Advances in Human-Computer Interaction
Volume 2019 (2019), Article ID 1969107, 2 pages
https://doi.org/10.1155/2019/1969107

Corrigendum

Corrigendum to “Designing a Human Machine Interface for Quality Assurance in Car Manufacturing: An Attempt to Address the “Functionality versus User Experience Contradiction” in Professional Production Environments”

Nikolaj Borisov,¹ Benjamin Weyers,² and Annette Kluge³

¹University of Duisburg-Essen, 47057 Duisburg, Germany
²Computer Science Department, RWTH Aachen University, 52074 Aachen, Germany
³Department of Psychology, Ruhr-University Bochum, 44801 Bochum, Germany

Correspondence should be addressed to Benjamin Weyers; weyers@vr.rwth-aachen.de

Received 16 April 2019; Accepted 21 April 2019; Published 12 June 2019

Copyright © 2019 Nikolaj Borisov et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Designing a Human Machine Interface for Quality Assurance in Car Manufacturing: An Attempt to Address the “Functionality versus User Experience Contradiction” in Professional Production Environments” [1], there was an error in Table 4 during the editing process as the reported values are wrongly sorted in the table. However, they are correct in the text. Accordingly, the change did not affect the results of the article. The correct version of Table 4 should be as follows:

Table 4: Device score model: results overview (the lower the better).

DEVICE SCORE MODEL
Smartphone
Tablet
Headset
AR-Mic.
AR-Gest.
Proj.-Mic.
Proj.-Gest.

Overall grade
2,1
2,2
3,0
2,6
3,5
3,6
4,2

Criterion
Weight.
Grade
Grade
Grade
Grade
Grade
Grade
Grade

Ergonomics
25%
2,4
3,4
3,0
3,2
3,2
3,1
2,9

Performance
40%
1,7
1,9
2,8
1,7
2,9
4,4
5,8

Technology acceptance
15%
1,7
1,1
5,0
3,3
2,0
5,1
4,4

User Experience
20%
2,7
2,3
1,8
3,2
6,0
1,7
2,6

AR-Mic = augmented reality: data glasses with microphone as input device.

AR-Gest. = augmented reality: data glasses with hand gesture as input device.

Proj.-Mic. = display instructions over projection with microphone as input device.

Proj.-Gest. = display instructions over projection with hand gesture as input.

References

N. Borisov, B. Weyers, and A. Kluge, “Designing a human machine interface for quality assurance in car manufacturing: an attempt to address the “functionality versus user experience contradiction” in professional production environments,” Advances in Human Computer Interaction, vol. 2018, Article ID 9502692, 18 pages, 2018.