Advances in Materials Science and Engineering
Volume 2016 (2016), Article ID 5962821, 8 pages
http://dx.doi.org/10.1155/2016/5962821

Research Article

The Influence of C₃A Content in Cement on the Chloride Transport

Min Jae Kim, Ki Beom Kim, and Ki Yong Ann

Department of Civil and Environmental Engineering, Hanyang University, Ansan 15588, Republic of Korea

Received 19 May 2016; Revised 29 August 2016; Accepted 6 September 2016

Academic Editor: Antônio G. de Lima

Copyright © 2016 Min Jae Kim et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The present study concerns the influence of C₃A in cement on chloride transport in reinforced concrete. Three modified cement was manufactured in the variation of the C₃A content, ranging from 6.0 and 10.5 up to 16.9%. The setting time of fresh concrete was measured immediately after mixing, together with the temperature at the time of initial set. For properties of hardened concrete in the variation in the C₃A, a development of the compressive strength and chloride permeation were measured using mortar specimens. Simultaneously, chloride binding capacity was measured by the water extraction method. To ensure the influence of pore structure on chloride transport, the pore structure was examined by the mercury intrusion porosimetry. As a result, it was found that an increase in the C₃A content resulted in an increase in chloride binding capacity. However, it seemed that increased binding of chlorides is related to the higher ingress of chlorides, despite denser pore structure. It may be attributed to the higher surface chloride, which could increase the gradient of chloride concentration from the surface, thereby leading to the higher level of chloride profiles. Substantially, the benefit of high C₃A in resisting corrosion, arising from removal of free chlorides in the pore solution, would be offset by increased chloride ingress at a given duration, when it comes to the corrosion-free service life.

1. Introduction

Chloride attack is one of the main causes of deterioration of reinforced concrete structures that is exposed on a marine environment or deicing salts. It is generally believed that steel embedded in concrete maintains a passive film (i.e., -Fe₂O₃) which protects the metal against corrosion due to the high alkalinity of concrete pore solution [1]. However, the passive film would be subsequently destroyed by chloride attack, once chloride ions reach steel. Likewise, to alert the risk of chloride-induced corrosion of steel in concrete, chloride threshold level can be defined as the chloride ion concentration at the depth of the steel which induce a breakdown of passive film and induce corrosion initiation. Consequently, chloride concentration at the depth of the steel is indicative of the corrosion risk and can be represented by different forms [2, 3].

Chloride binding is an interaction between hydration products and chloride ions. In particular, the hydration products of C₃A and C₄AF bind chlorides to form 3CaOAl₂O₃CaCl₂10H₂O (Friedel’s salt) and 3CaOFe₂O₃CaCl₂10H₂O, respectively [4]. It has been conventionally regarded that chloride binding is an important factor in the corrosion of reinforced steel, because it removes chloride ions from the pore solution. There are some literatures concerning the influence of C₃A in cement on chloride binding capacity, depending on the source of chlorides. For example, chlorides in cast were significantly removed or/and bound by C₃A in cement clinker [5, 6]. However, chlorides penetrated from an external source had no benefit of C₃A in being bound in the cement matrix [7].

Besides, binding of chloride ions has been intuitively deemed to impede chloride transport, due to immobilisation of chlorides. Increased chloride binding in a high level C₃A cement would lower chloride transport and thus the corrosion risk. However, the influence of C₃A content on chloride transport has been less experimented, to date. Glass and Buenfeld [8] developed a model to predict the chloride ingress with respect to C₃A content, ranging from 2.0 to 14.0%. Their calculation and modeling showed that an increase in C₃A content resulted in a decrease in the penetration of free chlorides, assuming that the pore structure is given (i.e., identical pore distribution). Thus, to ensure the C₃A influence on chloride transport, a well-arranged experiment set is required.

The present study concerns the influence of C₃A content on chloride transport. In fact, the C₃A content in cement is often limited by guidelines and standards due to heat generation in hydration. However, to secure the variation in the chloride binding capacity, a wide range of C₃A was selected in this study. Tests for fundamental properties, including compressive strength, setting time, and chloride profile, were conducted with cement containing different level of C₃A. Chloride binding capacity test was carried out to determine the chemical effect of C₃A. Simultaneously, the pore structure was analyzed by using mercury intrusion porosimetry to identify the role of C₃A in transport of chloride ions.

2. Experimental Works

2.1. Strength and Setting Time

Portland cement containing four different levels of C₃A in the clinker was manufactured by modifying Al₂O₃ and Fe₂O₃ in oxides, as given in Table 1. For a development of the compressive strength for hardened mortar, cylindrical mortar specimens (Ø100 × 200 mm) were cast; the mix ratio of the Portland cement, water, and sand (Grade M) was 1.00 : 0.40 : 2.52. After casting, the mortar specimens were cured in a wet chamber at 20 ± 2°C and subsequently measured at 7, 28, and 56 days.

Table 1: Oxide composition of Portland cement determined by XRF (%).

CaO
SiO₂
Al₂O₃
SO₃
Fe₂O₃

C₃A: 6.0%
70.3
17.4
4.0
4.2
4.1

C₃A: 10.5%
64.2
20.1
6.0
2.0
3.2

C₃A: 16.9%
62.8
19.3
8.3
1.9
3.0

Setting time was determined by the penetration resistance of fresh mortar. Standard needles (645, 312, 161, 65, 32, and 16 mm² of the area of the needles in a circular shape) were used to measure the penetration resistance at regular time intervals, since the casting of mortar has been finished immediately. After obtaining the relation of the penetration resistance with time, the initial and final set were determined; the initial and final setting time were taken as the time of penetration resistance reaching 3.4 and 27.5 MPa, respectively. Also, the temperature of fresh concrete was measured at the time of initial set by a thermocouple.

2.2. Chloride Profiling

Mortar discs (Ø100 × 50 mm) were cast and cured in a wet chamber for 56 days to secure a hydration degree enough to gain the strength, of which all the surfaces were subsequently coated by a polymer-based resin except one surface for one-dimensional chloride penetration. After immersing the specimens in a 4.0 M NaCl solution for 100 days at 20 ± 2°C, the profile of free chloride in mortars was achieved by grinding the surface with 5 mm increments. Free chloride contents in each sample were measured by the water extraction method in 50°C deionized water, followed by the potentiometric titration against silver nitrite. By substituting the measured chloride concentration with error function solution from Fick’s second law, an apparent diffusion coefficient and the surface chloride concentration were determined as follows:

where, is chloride concentration at depth after time (%/m³), is surface chloride concentration (%/m³),  is depth (mm),  is apparent diffusion coefficient (m²/s), and  is time of exposure (s).

2.3. Chloride Binding Capacity

Cement pastes were cast in a 50 mm cube mould at 0.4 of a free W/C, containing eight levels of chlorides: 0, 0.2, 0.5, 1.0, 1.5, 2.0, 2.5, and 3.0% weight by cement. The specimens were cured for 56 days by wrapping in a polythene film to prevent a leaching-out of ions from the cement paste, which would otherwise occur in a wet curing. Then, the specimens were dried in oven at 50°C for 24 hours, ground/crushed in a mill, and then passed through a 300 μm sieve to collect dust samples. The dust samples were diluted in 50 ml of distilled water at 50°C and stirred for 5 min. Then a further 30 min of standing was applied to reach a chemical equivalent, followed by being filtered out by filter papers to obtain a solution containing chlorides then to determine the concentration of water-soluble chloride in each sample, as being regarded as free one. Once free chloride content was determined at a given total, the relation between free and bound chloride was achieved in terms of the binding isotherm : the concentration of bound chloride was defined as the concentration of chlorides subtracted free from the total one.

To ensure chemical byproducts (i.e., Friedel’s salt) after the reaction of chlorides in the cement matrix, the XRD analysis was simultaneously performed. Ground cement paste containing 1.0% chloride was used representatively. The D/MAX-2500 model was employed and the diffraction pattern was performed in the range of 6–60° (2θ) at 0.1°/sec scanning rate for a 30 kV voltage.

2.4. Examination of Pore Structure

To verify the distribution of pores with the content of C₃A, the porosity of mortars containing different levels of C₃A was measured by the mercury intrusion porosimetry. To remove the pore solution remaining in mortar, the mortar sample was dried in oven at 50°C and immersed in acetone. Then, the mortar fragment obtained from the middle of the specimen was placed in a vacuum chamber to evacuate up to about 50 μm mercury (Hg). The low pressure was generated to 0.21 MPa by nitrogen gas, and then the pressure was gradually increased to 117.21 × 103 MPa at the rate of 9.1 × 103 kPa/s. The pore diameter at a given pressure was calculated by the Washburn equation as given in (2). Then, the pore volume distribution versus pore diameter was achieved in an accumulated curve.

where is pore diameter (m), is surface tension (N), is contact angle (°), and is pressure (MPa).

3. Results

3.1. Fundamental Properties

A development of the compressive strength for mortars containing different C₃A content in Portland cement was measured at 7, 28, and 56 days, as given in Figure 1. As expected, all the compressive strength increased with time, irrespective of C₃A content. It is evident that the rate of strength development is strongly dependent on the C₃A content in cement; an increase in the C₃A content resulted in an increase in the compressive strength at all ages. In particular, the mortar specimen containing 16.9% of C₃A in cement clinker indicated a quite high strength at an early age, of which the value accounted for about 36.7 MPa at 7 days. However, at exceeding 28 days, the compressive strength was present in the range of 39.0–41.3 MPa, as being in a small increase. In turn, the mortar specimen with the lowest C₃A content in cement imposed the lowest strength, which exceeded, however, 30.7 MPa at 7 days and then reached 36.3 MPa at 56 days. The influence of C₃A content on the strength at an early age may be attributed to the set of C₃A into the form of insoluble calcium sulfoaluminate (3CaOAl₂O₃3CaSO₄31H₂O). In fact, the strength at an early age is mostly equivalent to the strength of C₃A rather than silicates (C₃S, C₂S), which would be subsequently raised by activated silicate crystal lattice in the presence of Al₂O₃ [9].

Figure 1: Development of compressive strength of mortar at different C₃A content in cement.

The influence of C₃A on setting and hardening of fresh concrete is very crucial. As seen in Figure 2, the penetration resistance of fresh mortar obtained immediately after casting was strongly dependent on the C₃A content in cement clinker; an increase in the C₃A in cement resulted in a rapid hardening. For example, the fresh mortar specimen containing 16.9% of C₃A was hardened at 78 min for the initial set and 202 min for the final, while mortar containing 6.0% of C₃A indicated 254 min and 434 min of the initial and final sets, respectively. Apart from C₃S, significantly attributed to early setting and hardening as well, C₃A imposes the formation of AFt phases at fresh state, leading to a rapid hardening of Portland cement [10]. Substantially, the accelerated hardening of cement paste arising from the higher C₃A may accompany a rapid development of the strength. However, at a value only exceeding about 10.5% of C₃A, a rapid set was observed; at 10.5 and 6.0% of C₃A in cement clinker there was only a marginal difference in the setting time of fresh concrete. It is notable that the heat generation in hydration of fresh concrete was strongly dependent on C₃A content. At 16.9% of C₃A, the temperature at the initial set accounted for 87°C, while other level of C₃A produced a lower temperature, ranging about 63-64°C. This may arise from a rapid setting and hardening of fresh concrete, leading to densifying the cement matrix.

Figure 2: Setting time of different C₃A containing binder measured by penetration resistance of fresh concrete (initial set: 3.43 MPa; final set: 27.46 MPa).

3.2. Chloride Transport

Figure 3 shows chloride profiles for the mortar exposed to a 4.0 M NaCl solution for 100 days, measured in water- and acid-soluble concentrations (i.e., mostly identical to the free and total concentration of chlorides) at each depth with increments of 2.0 mm. Then, the apparent diffusion coefficient of chlorides in mortar was calculated by Fick’s second law. It is evident that an increase in the C₃A content resulted in an increase in the ingress of chloride at every depth, presumably implying that increased chloride binding capacity in terms of the C₃A content may accelerate the rate of chloride transport at a given exposure condition. In particular, the surface chloride concentration was strongly related to the C₃A content in cement clinker, at a lower C₃A content; for example 6.0% of the C₃A indicated 0.96 and 1.85% of the surface chloride at water- and acid-soluble chlorides, respectively. At 16.9% of the C₃A content, the surface chloride was dramatically increased up to 2.14 and 3.64% at water- and acid-soluble chlorides, respectively. It may be attributed to the chemical balance at chlorides in the vicinity of the interfacial region between concrete and water-based media (salt solution). As the higher C₃A content imposes the increased binding of chloride ions on the surface of concrete, more chlorides would percolate to meet the equilibrium of chloride gradient. Thus, the mobility of chlorides would increase with the chloride binding capacity so that more free chlorides could be accumulated on the surface of concrete, thereby increasing substantially both the free and bound chlorides.

(a)

(b)

(c)

Figure 3: Chloride profiles for mortar with different C₃A content after 100 days of exposure to 4.0 M NaCl solution.

The diffusivity of chloride ions in concrete was strongly affected and, in fact, increased by the C₃A content. For both water- and acid-soluble chlorides, the apparent diffusion coefficient for 6.0% of the C₃A content was ranked at the lowest range, accounting for 5.22 × 10⁻¹² and 5.81 × 10⁻¹² m²/s, respectively. At exceeding 10.5% of the C₃A content, however, the apparent diffusion coefficient was not much affected, indicating about 6.32 × 10⁻¹² and 9.66 × 10⁻¹² m²/s for water- and acid-soluble chlorides, respectively. The influence of C₃A content on the chloride diffusivity in concrete may be ascribed to either the pore structure or chloride binding capacity. The C₃A content governs the hydration process and rate, which would subsequently modify the pore distribution, in particular, capillary pores. At the high C₃A content, hydration and hardening may be accelerated at an early age then to densify the pore structure, as long as hydration heat is restricted to the range of no generation of thermal crack. Otherwise, increased chloride binding capacity, arising from the higher C₃A content, would enhance the gradient of chloride concentration at depths, thereby leading to an increase in the rate of chloride transport in a diffusion-driven environment.

3.3. Chloride Binding Capacity and XRD Analysis

Chloride binding capacity, defined by the ratio of content of bound to free chloride, at different C₃A contents in cement clinker was described by the Langmuir isotherm, as given in Figure 4. The cement paste containing chlorides ranging from 0.0 to 3.0% by weight of cement was cured for 56 days and then water- and acid-soluble chloride concentrations in the paste were measured by the titration method against silver nitrate. As expected, an increase in the C₃A content results in an increase in the binding capacity at a given chloride concentration in cast. However, the chloride binding capacity was not proportionally increased to the C₃A content, because the contribution of C₃A in reacting with chlorides is limited. In fact, there are other hydration phases reacting with chloride ions to immobilize them, such as C₄AF, precipitated Ca(OH)₂, and C-S-H gel. Chlorides chemically reacted with hydrations (C₃A, C₄AF) are insoluble, immobile in the pore solution after forming Friedel’s salt, which have been therefore regarded as an inhibitive nature with no acidification of the cement matrix. Chloride ions are simultaneously adsorbed on the surface of hydration products such as precipitated Ca(OH)₂, which may be usually water-soluble depending on the temperature, duration of immersion in water, and the fineness of cement paste. To avoid dissolution of adsorbed chloride in the process of titration, the temperature and immersion in water were restricted. Thus, chlorides adsorbed in the hydrations were also taken as bound ones. It is notable that the concentration of bound chloride was rapidly increased up to 1.0% of free chlorides, while the chloride binding capacity was reduced beyond this range; the concentration of bound chloride was marginally increased with free chlorides at a given total, irrespective of the C₃A content. This may be attributed to limited binding capacity of the cement matrix in Portland cement, due to a small margin in the amount of hydration products (i.e., C₃A, C₄AF, precipitated Ca(OH)₂, and C-S-H gel) related to the chemical reaction with chloride ions.

Figure 4: Chloride binding capacity in cement paste at different C₃A content after 56 days of curing with the variation in total chloride in cast.

The XRD curve for pastes containing 1.0% chlorides at different C₃A contents is given in Figure 5. It is evident that the peak intensity and location for hydration products were mostly identical between the three Portland cement, implying that there was marginal difference in forming hydrations: alite, belite, calcite, and portlandite. However, the variation in the peak intensity at 11.2–11.4° of 2θ was observed, where Friedel’s salt is identified. It suggests that the concentration of bound chloride is dependent on the C₃A content: in fact, an increase in the C₃A content resulted in an increase in the intensity of the peak at 11.2–11.4°. Despite limited use of the XRD analysis in a qualitative measurement, the peak intensity may indicate a relative concentration or/and amount of inorganic hydration products between different samples at the same setup of the XRD. Substantially, it can be said that an increase in the C₃A content results in an increase in Friedel’s salt.

(a)

(b)

Figure 5: (a) XRD curves for cement paste with different C₃A content (A: alite, B: belite, C: calcite, and P: portlandite) and (b) Peak intensity for the Friedel’s salt.

3.4. Pore Structure

The pore size distribution of mortar containing different C₃A contents in cement was measured by the MIP, as shown in Figure 6. It was seen that an increase in the C₃A content resulted in a decrease in the total porosities; for example, total pore volume for 6.0, 10.5, and 16.9% of C₃A content accounted for 0.164, 0.143, and 0.119 ml/g, respectively, due to a significant reduction in the large capillary pores, of which the range is equated to 0.1–1.0 µm. The reduction of the pore volume in increased C₃A may be attributed to filler effect of the hydration products. In fact, C₃A and C₄AF generally occupy smaller margin for the pores and moreover the interfacial porous zone within C-S-H gel, while silicates cover up the larger pores, which subsequently form the C-S-H gel at hydration. Moreover, a reduction of the C-S-H gel, presumably due to an overwhelming formation of C₃A, may accompany a further reduction of the gel pores and thus the total pore volume. Apart from the matrix strength, the high C₃A in cement may benefit in raising the compressive strength of concrete by a reduction of pores and porosity in the matrix.

Figure 6: Pore distribution and pore intensity in paste to given pore diameter of each different C₃A containing binder.

4. Discussion

Conventionally, the C₃A content in Portland cement clinker was modified from about 6 to 13% at the manufacturing phase according to the required performance [11, 12]. In Portland cement, C₃A content is controlled by adjusting the contents of Al₂O₃ up to 12-13% in cement. For example, the OPC type III may have 17% of C₃A to accelerate setting and hardening, while type II and type V contain the lower C₃A content to decline the hydration heat during the curing age and prevent sulfate attack, respectively. Moreover, it has an important implication on the role of Al₂O₃ in developing the early strength. At a high level of Al₂O₃ in cement oxides, more C₃A would be present in the clinker then to form calcium sulfoaluminate, thereby leading to a higher strength at an early age. Simultaneously, silicate activation would further enhance the strength of concrete [9]. However, the high C₃A content in cement may impose flash set or thermal cracking.

C₃A may increase the chemical reactivity with chlorides in terms of stabilization of free chlorides into Friedel’s salt, of which the reactivity in turn affects chloride transport, resulting in the formation of further surface chloride. According to Glass and Buenfeld [8], the concentration of chloride in the nearer surface increased with C₃A content but decreased deeper in the concrete. An increase in the surface chloride content would arise from the binding effect, which allows the progressive build-up of higher total chloride content at increasing distances from the concrete surface. Simultaneously, increased C₃A may alternatively govern the gradient of chloride ingress at different depths, rather than pore distribution/network for ionic transport. In the present study, the higher binding capacity, induced by high C₃A content in clinker, leads to a build-up of bound chlorides that increases the surface chloride. Therefore, it can be presumed that the promotion of chloride penetration is affected by the formation of the high gradient of chloride concentration from the surface. Moreover, the hydration process of overwhelmingly increased C₃A may form denser pore structure, especially at pore size exceeding 0.1 μm, leading to a reduction of path for ionic transport. It was found that an increase in C₃A content in cement resulted in a decrease in the total pore volume, which would provide paths of chloride ions to transport. The decrease of large size pore may reduce air void in concrete, which blocks the ionic transport due to the absence of water. Furthermore, the critical path of ionic transport may be shortened by reduction of tortuosity of pore structure. Thus, the increase of C₃A gives rise to a rapid chloride transport by both progressive build-up of chloride from concrete surface and shortening of ionic transport path.

Apart from hydration process, the reactivity of C₃A with chloride ions in the concrete pore solution often forms crystallised salt in terms of Friedel’s salt, which could remove, in fact, chlorides from the pore solution and thus not participate in the corrosion process. Thus, a high concentration of C₃A is regarded as an inhibitive nature against chloride-induced corrosion of steel in concrete. For example, sulfate resisting Portland cement (Type V) with a lower concentration of C₃A, usually ranging within <5.0%, has increased corrosion reactivity; Page et al. [13] showed that the steel in sulfate resisting Portland cement concrete had a very high corrosion current, accounting for several hundred mA/m², while ordinary Portland cement indicated the passivity. Thus, it is advised not to use sulfate resisting Portland cement in a marine environment to avoid unnecessary risk of the steel corrosion. Moreover, in the majority of the previous studies, the benefit of high C₃A cement was confirmed by their lower corrosion rate in a beaker test and in turn a higher chloride threshold level for steel corrosion [14].

5. Conclusion

In this study, the influence of C₃A concentration in cement clinker on development of the compressive strength and chloride transport was investigated. Simultaneously, the pore structure and chloride binding capacity were experimented to explain the rate of chloride transport with C₃A content in cement. The conclusion derived from the experimental study is given as follows:

(1)An increase in the C₃A content in cement resulted in a dramatic decrease in the setting time and an increase in a development of the compressive strength at a given age, presumably due to accelerated hardening process. Simultaneously the temperature of fresh concrete was more or less affected by the content of C₃A. However, no thermal cracking was not observed for all specimens, irrespective of C₃A content.(2)The rate of chloride transport was assessed by an exposure test in terms of diffusion of chloride ions. The ingress of chloride in the higher C₃A concrete was significantly higher in the vicinity of concrete surface, due to increased chloride binding capacity, which would lead to build up of a higher chloride at a given free chloride on the surface. Due to increased chloride ingress, the diffusion coefficient was increased by C₃A, arising from the higher gradient of chloride concentration.(3)However, the higher C₃A in cement may be beneficial in forming denser pore structure. An increase in the C₃A resulted in a decrease in the pore volume. As the hydration of C₃A is related to a formation of expansive ettringite, the higher C₃A in cement substantially produced the denser pore structure.

Competing Interests

The authors declare that they have no competing interests.

Acknowledgments

This research was supported by a grant (15CTAP-C097546-01) from Technology Advancement Research Program funded by Ministry of Land, Infrastructure and Transport of Korean government.

References

C. L. Page, “Mechanism of corrosion protection in reinforced concrete marine structures,” Nature, vol. 258, no. 5535, pp. 514–515, 1975.

K. Y. Ann and H.-W. Song, “Chloride threshold level for corrosion of steel in concrete,” Corrosion Science, vol. 49, no. 11, pp. 4113–4133, 2007.

U. Angst, B. Elsener, C. K. Larsen, and Ø. Vennesland, “Critical chloride content in reinforced concrete-a review,” Cement and Concrete Research, vol. 39, no. 12, pp. 1122–1138, 2009.

P. Lambert, C. L. Page, and N. R. Short, “Pore solution chemistry of the hydrated system tricalcium silicate/sodium chloride/water,” Cement and Concrete Research, vol. 15, no. 4, pp. 675–680, 1985.

Rasheeduzzafar, “Influence of cement composition on concrete durability,” ACI Materials Journal, vol. 89, no. 6, pp. 574–586, 1992.

S. E. Hussain, Rasheeduzzafar, and A. S. Al-Gahtani, “Influence of sulfates on chloride binding in cements,” Cement and Concrete Research, vol. 24, no. 1, pp. 8–24, 1994.

O. Wowra and M. J. Setzer, “Sorption of chlorides on hydrated cements and C₃S pastes,” in Frost Resistance of Concrete: Proceedings of the International RILEM Workshop, pp. 147–153, University of Essen, 1997.

G. K. Glass and N. R. Buenfeld, “The influence of chloride binding on the chloride induced corrosion risk in reinforced concrete,” Corrosion Science, vol. 42, no. 2, pp. 329–344, 2000.

G. Verbeck, “Cement hydration reactions at early ages,” Portland Cement Association, vol. 3, pp. 57–63, 1965.

P. C. Hewlett, Lea's Chemistry of Cement and Concrete, Elsevier, 4th edition, 2013.

ASTM, “Standard specification for portland cement,” ASTM C 150, ASTM International, 2008.

A. M. Nevile, Properties of Concrete, Longman Group, 4th edition, 1995.

C. L. Page, N. R. Short, and W. R. Holden, “The influence of different cements on chloride-induced corrosion of reinforcing steel,” Cement and Concrete Research, vol. 16, no. 1, pp. 79–86, 1986.

S. E. Hussain, Rasheeduzzafar, A. Al-Musallam, and A. S. Al-Gahtani, “Factors affecting threshold chloride for reinforcement corrosion in concrete,” Cement and Concrete Research, vol. 25, no. 7, pp. 1543–1555, 1995.