The Scientific World Journal
Volume 2017 (2017), Article ID 3178673, 1 page
https://doi.org/10.1155/2017/3178673

Corrigendum

Corrigendum to “Development and Application of a ZigBee-Based Building Energy Monitoring and Control System”

Changhai Peng1,2,3 and Kun Qian⁴

¹School of Architecture, Southeast University, Nanjing 210096, China
²Key Laboratory of Urban and Architectural Heritage Conservation (Southeast University), Ministry of Education, Nanjing 210096, China
³IIUSE, Southeast University, Nanjing 210096, China
⁴School of Automation, Southeast University, Nanjing 210096, China

Correspondence should be addressed to Changhai Peng; pengchanghai@foxmail.com

Received 24 May 2017; Accepted 11 June 2017; Published 12 July 2017

Copyright © 2017 Changhai Peng and Kun Qian. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Development and Application of a ZigBee-Based Building Energy Monitoring and Control System” [1], the authors based their article on two of their previous publications [2, 3] that are not cited. The four numbered items in the section titled “5. Application of ZBEMCS” in our article [1] are reproduced from the section titled “3.1. Classification and Subentry Metering of the BEEMS” in article [2].

Additionally, there are three figures in article [1] that are taken from the previous publications [2, 3], where Figures and correspond to Figures and in article [2], respectively, and Figure is the same as Figure in article [3].

References

C. Peng and K. Qian, “Development and application of a ZigBee-based building energy monitoring and control system,” The Scientific World Journal, vol. 2014, Article ID 528410, 13 pages, 2014.

C. H. Peng and Y. J. Mu, “Case study of building energy and environment management system on campus: A report from Southeast University,” Advanced Materials Research, vol. 860–863, pp. 1316–1322, 2014.

K. Qian, X. Ma, C. Peng, Q. Ju, and M. Xu, “A zigbee-based building energy and environment monitoring system integrated with campus GIS,” International Journal of Smart Home, vol. 8, no. 2, pp. 107–114, 2014.