Advances in Materials Science and Engineering
Volume 2016 (2016), Article ID 2349476, 13 pages
http://dx.doi.org/10.1155/2016/2349476

Research Article

Application of Response Surface Methodology and Central Composite Inscribed Design for Modeling and Optimization of Marble Surface Quality

Sümeyra Cevheroğlu Çıra,¹ Ahmet Dağ,² and Askeri Karakuş¹

¹Mining Engineering Department, Faculty of Engineering, Dicle University, 21280 Diyarbakır, Turkey
²Mining Engineering Department, Faculty of Engineering, Çukurova University, 01330 Adana, Turkey

Received 18 April 2016; Revised 28 June 2016; Accepted 19 July 2016

Academic Editor: Antonio Riveiro

Copyright © 2016 Sümeyra Cevheroğlu Çıra et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Factors affecting the final surface quality of polished marble are not yet fully understood. Clarifying these factors for optimization of multivariate polishing process by trial and error method is difficult, time-consuming, and costly task. In this study, the empirical practices were carried out using an experimental design, specifically, a central composite inscribed (CCI) design. The factors considered in CCI design were belt speed, rotational speed, and pressure of the polishing head, and the responses were surface glossiness and roughness. Mathematical models describing responses were produced using experimental datasets, and analysis of variance (ANOVA) was used to assess the fit of the models generated with the experimental data. For process optimization, desirability function analysis (DFA) was used. This study has shown that the CCI could efficiently be applied for the modelling of polishing machine for surface quality of marble strips. Better surface quality generally resulted from lower belt speeds, which increased contact time between the abrasives and strips. Optimized surface quality for marble specimen was established.

1. Introduction

Since ancient times, marble has been used in artistic fields due to its strength. Today, in parallel with the development of technology and rising living standards, marble is used for many purposes, such as floorings and coatings and interior and exterior designs of buildings, and because of the fact that it satisfies environmental regulations. For decorative purposes, polished marbles are widely preferred in the global market because of their pleasing aesthetic appearance. To obtain a polished surface, polishing process is applied to the stone. This process can represent an important part (>40%) of the total production cost [1].

Many researchers have conducted studies aimed at decreasing the cost of polishing and have investigated parameters affecting surface quality. The effects of mineralogical- petrographical and chemical variables on the surface roughness and glossiness were investigated by Gürcan et al. [2]. The effects of mineral composition, structure, joint fillings of the stone, and the angular relationship between cutting direction and crystal orientation were investigated by Erdoğan [3]. Ribeiro et al. [4] studied the relationship between cutting speed and roughness by characterizing stones using petrographic analyses, Knoop hardness, deep abrasion, and Amsler wear. The effects of diamond and SiC abrasives on surface quality were investigated by Görgülü and Ceylanoğlu [5]. Huang et al. [6] studied the relationship between the morphology of the stone and surface quality from sawing to polishing by measuring roughness and glossiness values. Furthermore, Ersoy and Kose [7] investigated the relationship between polishing ease and the mechanical properties of marble. Karaca [8] studied the relationship between mechanical properties and the surface roughness of marble samples. Yavuz et al. [1] and Ersoy et al. [9] investigated the effects of belt speed on surface quality by performing polishing tests at various speeds under fixed rotational speed and pressure of the polishing head. However, few studies have investigated optimization of the marble surface. To our knowledge, this is the first reported study to use an experimental design to optimize marble surface quality.

The main objective of this research was to determine the effects of operating variables on surface quality and to identify appropriate parameter settings that produced optimum surface quality, with maximum glossiness and minimum roughness values. However, observing the effects of polishing machine operating variables on surface quality by varying two factors at a time while keeping the others constant requires many individual tests, increasing experimental costs. Moreover, interactions between factors cannot be assessed. With the use of an experimental design, it is possible to remove the complications associated with trial and error methods.

Experimental design methodology is being divided into a few types, such as factorial, mixture, crossed, and response surface methodology (RSM). Among the other types, RSM was selected according to the purpose of this study mentioned above.

2. Materials and Methods

Polishing tests were conducted with a laboratory-scale polishing machine, equipped with a conveyor belt and four polishing heads, which was designed to be similar to an industrial-scale machine (Figure 1). Limestones, Adara, Emperador, Crema Nera, and Sand Wave, from Adıyaman, Kahramanmaraş, and Diyarbakir, Turkey, were used. For determining the material properties of specimen physicomechanical tests were carried out and the results were presented in Table 1. For utilizing the results of the polishing tests directly in industrial applications, 500 mm long and 300 mm wide and 20 mm thick industrial dimensioned specimens were selected also by considering the type of polishing machine.

Table 1: Results of physicomechanical tests.

Marble unit
UW (KN/m³)
(%)
UCS (MPa)
FS (MPa)
ITS (MPa)
BAR (cm³/50 cm²)
SH

Adara
25.7
0.39
77.9
15.01
7.53
15.76
39.2

Emperador
25.8
1.85
61.69
13.44
7.23
18.79
41.2

Crema Nera
26.59
0.34
83.99
12.9
8.6
15.41
43.6

Sand Wave
27.08
1.46
72.05
8.96
7.35
7.95
40.0

Unit weight (UW), porosity (), uniaxial compressive strength (UCS), flexural strength (FS), indirect tensile strength (ITS), Bohme abrasion resistance (BAR), and Schmidt hardness (SH).

Figure 1: Polishing machine.

Central composite design (CCD) one of the most popular RSM due to Box and Wilson [10] was selected as the experimental design method. There are three main varieties of CCD, namely, Central Composite Circumscribed (CCC), central composite inscribed (CCI), and Central Composite Faced (CCF) ones. CCC designs are the original form of the central composite design. In the CCC design the low and high values of each factor have been extended to create the star points. The star points are at some distance “α” from the center based on the properties desired for the design and the number of factors in the design. In this manner the star points establish new extremes for the low and high settings for all factors. In the CCI design, the specified low and high values become the star points, and the system computes appropriate settings for the factorial part of the design inside those boundaries. CCF designs do not require using points outside the original factor range. However, they give poor precision for estimating pure quadratic coefficients [11]. In this research, only the points within the factor ranges originally specified were required. Thus CCI design was selected for determining the experimental program and deriving mathematical equations between factors and responses to clarify the effects of operating variables of polishing machine on marble surface quality.

Three operating polishing machine variables, that is, belt speed (), polishing head pressure (), and polishing head rotational speed (), were assessed as factors, and surface glossiness and roughness were selected as responses in the CCI design. The experimental studies started by identifying the ranges of these factors, which are shown in Figure 2. Using the Design-Expert 6.0 software (trial), actual levels of factors (Table 2) were determined, and an experimental programme was developed (Table 3). Belt speed, rotational speed, and pressure of the polishing head were adjusted according to the experimental programme, and 20 polishing tests were conducted for each marble type.

Table 2: Coded/actual levels of factors.

Factors
Symbol
Coded/actual variable level

Lowest
Low
Centre
High
Highest

−1.682
−1
0
1
1.682

Belt speed (m/min)

0.80
1.07
1.48
1.88
2.15

Pressure of the polishing head (bar)

0.50
0.80
1.25
1.70
2

Rotational speed of the polishing head (rpm)

409
445.69
499.50
553.31
590

Table 3: Experimental programme.

Test number
Coded level of variables
Actual level of variables

1
1
−1
1
1.88
0.80
553.31

2
0
0
0
1.48
1.25
499.50

3
−1
1
1
1.07
1.70
553.31

4
0
0
1.682
1.48
1.25
590.00

5
0
0
−1.682
1.48
1.25
409.00

6
0
0
0
1.48
1.25
499.50

7
1
1
−1
1.88
1.70
445.69

8
−1
1
−1
1.07
1.70
445.69

9
0
−1.682
0
1.48
0.50
499.50

10
1
1
1
1.88
1.70
553.31

11
0
1.682
0
1.48
2.00
499.50

12
0
0
0
1.48
1.25
499.50

13
−1.682
0
0
0.80
1.25
499.50

14
0
0
0
1.48
1.25
499.50

15
0
0
0
1.48
1.25
499.50

16
−1
−1
−1
1.07
0.80
445.69

17
1.682
0
0
2.15
1.25
499.50

18
1
−1
−1
1.88
0.80
445.69

19
−1
−1
1
1.07
0.80
553.31

20
0
0
0
1.48
1.25
499.50

Figure 2: Polishing machine operating variables.

The abrasive series was 60, 80, 120, 180, 220, 280, 320, 380, 600, 800, 5-extra, and a felt pad. The final surface quality of the strips was assessed after the felt pad was used for each of the 20 tests. For measuring average surface roughness of the strips a Taylor Hobson Surtronic 3+ portable surface roughness tester was used. A traverse length of 25 mm with the standard 0.8 mm cutoff was chosen. Ten points were marked on the edges of the strips because of the limited measuring distance of the surface roughness tester and to ensure the measurements were taken from the same points after each polishing test. The roughness values were measured in terms of the most commonly used parameter “” For glossiness parameters Konica Minolta Multi Gloss 268 Gloss Meter which has a measurement range of 0–100 gloss units was chosen and the glossiness values were evaluated using a 60° angle and a 9 × 15 mm area. The arithmetic means of 10 measurements were calculated, and surface profiles of the strips were determined.

At the end of 20 polishing tests, regression models were developed based on the experimental data. Analysis of variance (ANOVA) was used for graphical analysis of the data. Interactions between the factors and responses were analyzed. The goodness of fit of the polynomial model was expressed by the coefficient of determination (), and its statistical significance was checked using the Fisher -test. Three-dimensional (3D) plots were obtained based on the effects of the levels of two factors. Also distribution plots were drawn in order to reveal the relationship between glossiness and roughness of the specimen.

3. Results and Discussion

3.1. Development and Evaluation of Response Models

Quadratic equations (1)–(8) representing the relationships between responses and factors were developed for the coded factors ((1)-(2) for Adara, (3)-(4) for Emperador, (5)-(6) for Crema Nera, and (7)-(8) for Sand Wave units). In these equations, roughness () and glossiness () were determined as functions of the factors. Belt speed, pressure, and rotational speed of the polishing head are shown as , , and , respectively (Table 1). Consider

The results obtained from these equations were analyzed and Figure 3 was drawn to identify the relation between the responses. Figure 3 illustrates that roughness is well correlated with glossiness. The validity of the models was tested using analysis of variance (ANOVA; Tables 4 and 5). In the ANOVA test, the -ratio values obtained for roughness and glossiness were higher than the tabulated -value (9, 10 = 3.02). Thus, it can be concluded that the models were well fitted to the data. Also, an acceptable agreement with the adjusted determination coefficient is required. In this study, the values of and Adj- (Tables 4 and 5) are close to 1.0, which is very high and advocates a high trend between the experimental and the predicted values. This indicates that the regression models provide an excellent definition of the relationship between the factors and the responses.

Table 4: ANOVA results for roughness.

Source
df
SS
MS
-ratio
value

Adara
Model
9

32.36
<0.0001

Residual
10

Total
19

= 0.966
= 0.936

Emperador
Model
9

25.11
<0.0001

Residual
10

Total
19

= 0.957
= 0.919

Crema Nera
Model
9

23.40
<0.0001

Residual
10

Total
19

= 0.954
= 0.913

Sand Wave
Model
9

30.52
<0.0001

Residual
10

Total
19

= 0.964
= 0.933

df: degrees of freedom, SS: sum of squares, and MS: mean square.

Table 5: ANOVA results for glossiness.

Source
df
SS
MS
-ratio
value

Adara
Model
9
226.50
25.17
22.46
<0.0001

Residual
10
11.21
1.12

Total
19
237.70

= 0.952
= 0.910

Emperador
Model
9
240.51
26.72
16.35
<0.0001

Residual
10
16.34
1.63

Total
19
256.85

= 0.936
= 0.879

Crema Nera
Model
9
361.59
40.18
24.21
<0.0001

Residual
10
16.59
1.66

Total
19
378.19

= 0.956
= 0.916

Sand Wave
Model
9
118.93
13.21
65.39
<0.0001

Residual
10
2.02
0.2

Total
19
120.95

= 0.983
= 0.968

df: degrees of freedom, SS: sum of squares, and MS: mean square.

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 3: Relationship between glossiness and roughness.

After the suitability of the models was confirmed, we next sought the effects of various factors on the responses. The factor with the greatest effect on the responses was detected by analyzing the coefficients of , , and from (1)–(8). Belt speed (meaning contact time between abrasives and strips) clearly had the greatest effect on glossiness and roughness for Adara, Crema Nera, and Sand Wave, but the results for Emperador differed. It can be seen from equations and that the rotational speed of the polishing head (meaning the quantity of contact between abrasive and strip) had the most significant effect for Emperador. This difference is thought to be due to Emperador’s greater initial surface roughness compared with the others. Additionally, to gain a better understanding of the effects of the factors on surface quality responses, 3D response surface plots (Figures 4–9) were prepared by keeping one factor stable while varying the other two.

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 4: 3D surface plots for variations in roughness at different polishing head pressures () and belt speeds () at constant (499.5 rpm) polishing head rotational speed ().

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 5: 3D surface plots for variations in glossiness at different polishing head pressures () and belt speeds () at constant (499.5 rpm) polishing head rotational speed ().

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 6: 3D surface plots for variations in roughness at different polishing head rotational speeds () and belt speeds () at constant (1.25 bar) polishing head pressure ().

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 7: 3D surface plots for variations in glossiness at different polishing head rotational speeds () and belt speeds () at constant (1.25 bar) polishing head pressure ().

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 8: 3D surface plots for variations in roughness at different polishing head rotational speeds () and pressures () at constant (1.48 m/min) belt speed ().

(a) Adara

(b) Emperador

(c) Crema Nera

(d) Sand Wave

Figure 9: 3D surface plots for variations in glossiness at different polishing head rotational speed () and pressure () at constant (1.48 m/min) belt speed ().

3D surface plots for variations in glossiness and roughness at different polishing head pressures and belt speeds at constant polishing head rotational speed are shown in Figures 4 and 5. Minimum roughness and maximum glossiness values were obtained at 2 bar polishing head pressure for Adara, Emperador, and Sand Wave, but the optimal belt speed was 1.23 m/min for Adara (Figures 4(a) and 5(a)) and 0.8 m/min for both Emperador (Figures 4(b) and 5(b)) and Sand Wave (Figures 4(d) and 5(d)). For Crema Nera, the lowest roughness and highest glossiness values were achieved at 0.8 m/min belt speed and 0.65 bar polishing head pressure (Figures 4(c) and 5(c)).

The effects of belt speed and polishing head rotational speed on roughness and glossiness at the central level of polishing head pressure are shown in Figures 6 and 7. At 1.27 m/min and 462.73 rpm, Adara showed maximum glossiness and minimum roughness values (Figures 6(a) and 7(a)). For Emperador, Crema Nera, and Sand Wave, the highest glossiness and lowest roughness values were achieved with 0.8 m/min belt speed and 457.87 (Figures 6(b) and 7(b)), 436.64 (Figures 6(c) and 7(c)), and 409 (Figures 6(d) and 7(d)) rpm polishing head rotational speed, respectively.

The effects of polishing head rotational speed and pressure on glossiness and roughness at the central level of belt speed can be seen in Figures 8 and 9. To obtain the glossiest and smoothest surface, the pressure of the polishing head should be adjusted to a pressure of 2 bar and a rotational speed of 409 (Figures 8(a) and 9(a)), 461.62 (Figures 8(b) and 9(b)), 436.64 (Figures 8(c) and 9(c)), and 409 (Figures 8(d) and 9(d)) rpm for Adara, Emperador, Crema Nera, and Sand Wave, respectively.

Finally the DFA was used for the optimization of the process. Roughness values were minimized and glossiness values were maximized, in order to produce products of desired characteristics. Using the desirability function, roughness and glossiness were combined in one overall response. The results were presented in Table 6 for each marble specimen.

Table 6: Results of desirability function analysis.

Specimen

(m/min)

(bar)

(rpm)
Roughness (µm)
Glossiness (%)
Desirability

Adara
1.43
1.99
430.24
0.024353
98.5184
1

1.42
1.91
456.94
0.026821
97.2577
1

1.27
1.87
445.78
0.025516
97.6224
1

1.14
1.91
472.54
0.026655
97.2
1

1.51
1.99
452.32
0.02663
97.6163
1

1.21
1.97
466.55
0.024925
98.0937
1

1.01
1.96
468.01
0.026377
97.2929
1

1.04
1.99
459.93
0.024636
98.1048
1

1.02
1.96
422.37
0.023883
98.4338
1

1.47
1.92
442.5
0.026544
97.4198
1

Emperador
1.47
1.92
442.5
0.026544
97.4198
1

1.05
1.97
495.61
0.057958
88.4581
1

0.87
1.89
490.91
0.054928
89.9367
1

1.06
1.91
490.97
0.058389
88.1515
1

0.88
1.78
466.37
0.055282
89.5013
1

0.96
1.96
413.53
0.057281
89.0539
1

0.93
1.92
488.02
0.05533
89.6604
1

1.06
1.72
464.13
0.059584
87.2984
1

0.99
1.79
480.66
0.058081
88.1641
1

1.23
1.96
460.77
0.059729
87.3387
1

Crema Nera
1.23
1.96
460.77
0.059729
87.3387
1

1.38
1.98
415.76
0.023521
98.9708
1

1.58
1.96
411.99
0.0232711
99.8326
1

1.35
1.93
421.76
0.0239895
98.7389
1

0.80
0.64
527.22
0.0244613
99.4344
0.992986

0.80
0.65
527.65
0.0244622
99.4177
0.992972

0.80
0.69
522.79
0.0244713
99.3755
0.992833

0.80
0.65
526.67
0.0244786
99.4078
0.992722

0.80
0.77
514.46
0.0245365
99.2266
0.991838

0.80
0.78
504.88
0.024713
99.2337
0.989137

Sand Wave
1.32
1.87
412.14
0.03903
95.0687
1

0.82
1.03
421.2
0.039582
96.1216
1

0.81
1.28
442.96
0.039169
95.3551
1

0.81
1.33
451.25
0.040047
94.903
1

0.88
1.9
445.67
0.028955
94.997
1

1.31
1.95
413.04
0.036807
95.1173
1

0.8
0.5
589.77
0.052103
94.5075
0.793667

0.8
0.5
588.93
0.052274
94.4029
0.790065

0.8
1.42
590
0.054404
93.43
0.74378

3.2. Effects of Physicomechanical Properties of Specimen on Surface Quality

To examine the effects of each physicomechanical property on average surface roughness and glossiness values at 1.48 m/min belt speed, 1.25 bar pressure, and 499.5 rpm rotational speed of the polishing head regression analysis was conducted. A linear trend () was observed between porosity and surface quality. By the increase of porosity roughness also increased but glossiness decreased (Figures 10(a) and 10(b)). There was an inverse linear relation between UCS and ITS and roughness (Figures 10(c)–10(e)), but it was vice versa for glossiness (Figures 10(d)–10(f)). The trend coefficients between the UW, BAR, FS, and SH test results and polishing test results were lower than 48% and these values were not enough to claim existence of any relationship.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 10: Physicomechanical properties versus roughness and glossiness.

4. Conclusions

The RSM was shown to be useful for the design of experiments investigating the effects of the three evaluated factors (belt speed, pressure, and rotational speed of the polishing head) on the response parameters (glossiness and roughness). Experimental studies were designed according to the CCI design technique. A quadratic model was found to best fit the experimental data. The models were significant at a 95% confidence level. The factor having the greatest effect on surface quality, as determined by analyzing the coefficients of all factors in the models, was found to be belt speed, that is, contact time between the abrasives and strips, for Adara, Crema Nera, and Sand Wave. However, for Emperador, it was the rotational speed of the polishing head, that is, the quantity of contact between the abrasive and the marble strip. It can be seen from the statistical evaluations that surface quality was affected strongly by porosity and UCS.

This study was performed with a small number of marble types. To enhance the reliability of the results, different types and larger numbers of marbles should be studied.

Competing Interests

The authors declare that they have no competing interests.

References

H. Yavuz, T. Özkahraman, and S. Demirdağ, “Polishing experiments on surface quality of building stone tiles,” Construction and Building Materials, vol. 25, no. 4, pp. 1707–1711, 2011.

S. Gürcan, R. M. Goktan, and A. Yıldız, “Effect of mineralogical and microstructural properties on surface roughness and gloss of some ornamental marbles subjected to polishing process,” X-Ray Spectrometry, vol. 43, no. 2, pp. 70–78, 2014.

M. Erdoğan, “Measurement of polished rock surface brightness by image analysis method,” Engineering Geology, vol. 57, pp. 65–72, 2000.

R. P. Ribeiro, A. B. Paraguassú, and J. E. Rodrigues, “Sawing of blocks of siliceous dimension stone: influence of texture and mineralogy,” Bulletin of Engineering Geology and the Environment, vol. 66, no. 1, pp. 101–107, 2007.

K. Görgülü and A. Ceylanoğlu, “Evaluation of continuous grinding tests on some marble and limestone units with silicon carbide and diamond type abrasives,” Journal of Materials Processing Technology, vol. 204, no. 1–3, pp. 264–268, 2008.

H. Huang, Y. Li, J. Y. Shen, H. M. Zhu, and X. P. Xu, “Micro-structure detection of a glossy granite surface machined by the grinding process,” Journal of Materials Processing Technology, vol. 129, no. 1–3, pp. 403–407, 2002.

M. Ersoy and H. Kose, “The relationship between easiness to polishing and mechanical properties of marbles,” in Proceedings of the National Marble Symposium, pp. 337–349, Afyon, Turkey, 2001, http://www.maden.org.tr/resimler/ekler/e4243f5511fd6ef_ek.pdf.

Z. Karaca, “Relationship between the mechanical properties and the surface roughness of marble,” International Journal of Materials Research, vol. 103, no. 5, pp. 633–637, 2012.

M. Ersoy, L. Yeşilkaya, M. Y. Çelik, and Y. Geçer, “Investigation of the belt conveyor speed effect to the surface quality in marble polishing process,” Journal of Polytechnic, vol. 17, no. 4, pp. 153–160, 2014.

G. E. Box and K. B. Wilson, “On the experimental attainment of optimum conditions,” Journal of the Royal Statistical Society. Series B. Methodological, vol. 13, pp. 1–45, 1951.

NIST/SEMATECH e-Handbook of Statistical Methods, http://www.itl.nist.gov/div898/handbook/10/06/2016