ISRN NeurologyVolume 2011 (2011), Article ID 947476, 3 pagesdoi:10.5402/2011/947476

Clinical Study

Initial Stroke Severity Is the Major Outcome Predictor for Patients Who Do Not Receive Intravenous Thrombolysis due to Mild or Rapidly Improving Symptoms

Mu-Chien Sun¹ and Tien-Bao Lai²

¹Department of Neurology, Changhua Christian Hospital, Changhua 500, Taiwan²Department of Emergency Medicine, Changhua Christian Hospital, Changhua 500, Taiwan

Received 6 May 2011; Accepted 5 June 2011

Academic Editors: A. Arboix , R. L. Macdonald , and A. K. Petridis

Copyright © 2011 Mu-Chien Sun and Tien-Bao Lai. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Intravenous tissue plasminogen activator thrombolysis for stroke is still under use. A substantial proportion of excluded patients for mild or improving symptoms are dependent at discharge. We prospectively recruited 49 patients who did not receive thrombolysis because of mild or improving symptoms. 32 had favorable outcome (mRS ≤ 2) and 17 had unfavorable outcome (mRS > 2) at discharge. Comparisons were made between the two groups. Age was older (72.5 ± 10.0 versus 64.7 ± 13.2 years, P = 0.037), and initial National Institutes of Health Stroke Scale (NIHSS) score (5.7 ± 4.0 versus 2.2 ± 2.1, P < 0.001) was higher in the unfavorable group. Diastolic blood pressure was higher in the favorable group (98 ± 15 versus 86 ± 18  mmHg; P = 0.018). Atrial fibrillation (3.1 versus 23.5%; P = 0.043) and ipsilateral artery stenosis (21.9 versus 58.8%; P = 0.012) were more frequently found in the unfavorable group. Percentage of patients excluded from thrombolysis due to improving symptoms was higher in the unfavorable group (40.6 versus 82.4%; P = 0.005). Initial NIHSS score, but not other factors, was identified by logistic regression analysis as a major independent predictor for unfavorable outcome (OR 1.44; 95%CI, 1.03–2.02).

1. Introduction

Patients with minor or rapidly improving neurological signs are excluded from intravenous tissue plasminogen activator (tPA) thrombolysis for acute ischemic stroke in current American Heart Association/American Stroke Association guideline [1]. A substantial proportion of patients were excluded for these reasons [2–4]. Many among those patients were significantly dependent at discharge or unable to be discharged home [2, 5]. The aim of this study was to identify predictors for unfavorable outcome in this patient group.

2. Methods

Changhua Christian Hospital (CCH) is a medical center with 1.684 inpatient beds in western Taiwan, in an area with a population of 1.3 million. CCH is a participant of the nationwide Taiwan Stroke Registry (TSR) that enrolled acute stroke patients within 10 days after onset [6]. Code CCH-tPA was implemented for thrombolytic therapy in May 2008 in the hospital and activated 24 hours a day, seven days a week, at the triage by senior nursing staffs when both Cincinnati Prehospital Stroke Scale and a set of prescreen criteria are fulfilled. All patients who were excluded from intravenous thrombolysis due to mild or rapidly improving symptoms were prospectively recruited for analysis. Mild symptom was defined as National Institute of Health Stroke Scale (NIHSS) score lower than 4. Rapidly improving symptom was defined as regression of neurological symptoms between stroke onset and evaluation by the treating neurologist.

Any known history or newly found atrial fibrillation was recorded. Carotid duplex and/or magnetic resonant angiography (MRA) was used to identify vascular stenosis. Any ipsilateral extracranial or intracranial artery stenosis more than 50% was defined as artery stenosis.

Favorable outcome was defined as modified Rankin scale (mRS) score ≦ 2 at discharge. Unfavorable outcome was defined as mRS > 2 at discharge. Analyses for comparisons were made between groups with favorable and unfavorable outcomes. Independent predictors for unfavorable outcome were further identified by binary logistic regression analysis. Statistical analyses were performed with SPSS for Windows, version 13.0. The χ ² and Fisher exact tests were used to compare dichotomous variables, and the unpaired, 2-tailed t-test was used to compare continuous variables.

3. Results

Between May 2008 and February 2010, 368 patients with acute ischemic stroke or TIA were admitted to our hospital within 3 hours of symptom onset. Fifty one were excluded from intravenous thrombolysis due to mild or rapidly improving symptoms. Two patients were excluded from this analysis: one left the hospital against medical advice, the other was severely disable before stroke due to femoral fracture. Forty-nine patients were included in this analysis. Among the included patients, 22 were excluded from thrombolysis due to mild symptoms and 27 due to improving symptoms. The initial NIHSS score was 1.9 ± 1.3 in those with mild symptoms and 4.6 ± 3.9 in those with improving symptoms. The difference of initial NIHSS score between the two groups was not statistically significant (P = 0.237).

Among 49 patients, 32 had favorable outcome, and 17 had unfavorable outcome at discharge (Table 1). Age was older (72.5 ± 10.0 versus 64.7 ± 13.2 years, P = 0.037), and initial NIHSS score (5.7 ± 4.0 versus 2.2 ± 2.1, P < 0.001) was higher in the unfavorable group. Diastolic blood pressure was significantly higher in the favorable group (98 ± 15 versus 86 ± 18 mmHg; P = 0.018). Electrocardiography and vascular study were performed in high proportion of patients in both groups. Atrial fibrillation (3.1 versus 23.5%; P = 0.043) and ipsilateral artery stenosis (21.9 versus 58.8%; P = 0.012) were more frequently found in the unfavorable group. Percentage of patients excluded from thrombolysis due to improving symptoms was higher in the unfavorable group (40.6 versus 82.4%; P = 0.005).

Table 1: Characteristics of patients in the groups of favorable and unfavorable outcome.

Favorable
Unfavorable
P

No
32
17

Age, years
64.7 ± 13.2
72.5 ± 10.0
0.037

Female sex
10 (31.3)
9 (52.9)
0.138

Initial presentations

    NIHSS
2.2 ± 2.1
5.7 ± 4.0
< 0.001

    Improving symptoms*
13 (40.6)
14 (82.4)
0.005

    Systolic BP, mmHg
170 ± 26
162 ± 26
0.261

    Diastolic BP, mmHg
98 ± 15
86 ± 18
0.018

    Glucose, mg/dL
158 ± 64
151 ± 50
0.724

Risk factors

    Atrial fibrillation
1 (3.1)
4 (23.5)
0.043

    Artery stenosis
7 (21.9)
10 (58.8)
0.012

    Hypertension
23 (71.9)
14 (82.4)
0.417

    Diabetes
9 (28.1)
8 (47.1)
0.185

    Previous stroke
5 (15.6)
4 (23.5)
0.700

    Smoking habit
14 (43.8)
5 (29.4)
0.327

Outcome at discharge

    NIHSS
1.4 ± 1.3
5.3 ± 3.3
< 0.001

    mRS
1.2 ± 0.6
3.4 ± 0.5
< 0.001

    Barthel index
95.7 ± 8.4
57.7 ± 23.9
< 0.001

Examinations

    MRA
16 (50.0)
12 (70.6)
0.166

    Carotid duplex
28 (87.5)
17 (100.0)
0.248

    MRA or duplex
29 (90.6)
17 (100.0)
0.542

    EKG
32 (100.0)
17 (100.0)
—

*Number of patients excluded from thrombolysis due to improving symptoms. Continuous variables are median ± standard deviation. Numbers in parenthesis denote percentage.

Further logistic regression analysis identified initial NIHSS score, but not other factors, as an independent predictor for unfavorable outcome (OR 1.44; 95%CI, 1.03–2.02) (Table 2, model 1). Using dichotomous NIHSS score (at 3) in the regression analysis demonstrated high risk of unfavorable outcome (OR 5.95; 95%CI, 1.10–32.12) for patients with initial NIHSS score  ≧  3. No other factors independently predicted unfavorable outcome, including improving symptom (Table 2, model 2).

Table 2: Logistic regression analyses for unfavorable outcome.

Odds ratio
95% C.I.
P

Model 1

NIHSS score
1.44
1.03–2.02
0.034

Age
1.03
0.95–1.12
0.493

DBP
0.96
0.91–1.02
0.229

Atrial fibrillation
11.56
0.63–211.75
0.099

Artery stenosis
1.69
0.29–9.79
0.561

Improving symptom
2.29
0.37–14.02
0.372

Model 2

NIHSS ≧ 3 versus < 3
5.95
1.10–32.12
0.038

Age
1.04
0.95–1.12
0.459

DBP
0.96
0.91–1.02
0.216

Atrial fibrillation
5.21
0.24–110.98
0.290

Artery stenosis
2.57
0.45–14.61
0.285

Improving symptom
2.94
0.49–17.59
0.237

4. Discussion

In tPA thrombolytic therapy for acute ischemic stroke, exclusion criteria “mild neurological impairment” and “rapidly improving symptoms” were not clearly defined and left to the clinicians’ interpretation. A proportion of stroke patients are not receiving thrombolytic therapy due to these exclusion criteria. Some studies aimed at identifying patients who are excluded but will benefit from the treatment [7, 8]. A post hoc subgroup analyses from the NINDS rt-PA Stroke Study group showed that no difference was detected in the beneficial effects of tPA in patients with 5 different definitions of minor stroke syndromes compared to the overall treatment effects in the entire cohort [7]. 32 patients with mild symptoms with aphasia representing the most common symptom were treated with intravenous thrombolysis. Outcome was favorable. Patients with mild but disabling symptoms were suggested to be treated with tPA regardless of their baseline NIHSS score [8].

An operational definition of “mild neurological impairment” seems not to be feasible based on NIHSS score. However, an international survey on the inclusion and exclusion criteria for tPA thrombolysis reached a consensus on a minimal NIHSS score of 2 to 3 to warrant treatment [9]. Our study demonstrated that patients with initial NIHSS score above this limit had 5.95 times risk to have unfavorable outcome. On the contrary, consensus was not reached in the survey on rapidly improving symptoms. A study on patients who were excluded from tPA treatment due to mild or improving symptoms showed that patients who had 4-point improvement in NIHSS score and were excluded from tPA treatment were more likely to have subsequent neurological worsening. However, no single variable at presentation was identified to be associated with death or lack of home discharge [5]. In our study, we identified initial NIHSS score as the sole predictor for unfavorable outcome in patients who were excluded from tPA treatment because of mild or rapidly improving symptoms.

A study on thrombolytic treatment to 19 acute stroke patients with rapid early improvement of neurological deficit showed no neurological deterioration during hospitalization and good outcomes. The NIHSS score before treatment was 5 (4 to 6) [10]. A high proportion of excluded patients in our study (34.7%) had unfavorable outcome. Treatment for patients with higher initial NIHSS score, regardless of regressing symptoms, seems to be justified. Thus, we propose that “rapidly improving symptoms” may be removed from the exclusion criteria for intravenous tPA thrombolysis in stroke patients. Further studies are required to identify a feasible definition of “mild symptoms” and justify a cut-off point of initial NIHSS score for thrombolytic therapy.

References

H. P. Adams, G. del Zoppo, M. J. Alberts et al., “Guidelines for the early management of adults with ischemic stroke: a guideline from the American heart association/American stroke association stroke council, clinical cardiology council, cardiovascular radiology and intervention council, and the atherosclerotic peripheral vascular disease and quality of care outcomes in research interdisciplinary working groups,” Stroke, vol. 38, no. 5, pp. 1655–1711, 2007.

P. A. Barber, J. Zhang, A. M. Demchuk, M. D. Hill, and A. M. Buchan, “Why are stroke patients excluded from TPA therapy? An analysis of patient eligibility,” Neurology, vol. 56, no. 8, pp. 1015–1020, 2001.

I. L. Katzan, M. D. Hammer, E. D. Hixson, A. J. Furlan, A. Abou-Chebl, and D. M. Nadzam, “Utilization of intravenous tissue plasminogen activator for acute ischemic stroke,” Archives of Neurology, vol. 61, no. 3, pp. 346–350, 2004.

J. C. García-Moncó, A. Pinedo, I. Escalza et al., “Analysis of the reasons for exclusion from tPA therapy after early arrival in acute stroke patients,” Clinical Neurology and Neurosurgery, vol. 109, no. 1, pp. 50–53, 2007.

E. E. Smith, A. R. Abdullah, I. Petkovska, E. Rosenthal, W. J. Koroshetz, and L. H. Schwamm, “Poor outcomes in patients who do not receive intravenous tissue plasminogen activator because of mild or improving ischemic stroke,” Stroke, vol. 36, no. 11, pp. 2497–2499, 2005.

F. I. Hsieh, L. M. Lien, S. T. Chen et al., “Get with the guidelines-stroke performance indicators: surveillance of stroke care in the Taiwan stroke registry: get with the guidelines-stroke in Taiwan,” Circulation, vol. 122, no. 11, pp. 1116–1123, 2010.

The National Institute of Neurological Disorders Stroke rt-PA Stroke Study Group, “Recombinant tissue plasminogen activator for minor strokes: the National Institute of Neurological Disorders and Stroke rt-PA Stroke Study experience,” Annals of Emergency Medicine, vol. 46, no. 3, pp. 243–252, 2005.

M. Köhrmann, T. Nowe, H. B. Huttner et al., “Safety and outcome after thrombolysis in stroke patients with mild symptoms,” Cerebrovascular Diseases, vol. 27, no. 2, pp. 160–166, 2009.

M. Dirks, L. W. Niessen, P. J. Koudstaal, C. L. Franke, R. J. Van Oostenbrugge, and D. W.J. Dippel, “Intravenous thrombolysis in acute ischaemic stroke: from trial exclusion criteria to clinical contraindications. An international Delphi study,” Journal of Neurology, Neurosurgery and Psychiatry, vol. 78, no. 7, pp. 685–689, 2007.

C. R. Baumann, R. W. Baumgartner, J. Gandjour, H. -C. Von Büdingen, A. M. Siegel, and D. Georgiadis, “Good outcomes in ischemic stroke patients treated with intravenous thrombolysis despite regressing neurological symptoms,” Stroke, vol. 37, no. 5, pp. 1332–1333, 2006.