ISRN Corrosion

Volume 2013 (2013), Article ID 476170, 9 pages

http://dx.doi.org/10.1155/2013/476170

Research Article

Corrosion Inhibition and Adsorption Properties of Ethanolic Extract of Calotropis for Corrosion of Aluminium in Acidic Media

Sudesh Kumar and Suraj Prakash Mathur

Department of Pure and Applied Chemistry, Maharshi Dayanand Saraswati University, C-698, Panchsheel Nagar, Ajmer, Rajasthan 305009, India

Received 24 December 2012; Accepted 15 January 2013

Academic Editors: N. Boshkov, C. Gervasi, and Q. Qu

Copyright © 2013 Sudesh Kumar and Suraj Prakash Mathur. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The corrosion inhibition of aluminium in sulfuric acid solution in the presence of different plant parts, namely, leaves, latex, and fruit was studied using weight loss method and thermometric method. The ethanolic extracts of Calotropis procera and Calotropis gigantea act as an inhibitor in the acid environment. The inhibition efficiency increases with increase in inhibitor concentration. The plant parts inhibit aluminium, and inhibition is attributed, due to the adsorption of the plant part on the surface of aluminium.

1. Introduction

Aluminium is widely used in chemical industries due to its low cost and easy availability for fabrication reaction of vessel, tanks, pipeline, and boiler. Alumninium suffers from severe corrosion in aggressive environments, and it has to be protected. The corrosion of metal in aqueous solution occurs in two steps oxidation and reduction. Oxidation reaction takes place at anode, whereas reduction takes place at cathode. The cathodic reaction may be either by evolution of hydrogen or absorption of oxygen. The use of inhibitors is one of the best methods of protecting metals against corrosion [1, 2]. Most corrosion inhibitors are organic compounds having hetero atoms in their aromatic or long carbon chain. However, there is increasing concern about the toxicity of most corrosion inhibitors. The toxic effect does not only affect living organisms but also poison the environment. Due to toxicity of some corrosion inhibitors, there has been increasing search for green corrosion inhibitors [3]. Natural products of plant origin containing different organic compounds (e.g., alkaloids, tannins, pigments, organic, and amino acids) are known to have inhibitive action [4, 5]. Inhibitors in this class are those that are environment friendly, less polluting, cheap, and easily available and are obtained from natural products such as plant extracts [6]. Several studies have been carried out on the inhibition of corrosion of metals by plant extract [7–13]. Aluminium is a reactive metal to reduce the corrosion problem in these environment inhibitive effects of various naturally occurring substances like Datura stramonium [14], Tannin beet root, Tamarind, Pomegranate juice, Saponin [15], Embellica officinalis, Terminalia bellerica, Mahasudarshana churna, Prosopis juliflora [16], Caparis decidu [17], Adhatoda vasica, Vinca rosea, Heena [18], Eugenia jambolana, pomegranate and Peels [19, 20], Tannins, Caffeine, Prosopis cineraria [21], and Ficus religiosa [22] that have been evaluated as effective corrosion inhibitors. Calotropis is used as a traditional medicinal plant with unique properties. Calotropis is used alone or with other medicine to treat common diseases. Generally, organic compounds having heteroatom O, N, and S are found to have basicity and electron density thus assist in corrosion inhibitor. O, N, and S are the active centers for the adsorption on the metal surface [23, 24]. Mass loss is determined gravimetrically, volumetrically, and radiometrically. These all are the direct measures of corrosion, and gravimetrically mass loss methods are most used for inhibitor testing.

2. Extraction of Plants and Experimental Methods

Samples of Calotropis procera and Calotropis gigantea obtained from the Maharshi Dayanand Sarswati University Botanical Garden were dried, grinded, and soaked in a solution of ethanol. After 48 hours, the sample was cooled and filtered. The filtrate was subjected to evaporation (in order to leave the sample free of the ethanol) using a rotary evaporator. The stock solution of the extract so obtained was used in preparing 0.5 N, 1.0 N H₂SO₄ for mass loss method and 3 N, 4 N, and 5 N H₂SO₄ for thermometric analysis, respectively.

Aluminium of composition (wt %) Mn (0.6), P (0.36), C (0.15), S (0.07), and Al (98.79) was used for the study. The sheet was mechanically pressed and cut to form different coupons, each of dimensions, 2.5 cm * 1.5 cm * 0.2 cm. Each coupon was degreased by washing with ethanol. The washed sample was dipped in acetone, removed, and allowed to dry in air before use. All reagents used for the study were AR grade, and deionized water was used for their preparation.

Aluminium specimens were cleaned with emery paper. The corrosion products were cleaned with Clark’s solution [25]. The weight of the specimens before and after immersion was determined using a Shimadzu balance. Specimens were suspended by glass hook; the degree of surface coverage () is calculated by the formula [26]

where is surface coverage and , and are the mass loss of the metal in uninhibited and inhibited acids, respectively.

The corrosion rate mmpy (millimeter penetration per year) is obtained by the following equation [27]:

where mass loss is expressed in mg, area is expressed in cm² of metal surface exposed, time is expressed in hours of exposure, metal density is expressed in gm/cm³, and 87.6 is the conversion factor.

Inhibition efficiency was also determined using a thermometric technique [28]. Each specimen 2.5 cm * 1.5 cm * 0.02 cm was placed in a glass hook and immersed in a beaker containing 50 mL of test solution at 30°C ± 0.5°C and exposed to air. Evaporation losses were made up with deionized water. After the test specimens were cleaned with acetone [29], duplicate experiments were performed in each case, and mean values of the mass loss were calculated.

The acidic solutions (0.5 N, 1 N, 2 N, and 4 N) were prepared by using deionized water. Temperature changes were measured at intervals of one minute using a thermometer with a precision of ±0.5°C. The temperatures increased slowly in the beginning, maximum temperature attained was recorded, and percentage inhibition efficiencies were calculated as [30]

where and are the reaction numbers in the presence and absence of inhibitors, respectively, and RN (°C/min) is defined as

where and are the maximum and initial temperatures respectively and is the time required to reach the maximum temperature.

3. Result and Discussion

The inhibition efficiency (%) calculated from the mass loss measurement for sulfuric acid solution and inhibitors are given in Tables 1, 2, 3, and 4. It is observed that the inhibition efficiency increases with increase in the concentration of inhibition and decreases with increases in acid strength. The corrosion rate decreases with increases in concentration of inhibitor. The maximum efficiency was obtained in low acid concentration. The inhibitors have shown the efficiency in this range. Calotropis procera shows minimum 45.00% and maximum 82.98% whereas Calotropis gigantea shows minimum 43.26% and maximum 82.82% for 0.5 N sulfuric acid with aluminium, but Calotropis procera in 1 N sulfuric acid solution shows minimum 48.58% and maximum 78.86% inhibition efficiency, and Calotropis gigantea shows minimum 48.69% and maximum 78.82% inhibition efficiency with latex extract illustrated by Figures 1, 2, 3, and 4.

Table 1: Mass loss data for aluminium in 0.5 N sulfuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis procera.

Inhibitor concentration
Mass loss (gm)

Inhibition efficiency (%)
Corrosion rate (mmpy)
Surface coverage (θ)

Uninhibited
1840

33.1

Leaves

    0.12
1012
45.00
18.2
0.4500

    0.24
872
52.60
15.7
0.5260

    0.36
653
64.51
11.7
0.6451

    0.48
487
73.53
8.77
0.7353

    0.60
348
81.08
6.27
0.8108

Latex

    0.12
987
46.35
17.7
0.4635

    0.24
856
53.47
15.4
0.5347

    0.36
641
65.16
11.5
0.6516

    0.48
465
74.72
9.43
0.7472

    0.60
313
82.98
5.64
0.8298

Fruit

    0.12
1026
44.23
18.4
0.4423

    0.24
898
51.19
16.1
0.5119

    0.36
674
63.36
12.1
0.6336

    0.48
465
74.72
8.38
0.7472

    0.60
338
81.63
6.09
0.8163

Table 2: Mass loss data for aluminium in 0.5 N sulfuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis gigantea.

Inhibitor concentration
Mass loss (gm)

Inhibition efficiency (%)
Corrosion rate (mmpy)
Surface coverage (θ)

Uninhibited
1840

33.1

Leaves

    0.12
1023
44.40
18.4
0.4440

    0.24
851
53.73
15.3
0.5373

    0.36
634
65.54
11.4
0.6554

    0.48
465
74.72
8.38
0.7472

    0.60
327
82.22
5.89
0.8222

Latex

    0.12
951
48.31
17.1
0.4831

    0.24
833
54.72
15.0
0.5472

    0.36
627
65.92
11.3
0.6592

    0.48
442
75.97
7.96
0.7597

    0.60
316
82.82
5.69
0.8282

Fruit

    0.12
1044
43.26
18.8
0.4326

    0.24
875
52.44
15.7
0.5244

    0.36
653
64.51
11.7
0.6451

    0.48
482
73.80
8.68
0.7380

    0.60
319
82.66
5.74
0.8266

Table 3: Mass loss data for aluminium in 1.0 N sulfuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis procera.

Inhibitor Concentration
Mass loss (gm)

Inhibition efficiency (%)
Corrosion rate (mmpy)
Surface coverage (θ)

Uninhibited
2460

44.3

Leaves

    0.12
1242
49.51
22.3
0.4951

    0.24
935
61.99
16.8
0.6199

    0.36
721
70.69
12.9
0.7069

    0.48
663
73.04
11.9
0.7304

    0.60
548
77.72
9.87
0.7772

Latex

    0.12
1263
48.58
22.7
0.4858

    0.24
931
62.15
16.7
0.6215

    0.36
748
69.59
13.4
0.6959

    0.48
625
74.59
11.2
0.7459

    0.60
520
78.86
9.37
0.7886

Fruit

    0.12
1186
51.78
21.3
0.5178

    0.24
958
61.05
17.2
0.6105

    0.36
712
71.05
12.8
0.7105

    0.48
643
73.86
11.5
0.7386

    0.60
574
76.66
10.3
0.7666

Table 4: Mass loss data for aluminium in 1.0 N sulfuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis gigantea.

Inhibitor concentration
Mass loss (gm)

Inhibition efficiency (%)
Corrosion rate (mmpy)
Surface coverage (θ)

Uninhibited
2460

44.3

Leaves

    0.12
1262
48.69
22.7
0.4869

    0.24
957
61.09
17.2
0.6109

    0.36
734
70.16
13.2
0.7016

    0.48
641
73.94
11.5
0.7394

    0.60
523
78.73
9.42
0.7873

Latex

    0.12
1244
49.43
22.4
0.4943

    0.24
950
61.38
17.1
0.6138

    0.36
763
68.98
13.7
0.6898

    0.48
619
74.83
11.1
0.7483

    0.60
521
78.82
9.39
0.7882

Fruit

    0.12
1164
52.68
20.9
0.5268

    0.24
934
62.03
16.8
0.6203

    0.36
727
70.44
13.1
0.7044

    0.48
651
73.53
11.7
0.7353

    0.60
543
77.92
9.78
0.7792

Figure 1: Inhibition efficiency versus concentration for AI in 0.5 N sulphuric acid for Calotropis procera.

Figure 2: Inhibition efficiency versus concentration for AI in 0.5 N sulphuric acid for Calotropis gigantea.

Figure 3: Inhibition efficiency versus concentration for AI in 1 N sulphuric acid for Calotropis procera.

Figure 4: Inhibition efficiency versus concentration for AI in 1 N sulphuric acid for Calotropis gigantea.

Inhibition efficiency values were also determined by the thermometric method (Tables 5 and 6). Temperature changes for aluminium in 2 N, 3 N, 4 N, and 5 N sulfuric acid solutions were recorded at various inhibitor concentrations. However, no significance temperature changes were obtained for 1 N sulfuric acid solution. Therefore, the thermometric method was used for 2 N, 3 N, 4 N, and 5 N sulfuric acid solution. Calotropis procera extract shows minimum inhibition efficiency 34.15% and maximum 72.96% for 2 N sulfuric acid, but 3 N sulfuric acid shows minimum 27.83% and maximum 69.03%, while 4 N sulfuric acid shows minimum 36.36% and maximum 67.33%, and 5 N sulfuric acid shows minimum 21.84% and maximum 61.15%, whereas Calotropis gigantea extract shows minimum inhibition efficiency 34.75% and maximum 73.58% for 2 N sulfuric acid, but 3 N sulfuric acid shows minimum 28.83% and maximum 68.56%, while 4 N sulfuric acid shows minimum 37.43% and maximum 67.87%, and 5 N sulfuric acid shows minimum 25.21% and maximum 62.26% (Tables 7 and 8).

Table 5: Thermometric reaction for aluminium in 2 N and 3 N sulphuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis procera.

Inhibitor

concentration
Reaction

number (RN) 2 N
Inhibition

efficiency (%)
Reaction

number (RN) 3 N
Inhibition

efficiency (%)

Uninhibited
1.26

1.91

Leaves

    0.12
0.81
35.65
127
33.63

    0.24
0.76
39.21
1.20
37.13

    0.36
0.70
44.27
1.15
39.69

    0.48
0.51
59.53
0.80
58.07

    0.60
0.40
67.83
0.67
64.60

Latex

    0.12
0.83
34.15
1.26
34.05

    0.24
0.78
37.94
1.25
34.67

    0.36
0.71
43.32
0.95
50.08

    0.48
0.54
57.15
0.84
51.33

    0.60
0.41
67.43
0.76
62.66

Fruit

    0.12
0.78
38.02
1.38
27.83

    0.24
0.71
43.40
1.32
31.07

    0.36
0.64
49.01
1.11
41.67

    0.48
0.48
61.34
0.75
60.63

    0.60
0.34
72.96
0.59
69.03

Table 6: Thermometric reaction for aluminium in 4 N and 5 N sulphuric acid with ethanolic extract of leaves, latex, and fruit of Ccalotropis procera.

Inhibitor

concentration
Reaction

number (RN) 4 N
Inhibition

efficiency (%)
Reaction

number (RN) 5 N
Inhibition

efficiency (%)

Uninhibited
2.48

3.10

Leaves

    0.12
1.58
36.36
2.27
26.83

    0.24
1.55
37.37
2.05
33.86

    0.36
1.50
39.38
1.92
38.11

    0.48
1.02
58.61
1.60
48.32

    0.60
0.89
63.87
1.20
61.15

Latex

    0.12
1.46
41.19
2.42
21.84

    0.24
1.40
43.64
2.11
31.89

    0.36
1.26
49.12
2.08
32.89

    0.48
1.12
54.87
1.84
40.56

    0.60
0.94
61.83
1.48
52.19

Fruit

    0.12
1.44
41.95
2.09
32.57

    0.24
1.32
44.01
1.94
37.31

    0.36
1.22
50.80
1.87
39.47

    0.48
1.01
59.17
1.53
50.48

    0.60
0.81
67.33
1.18
61.95

Table 7: Thermometric reaction for aluminium in 2 N and 3 N sulphuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis gigantea.

Inhibitor

concentration
Reaction

number (RN) 2 N
Inhibition

efficiency (%)
Reaction number (RN) 3 N
Inhibition

efficiency (%)

Uninhibited
1.26

1.91

Leaves

    0.12
0.82
34.75
1.28
33.94

    0.24
0.76
39.21
1.19
38.43

    0.36
0.69
45.27
1.14
40.31

    0.48
0.52
58.53
0.81
59.23

    0.60
0.39
68.53
0.67
64.60

Latex

    0.12
0.82
35.19
1.27
35.24

    0.24
0.77
38.94
1.15
39.47

    0.36
0.72
44.32
0.94
53.08

    0.48
0.54
57.25
0.83
57.73

    0.60
0.40
68.53
0.72
62.66

Fruit

    0.12
0.79
38.89
1.37
28.83

    0.24
0.70
44.60
1.31
32.37

    0.36
0.64
49.01
1.10
42.37

    0.48
0.47
62.56
0.78
60.63

    0.60
0.35
73.58
0.58
68.56

Table 8: Thermometric reaction for aluminium in 4 N and 5 N sulphuric acid with ethanolic extract of leaves, latex, and fruit of Calotropis gigantea.

Inhibitor

concentration
Reaction

number (RN) 4 N
Inhibition

efficiency (%)
Reaction number (RN) 5 N
Inhibition

efficiency (%)

Uninhibited
2.48

3.10

Leaves

    0.12
1.57
37.43
2.24
28.83

    0.24
1.54
38.37
2.03
35.33

    0.36
1.48
41.47
1.95
37.21

    0.48
1.01
59.61
1.66
50.48

    0.60
0.88
64.87
1.22
60.75

Latex

    0.12
1.48
42.19
2.36
25.21

    0.24
1.37
45.34
2.14
31.37

    0.36
1.24
50.52
2.08
32.89

    0.48
1.09
56.54
1.82
42.56

    0.60
0.91
62.83
1.46
53.19

Fruit

    0.12
1.43
41.77
2.10
32.57

    0.24
1.33
44.81
1.95
37.22

    0.36
1.21
51.83
1.81
43.39

    0.48
1.06
58.17
1.55
51.43

    0.60
0.82
67.05
1.17
62.26

Generally, the adsorption of organic molecules involves O, N, and S atoms. This process blocks the active sites and hence decreases the corrosion rate. In the present study, it was assumed that the plant extract is adsorbed on the metal surface and decreases the surface area available for cathodic and anodic reaction to take place. The nitrogen, sulphur and oxygen may be responsible for the adsorption. Organic inhibitors, with active portions, contain generally large C–H chains or rings with positively charged amine nitrogen group at the one end.

Organic corrosion inhibitors may function as follows:

(1)chemisorption of the molecule on the metallic surface;(2)complexing of the molecule with the metal ion which remains in solid state;(3)neutralising the corrodent;(4)adsorbing the corrodent.

They offered large coverage due to the long hydrocarbon chain and by the presence of –OH group, being hydrophilic in nature; the –OH group counteracted the effects of chain length and ensured higher solubility.

Cathodic inhibitors slow down the reaction taking place at cathode (i.e., H₂ evolution).

For example, organic inhibitors like amine substituted urea’s heavy metal soap and so forth decreases H₂ evolution process. Aluminium salts deposits on cathode help in decreasing the O₂ absorption process.

4. Absorption of Oxygen

This type of corrosion occurs generally in aqueous solution.

The corrosion of aluminium and aluminium alloys precede through the following elementary reactions:

All metals above the hydrogen in electrochemical series have a tendency to get dissolve in acidic solution releasing hydrogen.

It has been observed that the fruit extract of Calotropis procera and Calotropis gigantea has maximum inhibition efficiency compared to the latex and leaves extracts. This process increased the absorptivity of the fruit extract on the corroding site of the metal. This explained that the higher inhibition efficiency displayed by the latex for mass loss method and fruit extract for thermometric method in 0.60% inhibitors concentration.

5. Surface Analysis

Surface analysis of metal by Scanning Electron Microscopy was carried out on Model-ZEISS EVO 50. The surface morphological characteristics of the blank and inhibited aluminium were analyzed at magnification of 2.0 KX operated at an accelerating voltage of 20 KV. Scanning electron microscopy reveals that plant extract adsorbed on metal surface and increased the smoothness of aluminium that decreases the metal surface for corrosion attack (Figure 6). SEM provides a two-dimensional projection or a two-dimensional image of a sample. SEM of alumnium in sulphuric acid (uninhibited) is showed by Figure 5.

Figure 5: Scanning Electronic Microscopy (SEM)—image of aluminum.

Figure 6: Aluminium with 0.5 N sulphuric acid with Calotropis procera (SEM).

6. Conclusion

From the study, the following conclusions are made:

(i)ethanol extract of Calotropis procera and Calotropis gigantea is a good inhibitor for the corrosion of aluminium in H₂SO₄;(ii)the inhibitor action results in a reduction of surface roughness due to corrosion processes.

Acknowledgments

This work was supported by Material laboratory, Maharshi Dayanand Saraswati University, Ajmer (Rajasthan) India. The authors express their sincere gratitude to the referee for valuable suggestion.

References

N. O. Eddy and E. E. Ebenso, “Adsorption and inhibitive properties of ethanol extracts of Musa sapientum peels as a green corrosion inhibitor for mild steel in H₂SO₄,” African Journal of Pure and Applied Chemistry, vol. 2, no. 6, pp. 46–54, 2008.

N. O. Eddy and S. A. Odoemelam, Journal of Materials Science, vol. 4, no. 1, pp. 10–16, 2008.

A. Al-Sehaibani, “Evaluation of extracts of henna leaves as environmentally friendly corrosion inhibitors for metals,” Materialwissenschaft und Werkstofftechnik, vol. 31, no. 12, pp. 1060–1063, 2000.

U. J. Ekpe, E. E. Ebenso, and U. J. Ibok, “Inhibitory actions of Azadirachta indica leaf extract on the corrosion of mild steel in H2SO4,” J. W. African Science Association, vol. 39, pp. 13–30, 1994.

O. K. Abiola and N. C. Oforka, “The corrosion inhibition effect of Cocos Nucifera (coconut) water on mild steel in HCl solution,” in Proceeding’s of the Chemical Society of Nigeria, 25th International Conference, 2002.

G. O. Avwiri and F. O. Igho, “Inhibitive action of Vernonia amygdalina on the corrosion of aluminium alloys in acidic media,” Materials Letters, vol. 57, no. 22-23, pp. 3705–3711, 2003.

E. S. H. El Ashry, A. El Nemr, S. A. Esawy, and S. Ragab, “Corrosion inhibitors. Part II: quantum chemical studies on the corrosion inhibitions of steel in acidic medium by some triazole, oxadiazole and thiadiazole derivatives,” Electrochimica Acta, vol. 51, no. 19, pp. 3957–3968, 2006.

A. Y. El-Etre and M. Abdallah, “Natural honey as corrosion inhibitor for metals and alloys. II. C-steel in high saline water,” Corrosion Science, vol. 42, no. 4, pp. 731–738, 2000.

P. C. Okafor, M. E. Ikpi, I. E. Uwah, E. E. Ebenso, U. J. Ekpe, and S. A. Umoren, “Inhibitory action of Phyllanthus amarus extracts on the corrosion of mild steel in acidic media,” Corrosion Science, vol. 50, no. 8, pp. 2310–2317, 2008.

M. I. Awad, “Eco friendly corrosion inhibitors: Inhibitive action of quinine for corrosion of low carbon steel in 1 m HCl,” Journal of Applied Electrochemistry, vol. 36, pp. 1163–1168, 2006.

S. A. Odoemelam and N. O. Eddy, Journal of Surface Science and Technology, vol. 24, p. 1, 2008.

S. Rajendran, V. Ganga Sri, J. Arockiaselvi, and A. J. Amalraj, “Corrosion inhibition by plant extracts—an overview,” Bulletin of Electrochemistry, vol. 21, no. 8, pp. 367–377, 2005.

M. G. Sethuraman and P. B. Raja, “Corrosion inhibition of mild steel by Datura metel in acidic medium,” Pigment and Resin Technology, vol. 34, no. 6, pp. 327–331, 2005.

G. S. Verma, P. Anthony, and S. P. Mathur, Journal of the Electrochemical Society of India, vol. 51, p. 173, 2002.

“The useful plants of India” CSIR New Delhi “The wealth of India-Raw materials” CSIR New Delhi, 1986

R. Chowdhary, T. Jain, M. K. Rathoria, and S. P. Mathur, “Corrosion inhibition of mild steel by acid extracts of Prosopis Juliflora,” Bulletin of Electrochemistry, vol. 20, no. 2, pp. 67–75, 2004.

P. Arora, T. Jain, and S. P. Mathur, Chemistry, vol. 1, p. 766, 2005.

A. Chetouani and B. Hammouti, “Corrosion inhibition of iron in hydrochloric acid solutions by naturally henna,” Bulletin of Electrochemistry, vol. 19, no. 1, pp. 23–25, 2003.

A. A. El Hossary, R. H. Saleh, and A. M. Shams El Din, “Corrosion inhibition by naturally occurringsubstances-I. The effect of Hibiscus subdariffa (karkade) extract on the dissolution of Al and Zn,” Corrosion Science, vol. 12, no. 12, pp. 897–904, 1972.

R. M. Saleh and A. A. El Hossary, in Proceedings of the 13th Seminar on Electrochemistry, CECRI, 1972.

M. K. Sharma, P. Arora, S. Kumar, S. P. Mathur, and R. Ratnani, “Inhibitive effect of Prosopis cineraria on mild steel in acidic media,” Corrosion Engineering Science and Technology, vol. 43, no. 3, pp. 213–218, 2008.

T. Jain, R. Chowdhary, and S. P. Mathur, Journal of the Electrochemical Society of India, vol. 53, p. 33, 2004.

B. C. Edwards, “The protection of Cu-Ni condenser tubes with high molecular weight water-soluble polymers,” Corrosion Science, vol. 9, no. 6, pp. 395–402, 1969.

B. Brooks, Mate Prot, vol. 7, p. 24, 1968.

G. Waranglen, Introduction To Corrosion and Protection of Metals, vol. 236, Chapman and Hall, London, UK, 1985.

J. D. Talati and D. K. Gandhi, “Corrosion of zinc in citric acid containing food colourants,” Indian Journal of Technology, vol. 29, no. 6, pp. 277–282, 1991.

M. K. Sharma, S. Kumar, R. Ratnani, and S. P. Mathur, “Corrosion inhibition of Aluminium by extracts of Prosopis cineraria in acidic media,” Bulletin of Electrochemistry, vol. 22, no. 2, pp. 69–73, 2006.

P. B. Raja and M. G. Sethuraman, “Inhibition of corrosion of mild steel in sulphuric acid medium by ITCalotropis procera/IT,” Pigment and Resin Technology, vol. 38, no. 1, pp. 33–37, 2009.

K. Aziz and A. M. El-Din Shams, Corrosion Science, vol. 3, p. 582, 1953.

R. H. Hausler, in Proceedings of the International Conference on Corrosion Inhibition, vol. 7, p. 16, Dallas, Tex, USA, 1983.