Wireless Communications and Mobile Computing
Volume 2019 (2019), Article ID 2418643, 1 page
https://doi.org/10.1155/2019/2418643

Corrigendum

Corrigendum to “Towards Smart Healthcare: Patient Data Privacy and Security in Sensor-Cloud Infrastructure”

Isma Masood,¹ Yongli Wang,¹ Ali Daud,² Naif Radi Aljohani,³ and Hassan Dawood⁴

¹School of Computer Science and Engineering, Nanjing University of Science and Technology, Nanjing 210000, China
²Department of Computer Science and Software Engineering, International Islamic University, Islamabad 44000, Pakistan
³Faculty of Computing and Information Technology, King Abdulaziz University, Jeddah 21432, Saudi Arabia
⁴Department of Software Engineering, University of Engineering and Technology, Taxila 47070, Pakistan

Correspondence should be addressed to Yongli Wang; yongliwang@njust.edu.cn

Received 1 October 2019; Accepted 4 October 2019; Published 21 November 2019

Copyright © 2019 Isma Masood et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Towards Smart Healthcare: Patient Data Privacy and Security in Sensor-Cloud Infrastructure” [1], Dr. Isma Masood was incorrectly listed as the corresponding author. The corresponding author is Dr. Yongli Wang.

References

I. Masood, Y. Wang, A. Daud, N. R. Aljohani, and H. Dawood, “Towards smart healthcare: patient data privacy and security in sensor-cloud infrastructure,” Wireless Communications and Mobile Computing, vol. 2018, Article ID 2143897, 23 pages, 2018.