Advances in Materials Science and Engineering

Volume 2013 (2013), Article ID 382380, 6 pages

http://dx.doi.org/10.1155/2013/382380

Research Article

Structural, Morphological, and LPG Sensing Properties of Al-Doped ZnO Thin Film Prepared by SILAR

Shampa Mondal, Shatabda Bhattacharya, and P. Mitra

Department of Physics, The University of Burdwan, Golapbag, Burdwan, West Bengal 713104, India

Received 19 May 2013; Accepted 9 October 2013

Academic Editor: Jun Zhang

Copyright © 2013 Shampa Mondal et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Undoped and aluminum doped zinc oxide (AZO) thin films were deposited on glass substrates by successive ion layer adsorption and reaction (SILAR) technique from ammonium zincate complex. The thin films are characterized by X-ray diffraction (XRD) and scanning electron microscopy (SEM) for their structural and morphological studies. Both undoped and -doped film show strong preferred c-axis orientation. The texture coefficient (TC) of the film along (002) direction increases due to Al incorporation. SEM micrograph shows round shaped particles for pure ZnO. However AZO films show particles with off spherical shape and compact interconnected grains. Sensitivity of the film in presence of 80% LEL (lower explosive limit) of LPG increases with temperature and is maximum at 325°C. Significantly high sensitivity of 87% with reasonably fast response was observed for 1% -doped ZnO (AZO) film in presence of 1.6 vol% LPG at 325°C.

1. Introduction

Zinc oxide (ZnO) is a promising material for gas sensor application. Thin films of ZnO are important for detecting toxic pollutant gases, combustible gases and organic vapors. The performance and efficiency of thin film-based devices are determined strongly by the structural, morphological, and electrical properties of the component films. These properties are determined by the process parameters during film growth as well as by the presence of impurities and defects in the films. AZO films have got potential applications in solar cells, solid-state display devices, optical coatings, heaters, defrosters, and chemical sensors [1, 2]. Doping with is primarily done to achieve high transparency, stability, and high conductivity and also because it enhances the gas-sensing properties of the ZnO thin films, which have immensely important industrial and domestic applications for detecting hazardous gases, including LPG [3]. Accordingly, synthesis of polycrystalline AZO thin films has been widely carried out using different techniques such as ultrasonic chemical vapor deposition [4], spray pyrolysis [5], pulsed laser deposition [6], DC reactive sputtering [7], RF magnetron sputtering [8], helicon-wave excited plasma (HWP) deposition [9], spin coating [10], sol-gel [11], and chemical beam deposition [12] among many others.

Although the conventional physical techniques give uniform and compact films with high transparency, they are usually very expensive and are difficult to expand to large scale. The desired characteristics of a sensor material need to be balanced with the processing costs for practical applications. Low-temperature chemical techniques involving aqueous route (from solutions) on the other hand are versatile, simple, and cost-effective as compared with vapor-phase techniques. Among the various chemical techniques, one of the less used and less studied chemical techniques is SILAR. In SILAR technique, a substrate is dipped alternately into beakers containing aqueous solutions (cationic and anionic) for the reaction to take place at the substrate surface. The substrate can be introduced into various reactants for a specific length of time depending on the nature and kinetics of the reaction. The immersion-reaction cycle can be repeated for any number of times, limited only by the inherent problems associated with the deposition technique and the substrate-thin film interface. The technique is called SILAR (successive ion layer adsorption and reaction) since it involves adsorption of a layer of complex ion on the substrate followed by reaction of the adsorbed ion layer. Since the synthesis can be carried out under mild conditions and at lower processing temperatures, implantation of dopant at low temperatures may be particularly suitable by this method.

The present study deals with the preparation and characterization of undoped and -doped ZnO thin films on glass substrate by SILAR and their gas sensing characteristics in presence of LPG. incorporation in ZnO lattice is always limited [13, 14]. In the present work 1% AZO films have been prepared. Earlier Rakhshani [15] reported preparation of AZO films by SILAR using sodium zincate complex. However use of sodium complex always introduces highly mobile sodium ions in the films [16] which can be detrimental for their practical applications. The objective of this work was to synthesize AZO films from ammonium zincate complex in order to eliminate the incorporation of highly mobile sodium ions in the films and to study the application potentiality of the films as LPG sensor.

2. Materials and Methods

Pure and -doped ZnO thin films were deposited on clean glass substrates by SILAR technique which involved dipping of the substrate in ammonium zincate complex kept at room temperature and hot water bath kept near boiling point. The ammonium zincate bath, used for deposition, was prepared by adding ammonium hydroxide (~25% pure ammonia solution; Merck, Mol. Wt. 17.03 g/mol, density 0.91) to an aqueous solution of zinc acetate dihydrate (Merck, India). The pH of the zincate solution measured in a Systronics pH meter (Model 335) was 10.80.

The details of pure ZnO film deposition from ammonium zincate bath have been reported earlier [16–18]. Briefly, a precleaned substrate (microscopic glass slide) is alternately dipped in zinc complex kept at room temperature and hot water bath maintained at ~95–98°C. One complete set of dipping involves dipping the substrate in each bath for two (2) seconds. 50 dippings were performed for the present experiment. 1% -doped ZnO film was prepared by adding aluminium chloride hexahydrate (AlCl₃6H₂O, Merck) as the source of dopant and was added in requisite amount in the zincate bath. All the deposited films were white and homogeneous. After deposition, peel-off test was conducted to confirm the adhesivity of the coated films on glass substrates which showed well adherent films on the substrate. The thicknesses of the films were measured by the weight difference-density consideration [19] method using an electronic high precision balance. The thickness for pure ZnO film was ~0.8 μm and it was ~0.96 μm for Al-doped film indicating higher growth rate due to Al incorporation.

Structural analysis of the deposited films was carried out using Philips PW 1830 X-ray diffractometer with radiation (λ = 1.5418 Å) as X-ray source at 40 kV and 20 mA. The experimental peak positions were compared with the standard JCPDS files and the Miller indices were assigned to the peaks. Scanning electron microscopy (FEI FEG Nova 600) was used to study the variation of surface morphology and to illustrate the formation of crystallites on the film surface. EDX analysis was carried out to check the incorporation of Al in the doped film. High conducting silver (Ag) paste was used to make ohmic contacts on both the ends of the films to carry out electrical measurements on them. Approximately 20 mm long silver contacts, separated by 5 mm, were made on the films for electrical measurements. The width of the electrodes was approximately 1 mm. The film was mounted on a home-made two-probe assembly placed into a ceramic tube which was inserted coaxially inside a resistance-heated furnace. The electrical resistance of the films was measured before and after exposure to LPG using a Keithley System Electrometer (Model: 6514). The sensitivity of the film was determined at different operating temperatures in the range 250–375°C in presence of LPG in air. Commercially available calibrated mixtures of LPG were used for this purpose. Before exposing to LPG, the film was allowed to equilibrate at each operating temperature for 30 minutes. The percent sensitivity was estimated by measuring the percent reduction of resistance in presence of the test gas. Thus if and represent the equilibrium sample resistance in ambient air and under test gas, respectively, the percent sensitivity can be expressed as

3. Results and Discussions

Figure 1 shows the X-ray diffraction (XRD) spectra of undoped and 1% -doped ZnO films. The films were annealed at 350°C for 2 hr in air prior to structural characterization. The diffraction pattern for pure ZnO is shown in Figure 1(a), while Figure 1(b) shows the diffractogram for 1% AZO. The diffraction angle 2θ was scanned in the range 20° to 70°. The 2θ variation was employed with a 0.05 degrees step and a time step of 1 second. Intensity in arbitrary units is plotted against 2θ in Figure 1. It is seen from Figure 1(a) that peaks appear at 31.75°, 34.389°, 36.205°, 47.434°, 56.576°, and 62.855°. All the peaks are in good agreement with the joint committee on powder diffraction standard (JCPDS) data belonging to hexagonal structure [20]. The corresponding reflecting planes are (100), (002), (101), (102), (110), and (103), respectively. Apart from ZnO characteristic peaks, no phase corresponding to aluminum or other aluminium compounds was observed in the XRD patterns. This observation suggests that the films do not have any phase segregation or secondary phase formation as well as Al incorporation into ZnO lattice. The (002) peak appears with maximum intensity in undoped and Al-doped films indicating preferred orientation of the crystals along c-axis that is perpendicular to the substrate. The other peaks corresponding to (100), (101), (102), (110), and (103) are present with low relative intensities.

(a)

(b)

Figure 1: X-ray diffraction pattern of (a) undoped ZnO and (b) 1% AZO film.

Quantitative information concerning the preferential crystal orientation can be obtained from the texture coefficient, , defined as [21]

where is the texture coefficient, is the number of diffraction peaks considered, is the measured X-ray intensity, and is the corresponding recorded intensity according to JCPDS card. represents the X-ray intensities from standard ZnO powder with randomly oriented grains or with no preferred orientation (JCPDS). Since the diffraction peaks corresponding to (102), (110), and (103) appear with low relative intensities, the first three diffraction peaks corresponding to ((100), (002), and (101)) were considered for calculating TC. The texture coefficient for the (002) orientation was found to be 2.292 for undoped ZnO and it increases to 2.327 for -doped ZnO indicating improved crystallinity of the doped film along (002) plane. The value of the texture coefficient indicates the maximum preferred orientation of the film along the diffraction plane under consideration. The incorporation of in the films was verified by the EDAX result. Figure 4 shows the energy dispersive X-ray spectrum of AZO film. The spectrum reveals the presence of Zn, O, and Al elements in the deposited films. The silicon signal appears from the substrate.

Figure 2 shows the SEM micrograph of undoped ZnO film, while Figure 3 shows the SEM image for 1% AZO films. The incorporation of into the lattice affects the morphology as can be seen from the micrographs. Figure 2(a) shows SEM image at normal incidence with magnification 12000. It is evident that the microstructure consists of many round shaped clearly defined grains covering the substrate surface more or less uniformly. However there is agglomeration in certain regions of the film which is clearly visible in the SEM image with magnification 35000 (Figure 2(b)) and articles with off spherical shape are observed in AZO film indicating that doping modifies the shape of the grains. Also the film appears to have less porosity compared to undoped ZnO. Figure 3(b) shows the SEM image of the same film with magnification 40000. The microstructure formed is found to be uniform with compact interconnected grains. Thus incorporation of Al leads to a more continuous film having higher density compared to undoped ZnO.

(a)

(b)

Figure 2: SEM image of undoped ZnO (a) with magnification 12000 and (b) with magnification 35000.

(a)

(b)

Figure 3: SEM image of 1% AZO film (a) with magnification 12000 and (b) with magnification 40000.

Figure 4: EDX pattern of AZO film.

Electrical resistance measurement at 100°C shows a marked decrease in resistance due to Al incorporation. While undoped ZnO shows a resistance of 2.28 MΩ, 1% AZO shows a resistance value of 0.189 MΩ. Such decrease in resistance confirms the substitutional replacement of ions by and subsequent enhancement of carrier density. Distribution of in the grains leading to interconnected grains and a more continuous film also might contribute to the lowering of resistance by enhancing the mobility of charge carriers.

Figure 5 shows the percent sensitivity (%) as a function of operating temperature in presence of 1.6 vol% LPG in air. This value corresponds to 80% LEL (lower explosive limit) of LPG in air. Butane has a LEL of 1.6 vol% and propane has a LEL of 2.1 vol%. Thus the LEL of LPG is generally taken to be 2 vol%. The exposure time to the target gas was 15 minutes. It is observed that compared to undoped ZnO film, -doping enhances the sensitivity of the films at all temperatures. The sensitivity increases with increasing temperature of the sensor element, reaches a peak value, and then decreases again. The peak sensitivity for AZO film was observed at 325°C and the value of maximum sensitivity was 87%. Similar characteristic has been reported by Sahay and Nath [22] with peak sensitivity of ~89% at 325°C in presence of 1 vol% LPG. Figure 6 shows sensing characteristics of the undoped and Al-doped film in presence of 1.6 vol% LPG in air at 325°C. The plot of resistance ratio against time is shown in the figure. Faster response (short response time) is given by Al-doped ZnO compared to undoped ZnO film.

Figure 5: Sensitivity versus operating temperature of (a) undoped ZnO and (b) 1% AZO film.

Figure 6: Sensing characteristics in presence of 1.6 vol% LPG in air at 325°C for (a) undoped ZnO and (b) 1% AZO film.

The gas sensing mechanism normally accepted for semiconductor sensors assumes that the oxygen adsorbed on the surface of the oxide traps some of the conduction electrons and thus decreases the material’s conductivity [23]. The surface adsorbed oxygen species thus becomes negatively charged chemisorbed species , or and acts as reaction centers for gas molecules. When reduction gas molecules come into contact with this surface, they may interact with this chemisorbed oxygen species, leading to an inverse charge transference [19]. Upon the return of the electrons to the conduction band, conductivity increases. The reaction mechanism for LPG (containing the hydrocarbons propane and butane) with surface adsorbed species leading to the final products CO₂ and H₂O is quite complicated and proceeds through several intermediate steps [22, 24].

Enhancement of sensitivity with operating temperature has been attributed to increased speed of chemical reaction between the gas molecules and chemisorbed oxygen species [21]. At high temperatures, gas molecules have enough thermal energy to react with the chemisorbed species. However the appearance of peak sensitivity at 325°C has not been explained. It has been established that the nature of the chemisorbed species is a function of temperature [25]. While is considered to be the prominent chemisorbed species upto 500 K, for temperatures higher than 500 K, is the predominant species. As is evident from experimental observation, reasonable sensitivity appears for temperatures higher than 500 K where the predominant species is . With increase in temperature, the reaction , leading to the formation of species proceeds at a faster rate, thereby increasing the density of species. Since these are the active sites for reaction with gas molecules, the sensitivity increases with temperature. This process must accompany the process of enhancement of thermal energy of the gas molecules with temperature in order to explain the reduction of sensitivity above a particular temperature. With further increase in operating temperature a gradual change of the adsorbed species from to takes place according to the reaction . The latter species, despite having high reactivity, is unstable and can go into the lattice as lattice oxygen [25, 26]. Thus we can presume that at temperatures above 325°C, the number of chemisorbed species available for surface activity is lowered. This lack in number of chemisorbed species can slow down the catalytic oxidation reaction and leads to a decrease in net yield of conduction electrons and hence sensitivity.

The enhancement of sensitivity due to incorporation might be due to increase in electron concentration (carrier density) as has been observed in resistance measurement as well as less porosity in the film as has been observed in SEM measurements. Such increase in conduction electron concentration leads to an increased density of surface active chemisorbed species which are the reaction centers for gas-surface reaction. Also more porous film allows gas molecules to penetrate inside the film and the resistance reduction process continues for a longer time. This delays the attainment of equilibrium resistance value in presence of target gas and increases response time as has been observed for undoped film in the present work.

4. Conclusions

Undoped and -doped ZnO thin film could be successfully synthesized from ammonium zincate complex for the first time by SILAR technique. Apart from being an inexpensive and simple technique, the method uses milder reaction conditions than those employed by most chemical methods proposed in the literature. incorporation increases the growth rate of the film. XRD spectra showed that the films have hexagonal structure with preferred c-axis orientation. Texture coefficient of (002) plane increases due to incorporation indicating improved crystallinity along c-axis. SEM micrograph shows round shaped particles for pure ZnO. doping modifies the shape of the grains to off spherical ones. AZO film also appears to have high density (i.e., less porosity) compared to undoped ZnO and consists of compact interconnected grains leading to a more continuous film. This fact along with substitutional replacement of divalent by trivalent decreases the film resistance. The sensitivity of the films increases with temperature, reaches a maximum, and then decreases. The phenomena can be explained by the change in nature of chemisorbed species with temperature as well as their number density. Significantly high sensitivity of 87% with a reasonably fast response is observed for AZO film in presence of 1.6 vol% LPG in air.

Acknowledgment

P. Mitra gratefully acknowledges CSIR (Council of Scientific and Industrial research, New Delhi, India) for providing some financial support for the work in the form of a research project (no. 03 (1195)/11/EMR-II).

References

S. H. Jeong, B. N. Park, D.-G. Yoo, J.-H. Boo, and D. Jung, “Al-ZnO thin films as transparent conductive oxides: synthesis, characterization, and application tests,” Journal of the Korean Physical Society, vol. 50, no. 3, pp. 622–625, 2007.

K. V. Gurav, V. J. Fulari, U. M. Patil, C. D. Lokhande, and O.-S. Joo, “Room temperature soft chemical route for nanofibrous wurtzite ZnO thin film synthesis,” Applied Surface Science, vol. 256, no. 9, pp. 2680–2685, 2010.

B. Baruwati, D. K. Kumar, and S. V. Manorama, “Hydrothermal synthesis of highly crystalline ZnO nanoparticles: a competitive sensor for LPG and EtOH,” Sensors and Actuators B, vol. 119, no. 2, pp. 676–682, 2006.

T. M. Barnes, J. Leaf, C. Fry, and C. A. Wolden, “Room temperature chemical vapor deposition of c-axis ZnO,” Journal of Crystal Growth, vol. 274, no. 3-4, pp. 412–417, 2005.

S. Tewari and A. Bhattacharjee, “Structural, electrical and optical studies on spray-deposited aluminium-doped ZnO thin films,” Pramana, vol. 76, no. 1, pp. 153–163, 2011.

S. Y. Lee, Y. Li, J.-S. Lee et al., “Effects of chemical composition on the optical properties of Zn1-xCdxO thin films,” Applied Physics Letters, vol. 85, no. 2, pp. 218–220, 2004.

H. T. Cao, Z. L. Pei, J. Gong, C. Sun, R. F. Huang, and L. S. Wen, “Preparation and characterization of Al and Mn doped ZnO (ZnO: (Al, Mn)) transparent conducting oxide films,” Journal of Solid State Chemistry, vol. 177, no. 4-5, pp. 1480–1487, 2004.

K. Yim and C. Lee, “Optical properties of Al-doped ZnO thin films deposited by two different sputtering methods,” Crystal Research and Technology, vol. 41, no. 12, pp. 1198–1202, 2006.

K. Yamaya, Y. Yamaki, H. Nakanishi, and S. Chichibu, “Use of a helicon-wave excited plasma for aluminum-doped ZnO thin-film sputtering,” Applied Physics Letters, vol. 72, no. 2, pp. 235–237, 1998.

S. P. Shrestha, R. Ghimire, J. J. Nakarmi et al., “Properties of ZnO:Al films prepared by spin coating of aged precursor solution,” Bulletin of the Korean Chemical Society, vol. 31, no. 1, pp. 112–115, 2010.

H.-M. Zhou, D.-Q. Yi, Z.-M. Yu, L.-R. Xiao, and J. Li, “Preparation of aluminum doped zinc oxide films and the study of their microstructure, electrical and optical properties,” Thin Solid Films, vol. 515, no. 17, pp. 6909–6914, 2007.

H. Sato, T. Minami, S. Takata, T. Miyata, and M. Ishii, “Low temperature preparation of transparent conducting ZnO:Al thin films by chemical beam deposition,” Thin Solid Films, vol. 236, no. 1-2, pp. 14–19, 1993.

W. Tang and D. C. Cameron, “Electrical resistivity of nanocrystalline Al-doped zinc oxide films as a function of Al content and the degree of its segregation at the grain boundaries,” Thin Solid Films, vol. 238, pp. 83–87.

J. Mass, P. Bhattacharya, and R. S. Katiyar, “Effect of high substrate temperature on Al-doped ZnO thin films grown by pulsed laser deposition,” Materials Science and Engineering B, vol. 103, no. 1, pp. 9–15, 2003.

A. E. Rakhshani, “Al-doped zinc oxide films grown by successive chemical solution deposition,” Applied Physics A, vol. 92, no. 2, pp. 413–416, 2008.

P. Mitra, “Preparation of ZnO film on p-Si substrate and I-V characteristics of p-Si/n-ZnO,” Material Science Research India, vol. 8, pp. 197–202, 2011.

P. Mitra and J. Khan, “Chemical deposition of ZnO films from ammonium zincate bath,” Materials Chemistry and Physics, vol. 98, no. 2-3, pp. 279–284, 2006.

S. Mondal and P. Mitra, “Preparation of cadmium doped ZnO thin films by SILAR and their characterization,” Bulletin of Materials Science, vol. 35, pp. 751–757, 2012.

S. S. Kale, R. S. Mane, H. M. Pathan, A. V. Shaikh, O.-S. Joo, and S.-H. Han, “Preparation and characterization of ZnTe thin films by SILAR method,” Applied Surface Science, vol. 253, no. 9, pp. 4335–4337, 2007.

Joint Committee on Powder Diffraction standards, “Inorganic,” B. Post, S. Weissmann, and H. F. McMurdie, Eds., Card No. 36-1451, International Centre for Diffraction Data, Swarthmore, Pa, USA, 1990.

C. S. Prajapati and P. P. Sahay, “Growth, structure and optical characterization of Al-doped ZnO nanoparticle thin films,” Crystal Research and Technology, vol. 46, no. 10, pp. 1086–1092, 2011.

P. P. Sahay and R. K. Nath, “Al-doped zinc oxide thin films for liquid petroleum gas (LPG) sensors,” Sensors and Actuators B, vol. 133, no. 1, pp. 222–227, 2008.

S. M. Chou, L. G. Teoh, W. H. Lai, Y. H. Su, and M. H. Hon, “Thin film gas sensor for detection of ethanol,” Vapor Sensors, vol. 6, pp. 1420–1427, 2006.

V. R. Shinde, T. P. Gujar, and C. D. Lokhande, “LPG sensing properties of ZnO films prepared by spray pyrolysis method: effect of molarity of precursor solution,” Sensors and Actuators B, vol. 120, no. 2, pp. 551–559, 2007.

J. C. Simpson and J. F. Cordaro, “Characterization of deep levels in zinc oxide,” Journal of Applied Physics, vol. 63, no. 5, pp. 1781–1783, 1988.

G. Heiland and D. Kohl, “Chemical sensor technology,” in Ceramics for Chemical Sensing, T. Seiyama, Ed., vol. 1, p. 15, KodanshaSpringer, Tokyo, Japan, 1988.