7.

Figure 2: TEC residual error, TEC versus 10.7 at a grid point (45°N, 0°E) for 30 May 2004. The TEC observations are from JPL GIMs and the daily Az value for the grid point equals 127.7.

Repeating the procedures described above, global maps of Az and TEC can be obtained for the selected day. Figures 3 and 4 illustrate the geographic distribution of Az and TEC on 10 January 2000 (10.7 = 157.8, high solar activity), respectively. Following the geographic distribution of both parameters, the world can be divided into 5 wide regions characterized by quite different behaviors.

(1)The equatorial region, corresponding to a narrow belt (~15° width) around the geomagnetic equator, which exhibits Az values a little higher than 10.7 and largest TEC residual errors. The TEC errors show maxima (close to 20 TECU) in the crests of the equatorial anomaly while being significantly lower at geomagnetic equator.(2)Mid-latitude bands, extending from the equatorial region boundary to about 60° northward and southward of the equator, which show smooth Az values (near to 10.7) and low residual errors (no more than 10 TECU). It is interesting to note that both parameters are smoother and lower in the northern hemisphere than in the southern hemisphere, in accordance with the highest number of northern observations incorporated by both NeQuick and GIMs.(3)Two polar regions, extending from about 60° northward and southward of the equator to polar caps, which exhibit the highest (up to 320) and highly variable Az values. However, the TEC residual errors are the lowest (no more than 5 TECU) and more remarkable in the southern hemisphere. The Az peaks around Auroral zone might be partly due to the fact that the enhanced ionospheric ionization in ~120 km altitude resulting from the energetic particles precipitation is not included in the NeQuick empirical modeling [35]. The energetic particles precipitation occurs in spring, fall, and winter. NeQuick 2 and GIMs in polar region may not behave as well as in mid-and-low latitude regions; therefore we only consider dataset having the geographical latitude between 60°S and 60°N in the following study.

Figure 3: Geographic distribution of Az for 10 January 2000, after ingesting the current day JPL GIMs into the NeQuick 2 model.

Figure 4: Geographic distribution of TEC residual errors for 10 January 2000, after ingesting the current day JPL GIMs into the NeQuick 2 model.

To demonstrate the effectiveness of data ingestion techniques in adapting NeQuick 2 to GIMs dataset, Figure 5 displays a similar figure as Figure 4, but NeQuick 2 is driven by standard input, the 10.7 index of the day. Comparing both figures, there is no remarkable difference of residual error in the northern hemisphere. But it is not the case in the equatorial and southern hemisphere, where much higher residual errors (up to 15–20 TECU) are present. It can be concluded that through designating a much higher (sometimes lower) Az value than real 10.7 index, data ingestion process would reduce the discrepancies.

Figure 5: Geographic distribution of TEC residual errors for 10 January 2000, when NeQuick 2 model is driven by 10.7.

Even if it is not a real ionospheric parameter, Az exhibits variations with geographic location. To describe the mixed dependence of Az on the geomagnetic field and geographical latitude, modified dip latitude (MODIP [36]) μ [°] defined as follows has been used:

Here, and denote the geomagnetic dip and geographic latitude, respectively. can be computed using the IGRF (or DGRF) models.

After the daily Az values for all the 3528 grid points (72 and 49 grid points along the geographic longitude and latitude, resp.) are calculated and collected, Az can be regressed as a second order polynomial function of MODIP:

In the following, the three coefficients , , and will be calculated after an optimization procedure based on the global observations. Then will be obtained by substituting , , and μ values into (4). An example illustrated how Az values (denoted as original values, with blue dots) change versus MODIP is shown in Figure 10, together with values using (4) (green), and will be discussed later.

For a given grid point, the GIMs-driven-NeQuick results can be obtained by using as NeQuick 2 input. Taking the GIMs as reference, a statistical analysis on the global TEC difference (errors) can be carried out to check the ability of NeQuick 2 to reproduce global TEC distribution. Likewise, if 12 GIMs of the previous day are used as ingested dataset and GIMs of the current day are considered as reference, the performance of NeQuick 2 in ionospheric correction prediction (one day in advance) can be obtained through 12 maps of TEC errors for a given day.

Figure 6 displays 12 maps of TEC differences on 15 March 2006 after ingesting the previous day JPL GIMs. The -axis and -axis denote LT and geographic latitude, respectively. Indicated from the figure, it is evident that the maximum, minimum, and highest variability of TEC differences (denoted as δTEC) appear during daytime, but their amplitude seldom exceeds 15 TECU. As the time delays on GNSS signals are proportional to the TEC values, which makes the necessity of ionospheric correction not as impendent at nighttime as at daytime, the nighttime situations (LT > 18 or LT < 6) are discarded.

Figure 6: As Figure 1, but for TEC differences, when the previous day JPL GIMs are ingested into NeQuick 2 in a Galileo-like mode. The -axis and -axis denote LT and geographic latitude, respectively.

To assess the performance of ionospheric correction based on ingestion of GIMs into NeQuick 2, the cumulative distribution function (CDF) of TEC error absolute values not exceeding a certain value can be taken as a criterion, which is defined as follows:

Here, is the number of daytime TEC grid points involved in the data ingesting process, and is the number of grid points where daytime TEC errors are not exceeding a certain value, . Since the absolute values of TEC error seldom exceed 15 TECU, we take 10 TECU as the threshold and denote the parameter (CDF of absolute values of TEC error not exceeding 10 TECU) as zi₁₀. An example of cumulative distribution function of TEC errors is given in Figure 7 (for 10 January 2000), when JPL GIMs of the previous day are ingested into NeQuick 2. The blue area denotes CDF of the absolute values of TEC errors less than 10 TECU. Here, computed CDF for TEC errors less than 10 TECU, , and less than −10 TECU, , are 0.9845 and 0.1892, respectively; therefore zi₁₀ equals 0.7953.

Figure 7: Cumulative distribution function (CDF) of TEC errors for 10 January 2000, when the previous day JPL GIMs are ingested into NeQuick 2 in a Galileo-like mode. The blue area denotes CDF of absolute values of TEC errors less than 10 TECU, and zi₁₀ equals 0.7953 (0.9845 − 0.1892).

4. Results and Discussions

In this section the analysis results of ionospheric correction based on NeQuick 2 adaption to the previous day GIMs will be displayed and discussed. The ability of NeQuick 2 to predict global daily TEC values will be assessed, and the results of an attempt to further improve the model performance will also be proposed.

Considering the situation that in some applications we cannot get GIMs or other measurements the day before, the possibility of using measurements taken at earlier times may have some practical meanings and is investigated here. In this context, we performed a test study of ionospheric correction given by NeQuick 2 adaption to GIMs data of the previous day, during 1 to 3 days before, during 1 to 5 days before, respectively. The results of zi₁₀ can be considered as an indication of the model performance in predicting the TEC values at a given day after ingesting the GIMs data of a suitable number of days before. For comparison, the results of NeQuick 2 adaption to GIMs of the current day are also present.

Time series of zi₁₀ are given in Figure 8, computed by ingesting previous day(s) JPL GIMs into NeQuick 2 and Az are modeled with 3 coefficients according to (4), like in the scheme adopted by Galileo ICA. The ingested GIMs data are of the current day (a), of the previous day (b), during 1 to 3 days before (c), and during 1 to 5 days before (d), respectively. The mean values of zi10 are given in the title. Figure 9 shows similar results but the ingested GIMs data are from CODE. From both figures, the following can be concluded. In general, the performance of GIMs-driven-NeQuick model in predicting global TEC distribution is quite good. Few values of zi₁₀ fall below 60%, and the mean values get close to 85%. Very similar trends of zi₁₀ changes with time can be seen quite clearly, regardless of GIMs from JPL or CODE, of GIMs from the current day or historical data as old as 5 days. The temporal variations of zi₁₀ are over several time scales, such as annual, semiannual, and solar cycle periodic variations. As more measurements from earlier days are used, the accuracy of NeQuick 2 adaption to both JPL GIMs and CODE GIMs may decrease. When NeQuick 2 is adapted to JPL GIMs, zi₁₀ decreases from 86.78% using the current day GIMs to 85.61% using the previous day GIMs, then to 85.18% using GIMs 1 to 3 days before, and finally to 84.72% using GIMs 1 to 5 days before. When NeQuick 2 is adapted to CODE GIMs, zi₁₀ generally shows similar trends but a little higher in terms of amplitude correspondingly. The performance of GIMs-driven-NeQuick model also presents variability with solar activity and behaves better during low solar activity years. It can be seen from the zi₁₀ values during the years 2007 to 2010 indicating that the TEC error is below 10 TECU 90% of the time.

(a)

(b)

(c)

(d)

Figure 8: Time series of zi₁₀ computed by ingesting of JPL GIMs into NeQuick 2 in a Galileo-like mode. The ingested GIMs data are of the current day (a), of the previous day (b), during 1 to 3 days before (c), and during 1 to 5 days before (d), respectively. The mean values of zi₁₀ are given in the title.

(a)

(b)

(c)

(d)

Figure 9: As Figure 8, but the ingested GIMs data are from CODE.

Figure 10: Az versus MODIP for 12 April 2003.

As an attempt to further improve the accuracy of global daily TEC prediction, we add a 4th term to (4), to form the following expression:

A justification for this representation is given after considering Figure 10, which presents an example of calculated Az values at every grid point (blue dots) versus MODIP and the corresponding Az fitting values obtained with (4) (green) and (6) (red). It is clear that the 4- coefficient function can reproduce the trends of Az values better than that of 3 coefficients. Particularly in the equatorial anomaly region, the peak is represented more precisely. According to Figure 10, the following is clear. After adding the 4th coefficients, the wavelike shape of Az values can be reproduced well. For a fixed MODIP, there is a spread of Az, and the variability of Az can reach up to 50 (near 40°N), and we attribute it to the longitudinal effect as shown in Figure 3. Thus we suppose that using a single value to characterize them will not be enough and induce some errors. The global variability of Az can reach up to 100 and it clearly reflects that the NeQuick 2 model itself can not fully reproduce the detailed characteristics of global daily TEC distribution, in particular with the Galileo-like adaption technique.

When Az are modeled with 4 coefficients according to (6), time series of zi₁₀ shows similar trends as that when Az are modeled with 3 coefficients according to (4), whether ingested previous day(s) GIMs data are from JPL or CODE. Due to the similarity, we do not display the individual time series of zi₁₀ here, but only the mean values of zi₁₀ and corresponding improvement are summarized in Tables 1 and 2.

Table 1: Mean values of zi₁₀ and improvement, when JPL GIMs are ingested into NeQuick 2.

With 3 coefficients
With 4 coefficients
Improvement

Current day
86.78%
88.45%
1.67%

1 day before
85.61%
87.15%
1.54%

1 to 3 days before
85.18%
86.70%
1.52%

1 to 5 days before
84.72%
86.22%
1.5%

Table 2: As Table 1, but the ingested GIMs are from CODE.

With 3 coefficients
With 4 coefficients
Improvement

Current day
87.56%
89.03%
1.47%

1 day before
86.46%
87.80%
1.34%

1 to 3 days before
86.08%
87.42%
1.34%

1 to 5 days before
85.66%
86.98%
1.32%

From both tables, it is obvious that the performance of global daily TEC predictions is slightly improved further after adding the 4th coefficient. On average, this improvement is ~1.56% for JPL GIMs and ~1.37% for CODE GIMs, respectively.

It is interesting to note that even using GIMs dataset of the current day, the zi₁₀ mean values can hardly reach to 90%. This is probably due to the longitude variation of Az index; the performance of NeQuick 2 model might have local time dependence at a selected location, thus only one Az index is not sufficient to reduce the residual error significantly; the uncertainty of the observations used. The fact that zi₁₀ may decrease as more measurements from earlier days are used in the constructing process may be due to the short correlation scale of ionospheric TEC. Thus, for forecasting purpose, historical data older than 5 days should not be considered. It has to be noted that the improvement of TEC predictions is not so remarkable as that of Az as shown in Figure 10. This fact may partly reflect that more efforts should be devoted to the model parametrization to improve the NeQuick capabilities in the equatorial and high-latitude regions, such as the electron density and TEC dependence on local time in these areas. The performance of ionospheric correction based on ingestion of GIMs dataset into NeQuick 2 also varies with seasons and geographic latitudes. A more detailed study on these aspects is being carried out and the relevant results will be present in the next future.

5. Conclusions

NeQuick is an empirical model that describes spatial and temporal variations of the ionospheric electron density. It employs the ionosonde observations derived ionospheric peak density and height maps as the basis and uses the DGR formulation to represent the altitude variation of electron density. The model output is the ionospheric electron density and TEC for the given location, time of the day, month, and solar activity. An adapted model version of the European Space Agency has been used in the Galileo single frequency receivers to compute ionospheric corrections. The effective ionization parameter input is described by three coefficients.

In this paper, we carried out a study of ionospheric modeling based on the NeQuick 2. Effective ionization indices (Az) have been estimated by ingesting observations into the model. In particular, GIMs computed by JPL and CODE during more than 13 years have been used. The investigation aims to assess the performance of NeQuick 2 in providing global TEC predictions after ingesting previous day GIMs data. The main conclusions are as follows.

(1)In general, the performance of NeQuick 2 adapted to GIMs is quite good, with average 86% of vertical TEC error less than 10 TECU, when the global daily Az function of MODIP is constructed as a second order polynomial. The performance of NeQuick 2 adapted to GIMs presents variability with solar activity and behaves better during low solar activity years.(2)As more measurements from earlier days are used, the accuracy may decrease. Thus, for forecasting purpose, we propose historical data older than 5 days should not be considered. The accuracy of TEC predictions is improved further after adding a 4th coefficient to the original expression adopted by Galileo ionospheric correction algorithm, but not remarkably. More robust technique is needed in the future to accurately nowcast/forecast the ionosphere [37].

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The global ionospheric maps (GIMs) are provided by Jet Propulsion Laboratory (JPL) and Center for Orbit Determination in Europe (CODE). The data is obtained from the Crustal Dynamics Data Information System (CDDIS) International GNSS Service (IGS) archive center (ftp://cddis.gsfc.nasa.gov/pub/gps/products/ionex/). This work was supported by International Science & Technology Cooperation Program of China (Grant no. 2011DFA-22270) and National 863 Program “GNSS vulnerability analysis and signal transmission environment” (Grant no. 2011AA120503).

References

Z. W. Xu, Ionospheric effects on satellite radio signal propagation and its performance [Ph.D. thesis], Xidian University, 2005.

P. M. Kintner and B. M. Ledvina, “The ionosphere, radio navigation, and global navigation satellite systems,” Advances in Space Research, vol. 35, no. 5, pp. 788–811, 2005.

L. R. Cander, “Ionospheric research and space weather services,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 70, no. 15, pp. 1870–1878, 2008.

R. Warnant, U. Foelsche, M. Aquino et al., “Mitigation of ionospheric effects on GNSS,” Annals of Geophysics, vol. 52, no. 3-4, pp. 373–390, 2009.

J. A. Klobuchar, “Ionospheric time-delay algorithm for single-frequency GPS users,” IEEE Transactions on Aerospace and Electronic Systems, vol. 23, no. 3, pp. 325–331, 1987.

R. Prieto-Cerdeira, R. Orus-Peres, E. Breeuwer, R. Lucas-Rodriguez, and M. Falcone, “Performance of the Galileo Single-Frequency Ionospheric Correction During In-Orbit Validation,” GPS World, 2014, http://gpsworld.com/innovation-the-european-way/

B. Arbesser-Rastburg, “The Galileo single frequency ionospheric correction algorithm,” in Proceedings of the 3rd European Space Weather Week, 2006, Brussels, Belgium.

S. M. Radicella, B. Nava, and P. Coïsson, “Ionospheric models for GNSS single frequency range delay corrections,” Física de la Tierra, vol. 20, pp. 27–39, 2008.

A. Aragón-Ángel, R. Orús, F. Amarillo, M. Hernández-Pajares, J. M. Juan, and J. Sanz, “Preliminary NeQuick assessment for future single frequency users of Galileo,” in Proceedings of the 6th Geomatic Week, Barcelona, Spain, February 2005.

B. Bidaine and R. Warnant, “Ionosphere modelling for Galileo single frequency users: Illustration of the combination of the NeQuick model and GNSS data ingestion,” Advances in Space Research, vol. 47, no. 2, pp. 312–322, 2011.

B. Nava, P. Coïsson, and S. M. Radicella, “A new version of the NeQuick ionosphere electron density model,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 70, no. 15, pp. 1856–1862, 2008.

G. di Giovanni and S. M. Radicella, “An analytical model of the electron density profile in the ionosphere,” Advances in Space Research, vol. 10, no. 11, pp. 27–30, 1990.

S. M. Radicella and M. L. Zhang, “The improved DGR analytical model of electron density height profile and total electron content in the ionosphere,” Annals of Geophysics, vol. 38, no. 1, pp. 35–41, 1995.

S. M. Radicella and R. Leitinger, “The evolution of the DGR approach to model electron density profiles,” Advances in Space Research, vol. 27, no. 1, pp. 35–40, 2001.

P. Coïsson, S. M. Radicella, R. Leitinger, and B. Nava, “Topside electron density in IRI and NeQuick: features and limitations,” Advances in Space Research, vol. 37, no. 5, pp. 937–942, 2006.

R. Leitinger, M. L. Zhang, and S. M. Radicella, “An improved bottomside for the ionospheric electron density model NeQuick,” Annals of Geophysics, vol. 48, no. 3, pp. 525–534, 2005.

B. Nava, P. Coïsson, G. M. Amarante, F. Azpilicueta, and S. M. Radicella, “A model assisted ionospheric electron density reconstruction method based on vertical TEC data ingestion,” Annals of Geophysics, vol. 48, no. 2, pp. 313–320, 2005.

M. Hernández-Pajares, J. M. Juan, J. Sanz, and D. Bilitza, “Combining GPS measurements and IRI model values for space weather specification,” Advances in Space Research, vol. 29, no. 6, pp. 949–958, 2002.

B. Nava, S. M. Radicella, R. Leitinger, and P. Coïsson, “A near-real-time model-assisted ionosphere electron density retrieval method,” Radio Science, vol. 41, no. 6, Article ID RS6S16, 2006.

B. Bidaine and R. Warnant, “Assessment of the NeQuick model at mid-latitudes using GNSS TEC and ionosonde data,” Advances in Space Research, vol. 45, no. 9, pp. 1122–1128, 2010.

D. Altadill, J. Boska, L. R. Cander et al., “Near earth space plasma monitoring under COST 296,” Annals of Geophysics, vol. 52, no. 3-4, pp. 221–234, 2009.

A. Bourdillon, B. Zolesi, and L. R. Cander, “COST 296 action results for space weather ionospheric monitoring and modelling,” Advances in Space Research, vol. 45, no. 9, pp. 1173–1177, 2010.

D. Buresova, B. Nava, I. Galkin, M. Angling, S. M. Stankov, and P. Coïsson, “Data ingestion and assimilation in ionospheric models,” Annals of Geophysics, vol. 52, no. 3-4, pp. 235–253, 2009.

R. Orús, M. Hernández-Pajares, J. M. Juan, and J. Sanz, “Improvement of global ionospheric VTEC maps by using kriging interpolation technique,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 67, no. 16, pp. 1598–1609, 2005.

R. Orús, M. Hernández-Pajares, J. M. Juan, J. Sanz, and M. García-Fernández, “Performance of different TEC models to provide GPS ionospheric corrections,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 64, no. 18, pp. 2055–2062, 2002.

L. B. Liu, W. X. Wan, B. Q. Ning, and M. L. Zhang, “Climatology of the mean TEC derived from GPS Global Ionospheric Maps,” Journal of Geophysical Research, vol. 114, Article ID A06308, 2009.

M. Hernández-Pajares, J. M. Juan, J. Sanz et al., “The IGS VTEC maps: a reliable source of ionospheric information since 1998,” Journal of Geodesy, vol. 83, no. 3-4, pp. 263–275, 2009.

M. J. Dow, R. E. Neilan, and C. Rizos, “The international GNSS service in a changing landscape of global navigation satellite system,” Journal of Geodesy, vol. 83, no. 3-4, pp. 191–198, 2009.

B. A. Iijima, I. L. Harris, C. M. Ho et al., “Automated daily process for global ionospheric total electron content maps and satellite ocean altimeter ionospheric calibration based on Global Positioning System data,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 61, no. 16, pp. 1205–1218, 1999.

A. J. Mannucci, B. D. Wilson, D. N. Yuan, C. H. Ho, U. J. Lindqwister, and T. F. Runge, “A global mapping technique for GPS-derived ionospheric total electron content measurements,” Radio Science, vol. 33, no. 3, pp. 565–582, 1998.

A. J. Mannucci, B. Iijima, L. Sparks, X. Pi, B. Wilson, and U. Lindqwister, “Assessment of global TEC mapping using a three-dimensional electron density model,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 61, no. 16, pp. 1227–1236, 1999.

S. Schaer, Mapping and predicting the Earth's ionosphere using the Global Positioning System [Ph.D. thesis], University of Bern, 1999.

S. Schaer, G. Beutler, L. Mervart, and M. Rothacher, “Global and regional ionosphere models using the GPS double difference phase observable,” in Proceedings of the IGS Workshop on Special Topics and New Directions, pp. 77–92, Potsdam, Germany, May 1995.

S. Schaer, G. Beutler, M. Rothacher, and T. A. Springer, “Daily global ionosphere maps based on GPS carrier phase date routinely produced by the Code Analysis Center,” in Proceedings of the IGS AC Workshop, pp. 181–192, Silver Spring, Md, USA, March 1996.

X. Yue, W. S. Schreiner, Y.-H. Kuo, Q. Wu, Y. Deng, and W. Wang, “GNSS radio occultation (RO) derived electron density quality in high latitude and polar region: NCAR-TIEGCM simulation and real data evaluation,” Journal of Atmospheric and Solar-Terrestrial Physics, vol. 98, pp. 39–49, 2013.

K. Rawer, “Propagation of decameter waves (HF band),” in Meteorological and Astronomical Influences on Radio Wave Propagation, B. J. Landmark, Ed., chapter 11, pp. 221–250, Academic Press, New York, NY, USA, 1963.

X. Yue, W. S. Schreiner, Y.-H. Kuo et al., “Global 3-D ionospheric electron density reanalysis based on multi-source data assimilation,” Journal of Geophysical Research: Space Physics, vol. 117, no. A9, Article ID A09325, 2012.