Autoimmune Diseases
Volume 2021 (2021), Article ID 9862946, 1 page
https://doi.org/10.1155/2021/9862946

Corrigendum

Corrigendum to “Gender and Ethnicity Based Differences in Clinical and Laboratory Features of Myasthenia Gravis”

Fawzi Abukhalil,¹ Ayyaz Alam Sultan,² Bijal Mehta,1,3 Erin Saito,¹ Sejal Mehta,¹ and Aaron McMurtray1,3

¹Neurology Department, Los Angeles Biomedical Research Institute, 1124 West Carson Street, Building E5, Torrance, CA 90502, USA
²Dow University of Health Sciences, Dow Medical College, Karachi, Pakistan
³Department of Neurology, Harbor-UCLA Medical Center, 1000 West Carson Street, Torrance, CA 90509, USA

Correspondence should be addressed to Aaron McMurtray; amcmurtray@hotmail.com

Received 24 May 2021; Accepted 24 May 2021; Published 7 June 2021

Copyright © 2021 Fawzi Abukhalil et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Gender and Ethnicity Based Differences in Clinical and Laboratory Features of Myasthenia Gravis” [1], Ayyaz Alam Sultan was missing from the authors’ list in error. With the agreement of all authors, Ayyaz Alam Sultan is added to the authors’ list due to the contribution to data interpretation and manuscript editing. The corrected authors’ list is shown above.

References

F. Abukhalil, B. Mehta, E. Saito, S. Mehta, and A. McMurtray, “Gender and Ethnicity Based Differences in Clinical and Laboratory Features of Myasthenia Gravis,” Autoimmune Diseases, vol. 2015, Article ID 197893, 4 pages, 2015.