ISRN Endocrinology

Volume 2013 (2013), Article ID 979481, 7 pages

http://dx.doi.org/10.1155/2013/979481

Clinical Study

Carotid Atherosclerosis as a Surrogate Maker of Cardiovascular Disease in Diabetic Patients

Ryuichi Kawamoto,1,2 Tateaki Katoh,² Tomo Kusunoki,1,2 and Nobuyuki Ohtsuka²

¹Department of Community Medicine, Ehime University Graduate School of Medicine, Ehime, Japan

²Department of Internal Medicine, Seiyo Municipal Nomura Hospital, 9-53 Nomura, Nomura-cho, Seiyo, Ehime 797-1212, Japan

Received 19 August 2013; Accepted 25 September 2013

Academic Editors: W. B. Chan and C. Rattarasarn

Copyright © 2013 Ryuichi Kawamoto et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Many studies have shown that carotid intima-media thickness (IMT) is associated with cardiovascular disease (CVD). Although it remains inconclusive whether assessment of carotid IMT is useful as a screening test for CVD in Japanese diabetic patients, a total of 271 patients (151 men aged 66 ± 10 (standard deviation) years and 220 women aged 71 ± 8 years) were divided into two groups based on the presence of CVD. We cross-sectionally assessed the ability of carotid IMT to identify CVD corresponding to treatment that was examined by receiver-operating characteristic (ROC) curve analyses. Among the 271 diabetic patients, 199 non-CVD and 72 CVD patients were examined. Multiple linear regression analysis using the presence of CVD as an objective variable showed that carotid IMT (, ) as well as other confounding factors was a significant independent contributing factor. The ROC curve analysis showed that the best marker of CVD was carotid IMT, with an area under the ROC curve of 0.718 (95% confidence interval (CI), 0.650–0.785). The greatest sensitivity and specificity were obtained when the cut-off value of mean carotid IMT was set at 0.95 mm (sensitivity = 0.71, specificity = 0.60, and accuracy = 0.627). Our study suggests that carotid IMT may be useful for screening diabetic patients with CVD.

1. Introduction

Diabetes is associated with a high risk of cardiovascular disease (CVD) which is the most common cause of mortality in people with diabetes. CVD accounts for more than 70% of deaths in people with diabetes [1]. A two- to fourfold increased risk of CVD in people with diabetes compared without diabetes has been reported by various research groups [2–4].

Carotid intima-media thickness (IMT) can now be measured noninvasively by B-mode ultrasonography and is an important and sensitive surrogate marker of cardiovascular disease (CVD). A lot of evidence has shown close associations between this parameter and conventional cardiovascular risk factors, including age, obesity, smoking status, hypertension, and dyslipidemia including hypertriglycerides, low high-density lipoprotein cholesterol (HDL-C) level, increased low-density lipoprotein cholesterol (LDL-C) level, and diabetes [5, 6]. In prospective studies, carotid IMT predicted clinical CVD events independently of traditional risk factors [7–10]. Recent findings have suggested that IMT measurements can be used to stratify patients into high-risk groups [11], but meta-analyses have found that carotid IMT is not predictive of cardiovascular events [12, 13], and in 2010 the American Heart Association and the American College of Cardiology advocated the assessment of carotid IMT on intermediate risk patients if usual risk classification was not useful [14]. Thus, to our knowledge there have been few published reports assessing carotid IMT as a screening test for CVD among Japanese diabetic patients.

We cross-sectionally examined the association of the carotid IMT and various risk factors with CVD in diabetic patients.

2. Methods

2.1. Subjects

Patients for this investigation were recruited from among consecutive diabetic patients aged ≤80 years that visited the medical department of Seiyo Municipal Nomura Hospital. Patients with severe cardiorenal (e.g., symptomatic chronic heart failure or chronic kidney disease) or nutritional disorders (albumin <2.5 g/dL) that would affect blood pressure, lipid, and glucose metabolism were excluded. Thus, 271 diabetic patients were enrolled in the study. All procedures were approved by the Ethics Committee of Seiyo Municipal Nomura Hospital, and written informed consent was obtained from each patient.

2.2. Case Definitions

Prevalent CVD was defined as doctor-diagnosed transient ischemic attack, cerebral infarction, ischemic heart disease, or myocardial infarction. Clinical syndrome of ischemic stroke or ischemic heart disease was defined as rapidly developing clinical symptoms and/or signs of focal and at times global loss of brain or heart function, with symptoms of or leading to earlier death, and with no apparent cause other than that of vascular origin. Patients were divided into two groups based on the presence of CVD.

2.3. Evaluation of Risk Factors

Information on demographic characteristics and risk factors was collected using the clinical files in all cases. Body mass index (BMI) was calculated by dividing weight (in kilograms) by the square of the height (in meters). We measured blood pressure (BP) in the right upper arm of patients in a sedentary posture using a standard sphygmomanometer or an automatic oscillometric BP recorder. Smoking status was defined as the number of cigarette packs per day multiplied by the number of years smoked (pack·year). Histories of antihypertensive and lipid-lowering medication used were also evaluated. Total cholesterol (T-C), triglycerides (TG), HDL-C, fasting plasma glucose (FPG), and creatinine (Cr) were measured under a fasting condition. Estimated Glomerular Filtration Rate (eGFR) was calculated using the following equation: 194 × Cr−1.094 × Age−0.287 × 0.739 (if female) [15].

2.3.1. Ultrasound Image Analysis

An ultrasonograph (Hitachi EUB-565, Aloka SSD-2000, or Prosound-6) equipped with a 7.5 MHz linear type B-mode probe was used by a specialist in ultrasonography to evaluate sclerotic lesions of the common carotid arteries on a day close to the day of blood biochemistry analysis (within 2 days). The ultrasonograph measurements were performed by a physician (R. K.) and the method provided a high reproducibility, with interobserver variability of 9.2%. Patients were asked to assume a supine position, and the bilateral carotid arteries were observed obliquely from the anterior and posterior directions. We measured the thickness of the intima-media complex (IMT) on the far wall of the bilateral common carotid artery about 10 mm proximal to the bifurcation of the carotid artery (as the image at that site is more clearly depicted than that at the near wall) [16, 17] as well as the wall thickness near the 10 mm point on a B-mode monitor. We then used the mean value for analysis.

2.4. Metabolic Syndrome (MetS)

We applied condition-specific cutoff points for MetS based on the modified criteria of the National Cholesterol Education Program’s Adult Treatment Panel (NCEP-ATP) III report [18]. MetS was defined as patients with at least two or more of the following four conditions: (1) obesity, BMI ≥25.0 kg/m2 according to the guidelines of the Japanese Society for the Study of Obesity (waist circumference was not available in this study) [19, 20]; (2) raised BP with a systolic BP (SBP) ≥130 mmHg and/or diastolic BP (DBP) ≥85 mmHg, and/or current treatment for hypertension; (3) hypertriglyceridemia with a TG level ≥150 mg/dL; and (4) low HDL cholesterolemia with a HDL-C level <40 mg/dL in men and <50 mg/dL in women and/or current treatment for dyslipidemia.

2.5. Statistical Analysis

All values are expressed as the mean ± standard deviation (SD), unless otherwise specified, and in the cases of parameters with nonnormal distributions (smoking status, TG and FPG), the data are shown as median (interquartile range) values. In all analyses, parameters with nonnormal distributions were used after log transformation. Statistical analysis was performed using IBM SPSS Statistics Version 21 (Statistical Package for Social Science Japan, Inc., Tokyo, Japan). The difference among the non-CVD patients and CVD patients was compared by the test or Student’s -test. Multiple linear regression analysis was used to evaluate the contribution of each confounding factor including carotid IMT as well as gender, age, BMI, smoking status, SBP, DBP, presence of antihypertensive medication, non-HDL-C, TG, HDL-C, presence of lipid-lowering medication, FPG, and eGFR for CVD. In addition, areas under the receiver operating characteristic (ROC) curves were determined for each variable to identify the presence of CVD. Areas under the ROC curves are provided with standard errors. An ROC curve is a plot of the sensitivity (true positive) versus 1—specifictiy (false positive) for each potential marker tested. The area under the ROC curve is a summary of the overall diagnostic accuracy of the test. The best markers have ROC curves that are shifted to the left with areas under the curve near unity. Nondiagnostic markers are represented by diagonals with areas under the ROC curves close to 0.5. Likelihood ratios were calculated as the ratios of sensitivity/ (1—specifictiy) (positive likelihood ratio) and (1—sensitivity)/ specificity (negative likelihood ratio). Multiple logistic regression analysis was used to evaluate the contribution of each characteristic for CVD. A value of was considered significant.

3. Results

Table 1 shows the clinical characteristics of the 199 non-CVD and 72 CVD patients. Prevalence of male gender and age, prevalence of antihypertensive and lipid-lowering medication, prevalence of low HDL cholesterolemia, and carotid IMT were significantly higher in the CVD patients than those in the non-CVD patients, but HDL-C and eGFR were significantly lower. There were no intergroup differences in BMI, smoking status, SBP, DBP, non-HDL-C, TG, and FPG.

Table 1: Characteristics of cardiovascular disease and control groups.

Characteristics
Non-CVD 

CVD 

value*

Male gender, (%)
102 (51.3)
49 (68.1)
0.018

Age (years)
67 ± 10
72 ± 8
<0.001

Body mass index† (kg/m²)
23.3 ± 4.0
23.9 ± 4.3
0.313

Obesity, (%)
54 (27.1)
24 (33.3)
0.363

Smoking status (pack·year)
0 (0–520)
300 (0–845)
0.092

Systolic blood pressure (mmHg)
140 ± 23
137 ± 20
0.389

Diastolic blood pressure (mmHg)
79 ± 14
77 ± 13
0.198

Antihypertensive medication (%)
88 (44.2)
55 (76.4)
<0.001

Raised blood pressure, (%)
159 (79.9)
61 (84.7)
0.482

Non-HDL cholesterol (mg/dL)
141 ± 43
136 ± 45
0.460

Triglycerides (mg/dL)
90 (67–146)
96 (65–129)
0.590

Hypertriglyceridemia, (%)
48 (24.1)
13 (18.1)
0.327

HDL cholesterol (mg/dL)
55 ± 19
49 ± 15
0.015

Lipid-lowering medication, (%)
12 (6.0)
20 (27.8)
<0.001

Low HDL cholesterolemia, (%)
69 (34.7)
40 (55.6)
0.003

Fasting plasma glucose (mg/dL)
166 (118–229)
137 (105–186)
0.082

eGFR‡ (mL/min/1.73 m²)
74.9 ± 21.0
66.6 ± 22.3
0.005

Carotid IMT (mm)
0.92 ± 0.20
1.11 ± 0.28
<0.001

CVD: cardiovascular disease; HDL: high-density lipoprotein; eGFR: estimated glomerular filtration ratio; IMT: intima-media thickness. †Body mass index was calculated using weight in kilograms divided by the square of the height in meters. ‡eGFR = 194 × Cr−1.094 × Age−0.287 × 0.739 (if female). Data presented are mean ± standard deviation. Data for smoking status, triglycerides, and fasting plasma glucose were skewed, are presented as median (interquartile range) values, and were log transformed for analysis.

Table 2 shows the relationship between various characteristics and CVD status. Pearson’s correlation coefficient showed that carotid IMT as well as male gender, age, prevalence of antihypertensive medication, HDL-C, lipid-lowering medication, and eGFR was significantly related to CVD. Multiple linear regression analysis using the presence of CVD as an objective variable showed that carotid IMT as well as male gender, prevalence of antihypertensive medication, HDL-C, and prevalence of lipid-lowering medication was a significant independent contributing factor.

Table 2: Relationship between various confounding factors and CVD.

Characteristics
Pearson’s

correlation coefficient

( value)
Multiple linear regression analysis

β ( value)

Male gender, %
0.149 (0.014)
0.197 (0.006)

Age (years)
0.238 (<0.001)
0.090 (0.165)

Body mass index (kg/m²)
0.062 (0.313)
0.033 (0.587)

Smoking status (pack·year)
0.102 (0.092)
−0.009 (0.896)

Systolic blood pressure (mmHg)
−0.052 (0.389)
−0.103 (0.136)

Diastolic blood pressure (mmHg)
−0.079 (0.198)
0.016 (0.822)

Antihypertensive medication (%)
0.285 (<0.001)
0.194 (0.001)

Non-HDL cholesterol (mg/dL)
−0.045 (0.460)
0.024 (0.725)

Triglycerides (mg/dL)
−0.033 (0.590)
−0.132 (0.059)

HDL cholesterol (mg/dL)
−0.148 (0.015)
−0.191 (0.001)

Lipid-lowering medication (%)
0.298 (<0.001)
0.284 (<0.001)

Fasting plasma glucose (mg/dL)
−0.106 (0.082)
−0.057 (0.296)

eGFR (mL/min/1.73 m²)
−0.170 (0.005)
−0.058 (0.312)

Carotid IMT (mm)
0.353 (<0.001)
0.259 (<0.001)

Data for smoking status, triglycerides, and fasting plasma glucose were skewed and log transformed for analysis.

The ROC curve analyses showed that the best marker of CVD was carotid IMT, with an area under the ROC curve of 0.718 (0.650–0.785) (Figure 1). The greatest sensitivity and specificity were obtained when the cut-off value of maximum IMT was set at 0.95 mm (sensitivity = 0.71, specificity = 0.60, and accuracy = 0.627). The positive likelihood ratio value indicates that the odds of CVD would increase 1.76-fold if carotid IMT was ≥0.95 mm, and the negative likelihood ratios indicate the extent to which the odds of CVD would decrease 0.493-fold if carotid IMT was <0.95 mm.

Figure 1: Receiver operating characteristics (ROC) curve. Sensitivity represents the true-positive results and 1—specificity, the false-positive results. The best markers have ROC curves that are shifted to the left with areas under the curve near unity. Nondiagnostic markers are represented by diagonals with areas under the ROC curves close to 0.5. The ROC curve analysis shows that the best marker of CVD was carotid IMT, with an area under the ROC curve of 0.718 (95% confidence interval (CI), 0.650–0.785).

Table 3 shows the odds ratios (ORs) 95% confidence interval (CI) of CVD with various characteristics in diabetic patients. The unadjusted odds ratio (95% CI) for Low HDL cholesterolemia, carotid IMT ≥0.95 mm, and MetS were 2.36 (1.36–4.08), 3.61 (2.02–6.46), and 1.86 (1.07–3.24), respectively. When adjusted for gender, age, smoking status, non-HDL cholesterol, and eGFR, in model 1 the multivariate-adjusted OR (95% CI) for low HDL cholesterolemia and carotid IMT ≥0.95 mm was 3.24 (1.66–6.30) and 2.30 (1.20–4.43), respectively, and in model 2 the multivariate-adjusted OR (95% CI) for MetS and carotid IMT ≥0.95 mm was 2.45 (1.30–4.62) and 2.41 (1.27–4.60), respectively.

Table 3: Determinants of CVD versus non-CVD from simple and multiple logistic regression models.

Characteristics
Unadjusted

odds ratio (95% CI)
Adjusted

odds ratio (95% CI)

Model 1

    Obesity

        Odds ratio (95% CI)
1.34 (0.75–2.40)
1.58 (0.77–3.22)

    Raised blood pressure

        Odds ratio (95% CI)
1.40 (0.67–2.89)
1.32 (0.57–3.08)

    Hypertriglyceridemia

        Odds ratio (95% CI)
0.69 (0.35–1.37)
0.52 (0.22–1.24)

    Low HDL cholesterolemia

        Odds ratio (95% CI)
2.36 (1.36–4.08)
3.24 (1.66–6.30)

    Carotid IMT ≥ 0.95 mm

        Odds ratio (95% CI)
3.61 (2.02–6.46)
2.30 (1.20–4.43)

Model 2

    Metabolic syndrome

        Odds ratio (95% CI)
1.86 (1.07–3.24)
2.45 (1.30–4.62)

    Carotid IMT ≥ 0.95 mm

        Odds ratio (95% CI)
3.61 (2.02–6.46)
2.41 (1.27–4.60)

Adjusted for gender, age, smoking status, non-HDL cholesterol, and eGFR. Data for smoking status was skewed and log transformed for analysis.

4. Discussion

In the present study, we showed that carotid IMT as well as confounding factors was significantly associated with the presence of CVD in Japanese diabetic patients. The ROC curve analysis showed that the area under the curve of carotid IMT was greater than those of the other parameters. The optimal cut-off point to identifying CVD yielded the following values: carotid IMT of ≥0.95 mm. When adjusted for confounding factors, the multivariate-adjusted odds ratio (95% CI) for low HDL cholesterolemia and carotid IMT ≥0.95 mm were 3.24 (1.66–6.30) and 2.30 (1.20–4.43), respectively, and the OR (95% CI) for MetS and carotid IMT ≥0.95 mm was 2.45 (1.30–4.62) and 2.41 (1.27–4.60), respectively. The carotid IMT, an inexpensive and routinely measured clinical variable, might be used as an integrated measure to evaluate the presence of CVD in diabetic patients.

Evidence that measurement of the carotid IMT improves the prediction of the absolute risk of incidental CVD is inconsistent. Many previous studies demonstrated that CVD risk factors (e.g., gender, age, smoking, increased LDL-C level, low HDL-C level, hypertension, and diabetes) are significantly associated with carotid IMT [5, 6, 21, 22]. In prospective studies, the progression of carotid IMT is influenced by CVD risk factors and directly predicts clinical CVD events, independently of classic risk factors [23]. Furthermore, the addition of carotid IMT to the conventional risk factors modestly increased the ability to predict CVD [9, 24]. Also in 900 Japanese outpatients with CVD factors or established atherosclerosis, carotid IMT was a significantly independent predictor after adjustment for risk factors and history of CVD [8]. In a meta-analysis of 37,197 participants followed up for a mean 5.5 years, Lorenz et al. demonstrated that a 0.1 mm absolute difference in carotid IMT was associated with a relative risk of myocardial infarction of 1.15 (95% CI: 1.12–1.17) and a relative risk of stroke of 1.18 (95% CI: 1.16–1.21) [7]. These studies suggest that carotid IMT measurement can assist in identifying people with diabetes who are at a higher risk of developing microvascular and macrovascular complications [23]. In our study, carotid IMT measurements of the risk of CVD events showed that the risk increases with an IMT ≥0.95 mm, and multivariate-adjusted OR (95% CI) for the presence of CVD was 2.41 (1.27–4.60) in patients with diabetes.

Although, recently, conflicting results have been reported on the addictive value of carotid IMT measurements in CVD risk prediction, Lorenz et al. [13] showed that, during a mean followup of 7.0 years among 36,984 participants from 16 studies, the overall hazard ratio of the CVD endpoint was 0.98 (0.95–1.01) when adjusted for vascular risk factors. The association between carotid IMT progression assessed from two ultrasound scans and CVD risk in the general population remains unproven, and no conclusion can be derived for the use of carotid IMT progression as a surrogate marker in clinical trials. Moreover, baseline characteristics and carotid IMT did not significantly influence the association between carotid IMT changes and clinical outcomes [12]. In diabetic individuals, there is no improvement in risk prediction when measurement of carotid IMT is added to the Framingham risk score [25]. These differences may be attributed to differences across studies on carotid IMT measurement (e.g., carotid segments (common, bifurcation, internal), including or excluding carotid plaques), participants' characteristics, cutoff values for risk categories, number of events (small numbers), and end-point definition [26]. We based our analysis on measurements of the mean common carotid IMT because they were available in all studies, they are generally feasible to use in routine clinical practice, and their use has been recommended [17]. In our cross-sectional study, carotid IMT measurement could assist in identifying diabetic people with CVD.

The common carotid artery IMT and inner carotid artery (ICA) IMT were statistically significant predictors of incident CVD, with the ICA IMT having a larger area under the ROC curve (0.756 versus 0.695) [27]. Iglesias Del Sol et al. found that the mean area under the ROC curves of carotid IMT, as a predictor of coronary artery disease, was 0.67 (95% CI: 0.61–0.73) [28]. Irie et al. [29] suggest that the addition of maximum IMT to conventional risk factors significantly improved the prediction ability for severe coronary artery disease in asymptomatic type 2 diabetic patients without history of coronary artery disease (from the area under the curve, 0.67 to 0.79; ). Also in our study, the mean area under the ROC curves of mean carotid IMT was 0.718 (0.650–0.785) for the presence of CVD among diabetic patients.

We need to be aware of the limitations in interpreting the present results. First, based on its cross-sectional study design, the present result is inherently limited in its ability to eliminate causal relationships between carotid IMT and CVD. Second, since all participants were patients, we could not eliminate the possible effects of underlying diseases (e.g., HbA1c, urine albumin to creatinine ratio) and medication (e.g., salicylic acid, insulin, or oral agent), especially antihypertensive (e.g., angiotensin converting-enzyme inhibitor or angiotensin II receptor blocker agents), and lipid-lowering medications on the results. The use of antihypertensive medications varied from 44.2% in those without CVD to 76.4% in those with CVD, and the use of lipid-lowering medications varied from 6.0% in those without CVD to 27.8% in those with CVD. In this population, the administration rate of antihypertensive medications and lipid-lowering medication is 23.7% and 4.9%, respectively [30]. Third, secondary preventive interventions after obesity, raised BP, dyslipidemia, and diabetes may be successful in reducing the risk factors, thus attenuating the observed association of risk factors with diseases. These points need to be addressed again in prospective population-based studies.

In conclusions, we report that carotid IMT may be useful for screening diabetic patients with CVD, and its identification may thus be important for risk assessment and treatment of patients.

Conflict of Interests

The authors declare that they have no competing interests.

Acknowledgment

This work was supported in part by a grant-in-aid for Scientific Research from the Foundation for Development of Community (2013).

References

M. Laakso, “Cardiovascular disease in type 2 diabetes: challenge for treatment and prevention,” Journal of Internal Medicine, vol. 249, no. 3, pp. 225–235, 2001.

M. Laakso and S. Lehto, “Epidemiology of macrovascular disease in diabetes,” Diabetes Reviews, vol. 5, no. 4, pp. 294–315, 1997.

S. M. Haffner, S. Lehto, T. Rönnemaa, K. Pyörälä, and M. Laakso, “Mortality from coronary heart disease in subjects with type 2 diabetes and in nondiabetic subjects with and without prior myocardial infarction,” New England Journal of Medicine, vol. 339, no. 4, pp. 229–234, 1998.

A. Juutilainen, S. Lehto, T. Rönnemaa, K. Pyörälä, and M. Laakso, “Type 2 diabetes as a “coronary heart disease equivalent”: an 18-year prospective population-based study in Finnish subjects,” Diabetes Care, vol. 28, no. 12, pp. 2901–2907, 2005.

R. Salonen and J. T. Salonen, “Progression of carotid atherosclerosis and its determinants: a population-based ultrasonography study,” Atherosclerosis, vol. 81, no. 1, pp. 33–40, 1990.

R. Salonen and J. T. Salonen, “Determinants of carotid intima-media thickness: a population-based ultrasonography study in Eastern Finnish men,” Journal of Internal Medicine, vol. 229, no. 3, pp. 225–231, 1991.

M. W. Lorenz, H. S. Markus, M. L. Bots, M. Rosvall, and M. Sitzer, “Prediction of clinical cardiovascular events with carotid intima-media thickness: a systematic review and meta-analysis,” Circulation, vol. 115, no. 4, pp. 459–467, 2007.

K. Kitagawa, H. Hougaku, H. Yamagami et al., “Carotid intima-media thickness and risk of cardiovascular events in high-risk patients. Results of the Osaka Follow-Up Study for Carotid Atherosclerosis 2 (OSACA2 Study),” Cerebrovascular Diseases, vol. 24, no. 1, pp. 35–42, 2007.

J. J. Cao, A. M. Arnold, T. A. Manolio et al., “Association of carotid artery intima-media thickness, plaques, and C-reactive protein with future cardiovascular disease and all-cause mortality: the cardiovascular health study,” Circulation, vol. 116, no. 1, pp. 32–38, 2007.

D. Baldassarre, M. Amato, L. Pustina et al., “Measurement of carotid artery intima-media thickness in dyslipidemic patients increases the power of traditional risk factors to predict cardiovascular events,” Atherosclerosis, vol. 191, no. 2, pp. 403–408, 2007.

R. Kawamoto, Y. Oka, H. Tomita, A. Kodama, and N. Ootsuka, “Association between abdominal wall fat index on ultrasonography and carotid atherosclerosis in non-obese men,” Journal of Atherosclerosis and Thrombosis, vol. 12, no. 2, pp. 85–91, 2005.

P. Costanzo, P. Perrone-Filardi, E. Vassallo et al., “Does carotid intima-media thickness regression predict reduction of cardiovascular events?: a meta-analysis of 41 randomized trials,” Journal of the American College of Cardiology, vol. 56, no. 24, pp. 2006–2020, 2010.

M. W. Lorenz, J. F. Polak, M. Kavousi et al., “Carotid intima-media thickness progression to predict cardiovascular events in the general population (the PROG-IMT collaborative project): a meta-analysis of individual participant data,” The Lancet, vol. 379, no. 9831, pp. 2053–2062, 2012.

P. Greenland, J. S. Alpert, G. A. Beller et al., “2010 ACCF/AHA guideline for assessment of cardiovascular risk in asymptomatic adults: executive summary: a report of the American College of cardiology foundation/American Heart association task force on practice guidelines,” Circulation, vol. 122, no. 25, pp. 2748–2764, 2010.

E. Imai, M. Horio, T. Watanabe et al., “Prevalence of chronic kidney disease in the Japanese general population,” Clinical and Experimental Nephrology, vol. 13, no. 6, pp. 621–630, 2009.

J. T. Salonen and R. Salonen, “Ultrasonographically assessed carotid morphology and the risk of coronary heart disease,” Arteriosclerosis and Thrombosis, vol. 11, no. 5, pp. 1245–1249, 1991.

J. H. Stein, C. E. Korcarz, R. T. Hurst et al., “American Society of Echocardiography Carotid Intima-Media Thickness Task Force; Endorsed by the Society for Vascular Medicine. Use of carotid ultrasound to identify subclinical vascular disease and evaluate cardiovascular disease risk: a consensus statement from the American Society of Echocardiography Carotid Intima-Media Thickness Task Force,” Journal of the American Society of Echocardiography, vol. 21, no. 2, pp. 93–111, 2008.

S. M. Grundy, J. I. Cleeman, S. R. Daniels et al., “Diagnosis and management of the metabolic syndrome. An American Heart Association/National Heart, Lung, and Blood Institute scientific statement,” Circulation, vol. 112, no. 17, pp. 2735–2752, 2005.

Examination Committee of Criteria, “Obesity Disease in Japan; Japan Society for Study of Obesity,New criteria for “obesity disease” in Japan,” Circulation Journal, vol. 66, no. 11, pp. 987–992, 2002.

T. Ota, T. Takamura, N. Hirai, and K.-I. Kobayashi, “Preobesity in World Health Organization classification involves the metabolic syndrome in Japanese,” Diabetes Care, vol. 25, no. 7, pp. 1252–1253, 2002.

A. Poli, E. Tremoli, A. Colombo, M. Sirtori, P. Pignoli, and R. Paoletti, “Ultrasonographic measurement of the common carotid artery wall thickness in hypercholesterolemic patients. A new model for the quantitation and follow-up of preclinical atherosclerosis in living human subjects,” Atherosclerosis, vol. 70, no. 3, pp. 253–261, 1988.

R. Salonen, K. Seppanen, R. Rauramaa, and J. T. Salonen, “Prevalence of carotid atherosclerosis and serum cholesterol levels in eastern Finland,” Arteriosclerosis, vol. 8, no. 6, pp. 788–792, 1988.

L. Sibal, S. C. Agarwal, and P. D. Home, “Carotid intima-media thickness as a surrogate marker of cardiovascular disease in diabetes,” Diabetes, Metabolic Syndrome and Obesity, vol. 4, pp. 23–24, 2011.

J. F. Polak, M. Szklo, R. A. Kronmal, et al., “The value of carotid artery plaque and intima-media thickness for incident cardiovascular disease: the multi-ethnic study of atherosclerosis,” Journal of the American Heart Association, vol. 2, no. 2, Article ID e000087, 2013.

H. M. den Ruijter, S. A. Peters, and K. A. Groenewegen, “Common carotid intima-media thickness does not add to Framingham risk score in individuals with diabetes mellitus: the USE-IMT initiative,” Diabetologia, vol. 56, no. 7, pp. 1494–1502, 2013.

H. M. den Ruijter, S. A. Peters, T. J. Anderson, et al., “Common carotid intima-media thickness measurements in cardiovascular risk prediction: a Meta-analysis,” Journal of the American Medical Association, vol. 308, no. 8, pp. 796–803, 2012.

J. F. Polak, M. J. Pencina, A. Meisner et al., “Associations of carotid artery intima-media thickness (IMT) with risk factors and prevalent cardiovascular disease: comparison of mean common carotid artery IMT with maximum internal carotid artery IMT,” Journal of Ultrasound in Medicine, vol. 29, no. 12, pp. 1759–1768, 2010.

A. Iglesias Del Sol, M. L. Bots, D. E. Grobbee, A. Hofman, and J. C. M. Witteman, “Carotid intima-media thickness at different sites: relation to incident myocardial infarction—the Rotterdam study,” European Heart Journal, vol. 23, no. 12, pp. 934–940, 2002.

Y. Irie, N. Katakami, H. Kaneto, et al., “The utility of carotid ultrasonography in identifying severe coronary artery disease in asymptomatic type 2 diabetic patients without history of coronary artery disease,” Diabetes Care, vol. 36, no. 5, pp. 1327–1334, 2013.

R. Kawamoto, K. Kohara, Y. Tabara, T. Miki, and N. Otsuka, “Serum gamma-glutamyl transferase levels are associated with metabolic syndrome in community-dwelling individuals,” Journal of Atherosclerosis and Thrombosis, vol. 16, no. 4, pp. 355–362, 2009.