Journal of Veterinary Medicine
Volume 2016 (2016), Article ID 6510347, 1 page
http://dx.doi.org/10.1155/2016/6510347

Corrigendum

Corrigendum to “Influence of a Diester Glucocorticoid Spray on the Cortisol Level and the CCR4⁺ CD4⁺ Lymphocytes in Dogs with Atopic Dermatitis: Open Study”

Masato Fujimura and Hironobu Ishimaru

Fujimura Animal Allergy Hospital, Aomatanihigashi 5-10-26, Minou-shi, Osaka 562-0022, Japan

Received 6 December 2015; Accepted 5 January 2016

Copyright © 2016 Masato Fujimura and Hironobu Ishimaru. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Our paper titled “Influence of a Diester Glucocorticoid Spray on the Cortisol Level and the CCR4⁺ CD4⁺ Lymphocytes in Dogs with Atopic Dermatitis: Open Study” [1] contains an error in Abstract and Introduction. The concentration of hydrocortisone aceponate spray was incorrectly reported as 0.00584% while the correct value is 0.0584%.

References

M. Fujimura and H. Ishimaru, “Influence of a diester glucocorticoid spray on the cortisol level and the CCR4⁺ CD4⁺ lymphocytes in dogs with atopic dermatitis: open study,” Journal of Veterinary Medicine, vol. 2014, Article ID 492735, 5 pages, 2014.