The Scientific World Journal
Volume 2017 (2017), Article ID 4583434, 1 page
https://doi.org/10.1155/2017/4583434

Retraction

Retracted: The Design and Implementation of Postprocessing for Depth Map on Real-Time Extraction System

The Scientific World Journal

Received 27 March 2017; Accepted 27 March 2017; Published 16 July 2017

Copyright © 2017 The Scientific World Journal. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The Scientific World Journal has retracted the article titled “The Design and Implementation of Postprocessing for Depth Map on Real-Time Extraction System” [1]. The peer review of the article has been compromised, due to a conflict of interest between the handling editor and one of the authors.

References

Z. Tang, B. Li, H. Li, and Z. Xu, “The design and implementation of postprocessing for depth map on real-time extraction System,” The Scientific World Journal, vol. 2014, Article ID 363287, 10 pages, 2014.