ISRN OphthalmologyVolume 2011 (2011), Article ID 648450, 6 pagesdoi:10.5402/2011/648450

Research Article

Diffusion Tensor Imaging for In Vivo Detection of Degenerated Optic Radiation

Georg Michelson,¹ Tobias Engelhorn,² Simone Waerntges,¹ and Arnd Doerfler²

¹Department of Opthtalmology, University Erlangen-Nuremberg, Schwabachanlage 6, 91054 Erlangen, Germany²Department of Neuroradiology, University Erlangen-Nuremberg, Schwabachanlage 6, 91054 Erlangen, Germany

Received 18 October 2011; Accepted 20 November 2011

Academic Editor: Á. Szél

Copyright © 2011 Georg Michelson et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Glaucomatous optic nerve atrophy may continue to the linked optic radiation by transneuronal degeneration, as described in animal models of glaucoma. In vivo visualization of the visual pathway represents a new challenge in the field of ophthalmology. We present a new approach for illustration of the optic radiation by diffusion tensor imaging (DTI) based on magnetic resonance imaging (MRI). The DTI was established by use of a 3T high-field scanner. The case of a patient with primary open-angle glaucoma is opposed to this one of a healthy subject to demonstrate the visible rarefication of the optic radiation. The goal was to introduce the technique of the DTI also in ophthalmology and to demonstrate that it may be useful to judge glaucoma-related differences.

1. Introduction

Transneuronal degeneration is a process of primary neuron injury affecting the linked distal neurons. It was described for pathophysiological changes in neurological diseases such as Alzheimer’s disease [1] and brain trauma [2]. More recent studies have suggested that this damage also occurs in the development of glaucoma [3–5]. Loss of retinal ganglion cells in the retina and their axons that represent the optic nerve (3rd neuron) [6] and a loss of astrocytes [7] is the predominant finding in primary open-angle glaucoma. The axons of various retinal ganglion cell subtypes, differing in specific morphology and function, exit the eye ball and finally converge to anatomically distinguishable layers of the lateral geniculate nucleus (LGN) [8] where a loss of neural cells has also been described in glaucoma [9]. The LGN serves as a “relay station” that transmits the information via the 4th neuron to the primary visual cortex (V1) [9]. Even in V1 neurons were found to be reduced in glaucomatous optic nerve atrophy [6]. The loss of axons of the 3rd neuron and astrocytes, which are placed between the optic nerve fibers becomes visible by a “cupping” of the optic nerve head [10]. Functionally, glaucoma results in a loss of visual function, which is detectable by determination of the visual field (white-white perimetry) and of the spatial-temporal contrast sensitivity (frequency doubling test, FDT) [11, 12].

It is not clear if the loss of axons of the 3rd neuron causes directly an injury of the 4th neuron in humans. However, animal experiments recently have shown that glaucomatous loss of axons of the 3rd neuron is followed by a loss of the LGN volume which indicates a reduced number of 4th neurons [9]. Furthermore, with increasing loss of retinal ganglion cells an increasing loss in LGN neurons was described [9].

In vivo detection of glaucomatous changes along the visual pathway and its conjunction to intraocular findings represents a special challenge. We report a new approach for in vivo visualization of pathological changes of the optic radiation (4th neuron) in glaucoma by use of diffusion tensor imaging (DTI). DTI is based on the random motion of water molecules, which is associated with their thermal energy at body temperature (Brownian motion) and which is known as “diffusion” [13]. In the presence of a strong magnetic gradient a loss of the magnetic resonance signal results as a consequence of the dephasing of spin coherence [14]. In each voxel the eigenvectors can be characterized from the generated diffusion-weighted magnetic resonance images [14]. In white matter consisting of axons in all directions of a three-dimensional space the diffusion of free water molecules is different (anisotropy) [15, 16]. Predominantly the orientation of fiber tracts and their micro- and macrostructural features influences the diffusion anisotropy [17] and provides the direction of the largest eigenvector. Macroscopically the degree of anisotropy assigned to a definite voxel is affected by the variability in the orientation of all white matter tracts in this imaging voxel [17]. Even reconstructions of fiber crossing and branching within the optic chiasm and the LGN are possible by DTI. Thus, the entire visual pathway from the optic nerve to the visual cortex may be reconstructed [18].

In our work we intended to introduce the DTI as a suitable examination method to detect changes of the optic radiation in glaucoma patients.

2. Materials and Methods

A case report in comparison to a healthy age-matched control subject is shown. Subjects received a questionnaire requesting age, gender, known cardiovascular risk factors (i.e., arterial hypertension, diabetes, smoking history), and cardiovascular events (i.e., myocardial infarction, peripheral arterial disease, transient ischemic attack, and stroke). Eyes were assessed by a full ophthalmological examination with dilated pupils and judgement of automated perimetry (Octo 101 dG2, Interzeag, Schlieren, Switzerland), of spatial-temporal contrast sensitivity (FDT, frequency doubling test, Carl Zeiss Meditec AG, Jena, Germany), and nonmydriatic fundus images (KOWA, Nonmyd-alpha 45, Japan).

MRI was performed on a 3T high-field scanner (Magnetom Tim Trio, Siemens, Erlangen, Germany) with a gradient field strength up to 45 mT/m (72 mT/m effective). The anatomical data were obtained in a T1-weighted 3D-MPRAGE sequence ( ms,  ms,  cm, acquisition matrix size = 512 × 256 reconstructed to 512 × 512, reconstructed axial plans with 1.2 mm slice thickness). For detection of microangiopathy, a heavily T2-weighted fluid-attenuated inversion recovery (FLAIR) sequence covering the whole brain was acquired ( ms,  ms, matrix size = 512 × 512). DTI was performed in the axial plane with 4 mm slice thickness and a 1 mm interslice separation using a single-shot, spin echo, echo planar imaging (EPI) diffusion tensor sequence thus covering the whole visual pathway ( ms,  ms, cm, acquisition matrix size = 128 × 128 reconstructed to , number of signal averages = 7, partial Fourier acquisition = 60%). Diffusion weighting with a maximal b-factor of 1000 s/mm² was carried out along 15 icosahedral directions complemented by one scan with . Datasets were automatically corrected for imaging distortions and coregistered in reference to T1-weighted MPRAGE images. These and further calculations such as determining the independent elements of the diffusion tensor, deriving the corresponding eigenvalues and eigenvectors, were performed with a dedicated software package (Neuro 3D, Siemens, Erlangen, Germany).

The study was conducted in accordance with the Declaration of Helsinki on Biomedical Research Involving Human Subjects. Written informed consent was obtained from all subjects.

3. Results and Discussion

3.1. Reliability of Semiautomated Segmentation of the Optic Radiation

The images of 14 patients were tested for the reliability of the corrected optic radiation segmentation. Two observers postprocessed manually the automatically provided segmentation to exclude cerebral structures that are not a part of the optic radiation and the fractional anisotropy was calculated. Cronbach-α at the 95% confidence interval for FA was 0.990 (right optic radiation, , ) and 0.886 (left optic radiation, , ) with and . Thus, the intraclass correlation coefficients of reliability of the semiautomated segmentation were within a very good range of reliability.

Compared to the optic radiation of a healthy volunteer the DTI of a patient with primary open-angle glaucoma appears rarefied (Figures 1 and 2). The number of voxels in the optic radiation of the POAG patient is on average a third smaller than in the control subject (Table 1). Calculations of the number of voxels in the manually segmented optic radiation have confirmed the rarefied optic radiation in glaucoma patients [19]. The underlying pathophysiology of the glaucoma disease is based on a damage of the 3rd neuron with loss of function. It is discussed that a “transneuronal degeneration” to the 4th neuron proceeds. Most studies examined primate models of experimentally induced glaucoma. It was reported that in unilateral experimental glaucoma in addition to the damage of retinal ganglion cells also the post-retinal magno- and parvocellular layers of the LGN of the thalamus [3] and the primary visual cortex may be impaired [9]. Transneuronal degeneration was also found in a postmortem human study of the optic nerve, LGN, and visual cortex [7]. In a primate model of glaucoma the neuronal degeneration was shown to proceed from the LGN to the visual cortex [20, 21]. It is progressive with increasing nerve fiber loss of the 3rd neuron [9]. A loss of 50–60% of the ganglion cells may be already present if visual field defects are detectable by perimetry [22]. It was also shown in experimental glaucoma that some of the 4th neurons in the LGN have died and surviving neurons were atrophic [3–5]. Because impairment of the visual field is associated with optic nerve degeneration a certain probability for neurodegeneration of the 4th neuron of the visual pathway may be adopted and even was confirmed.

Table 1: Characteristics of the case reports.

Case
Control

ID
HS
JS

Age [yr]
68
25

Gender
F
F

Concomitant diseases
HT, HC stroke 12 yr ago
Crohn’s disease

DTI diagnosis of optic radiation
Rarefication L > R
Vigorously and completely developed

MRI diagnosis
Moderate cerebral microangiopathy, level 2
No cerebral microangiopathy

OD
OS
OD
OS

Eye diagnosis
POAG
POAG, parapapillary bleeding
Vital papilla
Vital papilla

Visual acuity
1.0
0.6
1.25
1.0

IOP [mm Hg](Case with local therapy)
18
17
14
11

Octopus MD [dB]
3.6
6.6
−0.6
0.3

FDT (≤50 sec)
42
74
36
34

HRT Disc area (1.69–2.82 mm²)
1.855
1.718

HRT Cup area (0.26–1.27 mm²)
0.269
0.166

HRT Rim area (1.20–1.78 mm²)
1.586
1.552

Right OR
Left OR
Right OR
Left OR

DTI Voxel No.
575
470
848
717

F: female; OD: right eye; OS: left eye; OR: optic radiation; POAG: primary open-angle glaucoma; IOP: intraocular pressure, MD: mean defect; FDT: frequency doubling test (loss of spatial-temporal contrast sensitivity: A mild relative >95%, B moderate relative >98%, C severe >99%; number of fields of a maximum of 17); HRT: Heidelberg Retina Tomograph; DTI: diffusion tractography imaging; HT: arterial hypertension; HC: hypercholesterolemia.

Figure 1: DTI of the optic system in a healthy subject. (a) The automated perimeter did no show visual field defects. (b) The frequency doubling test likewise did not show any impaired spatial-temporal contrast sensitivity. (c) The findings in the T2-weighted MRI were normal. (d) The localization of the optic radiations (arrows) is labelled in the T1-weighted MRI. (e) DTI reveals that the optic radiation in the occipital lobe (arrows) is developed vigorously and completely. (f) The schematic drawing shows the anatomy of the visual pathway, particularly of the optic radiation and lateral geniculate nucleus (LGN).

Figure 2: Glaucomatous optic nerve atrophy (case no. 1). Woman, 68 yr, OD/OS with primary open-angle glaucoma, in OS a parapapillary bleeding of the optic nerve head; topical medication: brimonidine, latanoprost, dorzolamide. (a) In both eyes (OS (left) > OD [right]) the automated perimeter showed predominantly superior visual field defects due to a loss of axons of the 3rd neuron. (b) The frequency doubling test indicated impaired spatial-temporal contrast sensitivity primarily in OS in the superior and temporal area as well as nasal near the center. (c) Typical signs of glaucomatous optic nerve atrophy were recorded by a nonmydriatic fundus camera that is in OS a small rim area, smaller inferior rim than temporal and a parapapillary bleeding (arrows). (d) DTI reveals significant rarefication of the optic radiation (arrows) in both occipital lobes (left > right). (e) Circumscribed microangiopathy (arrow) was diagnosed in the optic radiation based on MRI (FLAIR sequence).

4. Conclusions

This case report demonstrates that the DTI allows an in vivo visualization of the posterior part of the visual pathway. This new technique in ophthalmology may be applicable for earlier diagnosis of glaucomatous changes and for noninvasive therapy monitoring in the future. However, presently this method is relatively expensive. Additionally, the impact for the different entities of optic nerve atrophy should be clearly validated prior to implementation into routine diagnostic.

Conflict of Interests

G. Michelson and T. Engelhorn declare that they had full access to all the data in the study and had final responsibility for the decision to submit for publication. All authors declare that they have no conflict of interest.

Authors’ Contribution

G. Michelson and T. Engelhorn contributed equally to this work and thus share first authorship.

Acknowledgments

The project was partly funded by the German Research Foundation (DFG, SFB 539 A4) and by the Federal Ministry for Education and Research (BMBF), Bonn, Germany in the Excellence Cluster Medical Valley EMN, Grant MVEMN-A-02.

References

J. H. Su, G. Deng, and C. W. Cotman, “Transneuronal degeneration in the spread of Alzheimer's disease pathology: immunohistochemical evidence for the transmission of tau hyperphosphorylation,” Neurobiology of Disease, vol. 4, no. 5, pp. 365–375, 1997.

A. C. Conti, R. Raghupathi, J. Q. Trojanowski, and T. K. McIntosh, “Experimental brain injury induces regionally distinct apoptosis during the acute and delayed post-traumatic period,” Journal of Neuroscience, vol. 18, no. 15, pp. 5663–5672, 1998.

Y. H. Yücel, Q. Zhang, R. N. Weinreb, P. L. Kaufman, and N. Gupta, “Atrophy of relay neurons in magno-and parvocellular layers in the lateral geniculate nucleus in experimental glaucoma,” Investigative Ophthalmology and Visual Science, vol. 42, no. 13, pp. 3216–3222, 2001.

Y. H. Yücel, Q. Zhang, N. Gupta, P. L. Kaufman, and R. N. Weinreb, “Loss of neurons in magnocellular and parvocellular layers of the lateral geniculate nucleus in glaucoma,” Archives of Ophthalmology, vol. 118, no. 3, pp. 378–384, 2000.

A. J. Weber, H. Chen, W. C. Hubbard, and P. L. Kaufman, “Experimental glaucoma and cell size, density, and number in the primate lateral geniculate nucleus,” Investigative Ophthalmology and Visual Science, vol. 41, no. 6, pp. 1370–1379, 2000.

R. D. Fechtner and R. N. Weinreb, “Mechanisms of optic nerve damage in primary open angle glaucoma,” Survey of Ophthalmology, vol. 39, no. 1, pp. 23–42, 1994.

N. Gupta, L. C. Ang, L. N. de Tilly, L. Bidaisee, and Y. H. Yücel, “Human glaucoma and neural degeneration in intracranial optic nerve, lateral geniculate nucleus, and visual cortex,” British Journal of Ophthalmology, vol. 90, no. 6, pp. 674–678, 2006.

D. M. Dacey, “Circuitry for color coding in the primate retina,” Proceedings of the National Academy of Sciences of the United States of America, vol. 93, no. 2, pp. 582–588, 1996.

Y. H. Yücel, Q. Zhang, R. N. Weinreb, P. L. Kaufman, and N. Gupta, “Effects of retinal ganglion cell loss on magno-, parvo-, koniocellular pathways in the lateral geniculate nucleus and visual cortex in glaucoma,” Progress in Retinal and Eye Research, vol. 22, no. 4, pp. 465–481, 2003.

J. Flammer and M. Mozaffarieh, “What is the present pathogenetic concept of glaucomatous optic neuropathy?” Survey of Ophthalmology, vol. 52, no. 6, supplement 2, pp. S162–S173, 2007.

A. J. Anderson and C. A. Johnson, “Frequency-doubling technology perimetry,” Ophthalmology Clinics of North America, vol. 16, no. 2, pp. 213–225, 2003.

C. A. Johnson, G. A. Cioffi, J. R. Liebmann, P. A. Sample, L. M. Zangwill, and R. N. Weinreb, “The relationship between structural and functional alterations in glaucoma: a review,” Seminars in Ophthalmology, vol. 15, no. 4, pp. 221–233, 2000.

T. P. L. Roberts and E. S. Schwartz, “Principles and implementation of diffusion-weighted and diffusion tensor imaging,” Pediatric Radiology, vol. 37, no. 8, pp. 739–748, 2007.

E. R. Melhem, S. Mori, G. Mukundan, M. A. Kraut, M. G. Pomper, and P. C. M. van Zijl, “Diffusion tensor MR imaging of the brain and white matter tractography,” American Journal of Roentgenology, vol. 178, no. 1, pp. 3–16, 2002.

T. L. Chenevert, J. A. Brunberg, and J. G. Pipe, “Anisotropic diffusion in human white matter: demonstration with MR techniques in vivo,” Radiology, vol. 177, no. 2, pp. 401–405, 1990.

M. E. Moseley, Y. Cohen, J. Kucharczyk et al., “Diffusion-weighted MR imaging of anisotropic water diffusion in cat central nervous system,” Radiology, vol. 176, no. 2, pp. 439–445, 1990.

C. Pierpaoli, P. Jezzard, P. J. Basser, A. Barnett, and G. di Chiro, “Diffusion tensor MR imaging of the human brain,” Radiology, vol. 201, no. 3, pp. 637–648, 1996.

P. Staempfli, A. Rienmueller, C. Reischauer, A. Valavanis, P. Boesiger, and S. Kollias, “Reconstruction of the human visual system based on DTI fiber tracking,” Journal of Magnetic Resonance Imaging, vol. 26, no. 4, pp. 886–893, 2007.

T. Engelhorn, G. Michelson, S. Waerntges, T. Struffert, S. Haider, and A. Doerfler, “Diffusion tensor imaging detects rarefaction of optic radiation in glaucoma patients,” Academic Radiology, vol. 18, no. 6, pp. 764–769, 2011.

M. L. J. Crawford, R. S. Harwerth, E. L. Smith Jr., S. Mills, and B. Ewing, “Experimental glaucoma in primates: changes in cytochrome oxidase blobs in V1 cortex,” Investigative Ophthalmology and Visual Science, vol. 42, no. 2, pp. 358–364, 2001.

D. Y. Lam, P. L. Kaufman, B. T. Gabelt, E. C. To, and J. A. Matsubara, “Neurochemical correlates of cortical plasticity after unilateral elevated intraocular pressure in a primate model of glaucoma,” Investigative Ophthalmology and Visual Science, vol. 44, no. 6, pp. 2573–2581, 2003.

R. S. Harwerth and H. A. Quigley, “Visual field defects and retinal ganglion cell losses in patients with glaucoma,” Archives of Ophthalmology, vol. 124, no. 6, pp. 853–859, 2006.