The Scientific World Journal
Volume 2016 (2016), Article ID 5960614, 1 page
http://dx.doi.org/10.1155/2016/5960614

Retraction

Retracted: An Improved Ant Colony Optimization Approach for Optimization of Process Planning

The Scientific World Journal

Received 3 March 2016; Accepted 3 March 2016

Copyright © 2016 The Scientific World Journal. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The article titled “An Improved Ant Colony Optimization Approach for Optimization of Process Planning” [1] has been retracted as it was found to contain a substantial amount of material from the following published article: “A Graph-Based Ant Colony Optimization Approach for Process Planning,” by JinFeng Wang, XiaoLiang Fan, and Shuting Wan, in The Scientific World Journal.

References

J. Wang, X. Fan, and H. Ding, “An improved ant colony optimization approach for optimization of process planning,” The Scientific World Journal, vol. 2014, Article ID 294513, 15 pages, 2014.