International Scholarly Research Notices
Volume 2017 (2017), Article ID 7258513, 1 page
https://doi.org/10.1155/2017/7258513

Corrigendum

Corrigendum to “Comparative Study on the Efficacy of Anorganic Bovine Bone (Bio-Oss) and Nanocrystalline Hydroxyapatite (Ostim) in Maxillary Sinus Floor Augmentation”

Adileh Shirmohammadi,¹ Leila Roshangar,² Mohammad Taghi Chitsazi,¹ Reza Pourabbas,¹ Masoumeh Faramarzi,¹ and Nasrin Rahmanpour³

¹Dental and Periodontal Research Center, Tabriz University of Medical Sciences, Tabriz 5166614711, Iran
²Department of Anatomy and Histology, Faculty of Medicine, Tabriz University of Medical Sciences, Tabriz 5166614711, Iran
³Department of Periodontics, Tabriz Dental Faculty, Tabriz 5166614711, Iran

Correspondence should be addressed to Mohammad Taghi Chitsazi; mtchitsazi@gmail.com

Received 9 April 2017; Accepted 27 April 2017; Published 11 May 2017

Copyright © 2017 Adileh Shirmohammadi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Comparative Study on the Efficacy of Anorganic Bovine Bone (Bio-Oss) and Nanocrystalline Hydroxyapatite (Ostim) in Maxillary Sinus Floor Augmentation” [1], the last name of the fifth author was given incorrectly as “Faramarzie.” The author’s name should have been written as “Faramarzi.” The revised authors’ list is shown above.

References

A. Shirmohammadi, L. Roshangar, M. T. Chitsazi, R. Pourabbas, M. Faramarzie, and N. Rahmanpour, “Comparative Study on the Efficacy of Anorganic Bovine Bone (Bio-Oss) and Nanocrystalline Hydroxyapatite (Ostim) in Maxillary Sinus Floor Augmentation,” International Scholarly Research Notices, vol. 2014, Article ID 967091, 7 pages, 2014.